Contrast Media & Molecular Imaging
Volume 2017 (2017), Article ID 4896310, 8 pages
https://doi.org/10.1155/2017/4896310

Research Article

Fluorine-19 Magnetic Resonance Imaging and Positron Emission Tomography of Tumor-Associated Macrophages and Tumor Metabolism

Soo Hyun Shin,¹ Sang Hyun Park,¹ Se Hun Kang,² Seung Won Kim,¹ Minsun Kim,¹ and Daehong Kim¹

¹Molecular Imaging Branch, Division of Convergence Technology, National Cancer Center, Ilsanro-ro 323, Ilsandong-gu, Goyang 10408, Republic of Korea
²Animal Molecular Imaging Unit, Research Institute, National Cancer Center, Ilsanro-ro 323, Ilsandong-gu, Goyang 10408, Republic of Korea

Correspondence should be addressed to Daehong Kim; dkim@ncc.re.kr

Received 22 July 2017; Revised 31 October 2017; Accepted 14 November 2017; Published 5 December 2017

Academic Editor: Sundaresan Gobalakrishnan

Copyright © 2017 Soo Hyun Shin et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

The presence of tumor-associated macrophages (TAMs) is significantly associated with poor prognosis of tumors. Currently, magnetic resonance imaging- (MRI-) based TAM imaging methods that use nanoparticles such as superparamagnetic iron oxide and perfluorocarbon nanoemulsions are available for quantitative monitoring of TAM burden in tumors. However, whether MRI-based measurements of TAMs can be used as prognostic markers has not been evaluated yet. In this study, we used positron emission tomography (PET) with ¹⁸F-2-fluoro-2-deoxy-D-glucose (¹⁸F-FDG) as a radioactive tracer and fluorine-19- (¹⁹F-) MRI for imaging mouse breast cancer models to determine any association between TAM infiltration and tumor metabolism. Perfluorocarbon nanoemulsions were intravenously administered to track and quantify TAM infiltration using a 7T MR scanner. To analyze glucose uptake in tumors, 18F-FDG-PET images were acquired immediately after ¹⁹F-MRI. Coregistered ¹⁸F-FDG-PET and ¹⁹F-MR images enabled comparison of spatial patterns of glucose uptake and TAM distribution in tumors. ¹⁹F-MR signal intensities from tumors exhibited a strong inverse correlation with ¹⁸F-FDG uptake while having a significant positive correlation with tumor growth from days 2 to 7. These results show that combination of ¹⁹F-MRI and ¹⁸F-FDG-PET can improve our understanding of the relationship between TAM and tumor microenvironment.

1. Introduction

Many types of tumors with poor prognosis are characterized by dense infiltration of tumor-associated macrophages (TAMs) [1–3]. Crosstalk between TAMs and tumor cells through anti-inflammatory cytokines such as interleukin-10 contributes to various aspects of tumor progression by activities such as promoting tumor angiogenesis [4–6], supporting destruction of basal extracellular matrix [7, 8], and facilitating metastasis [9]. Thus, TAMs have been drawing attention as key diagnostic, prognostic, and therapeutic targets for characterization and treatment of tumors [10–12].

Several imaging methods have been developed for noninvasive analysis of distribution and quantification of TAMs in tumors. One of these methods is the nanoparticle-based magnetic resonance imaging (MRI) cell-tracking method, which exploits the high phagocytic activity of macrophages to passively label them with nanoparticles through intravenous administration. Superparamagnetic iron oxide (SPIO) nanoparticles and perfluorocarbon (PFC) nanoemulsions are widely used as TAM-labeling contrast agents. With SPIO nanoparticles, TAMs are visualized as hypointense spots on T2-weighted MR images. These nanoparticles have a high potential for clinical translation owing to their approval by the Food and Drug Administration (e.g., Feraheme) [13, 14]. Upon fluorination with PFC nanoemulsions, TAMs are visualized as “hot spots” by fluorine-19- (¹⁹F-) MRI [15–18]. Because of the lack of ¹⁹F atoms in biological tissues, ¹⁹F-MRI confirms the presence of TAMs once ¹⁹F signals are detected; it also enables a simple quantification process, because the number of ¹⁹F spins is linearly correlated with the corresponding MR signal intensity.

