Case Reports in Cardiology
Volume 2016 (2016), Article ID 6283581, 3 pages
http://dx.doi.org/10.1155/2016/6283581

Case Report

¹⁸F-FDG-PET Scanning Confirmed Infected Intracardiac Device-Leads with Abiotrophia defectiva

Sonja van Roeden,¹ Hans Hartog,² Vivian Bongers,³ Steven Thijsen,⁴ and Sanjay Sankatsing¹

¹Department of Internal Medicine, Diakonessenhuis, 3582 KE Utrecht, Netherlands
²Department of Cardiology, Diakonessenhuis, 3582 KE Utrecht, Netherlands
³Department of Nuclear Medicine, Diakonessenhuis, 3582 KE Utrecht, Netherlands
⁴Department of Microbiology, Diakonessenhuis, 3582 KE Utrecht, Netherlands

Received 3 November 2015; Accepted 16 March 2016

Academic Editor: Antonio de Padua  Mansur

Copyright © 2016 Sonja van Roeden et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Abiotrophia species are relatively slow growing pathogens, which may be present as commensal flora. However, invasive infections are frequently reported, like endocarditis, septic arthritis, osteomyelitis, and many other types of infection. In this case report we describe a 65-year-old male patient with an intracardiac device- (ICD-) lead infection caused by Abiotrophia defectiva. Diagnosis was confirmed by ¹⁸F-FDG-PET scanning. This is remarkable, since Abiotrophia defectiva is a slow growing pathogen causing low-grade infections. This case demonstrates that although infection of ICD-leads cannot be excluded in case of ¹⁸F-FDG-PET-negative findings, positive findings are highly suggestive for infection.

1. Introduction

Abiotrophia species are nutritionally variant streptococci (NVS), with high similarity to Granulicatella spp. Abiotrophia defectiva is the only species in the genus. It may be difficult to distinguish subtypes of Abiotrophia and Granulicatella spp. by standard biochemical tests for clinical microbiological laboratories; therefore they are frequently reported as Abiotrophia or Granulicatella species. It is a relatively slow growing pathogen compared to other streptococci; therefore cultivation and identification can be challenging [1].

Abiotrophia species may be present as commensal flora of the oral cavity and the urogenital and gastrointestinal tracts [1]. Invasive infections are frequently reported in literature, for example, continuous ambulatory peritoneal dialysis-associated peritonitis, endocarditis, endovascular graft infection, osteomyelitis, pyogenic discitis, septic arthritis, spontaneous brain abscess, and ocular infections [1–5]. In this case report, we present a rare infection caused by Abiotrophia species, namely, a patient with ¹⁸F-FDG-PET scanning that confirmed infected ICD-leads with Abiotrophia species.

2. Case Report

A 65-year-old male was referred to the outpatient clinic Internal Medicine in February 2013 with complaints of pain and stiffness of his neck since three months. He reported two episodes of chills without fever. He had no weight loss, night sweats, traumatic injury, pain, or stiffness elsewhere in his body. His medical history revealed systolic and diastolic heart failure with a gated pool ejection fraction of 26%, for which he received cardiac resynchronization therapy with an intracardiac device (CRTD) (type: Sorin Paradym 8750) in July 2010. Physical examination revealed no abnormalities, explicitly no fever, cardiac murmurs, or skin abnormalities. Laboratory investigations showed a raised C-reactive protein of 68 mg/L (normal range: <10 mg/L), erythrocyte sedimentation rate >95 mm/H (normal range: <15 mm/hour), and leukocytes of 9.3 × 10⁹/L (normal range: <10 × 10⁹/L). A spondylodiscitis was considered; however there was no evidence for spondylodiscitis on a CT-scan of the cervical spine or bone scintigraphy. Blood cultures were taken and 10 out of 14 turned positive for Abiotrophia defectiva, confirmed with mass spectrometry (MALDI-TOF). Treatment with high dose intravenous penicillin (12 million units/24 hrs) was started. An intravascular focus, for example, endocarditis, was suspected. Duke’s criteria for infective endocarditis were not met; transesophageal echography of the heart revealed no vegetations on the cardiac valves or leads of the ICD. ¹⁸F-FDG-PET scanning demonstrated pathologic activity by the tip of both ICD-leads and at a right palatal tonsil (Figure 1). Removal of the ICD-leads was impossible due to extensive fibrosis caused by the infection. Treatment with high dose intravenous penicillin was continued for six weeks and the patient was additionally treated with clindamycin (600 milligrams three times/24 hrs) orally for six weeks. The ear-nose-throat specialist found no abnormalities on physical examination. The initial neck complaints disappeared after physical therapy. The infected ICD-leads could be the result of bacteriemia due to infection elsewhere; a potential dental focus was found. Two months after discontinuation of antibiotic therapy, laboratory findings did not indicate infection, and repeated ¹⁸F-FDG-PET scanning three months later showed no pathological activity: neither at the tips of the ICD-leads, nor elsewhere in the body.

