Case Reports in Anesthesiology
Volume 2019 (2019), Article ID 3605064, 1 page
https://doi.org/10.1155/2019/3605064

Corrigendum

Corrigendum to “Change of Anesthesia Management for a Patient Undergoing CABG by an Incidental Finding of a Genetic Variant Associated with Malignant Hyperthermia”

Trey B. Creech and Li Zhang

Anesthesiology Department, Geisinger Medical Center, Danville, PA, USA

Correspondence should be addressed to Trey B. Creech; tbcreech@geisinger.edu

Received 14 October 2019; Accepted 21 October 2019; Published 20 November 2019

Copyright © 2019 Trey B. Creech and Li Zhang. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Change of Anesthesia Management for a Patient Undergoing CABG by an Incidental Finding of a Genetic Variant Associated with Malignant Hyperthermia” [1], the sentence “At our institution, we do not routinely refer patients with genetic variants associated with MH for muscle contracture testing,” should be removed from the Discussion, where the third paragraph should read as follows:

“Muscle contracture testing may help confirm suspected pathogenic genes associated with MH. However, the muscle contracture testing has a sensitivity of 92–97% with specificity of only 53–78% for the North American Malignant Hyperthermia Group [8]”.

References

Trey B. Creech and Li Zhang, “Change of anesthesia management for a patient undergoing CABG by an incidental finding of a genetic variant associated with malignant hyperthermia,” Case Reports in Anesthesiology, vol. 2019, Article ID 3189719, 3 pages, 2019.