While both SPIO and PFC have been shown to be effective for monitoring and quantifying TAMs, whether TAM burden quantified through these nanoparticle-based methods is associated with tumor development has yet to be examined. To investigate the prognostic implications of MRI-based TAM monitoring, another imaging modality designed for observing tumor behavior may be concurrently used, along with histopathological analysis. We hypothesized that positron emission tomography (PET) with ¹⁸F-2-fluoro-2-deoxy-D-glucose (¹⁸F-FDG) as a radioactive tracer can serve such a purpose, since it is widely practiced as a clinical routine for staging tumor malignancy through measurement of tumor glucose uptake [19]. Simultaneous MRI tracking of TAMs and ¹⁸F-FDG-PET imaging of tumor metabolism might help determine the prognostic potential of MRI-based TAM tracking and provide new insights to understanding tumor physiology.

Here, we report the preliminary results from combining ¹⁹F-MRI and ¹⁸F-FDG-PET for monitoring TAM infiltration and tumor metabolism. The feasibility of spatial correlation of TAM distribution and glucose metabolism patterns was investigated, and significant correlations were observed between ¹⁹F-MR signal intensity and PET parameters. Overall, we demonstrate that combination of ¹⁹F-MR-based TAM tracking and ¹⁸F-FDG-PET imaging could provide opportunities for noninvasive yet precise profiling of tumor microenvironment and behavior.

2. Materials and Methods

2.1. Preparation of PFC Emulsion

PFC nanoemulsions were synthesized in accordance with a previous protocol, with a minor modification [20]. Lutrol F68 (60 mg/mL; BASF, Ludwigshafen, Germany) was dissolved in phosphate buffered saline (PBS; Gibco, Waltham, MA). Perfluoro-15-crown-5-ether (60% w/v; Oakwood Chemicals, Estill, SC) was thoroughly mixed into this solution using a micromixer. The mixture was emulsified by sonication in ice-cold water in a pulsed mode (2 s run and 2 s off) at 1.5 W for 10 min using a sonicator (Sonicator 3000; Misonix, Farmingdale, NY). In the last 2-3 cycles of sonication, 1,1′-dioctadecyl-3,3,3′3′-tetramethylindocarbocyanine perchlorate (DiI; 4 μl/mL; Molecular Probes, Eugene, OR) was added for fluorescence. The resultant emulsions were then filter-sterilized through 0.45 and 0.2 μm filters (Sartorius Stedim, Aubagne, France) and stored at 4°C until use. The size and polydispersity index of the PFC nanoemulsions were determined to be 160 nm and 0.08, respectively, using dynamic light scattering (Malvern Zetasizer, Worcestershire, UK).

2.2. Animal Models

All animal experiments were performed in accordance with the guidelines of the Institutional Animal Care and Use Committee (approval number, NCC-15-249) of the National Cancer Center, Korea. 4T1 mouse breast cancer cells (American Type Culture Collection, Manassas, VA) were cultured in Roswell Park Memorial Institute-1640 medium (Hyclone, Logan, UT) supplemented with 10% fetal bovine serum (Cellgro, Tewksbury, MA) and 1% antibiotic solution (Gibco) at 37°C in a 5%-CO₂ incubator. For establishing a 4T1-tumor model, 5 × 10⁵ cells were suspended in 100 μl of 5 mg/mL Matrigel (Corning, Corning, NY) and subcutaneously injected into the left and right flanks of 6-week-old female Balb/c mice (Japan SLC, Hamamatsu, Japan). Tumors (n = 16) were grown until they reached a size of 50–100 mm³. The mice were intravenously given 200 μl of the PFC nanoemulsions 48 h before the first MRI and ¹⁸F-FDG-PET scan.

2.3. In Vivo MRI

MR images were acquired using a 7T scanner (BioSpec 70/20 USR; Bruker, Billerica MA) and a custom-made ¹H/¹⁹F-double-tune 35 mm volume coil. A custom-built animal bed was used for transferring mice to the PET scanner without altering their posture. The mice were sedated with 2% isoflurane in 100% oxygen, and their respiration rates were monitored during imaging. Anatomical proton MR images were acquired using the rapid acquisition with relaxation enhancement (RARE) sequence. T2-weighted images were acquired with the following parameters: repetition time (TR), 2600 ms; echo time (TE), 30 ms; slice thickness (ST), 1 mm; RARE factor, 4; number of acquisitions (NA), 2; matrix size, 256 × 192; and field of view (FOV), 3.5 × 2.5 cm. For ¹⁹F image acquisition, the fast low angle shot sequence was used with the following parameters: TR, 100 ms; TE, 2.5 ms; ST, 2 mm; NA, 256; receiver bandwidth, 25 kHz; FOV, 3.5 cm × 2.5 cm; and matrix size, 64 × 48. A reference tube containing 6 mg/mL PFC nanoemulsions entrapped in acrylamide gel was placed next to the mice for tumor signal normalization. The mice were imaged 2 (day 2) and 7 (day 7) days after administration of the PFC nanoemulsions. ¹⁹F-MR images were acquired only on day 2.