Figure 1: ¹⁸F-FDG-PET scanning demonstrates pathologic activity by the tip of both ICD-leads.

3. Discussion

To our knowledge, only one suspected case of infected ICD and/or ICD-leads by Granulicatella spp. is reported in literature, with no confirmation by ¹⁸F-FDG-PET scanning nor removal of the ICD [4]. Infected ICDs coincide with a high mortality, up to 17% [6]. Infection may occur even >20 years after implantation and may be challenging to diagnose [7]. In case of signs and symptoms of infection, for example, fever, local symptoms, or positive blood cultures, echocardiography may indicate infection of intracardiac located parts of an ICD. However, infection of the extracardiac portion may be overlooked [8]. Vegetations on leads or ICDs can be suspected on CT-scan, but these findings are subtle and nonspecific and may represent thrombus or artifacts caused by metal parts. It is suggested that ¹⁸F-FDG-PET scanning is a promising and helpful tool in diagnosing an infected ICD and ICD-leads. Multiple patients with ¹⁸F-FDG-PET positive infected devices or leads caused by other species are reported with a sensitivity varying from 24 to 100% and a specificity varying from 79 to 100% [9, 10]. However, diagnosing infected ICD-leads by ¹⁸F-FDG-PET scanning is not free from pitfalls [9]. False positivity may be caused by mechanical rubbing of devices against thoracic muscles, leading to mild inflammation. Secondly, the size of the vegetations on the leads may be too small for detection by ¹⁸F-FDG-PET scanning, potentially causing false negative results [9]. However, specificity is high and, in case of pathological uptake around leads, infection is very likely [9].

In conclusion, we report the first ¹⁸F-FDG-PET positive intracardiac device lead infection caused by Abiotrophia defectiva, demonstrating that ¹⁸F-FDG-PET is a useful, noninvasive tool for detection and follow-up of infected ICD-leads. Although infection of ICD-leads cannot be excluded in case of ¹⁸F-FDG-PET-negative findings, positive findings are highly suggestive for infection. Even though Abiotrophia defectiva grows relatively slow, ¹⁸F-FDG-PET findings were positive. This demonstrates that ¹⁸F-FDG-PET may also be helpful for diagnosing low-grade infections of ICD-leads.

Competing Interests

The authors declare that they have no competing interests.

References

A. Al-Jasser, M. Enani, and M. Al-Fagih, “Endocarditis caused by Abiotrophia defectiva,” Libyan Journal of Medicine, vol. 2, no. 1, pp. 43–45, 2007.

U. Arslan, I. Guney, S. Yuksekkaya, H. Atalay, and H. T. Dagý, “First case of peritonitis due to Abiotrophia defectiva,” Peritoneal Dialysis International, vol. 26, no. 6, pp. 725–726, 2006.

Y. M. Paulus and G. C. Cockerham, “Abiotrophia defectiva causing infectious crystalline keratopathy and corneal ulcer after penetrating keratoplasty: a case report,” Journal of Ophthalmic Inflammation and Infection, vol. 3, no. 1, article 20, 2013.

O. Rosenthal, A. Woywodt, P. Kirschner, and H. Haller, “Vertebral osteomyelitis and endocarditis of a pacemaker lead due to Granulicatella (Abiotrophia) adiacens,” Infection, vol. 30, no. 5, pp. 317–319, 2002.

L. Senn, J. M. Entenza, G. Greub et al., “Bloodstream and endovascular infections due to Abiotrophia defectiva and Granulicatella species,” BMC Infectious Diseases, vol. 6, article 9, 2006.

K. G. Tarakji, E. J. Chan, D. J. Cantillon et al., “Cardiac implantable electronic device infections: presentation, management, and patient outcomes,” Heart Rhythm, vol. 7, no. 8, pp. 1043–1047, 2010.

G. de Lima Peixoto, R. F. Siciliano, R. A. Camargo et al., “Pacemaker-related infection detected by ¹⁸F-fluorodeoxyglucose positron emission tomography-computed tomography,” International Journal of Infectious Diseases, vol. 19, no. 1, pp. 87–90, 2014.

W. Chen, J. Kim, O. P. Molchanova-Cook, and V. Dilsizian, “The potential of FDG PET/CT for early diagnosis of cardiac device and prosthetic valve infection before morphologic damages ensue,” Current Cardiology Reports, vol. 16, article 459, 2014.

L. Bensimhon, T. Lavergne, F. Hugonnet et al., “Whole body [¹⁸F]fluorodeoxyglucose positron emission tomography imaging for the diagnosis of pacemaker or implantable cardioverter defibrillator infection: a preliminary prospective study,” Clinical Microbiology and Infection, vol. 17, no. 6, pp. 836–844, 2011.

L. Leccisotti, F. Perna, M. Lago et al., “Cardiovascular implantable electronic device infection: delayed vs standard FDG PET-CT imaging,” Journal of Nuclear Cardiology, vol. 21, no. 3, pp. 622–632, 2014.