Canadian Journal of Infectious Diseases and Medical Microbiology
Volume 2019 (2019), Article ID 4164982, 1 page
https://doi.org/10.1155/2019/4164982

Corrigendum

Corrigendum to “Development of IgY-Based Sandwich ELISA as a Robust Tool for Rapid Detection and Discrimination of Toxigenic Vibrio cholera”

Mahdiye Bayat,¹ Alireza Khabiri,² and Behzad Hemati¹

¹Department of Microbiology, Islamic Azad University-Karaj Branch, Karaj 3148635731, Iran
²Diagnostic Biotechnology Unit, Pasteur Institute of Iran, Research and Production Complex, Karaj, Iran

Correspondence should be addressed to Alireza Khabiri; khabiri@pasteur.ac.ir

Received 10 January 2019; Accepted 14 January 2019; Published 4 March 2019

Copyright © 2019 Mahdiye Bayat et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Development of IgY-Based Sandwich ELISA as a Robust Tool for Rapid Detection and Discrimination of Toxigenic Vibrio cholera” [1], the affiliation of the first author should be “Department of Microbiology, Islamic Azad University-Karaj Branch, Karaj 3148635731, Iran” only. The updated authors’ list and affiliations are shown above.

References

M. Bayat, A. Khabiri, and B. Hemati, “Development of IgY-based sandwich ELISA as a robust tool for rapid detection and discrimination of toxigenic Vibrio cholerae,” Canadian Journal of Infectious Diseases and Medical Microbiology, vol. 2018, Article ID 4032531, 9 pages, 2018.