2.4. PET/CT and Image Analysis

In order to maintain the orientation of the mice, PET/CT images were acquired immediately after MRI. The mice were fasted for 6 h before PET/CT. They were anesthetized with 2% isoflurane in 100% oxygen. Body temperature was maintained throughout the imaging procedure using a heating lamp and pad. ¹⁸F-FDG was prepared by an automated module (NEPTIS® Nx3 system, ORA, Philippeville, Belgium) using fluoride-18 generated by our on-site cyclotron (RDS-111, Siemens, Munich, Germany). The mice were intravenously injected with 18.5 MBq of ¹⁸F-FDG 40 min before PET. PET-CT fusion images were acquired through a three-dimensional acquisition mode (eXplore VistaCT, GE, Fairfield, CT) using the following X-ray parameters for CT: 250 μA tube current and 40 kV voltage for 6 min; resolution, 200 μm; and number of projections, 360. For PET images, the mice passed through the 6 cm diameter × 4.6 cm deep FOV of PET detector, and the voxel size of the reconstructed images was 0.3875 × 0.3875 × 0.775 mm. The images were acquired for 9 minutes per bed position and reconstructed by iterative reconstruction using the two-dimensional ordered subset expectation maximization method (32 subsets, 2 iterations). Normalization and scatter and attenuation correction were also applied for PET images. The images were normalized to standardized uptake values (SUVs) using the following formula: SUV = decay-corrected mean tissue activity concentration (Bq/ml)/[injected dose (Bq)/body weight (g)]. was measured as the maximum SUV in a given region of interest. Percentage injected dose per gram tissue (% ID/g) was calculated as follows: [mean tumor activity concentration (Bq/ml)/(injected dose (Bq) × density of a tumor (g/ml))] × 100%. All image analyses were performed using the OsiriX imaging software (Pixmeo SARL, Bernex, Switzerland).

2.5. Histological Examination and Immunofluorescence Staining

The mice were euthanized upon completion of imaging experiments. Tumors were excised, fixed in 4% paraformaldehyde (Sigma Aldrich, St. Louis, MO) for 24 h, embedded in paraffin blocks, and cut into 4 μm thick sections for hematoxylin and eosin (H&E) staining. The H&E-stained sections were imaged using the Aperio Scan Scope XT system (Leica Biosystems, Heidelerg, Germany) at 200x magnification.

For immunofluorescence staining, the fixed tumors were frozen in the optimal cutting temperature compound at −80°C and cut into 6 μm thick sections using a Cryotome. Fluorescein isothiocyanate- (FITC-) conjugated rat anti-mouse F4/80 antibody (AbCam, Cambridge, MA) was used for staining macrophages. The stained sections were observed with a fluorescence microscope (Axio Obsever.Z1, Zeiss, Germany).

2.6. Statistical Analysis

All statistical data were analyzed using GraphPad Prism 5 (GraphPad Software, La Jolla, CA). Correlations among ¹⁹F-MRI signal intensities, tumor volume, and PET parameters (including SUV, , and percentage injected dose per gram tissue [% ID/g]) were analyzed by Pearson’s correlation coefficient analysis. Absolute correlation coefficients ≥ 0.5 were considered as indicating strong correlation [21]. A value < 0.05 was considered to be statistically significant.

3. Results and Discussion

¹⁹F-MRI and ¹⁸F-FDG-PET images were first acquired 2 days after administration of PFC nanoemulsions (Figure 1). ¹⁹F-MR signals were detected not only from tumors but also from naturally macrophage-rich tissues such as the spleen and bone marrow (Figure 1(b)). Coregistration of proton MR images and their corresponding PET images demonstrated tumor glucose metabolism in the same slices in which TAMs were visualized in ¹⁹F-MR images (Figure 1(d)). While ¹⁸F-FDG-PET signals appeared to be homogeneously distributed in tumors, ¹⁹F signals exhibited relatively heterogeneous intratumoral distribution, with higher signals emanating from the periphery of tumors. This difference in spatial distribution was further highlighted by the histogram findings, which revealed different frequency distributions of ¹⁹F signals and consistent SUV distribution between the left and right tumors (Figures 1(c) and 1(e)).

