Case Reports in Cardiology

Volume 2012 (2012), Article ID 801423, 3 pages

doi:10.1155/2012/801423

Case Report

A Technique to Perform PCI and Stenting in an Anomalous RCA from the Left Sinus of Valsalva

Dazhong Sun¹ and Douglas Bogart²

¹Kansas City Cardiology, 930 Carondelet Drive Suite 304, Kansas City, MO 64114, USA

²Interventional Cardiology Section, Truman Medical Centers/University of Missouri-Kansas City, 2301 Holmes, Kansas City, MO 64108, USA

Received 3 June 2012; Accepted 4 September 2012

Academic Editors: J. A. Breall and T. Sahin

Copyright © 2012 Dazhong Sun and Douglas Bogart. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

This describes a technique for the successful performance of percutaneous coronary intervention in patients whose right coronary artery arises from the left sinus of Valsalva and in whom the standard guiding catheters do not allow coaxial support.

1. Introduction

Percutaneous coronary intervention (PCI) can be difficult in patients who have a culprit lesion in a coronary artery that arises from the opposite sinus of Valsalva. These arteries can be difficult to visualize by coronary angiography and are even harder to cannulate to ensure guide stability for PCI.

We describe a technique that has been successful in patients whose right coronary artery arises from the left coronary sinus when the standard guiding catheters do not work.

2. Case Report

A 51-year-old African American female with a prior history of coronary artery disease presented to Truman Medical Center with chest pain and a non-ST segment elevation myocardial infarction. She had significant risk factors including type II diabetes mellitus, hypertension, dyslipidemia, and tobacco abuse. Her echocardiogram revealed mild inferior wall hypokinesis with normal overall left ventricular function. She underwent cardiac catheterization which showed only mild left coronary artery disease and an anomalous right coronary artery (RCA) from the left sinus of Valsalva (Figure 1). The RCA had a high-grade stenosis which was felt to be the culprit vessel. After attempts with multiple left guiding catheters (all 6 French (F)) (left Judkins JL 4, 5, and 6), left Amplatz [1–3], and the XB/series (3.0, 3.5, and 4.0) (all from Cordis Corporation, Miami, Florida), we were not able to get coaxial alignment for the PCI.

Figure 1: The difficulty in aligning catheters with the anomalous right coronary artery arising from the left sinus of Valsalva is shown here.

We then used a 6 F left coronary bypass guide catheter which could be aligned for wiring of the RCA (Figure 2). We used a 180 cm Hi-Torque floppy wire and an over-the-wire 2.5 × 15 mm Voyager balloon (both from Abbott Vascular, Santa Clara, CA, USA).

Figure 2: The 6 french left bypass catheter is aligned for wiring the anomalous right coronary artery.

We were able to place the wire in the distal RCA (Figure 3). We then exchanged for a 300 cm balanced middle weight (BMW) universal wire (Abbott Vascular, Santa Clara, CA, USA) which was placed through the balloon after removing the Hi-Torque floppy wire. We dilated the lesion and then removed the balloon. The left bypass catheter did not give adequate support to deliver the stent. We then exchanged the left bypass catheter over the BMW for an XB 3.0 guide (Cordis, Miami, FL, USA). With the BMW in place, we could engage the RCA and then completed the procedure (Figure 4). Two vision stents were deployed 3.0 × 28 mm and 3.5 × 15 mm (Abbott Vascular, Santa Clara, CA).

Figure 3: Wire cannulation is shown with the wire in the distal right coronary artery allowing for balloon passage and wire exchange.

Figure 4: The completed result with the XB-3 guiding catheter well aligned demonstrating the final result.

The angiographic result was good, and the patient was discharged the following day.

3. Discussion

It is frequently difficult to selectively cannulate the right coronary artery when it arises from the left sinus of Valsalva. The failure to adequately engage the anomalous vessel may lead to poor angiographic visualization and an erroneous diagnosis. Likewise, lack of guide support may lead to PCI failure.

The right coronary arises from the left sinus of Valsalva in 0.17% (136/126, 595) of patients undergoing coronary angiography [1]. Various catheters have been used to cannulate the anomalous vessel. These include the Amplatz-shaped catheters, the XB guide catheters, and the left Judkins catheters [2]. Very frequently multiple catheters are used with variable success. A new catheter curve (Leya catheter) has been reported to be of value for this difficult cannulation [3].

Our technique involves the use of a left bypass guiding catheter which is manipulated to align across from anomalous (RCA) (Figure 2) which allows for wire cannulation with a flexible wire and an over-the-wire balloon (Figure 3). We then pass the balloon into the distal RCA over the wire and exchange for a stiffer wire. If the stiffer wire allows for adequate support and visualization, we can complete the procedure with this guide. We have done this on two other patients. In this case, however, the support was tenuous and we used the XB guiding catheter which could be manipulated to engage the anomalous vessel (Figure 4). The procedure was then easily completed.

While this is somewhat of a labor intensive technique with the exchange of a guiding catheter over an angioplasty wire, it can convert a failed procedure into a successful one.

Conflict of Interests

The authors have no conflict of interests with respect to this submitted paper.

Acknowledgments

The authors would like to thank Janice Burt and Amber Mahmood for secretarial and technical assistance.

References

O. Yamanaka and R. E. Hobbs, “Coronary artery anomalies in 126,595 patients undergoing coronary arteriography,” Catheterization and Cardiovascular Diagnosis, vol. 21, no. 1, pp. 28–40, 1990.

M. G. Cohen, T. R. Tolleson, R. H. Peter, J. K. Harrison, and M. H. Sketch Jr., “Successful percutaneous coronary intervention with stent implantation in anomalous right coronary arteries arising from the left sinus of valsalva: a report of two cases,” Catheterization and Cardiovascular Interventions, vol. 55, no. 1, pp. 105–108, 2002.

U. Qayyum, F. Leya, L. Steen et al., “New catheter design for cannulation of the anomalous right coronary artery arising from the left sinus of valsalva,” Catheterization and Cardiovascular Interventions, vol. 60, no. 3, pp. 382–388, 2003.