Case Reports in Infectious Diseases

Volume 2012 (2012), Article ID 698746, 3 pages

doi:10.1155/2012/698746

Case Report

Nontoxigenic Vibrio cholerae Septicemia in an Immunocompromised Patient

Kamran Kadkhoda,1,2 Heather Adam,2,3 Matthew W. Gilmour,2,4 and Gregory W. Hammond²

¹Cadham Provincial Public Health Laboratory, Winnipeg, MB, Canada

²Department of Medical Microbiology and Infectious Diseases, University of Manitoba, Winnipeg, MB, Canada

³Diagnostic Services of Manitoba, Winnipeg, MB, Canada

⁴National Microbiology Laboratory, Public Health Agency of Canada, Winnipeg, MB, Canada, R3E 3R2

Received 11 May 2012; Accepted 20 June 2012

Academic Editors: F. Mansour-Ghanaei and T. Shibata

Copyright © 2012 Kamran Kadkhoda et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

We report a recent case of non-O1, non-O139, nontoxigenic Vibrio cholerae septicemia in a post-liver-transplant immunocompromised patient associated with prior seafood consumption. Non-O1, non-O139 V. cholerae strains have been reported in several cases of extraintestinal infections and seem to be emerging infectious agents especially in patients with immunocompromising conditions.

1. Case History

On June 16, 2011, a 21-year-old female presented to the emergency department with a short duration of fever, chills, abdominal pain, and tachycardia. She denied having a recent history of diarrhea. On physical examination, generalized abdominal tenderness was present, but there were no signs of peritoneal irritation. Blood and urine cultures were obtained, along with blood specimens taken for routine hematology and biochemistry tests. Total bilirubin was 25.7 μmol/L (normal 2–20 μmol/L), GGT was 78 U/L (normal 5–29), and INR was 1.6 (normal 0.9–1.2). She was given intravenous piperacillin/tazobactam 3.375 gram along with hydration and improved rapidly. She was discharged without antibiotics. By June 20, 2011, her blood culture had been reported positive for an unidentified aerobic Gram-negative organism.

The patient had no travel history for over a year but had a complex past medical history, which included biliary atresia that culminated in an autologous liver transplant in 1996 when she was 6 years old. She was receiving Sirolimus 3 mg/day and in addition took ferrous sulfate and vitamin D 1000 IU/day. Her recent history was that on March 6, 2011, she had presented to the same emergency department with fever (39.5°C), abdominal pain, nausea and vomiting, but no diarrhea. She was found to have an Escherichia coli bacteremia, thought to have resulted from a liver abscess found by CT scan. She also had splenomegaly by ultrasound. She was treated with intravenous ceftriaxone 2 g/day until the liver abscess had been resolved by ultrasound. Her WBC count at that admission was 1.5 × 10⁹/L (normal 4.5–11.0), neutrophil count was 2.9 × 10⁹/L (normal 2–7 × 10⁹/L), platelets were 46 × 10⁹/L (normal 140–440), and haemoglobin was 99 g/L (normal 120–160).

2. The Study

A hemolytic, non-lactose-fermenting Gram-negative bacilli was isolated from a positive blood culture on a BacT/ALERT 3D instrument. The organism was preliminarily identified as Vibrio cholerae by an API 20E (BioMerieux) and referred to the Health Sciences Centre, Winnipeg, MB, Canada (the reference laboratory for Diagnostic Services of Manitoba rural sites) for identification and susceptibility testing. The organism was identified by VITEK 2 (bioMerieux) as Vibrio cholerae and was reported to the clinician as Vibrio spp. with appropriate antimicrobial susceptibility testing (AST) results as it is a rarely identified organism. The isolate was referred to Cadham Provincial Public Health Laboratory for further identification and to conform to the Regulations of the Manitoba Public Health Act, which includes V. cholerae as a notifiable organism.

As a reference isolate with previously known presumptive identification, the isolate was subcultured onto sheep blood agar, MacConkey agar, and TCBS media and incubated overnight at 35°C in an ambient air incubator. On blood agar, β-hemolytic colonies appeared overnight, that on Gram stain were curved Gram-negative bacilli and were oxidase positive. There were also non-lactose-fermenting colorless colonies on MacConkey agar and yellow-colored colonies on TCBS. The isolate was identified as Vibrio cholerae with 94.42% probability using VITEK 2 instrument. Initial 16S rDNA sequencing using a BLAST search of GenBank (NCBI, NIH, Bethesda, MD, USA) showed 99% probability for both Vibrio cholerae and Vibrio mimicus, but based on the presence of yellow colonies on TCBS, the isolate was identified as Vibrio cholerae. The isolate tested negative for beta-lactamase using the phenotypic method. The AST was done using the VITEK 2 instrument, disk diffusion method, and E-test (bioMerieux) and the isolate tested susceptible to ampicillin, azithromycin, trimethoprim-sulfamethoxazole, and tetracycline based on the CLSI criteria indicated in document M45-A2. The isolate was forwarded for confirmation to the Vibrio Reference Service (VRS) at the National Microbiology Laboratory (NML) in Winnipeg, MB, Canada.