(a)

(b)

(c)

(d)

(e)

Figure 1: In vivoF-MRI and PET and histogram analysis on day 2. (a) Serial ¹H MR image slices with tumors indicated with dotted white circles. The last slice in yellow box is the slice that is coregistered with corresponding ¹⁹F-MR image and ¹⁸F-FDG-PET image in (b) and (d), respectively. (b) Superimposition of an anatomical proton MR image and its corresponding ¹⁹F-MR image. ¹⁹F signals are detected not only from tumors, but also from the bone marrow, the spleen, and a reference tube placed on the right side of the mouse. (c) Histogram of ¹⁹F pixel intensities from left and right tumors. Blue and red are from left (blue asterisk) and right (red asterisk) tumors in (b). (d) Coregistration of the same anatomical MR image as that used in image A and its corresponding ¹⁸F-FDG-PET image. (e) Histogram of PET SUV from left and right tumors. Blue and red are from left (blue asterisk) and right (red asterisk) tumors in (d). ¹⁹F, fluorine-19; MRI, magnetic resonance imaging; PET, positron emission tomography; 2-FDG, fluoro-2-deoxy-D-glucose; SUV, standardized uptake value.

Proton MRI and ¹⁸F-FDG-PET were repeated on day 7, and the imaging data were coregistered (Figure 2). In PET images, SUV hypointensities were observed at the centers of tumors, which corresponded to hyperintense signals observed in T2-weighted MR images (Figures 2(b) and 2(c)). Considering a previous study that reported an association between necrosis and high-intensity signals on T2-weighted MR images [22], it is likely that the colocalization of low SUVs and hyperintense T2-weighted MR signals observed in the present study represents the formation a necrotic core. This possibility was further supported by the histological findings, which revealed hypocellularity at the center of tumor sections and intact cell morphology at the periphery (Figures 2(d)–2(f)).

(a)

(b)

(c)

(d)

(e)

(f)

Figure 2: PET-MRI and histological findings on day 7. (a) Axial MR image of a mouse and (b) the corresponding PET image were merged. (c) The coregistered MR-PET image shows overlapping of low SUV regions and high MR signal regions in tumors (white arrow in (b) and (c)). (d) Overview of an H&E-stained section of a tumor excised after PET-MRI (scale bar: 2 mm). (e) High-magnification view of the central region of the H&E-stained section (indicated by a yellow box in (d); scale bar: 100 μm); fragmented nuclei and disrupted cell morphology are observed, along with hypocellularity. (f) High-magnification view of the peripheral region of the tumor (white box in (d); scale bar: 100 μm); cell morphology and nuclei are intact, while the cells are densely packed. PET, positron emission tomography; MRI, magnetic resonance imaging; SUV, standardized uptake value; H&E, hematoxylin and eosin.

The findings of immunofluorescence staining—performed to confirm that the ¹⁹F-MR signals represent TAMs—demonstrated the colocalization of DiI with PFC nanoemulsions and F4/80-positive cells (Figure 3). While significant proportions of TAMs were labeled with PFC nanoemulsions, unlabeled TAMs were also detected (Figure 3(c)). This partial labeling of TAMs is consistent with the findings of previous studies [17, 23]. Further studies are needed to identify methods for achieving full saturation of endogenous macrophages with PFC nanoemulsions for more accurate quantification of TAMs.

(a)

(b)

(c)

Figure 3: Immunofluorescence staining of TAMs reveals colocalization of TAMs and PFC nanoemulsions (scale bar: 50 μm). (a) DiI on PFC nanoemulsions. (b) FITC on F4/80 antibodies. (c) Merged images of DAPI, DiI, and FITC staining showing colocalization of TAMs and PFC nanoemulsions (yellow); TAMs that are not labeled with PFC nanoemulsions are also observed (green). TAM, tumor-associated macrophage; PFC, perfluorocarbon; DiI, 1,1′-dioctadecyl-3,3,3′3′-tetramethylindocarbocyanine perchlorate; FITC, fluorescein isothiocyanate; DAPI, 4′,6-diamidino-2-phenylindole.

