Contrast Media & Molecular Imaging
Volume 2019 (2019), Article ID 4967404, 1 page
https://doi.org/10.1155/2019/4967404

Erratum

Erratum to “[18F]ML-10 Imaging for Assessment of Apoptosis Response of Intracranial Tumor Early after Radiosurgery by PET/CT”

Lu Sun,¹ Kedi Zhou,² Weijun Wang,¹ Xiaojun Zhang,³ Zhongjian Ju,⁴ Baolin Qu,⁴ Zhizhong Zhang,¹ Jinyuan Wang,⁴ Zhipei Ling,¹ Xinguang Yu,¹ Jinming Zhang,³ and Longsheng Pan¹

¹Department of Neurosurgery, PLA General Hospital, 28 Fuxing Rd., Haidian District, Beijing, China
²Department of Biomedical Engineering, College of Engineering, Peking University, 5 Yiheyuan Rd., Haidian District, Beijing, China
³Department of Nuclear Medicine, PLA General Hospital, 28 Fuxing Rd., Haidian District, Beijing, China
⁴Department of Radiation Oncology, PLA General Hospital, 28 Fuxing Rd., Haidian District, Beijing, China

Correspondence should be addressed to Longsheng Pan; panls301@163.com

Received 25 November 2018; Accepted 27 November 2018; Published 19 March 2019

Copyright © 2019 Lu Sun et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “[18F]ML-10 Imaging for Assessment of Apoptosis Response of Intracranial Tumor Early after Radiosurgery by PET/CT” [1], there was an error in the title where the word “Radiotherapy” should be corrected to “Radiosurgery.” The corrected title is shown above and updated in place.

References

L. Sun, K. Zhou, W. Wang et al., “[18F]ML-10 Imaging for Assessment of Apoptosis Response of Intracranial Tumor Early after Radiosurgery by PET/CT,” Contrast Media and Molecular Imaging, vol. 2018, Article ID 9365174, 9 pages, 2018.