Case Reports in Dentistry
Volume 2014 (2014), Article ID 609802, 1 page
http://dx.doi.org/10.1155/2014/609802

Retraction

Retracted: Primary Small Cell Undifferentiated (Neuroendocrine) Carcinoma of the Maxillary Sinus

Case Reports in Dentistry

Received 31 August 2014; Accepted 31 August 2014; Published 21 October 2014

Copyright © 2014 Case Reports in Dentistry. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

The paper titled “Primary Small Cell Undifferentiated (Neuroendocrine) Carcinoma of the Maxillary Sinus” [1], published in Case Reports in Dentistry, has been retracted as it was submitted without the knowledge or consent of coauthor Dr. Premalatha Shetty who was responsible for the patient whose case was presented in the manuscript.

References

S. K. Yadav and P. Shetty, “Primary small cell undifferentiated (neuroendocrine) carcinoma of the maxillary sinus,” Case Reports in Dentistry, vol. 2014, Article ID 463109, 5 pages, 2014.