¹⁹F-MR signal intensities from tumors measured on day 2 were correlated with tumor volume and various PET parameters (Table 1). Tumor ¹⁹F-MR signal intensities measured on day 2 exhibited significantly strong correlations with tumor volume measured on day 7 ( = 0.626; < 0.01) and tumor growth between days 2 and 7 ( = 0.624; < 0.01; Figures 4(a) and 4(d)). All PET parameters measured on day 7 exhibited strong negative correlations with ¹⁹F-MR signal intensities measured on day 2 (SUV: = −0.666, < 0.005; % ID/g: = −0.681, < 0.005; and : = −0.663, < 0.01; Figures 4(b), 4(c), and 4(e)). Changes in PET parameters over time were also correlated with ¹⁹F-MR signal intensity in a similar manner as the measurements on day 7—changes in SUV ( = −0.519, < 0.05) and % ID/g ( = −0.510, < 0.05) exhibited strong negative correlations (Figure 4(f)) with ¹⁹F-MR signal intensity. There was no correlation between ¹⁹F-MR signal intensity and any of the measurements recorded on day 2 or change in ( < 0.2, > 0.5).

Table 1: Correlation of ¹⁹F signal on day 2 with tumor volume, PET parameters, and their changes over time.

Parameters
r
p

Δ(day 7 − day 2)

    Tumor volume
0.6242
0.0098

    SUV

0.0393

0.5004

    % ID/g

0.0437

Day 2

    Tumor volume

0.533

    SUV
0.155
0.567

0.547

    % ID/g
0.1269
0.6396

Day 7

    Tumor volume
0.626
0.0096

    SUV

0.0049

0.0051

    % ID/g

0.0037

PET, positron emission tomography; SUV, standardized uptake value; , maximum SUV; % ID/g, percentage injected dose per gram tissue.

(a)

(b)

(c)

(d)

(e)

(f)

Figure 4: Correlation of ¹⁹F-MR signal intensity with tumor growth and PET parameters. (a) Tumor volume, (b) SUV, and (c) % ID/g measured on day 7 as functions of ¹⁹F-MR signal intensities measured on day 2. (d) Change in tumor growth from day 2 to day 7, (e) measured on day 7, and (f) change in % ID/g from day 2 to day 7 as functions of ¹⁹F-MR signal intensities measured on day 2. ¹⁹F, fluorine-19; MR, magnetic resonance; PET, positron emission tomography; SUV, standardized uptake value; % ID/g, percentage injected dose per gram tissue; , maximum SUV.

Considering the protumoral activities of TAMs, we initially hypothesized that ¹⁹F-MR signal intensity would be positively correlated with all of the parameters evaluated in the present study. While the positive correlation of ¹⁹F-MR signal intensity with tumor volume and growth can be explained by the effects of TAMs on tumor development, the negative correlation between ¹⁹F-MR signal intensity and PET measurements recorded on day 7, which often serve as indicators of tumor malignancy, seem to be paradoxical. A possible explanation for this inverse correlation is the decrease in average tumor metabolism due to the formation of the necrotic core, which was observed in PET/MR images acquired on day 7 as well as in histological specimens (Figure 2). It is widely known that aggressive tumors often outgrow their blood supply, upon which their central regions are exposed to chronic ischemia, which ultimately leads to necrosis. In breast cancer, formation of such necrotic cores is associated with an accelerated clinical course and poor prognosis [24, 25]. Similarly, the formation of necrotic zones in breast tumor models used in this study—visualized as decreased ¹⁸F-FDG uptake at the center of tumors—might represent the aggressiveness and malignancy of tumors. To investigate this possibility, tumor models with the same genetic background but different degrees of malignancies should be evaluated by imaging along with rigorous histopathological analysis.

The lack of correlation between ¹⁹F-MR signal intensity and PET parameters measured on day 2 should also be noted. A previous histopathological study had reported that immune-cell infiltration and ¹⁸F-FDG-PET SUV are not significantly correlated [26]. Nevertheless, there is a possibility that varying the timing of monitoring will generate different results. Using both SPIO and PFC labeling, Makela et al. showed that distribution of TAMs varies significantly on the basis of tumor size at the time of monitoring [17]. Future studies should evaluate whether the characteristics of TAMs, too, change along with their intratumoral distribution over time. It should also be determined if any correlation exists between ¹⁹F-MR signal intensity and PET parameters concurrently measured at a later time point in tumor growth.

The combination of proton MRI and PET has been widely studied, with the aim of gaining a comprehensive understanding of tumor physiology and differentiating tumor subtypes by monitoring various aspects of the tumor microenvironment [27]. Several MR parametric methods, such as chemical exchange saturation transfer imaging, dynamic contrast enhanced MRI, and apparent diffusion coefficient mapping, have been used for measuring tumor acidosis, perfusion, and necrosis [28–30]. In terms of ¹⁸F-FDG-PET, a myriad of analytic approaches, including texture analysis, are being studied for better assessment of glucose metabolism patterns and enhanced characterization of tumors [31]. Considering these developments in both MRI and PET approaches for tumor characterization, it is envisioned that our knowledge of tumor microenvironment would be further enriched through the combination of these two imaging modalities.

