Computational and Mathematical Methods in Medicine

Volume 2013 (2013), Article ID 213563, 1 page

http://dx.doi.org/10.1155/2013/213563

Erratum

Erratum to “Optimisation of a Generic Ionic Model of Cardiac Myocyte Electrical Activity”

Tianruo Guo, Amr Al Abed, Nigel H. Lovell, and Socrates Dokos

Graduate School of Biomedical Engineering, University of New South Wales, Sydney, NSW 2052, Australia

Received 27 May 2013; Accepted 28 May 2013

Copyright © 2013 Tianruo Guo et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

A mistake occurred in (1), and it should be replaced with the following equation: