Case Reports in Genetics
Volume 2019 (2019), Article ID 9056596, 3 pages
https://doi.org/10.1155/2019/9056596

Case Report

A Homozygous CASQ2 Mutation in a Japanese Patient with Catecholaminergic Polymorphic Ventricular Tachycardia

Taishi Fujisawa,¹ Yoshiyasu Aizawa,¹ Yoshinori Katsumata,¹ Akihiro Udo,² Shogo Ito,¹ Kazumasa Hatakeyama,² Makoto Hirose,² Hiroshi Miyama,¹ Kazuaki Nakajima,¹ Takahiko Nishiyama,¹ Takehiro Kimura,¹ Masamitsu Nitta,² Kazuo Misumi,² Seiji Takatsuki,¹ Kenjiro Kosaki,³ and Keiichi Fukuda¹

¹Department of Cardiology, Keio University School of Medicine, Tokyo, Japan
²Department of Cardiology, Chiba Nishi General Hospital, Chiba, Japan
³Center for Medical Genetics, Keio University School of Medicine, Tokyo, Japan

Correspondence should be addressed to Yoshiyasu Aizawa; yoshiyaaizawa-circ@umin.ac.jp

Received 28 October 2018; Accepted 24 December 2018; Published 8 January 2019

Academic Editor: Christos Yapijakis

Copyright © 2019 Taishi Fujisawa et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

A 62-year-old female had suffered from recurrent syncopal episodes triggered by physical and emotional stress since childhood. She had no family history of sudden death. An intensive examination could not detect any structural disease, and exercise stress testing provoked polymorphic ventricular ectopy followed by polymorphic ventricular tachycardia accompanied with syncope leading to a diagnosis of catecholaminergic polymorphic ventricular tachycardia (CPVT). A genetic analysis with a next generation sequencer identified a homozygous W361X mutation in the CASQ2 gene. Careful history taking disclosed that her parents had a consanguineous marriage. Here we present a Japanese patient with a recessive form of CPVT.

1. Introduction

Catecholaminergic polymorphic ventricular tachycardia (CPVT) is an inherited primary arrhythmia syndrome, which is characterized by adrenergic induced bidirectional or polymorphic ventricular tachycardia [1]. A recessive form of CPVT is caused by homozygous or compound heterozygous mutations in the calsequestrin 2 gene (CASQ2) [2]. The incidence of RyR2 mutations in CPVT is about 65%, whereas mutations in the CASQ2 gene account for only 1% [3]. An autosomal dominant form of CPVT is caused by mutations in the cardiac ryanodine receptor gene (RyR2). Although several compound heterozygous CASQ2 mutations have been reported, homozygous CASQ2 mutations are scarcely identified in CPVT patients.

2. Case Report

A 62-year-old female was referred to our hospital for a genetic evaluation. She had suffered from recurrent syncopal episodes since her childhood. Syncope, which lasted 2 to 3 minutes, developed repeatedly while she was playing table tennis or was distressed during earthquake attacks. Initially, she was diagnosed with epilepsy and was treated by antiepilepsy drugs, which were not effective for preventing her syncope. At the age of 60, she was referred to the cardiology division for an evaluation of bradycardia. However, she refused to undergo an intensive examination and drug therapy for sick sinus syndrome with cilostazol was initiated. She had no family history of sudden death or other cardiac disease. Her physical and neurological examinations were normal. Her ECG at rest exhibited left axis deviation and QT-U prolongation (Figure 1(a)). Late potentials were negative on signal-averaging electrocardiography. Transthoracic echocardiography did not reveal any structural abnormalities. Coronary angiography and an acetylcholine stress test also could not reveal any coronary artery stenosis or coronary vasospasms. The exercise stress testing revealed polymorphic ventricular ectopy (Figure 1(b)), which progressed to polymorphic ventricular tachycardia (Figure 1(c)) accompanied by syncope. She could not undergo electroencephalography or an MRI, including the head and heart, due to her claustrophobia. Based on these findings, she was diagnosed with CPVT. She was implanted with a dual chamber implantable cardioverter defibrillator prior to the prescription of a β blocker due to a previous 13 second episode of sinus arrest on the Holter ECG. Afterwards, she was started on bisoprolol and experienced no further syncopal episodes. Upon the patient’s request, a genetic evaluation for CPVT was performed. Comprehensive genetic testing was initiated using the TruSight One (Agilent Technologies, Santa Clara, CA) sequencing panel, which targets 4813 genes known to be associated with clinical phenotypes. Genetic testing revealed a homozygous c.1083 G>A/p.Trp361 stop-codon variant (W361X) in the CASQ2 gene (NM_001232.3). This variant was validated by direct capillary sequencing (Figure 2(a)). The W361X variant resulted in the termination of the CASQ2 protein at the C-terminal region (Figure 2(b)) and was reported as pathogenic mutation for CPVT. No other variant was detected in any of the other arrhythmia-related genes. After this homozygous mutation was identified, we further questioned the patient and discovered her parents were consanguineous (Figure 2(c)). She had two asymptomatic children aged 27 and 24. We also conducted genetic testing on them. Both her children carried a heterozygous W361X mutation, which was identical to that of the index patient. These genetic findings coincided with the autosomal recessive trait of a CASQ2 inheritance. We could not perform a genetic evaluation on the other family members.