To the best of our knowledge, the present study is the first to use a combination of ¹⁹F-MRI and ¹⁸F-FDG-PET. Owing to the simplicity of its quantification process and image interpretation, ¹⁹F-MRI has been suggested as a useful tool for quantitative monitoring of TAMs. The parametric potential of ¹⁹F-MRI TAM tracking has been suggested in a previous study, which had reported that the ¹⁹F-MR signal intensity observed in the colon of an inflammatory bowel disease model was correlated with a high chance of developing dysplasia [16]. Unlike SPIO nanoparticles, PFC nanoemulsions do not affect the proton spin of adjacent water molecules; this allows simultaneous measurement of other MR parameters, such as those mentioned above, for further analysis of the tumor microenvironment [20, 32]. Thus, ¹⁹F-MRI tracking of TAMs in conjunction with ¹⁸F-FDG-PET is expected to be a valuable bimodal platform that provides complementary information for comprehensive monitoring of the tumor microenvironment.

Yet, several concerns regarding PFC-based TAM tracking remain to be overcome. In most ¹⁹F-MRI-based TAM-tracking studies, including the present one, TAMs are passively labeled by PFC nanoemulsions, without targeting any specific moieties on the cells. It should be noted that not all TAMs are protumorigenic, and labeling both tumor-promoting and tumor-antagonizing TAMs would compromise the goal of tumor characterization. Therefore, for precise profiling of tumors, the phenotype of fluorinated TAMs should be analyzed, and methods for noninvasive differentiation of tumor-promoting and tumor-antagonizing TAMs should be developed. Another concern is that fluorination of TAMs with PFC nanoemulsions might affect the phenotype and physiology of these cells. In several studies, PFC nanoemulsions have been shown to preserve the original function and differentiation potential of various cell types, including hematopoietic [33, 34], neural [35], and mouse-mesenchymal [36] stem cells. Similar studies should be conducted to investigate the influence of PFC labeling on TAM characteristics. The recently reported intrinsic effects of SPIO nanoparticles on altering TAM polarization also emphasize the need for such investigations [37].

The sensitivity and resolution of ¹⁹F-MRI should also be improved. In this study, the correlations between ¹⁹F-MR signal and ¹⁸F-FDG-PET parameters were only done in tumor-by-tumor basis. To further examine the usefulness of combining ¹⁹F-MRI and ¹⁸F-FDG-PET in characterizing tumor heterogeneity, a voxel-by-voxel analysis in a tumor as well as correlation to corresponding histology should be performed. For these analyses to be precise, the spatial resolution of ¹⁹F-MRI should be improved without compromising the current sensitivity.

4. Conclusion

In summary, preliminary results from combining ¹⁹F-MRI and ¹⁸F-FDG-PET suggest that ¹⁹F-MRI tracking of TAMs might aid the characterization of tumors and prediction of tumor development. Comparison of intratumoral distribution of TAMs and the spatial pattern of tumor glucose uptake revealed several degrees of heterogeneity in the tumor microenvironment. A significant positive correlation was observed between ¹⁹F-MR signal intensity and subsequent tumor growth, while inverse correlations were observed between ¹⁹F signal intensity and ¹⁸F-FDG-PET parameters. These results together suggest that ¹⁹F-MRI tracking of TAMs could potentially be used for tumor characterization and that, in combination with ¹⁸F-FDG-PET, this method could further expand our understanding of the heterogeneous tumor microenvironment and its impact on tumor prognosis. Since TAMs are becoming popular as significant therapeutic targets for cancer treatment, the combination of ¹⁹F-MRI and ¹⁸F-FDG-PET might also serve as a platform for assessment of therapeutic response.

Conflicts of Interest

The authors declare that there are no conflicts of interest regarding the publication of this article.

Authors’ Contributions

Soo Hyun Shin and Sang Hyun Park are co-first authors and contributed equally to this study.

Acknowledgments

The authors are grateful to Soyeon Jeon for her support with MRI data acquisition. This study was supported by National Cancer Center, Korea (NCC 1510030-3).

References

A. Mantovani, B. Bottazzi, F. Colotta, S. Sozzani, and L. Ruco, “The origin and function of tumor-associated macrophages,” Trends in Immunology, vol. 13, no. 7, pp. 265–270, 1992.

J. W. Pollard, “Tumour-educated macrophages promote tumour progression and metastasis,” Nature Reviews Cancer, vol. 4, no. 1, pp. 71–78, 2004.

