Canadian Journal of Infectious Diseases and Medical Microbiology
Volume 2019 (2019), Article ID 9083980, 1 page
https://doi.org/10.1155/2019/9083980

Corrigendum

Corrigendum to “Development of New Tools to Detect Colistin-Resistance among Enterobacteriaceae Strains”

Lucie Bardet and Jean-Marc Rolain

Aix-Marseille Université, IRD, AP-HM, MEPHI, IHU-Méditerranée Infection, Marseille, France

Correspondence should be addressed to Jean-Marc Rolain; jean-marc.rolain@univ-amu.fr

Received 10 January 2019; Accepted 13 January 2019; Published 7 May 2019

Copyright © 2019 Lucie Bardet and Jean-Marc Rolain. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Development of New Tools to Detect Colistin-Resistance among Enterobacteriaceae Strains” [1], there was an error in the text of the Selective Culture Media section, where the sentence “The chromogenic and nonselective CHROMagar Orientation medium (Biomérieux, Marcy l’Étoile, France) was also used with 4 mg/ml of colistin” should be corrected to “The chromogenic and nonselective CHROMagar™ Orientation Medium (CHROMagar, Paris, France) was also used with 4 mg/ml of colistin.”

References

L. Bardet and J.-M. Rolain, “Development of new tools to detect colistin-resistance among Enterobacteriaceae strains,” Canadian Journal of Infectious Diseases and Medical Microbiology, vol. 2018, Article ID 3095249, 25 pages, 2018.