Case Reports in Dentistry
Volume 2018 (2018), Article ID 6561735, 4 pages
https://doi.org/10.1155/2018/6561735

Case Report

Chair-Side Direct Microscopy Procedure for Diagnosis of Oral Candidiasis in an Adolescent

Mathieu Lemaitre,¹ Sarah Cousty,² and Mathieu Marty³

¹Department of Biology, Toulouse Dental School, University of Toulouse III, Toulouse University Hospital, Toulouse, France
²Department of Oral Surgery, Toulouse Dental School, University of Toulouse III, Toulouse University Hospital, Toulouse, France
³Department of Pediatric Dentistry, Toulouse Dental School, University of Toulouse III, Toulouse University Hospital, Toulouse, France

Correspondence should be addressed to Mathieu Marty; martymat@hotmail.fr

Received 13 October 2017; Revised 12 February 2018; Accepted 29 March 2018; Published 29 April 2018

Academic Editor: Jose López-López

Copyright © 2018 Mathieu Lemaitre et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Oral candidiasis is caused by fungi of the genus Candida and one of the most common opportunistic fungal infections of the human oral cavity. Given the clinical variability of this disease, microbiological techniques are often required for clinical confirmation, as well as establishing a differential diagnosis with other diseases. The aim of this brief technical report is to illustrate a simple chair-side method, which can provide immediate microscopic diagnosis of this disease. We present the case of a 14-year-old boy suffering from a denture-related erythematous stomatitis, diagnosed and followed-up with a simplified direct microscopy technique. It enables an accurate diagnosis with a noninvasive and painless sampling method, linked to laboratory results.

1. Introduction

Oral candidiasis is caused by fungi of the genus Candida and one of the most common opportunistic fungal infections of the human oral cavity. One hundred fifty species of this genus have been isolated in the oral cavity, 80% of which correspond to Candida albicans [1]. An oral candidiasis infection could either be acute or chronic, and classified as either pseudomembranous or erythematous. Oral candidiasis represents one of the most frequent mucosal diseases as all types of infection can be found [2]. An increased incidence of infection can be linked to various predisposing factors, such as prolonged antibiotic therapy, malnutrition, endocrine disorders, HIV infection, xerostomia, smoking, poor oral hygiene, and the use of prosthetic dentures [3]. Typically, a diagnosis of oral candidiasis is based on clinical symptoms [4] and usually straightforward in cases of acute pseudomembranous candidiasis, especially in infants. However, given the clinical variability of this disease, microbiological techniques are often required for clinical confirmation, as well as establishing a differential diagnosis with other diseases. In addition, cases characterized by resistance to antifungal drugs, particularly in chronic patients, may benefit from an additional microbiological test. Several methods are currently used to isolate and identify Candida species, including direct microscopy of smears, stains, cultures, and genetic methods (PCR) [5]. Also new identification methods are tested to provide rapid and accurate detection [6]. A recent literature review demonstrated the advantages of direct microscopy in the diagnosis of oral candidiasis in children and adolescents [7]. The aim of this brief technical report is to illustrate a simple chair-side method which can provide immediate microscopic diagnosis of this disease.

2. Case Report

To illustrate this method, we present the case of a 14-year-old boy suffering from a denture-related erythematous stomatitis (Figure 1). Denture-related stomatitis is defined as an inflammatory process of the oral mucosa underlying a removable dental prosthesis. In young patients, a denture-related stomatitis could be due to a complication of a pediatric prosthetic denture or can occur during long-term orthodontic treatment with a removable material. This pathology has been described among both children and teenagers, and diagnosis methods and treatment have been proposed [8–11]. Here, a removable orthodontic appliance was worn for two years to compensate a dental agenesis.

Figure 1: Erythematous, denture‐related candidiasis in a 14-year-old boy (photography taken in an intraoral mirror).

A classical microscopical procedure typically involves removing a representative sample from the infected site (exfoliative cytology) which is transferred to a microscopic slide and treated with potassium hydroxide (KOH), Gram stain, or periodic acid-Schiff (PAS) stain. A sample collection was performed and sent to laboratory for cultivation and the result was positive for Candida albicans.

Then we provided simplified, direct microscopy method as comparison. In this method, the patient’s saliva was collected on the floor of the mouth. An intraoral mirror was placed horizontally beneath the tongue, in contact with mucosa. When saliva covers the mirror, it is removed from the mouth and laid on the slide (Figure 2(a)). The sample was subsequently collected with a sterile probe directly placed into the patient’s saliva (Figure 2(c)), and a cover slip was mounted. An important point to note is that the sulcus area is the optimal site to collect the sample using this method (Figure 2(b)). The practitioner should press with his or her finger on the slide to spread the sample. The sample was then analyzed under a phase contrast optical microscope (Figure 2(d)). The most interesting magnification is ×1000 as it allows nonpathogenic yeast forms to be differentiated from opportunistic hyphal forms. In pathological conditions, several hyphae are visible on each screen, mixed with oral bacteria and cells (Figure 3). Importantly, this method is valuable for determining the efficacy of treatment. The treatment consisted in 3 weeks of local treatment using antifungal agent (amphotericin B), and the modification of the prosthetic appliance for a fixed one. An other laboratory analysis by cultivation was negative. At the two years follow-up, the same procedure showed a normalization of oral flora, with absence of hyphae (Figure 4(b)), linked to a clinical improvement (Figure 4(a)).