F. Balkwill, K. A. Charles, and A. Mantovani, “Smoldering and polarized inflammation in the initiation and promotion of malignant disease,” Cancer Cell, vol. 7, no. 3, pp. 211–217, 2005.

S. F. Schoppmann, P. Birner, J. Stöckl et al., “Tumor-associated macrophages express lymphatic endothelial growth factors and are related to peritumoral lymphangiogenesis,” The American Journal of Pathology, vol. 161, no. 3, pp. 947–956, 2002.

L. Bingle, C. E. Lewis, K. P. Corke, M. Reed, and N. J. Brown, “Macrophages promote angiogenesis in human breast tumour spheroids in vivo,” British Journal of Cancer, vol. 94, no. 1, pp. 101–107, 2006.

R. D. Leek, C. E. Lewis, R. Whitehouse, M. Greenall, J. Clarke, and A. L. Harris, “Association of macrophage infiltration with angiogenesis and prognosis in invasive breast carcinoma,” Cancer Research, vol. 56, no. 20, pp. 4625–4629, 1996.

E. Y. Lin, V. Gouon-Evans, A. V. Nguyen, and J. W. Pollard, “The macrophage growth factor CSF-1 in mammary gland development and tumor progression,” Journal of Mammary Gland Biology and Neoplasia, vol. 7, no. 2, pp. 147–162, 2002.

J. Wyckoff, W. Wang, E. Y. Lin et al., “A paracrine loop between tumor cells and macrophages is required for tumor cell migration in mammary tumors,” Cancer Research, vol. 64, no. 19, pp. 7022–7029, 2004.

E. Y. Lin, A. V. Nguyen, R. G. Russell, and J. W. Pollard, “Colony-stimulating factor 1 promotes progression of mammary tumors to malignancy,” The Journal of Experimental Medicine, vol. 193, no. 6, pp. 727–739, 2001.

Y. Luo, H. Zhou, J. Krueger et al., “Targeting tumor-associated macrophages as a novel strategy against breast cancer,” The Journal of Clinical Investigation, vol. 116, no. 8, pp. 2132–2141, 2006.

C. H. Ries, M. A. Cannarile, S. Hoves et al., “Targeting tumor-associated macrophages with anti-CSF-1R antibody reveals a strategy for cancer therapy,” Cancer Cell, vol. 25, no. 6, pp. 846–859, 2014.

K. Movahedi, S. Schoonooghe, D. Laoui et al., “Nanobody-based targeting of the macrophage mannose receptor for effective in vivo imaging of tumor-associated macrophages,” Cancer Research, vol. 72, no. 16, pp. 4165–4177, 2012.

H. E. Daldrup-Link, D. Golovko, B. Ruffell et al., “MRI of tumor-associated macrophages with clinically applicable iron oxide nanoparticles,” Clinical Cancer Research, vol. 17, no. 17, pp. 5695–5704, 2011.

Y.-Y. I. Shih, Y.-H. Hsu, T. Q. Duong, S.-S. Lin, K.-P. N. Chow, and C. Chang, “Longitudinal study of tumor-associated macrophages during tumor expansion using MRI,” NMR in Biomedicine, vol. 24, no. 10, pp. 1353–1360, 2011.

A. Balducci, Y. Wen, Y. Zhang et al., “A novel probe for the non-invasive detection of tumor-associated inflammation,” OncoImmunology, vol. 2, no. 2, Article ID e23034, 2013.

S. H. Shin, D. K. Kadayakkara, and J. W. M. Bulte, “In vivo 19F MR imaging cell tracking of inflammatory macrophages and site-specific development of colitisassociated dysplasia,” Radiology, vol. 282, no. 1, pp. 194–201, 2017.

A. V. Makela, J. M. Gaudet, and P. J. Foster, “Quantifying tumor associated macrophages in breast cancer: a comparison of iron and fluorine-based MRI cell tracking,” Scientific Reports, vol. 7, Article ID 42109, 2017.

J. W. M. Bulte, “Hot spot MRI emerges from the background,” Nature Biotechnology, vol. 23, no. 8, pp. 945-946, 2005.

R. J. Shaw, “Glucose metabolism and cancer,” Current Opinion in Cell Biology, vol. 18, no. 6, pp. 598–608, 2006.

S. H. Shin, E.-J. Park, C. Min et al., “Tracking perfluorocarbon nanoemulsion delivery by 19FMRI for precise high intensity focused ultrasound tumor ablation,” Theranostics, vol. 7, no. 3, pp. 562–572, 2017.