Figure 1: The 12 lead ECG in the patient. (a) The HR was 60bpm. Left axis deviation and enlarged U-waves were noted. An exercise test demonstrated polymorphic ventricular extrasystoles (b) which progressed to sustained polymorphic ventricular tachycardia (c).

Figure 2: (a) Genetic characteristics of the proband and offspring. The result of DNA sequencing in the index patient (IV-4) demonstrating a homozygous single G to A nucleotide substation at position 1083 of the CASQ2 gene leading to a Trp361 (=W361X) stop-codon mutation. A heterozygous mutation was identified in her daughter (V-3) and son (V-4). (b) Schematic topology of CASQ2, displaying the putative location of the W361X mutation (red arrow). (c) Pedigree of the index family. The proband is marked by an arrow. The results of the CASQ2 genetic screen were performed on the index patient and her children at an age of 27 and 24, indicating a heterozygous mutation (c.1038 C/G) in the CASQ2 gene.

3. Discussion

CPVT is highly lethal if untreated. Approximately 30% of those patients experience cardiac arrest and 80% experience syncope. Sudden death may be the first onset of the disease. The diagnosis of CPVT is established in a patient with a structurally normal heart, normal resting ECG, and a bidirectional tachycardia or polymorphic VT on the exercise stress test [1]. Identification of heterozygous mutations in RyR2 or homozygous/compound heterozygous mutations in CASQ2 can also establish the diagnosis.

We identified a homozygous CASQ2 mutation in a Japanese CPVT patient. This W361X mutation was located at the C-terminal region of CASQ2. The homozygous mutation of the CASQ2 gene was first identified in the Bedouin tribe in 2001 [4]. The CASQ2 mutation accounts for approximately 1% of the CPVT cases, which is a lower rate than that of the RyR2 mutation identified in 65% of the CPVT cases [3]. It seems rare to form a homozygous mutation in a cohort without a high consanguinity rate. In Japan, only one compound heterozygous CASQ2 mutation was reported to be causative of CPVT [2]. Patients with the CASQ2 homozygous/compound heterozygous mutation are known to have a higher rate of sudden death, which affects the patient at an earlier stage than that in those with an RyR2 mutation [5]. Mutations in CPVT patients were identified in the RyR2, CASQ2, CALM2, TRD, KCNJ2, and ANK2 genes [3]. It is suggested that a reduced function of CASQ2, a Ca²⁺ storage protein within the sarcoplasmic reticulum (SR), may lead to increased levels of free Ca²⁺ within the SR, leading to a diastolic leak of Ca²⁺ [3].

In summary, to the best of our knowledge, this is the first report of a recessive CASQ2 homozygous mutation in Japanese CPVT patients. History taking of a consanguineous marriage in a family is of importance. A genetic analysis using NGS that can detect not only major RyR2 gene mutations but also minor CASQ2 mutations is useful.

Conflicts of Interest

The authors declare no conflicts of interest for this article.

Acknowledgments

We are grateful to Mr. John Martin for editing this article. This work was supported by MEXT KAKENHI grant number 17K09524.

References

S. G. Priori, A. A. Wilde, M. Horie et al., “HRS/EHRA/APHRS Expert Consensus Statement on the Diagnosis and Management of Patients with Inherited Primary Arrhythmia Syndromes: Document endorsed by HRS, EHRA, and APHRS in May 2013 and by ACCF, AHA, PACES, and AEPC in June 2013.,” Heart Rhythm, vol. 10, no. 12, pp. 1932–1963, 2013.

M. Kawamura, S. Ohno, N. Naiki et al., “Genetic background of catecholaminergic polymorphic ventricular tachycardia in Japan,” Circulation Journal, vol. 77, no. 7, pp. 1705–1713, 2013.

N. Sumitomo, “Current topics in catecholaminergic polymorphic ventricular tachycardia,” Journal of Arrhythmia, vol. 32, no. 5, pp. 344–351, 2016.

H. Lahat, E. Pras, T. Olender et al., “A missense mutation in a highly conserved region of CASQ2 is associated with autosomal recessive catecholamine-induced polymorphic ventricular tachycardia in Bedouin families from Israel,” American Journal of Human Genetics, vol. 69, no. 6, pp. 1378–1384, 2001.

A. V. Postma, I. Denjoy, T. M. Hoorntje et al., “Absence of calsequestrin 2 causes severe forms of catecholaminergic polymorphic ventricular tachycardia,” Circulation Research, vol. 91, pp. e21–e26, 2002.