Case Reports in Anesthesiology
Volume 2019 (2019), Article ID 7254218, 1 page
https://doi.org/10.1155/2019/7254218

Corrigendum

Corrigendum to “Bradycardia Leading to Asystole Following Dexmedetomidine Infusion during Cataract Surgery: Dexmedetomidine-Induced Asystole for Cataract Surgery”

Aikaterini Amaniti,¹ Ioannis Dalakakis,¹ Dimitrios Gkinas,¹ Konstantinos Sapalidis,¹ Vasilios Grosomanidis,¹ and Georgios Papazisis²

¹AHEPA University Hospital, Aristotle University of Thessaloniki, Thessaloniki, Greece
²Laboratory of Pharmacology, Aristotle University of Thessaloniki, Thessaloniki, Greece

Correspondence should be addressed to Aikaterini Amaniti; amanitik@gmail.com

Received 19 August 2019; Accepted 28 August 2019; Published 29 October 2019

Copyright © 2019 Aikaterini Amaniti et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Bradycardia Leading to Asystole Following Dexmedetomidine Infusion during Cataract Surgery: Dexmedetomidine-Induced Asystole for Cataract Surgery” [1], the names of some of the authors were given incorrectly as “Amaniti Aikaterini, Dalakakis Ioannis, Sapalidis Konstantinos, Grosomanidis Vasilios, and Papazisis George”. The authors’ names should have been written as “Aikaterini Amaniti, Ioannis Dalakakis, Konstantinos Sapalidis, Vasilios Grosomanidis, and Georgios Papazisis”. The revised authors’ list is shown above.

References

A. Aikaterini, D. Ioannis, G. Dimitrios, S. Konstantinos, G. Vasilios, and P. George, “Bradycardia leading to asystole following dexmedetomidine infusion during cataract surgery: dexmedetomidine-induced asystole for cataract surgery,” Case Reports in Anesthesiology, vol. 2018, Article ID 2896032, 2 pages, 2018.