Z. Ram, Z. R. Cohen, S. Harnof et al., “Magnetic resonance imaging-guided, high-intensity focused ultrasound for brain tumor therapy,” Neurosurgery, vol. 59, no. 5, pp. 949–955, 2006.

T. Uematsu, “MR imaging of triple-negative breast cancer,” Breast Cancer, vol. 18, no. 3, pp. 161–164, 2011.

R. B. Van Heeswijk, M. Pellegrin, U. Flögel et al., “Fluorine MR imaging of inflammation in atherosclerotic plaque in vivo,” Radiology, vol. 275, no. 2, pp. 421–429, 2015.

R. E. Jimenez, T. Wallis, and D. W. Visscher, “Centrally necrotizing carcinomas of the breast: a distinct histologic subtype with aggressive clinical behavior,” The American Journal of Surgical Pathology, vol. 25, no. 3, pp. 331–337, 2001.

R. D. Leek, R. J. Landers, A. L. Harris, and C. E. Lewis, “Necrosis correlates with high vascular density and focal macrophage infiltration in invasive carcinoma of the breast,” British Journal of Cancer, vol. 79, no. 5-6, pp. 991–995, 1999.

N. Avril, M. Menzel, J. Dose et al., “Glucose metabolism of breast cancer assessed by 18F-FDG PET: Histologic and immunohistochemical tissue analysis,” Journal of Nuclear Medicine, vol. 42, no. 1, pp. 9–16, 2001.

J. Schmitz, J. Schwab, J. Schwenck, Q. Chen, L. Quintanilla-Martinez, M. Hahn et al., “Decoding intratumoral heterogeneity of breast cancer by multiparametric,” Cancer Research, vol. 76, no. 18, pp. 5512–5522, 2016.

D. L. Longo, A. Bartoli, L. Consolino et al., “In vivo imaging of tumor metabolism and acidosis by combining PET and MRI-CEST pH imaging,” Cancer Research, vol. 76, no. 22, pp. 6463–6470, 2016.

S. Metz, C. Ganter, S. Lorenzen et al., “Multiparametric MR and PET imaging of intratumoral biological heterogeneity in patients with metastatic lung cancer using voxel-by-voxel analysis,” PLoS ONE, vol. 10, no. 7, Article ID e0132386, 2015.

M. A. Zahra, K. G. Hollingsworth, E. Sala, D. J. Lomas, and L. T. Tan, “Dynamic contrast-enhanced MRI as a predictor of tumour response to radiotherapy,” The Lancet Oncology, vol. 8, no. 1, pp. 63–74, 2007.

M. Soussan, F. Orlhac, M. Boubaya et al., “Relationship between tumor heterogeneity measured on FDG-PET/CT and pathological prognostic factors in invasive breast cancer,” PLoS ONE, vol. 9, no. 4, Article ID e94017, 2014.

E. Bible, F. Dell'Acqua, B. Solanky et al., “Non-invasive imaging of transplanted human neural stem cells and ECM scaffold remodeling in the stroke-damaged rat brain by (19)F- and diffusion-MRI,” Biomaterials, vol. 33, no. 10, pp. 2858–2871, 2012.

B. M. Helfer, A. Balducci, Z. Sadeghi et al., “19F MRI tracer preserves in vitro and in vivo properties of hematopoietic stem cells,” Cell Transplantation, vol. 22, no. 1, pp. 87–97, 2013.

L. E. Duinhouwer, B. J. M. Van Rossum, S. T. Van Tiel et al., “Magnetic resonance detection of CD34+ cells from umbilical cord blood using a 19F label,” PLoS ONE, vol. 10, no. 9, Article ID e0138572, 2015.

P. Boehm-Sturm, M. Aswendt, A. Minassian et al., “A multi-modality platform to image stem cell graft survival in the naïve and stroke-damaged mouse brain,” Biomaterials, vol. 35, no. 7, pp. 2218–2226, 2014.

G. Muhammad, A. Jablonska, L. Rose, P. Walczak, and M. Janowski, “Effect of MRI tags: SPIO nanoparticles and 19F nanoemulsion on various populations of mouse mesenchymal stem cells,” Acta Neurobiologiae Experimentalis, vol. 75, no. 2, pp. 144–159, 2015.

S. Zanganeh, G. Hutter, R. Spitler et al., “Iron oxide nanoparticles inhibit tumour growth by inducing pro-inflammatory macrophage polarization in tumour tissues,” Nature Nanotechnology, vol. 11, no. 11, pp. 986–994, 2016.