(a)

(b)

(c)

(d)

Figure 2: Step-by-step procedure for sampling.

Figure 3: Candida hyphae (×1000 in patient’s saliva).

(a)

(b)

Figure 4: (a) Clinical improvement at the 2 years follow-up. (b) Normalization of oral flora after treatment (×1000 in patient’s saliva).

3. Conclusion

Direct microscopy is widely used in laboratories to diagnose candidiasis. It enables an accurate diagnosis with a noninvasive and painless sampling method, particularly well-suited to young patients. A classical procedure, which involves sample collection and shipment to a laboratory, takes more time and expense. Moreover, the method presented here does not require any fixation or sample treatment. Therefore, it is a cost-effective way to examine a patient’s oral microbiota and determine any potential imbalance. Although direct microscopy is not as specific as culture, it appears to be a procedure of choice for a first-line diagnosis. Of course, a complete clinical examination remains absolutely necessary, as well as an extensive medical history, in order to study any associated general disease. Moreover, this approach requires experience in detecting yeast through microscopic observation which is not a transversal competence within clinicians. However the identification is not very difficult, and a simple, short-time formation may be sufficient. In this way, more practitioners will increasingly have access to this method; therefore, further awareness of this simple microscopic analysis will allow clinicians to make an immediate chair-side diagnosis. Furthermore, as it was the case for intraoral cameras, given the progress of microscopic devices, they can be integrated in the concept of person-centered care as an element of education and prevention to understand diagnoses and make informed treatment decisions [12]. Potential development of smartphone-based microscopes will provide easier access for clinicians to microscopy. Smartphone-based microscopes have already been in use to detect parasite [13] or obtain live-cells images [14]. This is a promising approach to perform accurate chair-side diagnosis in the future.

Ethical Approval

All procedures performed in the study involving human participants were in accordance with the ethical standards of Toulouse University and with the 1964 Helsinki declaration and its amendments.

Consent

Informed consent was obtained from all patients and their parents. All the authors gave their consent for publication.

Conflicts of Interest

The authors declare having no conflicts of interest.

References

L. Coronado-Castellote and Y. Jiménez-Soriano, “Clinical and microbiological diagnosis of oral candidiasis,” Journal of Clinical and Experimental Dentistry, vol. 5, no. 5, pp. e279–e286, 2013.

P. J. Giannini and K. V. Shetty, “Diagnosis and management of oral candidiasis,” Otolaryngologic Clinics of North America, vol. 44, no. 1, pp. 231–240, 2011.

N. Aslani, G. Janbabaei, M. Abastabar et al., “Identification of uncommon oral yeasts from cancer patients by MALDI-TOF mass spectrometry,” BMC Infectious Diseases, vol. 18, no. 1, p. 24, 2018.

P. A. Krishnan, “Fungal infections of the oral mucosa,” Indian Journal of Dental Research, vol. 23, no. 5, pp. 650–659, 2012.

J. M. Aguirre-Urízar, “Oral Candidiasis,” Revista Iberoamericana de Micología, vol. 19, pp. 17–21, 2002.

H. Noguchi, T. Iwase, D. Omagari et al., “Rapid detection of Candida albicans in oral exfoliative cytology samples by loop-mediated isothermal amplification,” Journal of Oral Science, vol. 59, no. 4, pp. 541–547, 2017.

M. Marty, E. Bourrat, F. Vaysse, M. Bonner, and I. Bailleul-Forestier, “Direct microscopy: a useful tool to diagnose oral candidiasis in children and adolescents,” Mycopathologia, vol. 180, no. 5-6, pp. 373–377, 2015.

M. H. Figueiral, A. Azul, E. Pinto, P. A. Fonseca, F. M. Branco, and C. Scully, “Denture-related stomatitis: identification of aetiological and predisposing factors-a large cohort,” Journal of Oral Rehabilitation, vol. 34, no. 6, pp. 448–455, 2007.

A. M. Iacopino and W. F. Wathen, “Oral candida infection and denture stomatitis: a comprehensive review,” Journal of the American Dental Association, vol. 123, no. 1, pp. 46–51, 1992.

C. O. Mosca, M. D. Moragues, S. Brena, A. C. Rosa, and J. Pontón, “Isolation of Candida dubliniensis in a teenager with denture stomatitis,” Medicina Oral, Patologia Oral Y Cirugia Bucal, vol. 10, no. 1, pp. 28–31, 2005.

M. H. Figueiral, P. A. Fonseca, M. M. Lopes, E. Pinto, T. Pereira-Leite, and B. Sampaio-Maia, “Effect of denture-related stomatitis fluconazole treatment on oral Candida albicans susceptibility profile and genotypic variability,” Open Dentistry Journal, vol. 9, no. 1, pp. 46–51, 2015.

M. Walji, N. Karimbux, and A. Spielman, “Person-centered care: opportunities and challenges for Academic Dental Institutions and Programs,” Journal of Dental Education, vol. 81, no. 11, pp. 1265–1272, 2017.

M. A. Saeed and A. Jabbar, “Smart diagnosis” of parasitic diseases by use of smartphones,” Journal of Clinical Microbiology, vol. 56, no. 1, p. e01469, 2017.

R. Hernández Vera, E. Schwan, N. Fatsis-Kavalopoulos, and J. Kreuger, “A modular and affordable time-lapse imaging and incubation system based on 3D-printed parts, a Smartphone, and off-the-shelf electronics,” PLoS One, vol. 11, no. 12, Article ID e0167583, 2016.