At the NML, mass-spectrometry-based identification was completed using the Bruker Autoflex III according to the manufacturer’s instructions. The isolate’s spectra were analyzed against the manufacturer’s entire taxonomy database and matched with V. cholerae with a score of 2.312 (correlated to “highly probable species identification”). Additionally, against a custom database of 16 reference V. cholerae isolates, this isolate scored 2.507, further substantiating the highly probable species-level identification as V. cholerae. A Vibrio-specific molecular speciation assay [1] was also used to confirm the identity of this isolate. Amplification and DNA sequencing of the ftsZ allele using oligonucleotides ftsZF1 and ftsZR2 for a 1041 bp fragment demonstrated 100% nucleotide identity between this isolate and reference non-O1 V. cholerae strain ATCC 35971, and 99.7% nucleotide identity between this isolate and V. cholerae O1 reference strains ATCC 31503 and NH-V-86. Antisera produced at the NML for O1 and O139 serogroups were used in the standard slide agglutination method and the isolate serogrouped as V. cholerae non-O1, non-O139.

The isolate was also positive for both hly and rtx genes, which is typical for most V. cholerae strains but tested negative for ctx gene using primers ctx2 and ctx3 [2] under the conditions described by Clark et al. [3].

After receiving follow-up notification and enquiries by public health, the patient was seen by an infectious diseases specialist. She had remained well with no signs or symptoms of infection since recovering from her febrile illness of the septicemia due to the liver abscess in March of 2011, until the June 2011 illness. She and her mother revealed that the patient had a fondness for shrimp and had cleaned, cooked, and eaten a meal of shrimp a few days before the onset of her most recent illness in June of 2011. There was no other history of seafood exposure and no opportunity to sample the presumptive contaminated shrimp. As an immunocompromised individual, she was treated with a 2-week course of amoxicillin. Stool cultures in the follow-up period were negative for Vibrio organisms.

3. Conclusions

Following Vibrio parahaemolyticus and V. vulnificus, the non-O1 and non-O139 serogroups of V. cholerae are the most commonly isolated Vibrio from extraintestinal sites in North America. Whereas the O1 and O139 serogroups are typically toxigenic and cause classical cholera, the other serogroups are often nontoxigenic and tend to cause extraintestinal infections such as wound infections, external ear infection, sepsis, epidural and subdural abbesses. From 1997 to 2011, amongst the total 117 human clinical non-O1/non-O139 isolates of V. cholerae that were submitted to the NML for identification, 61 (52%) were isolated from stool, 24 (29%) where from unknown sources, 16 (14%) from ear infections, 3 (0.03%) from urine, 2 wound isolates (0.02%), and notably the only blood isolate is described in the study herein.

Risk factors for bacteremia include underlying liver disease and malignancies, as exemplified by the case presented here. This patient was also immunocompromised, putting her at greater risk. The case fatality rate in these patient populations can be as high as 65% [4, 5]. Similar to this individual’s case which was associated with the recent consumption of shrimp, other Vibrio infections are associated with the consumption of sea foods of any kind [4, 6, 7]. Amongst the non-O1, and non-O139 serogroups that have caused sporadic cases of diarrhea in the United States, O75 and O141 have been observed, although both harboured toxin [8, 9].

If V. cholerae (either toxigenic or non-toxigenic) emerges as a common contaminant of widely distributed or widely consumed food types, this will require capacity for prompt and correct diagnosis and AST as well as public health notification and investigation for effective patient management and infection control. This demands an integrated effort involving specialized reference laboratories such as the VRS in Canada.

Conflict of Interests

The authors have no conflict of interests.

References

D. M. Tracz, P. G. Backhouse, A. B. Olson et al., “Rapid detection of Vibrio species using liquid microsphere arrays and real-time PCR targeting the ftsZlocus,” Journal of Medical Microbiology, vol. 56, no. 1, pp. 56–65, 2007.

P. I. Fields, T. Popovic, K. Wachsmuth, and O. Olsvik, “Use of polymerase chain reaction for detection of toxigenic Vibrio cholerae O1 strains from the Latin American cholera epidemic,” Journal of Clinical Microbiology, vol. 30, no. 8, pp. 2118–2121, 1992.

C. G. Clark, A. N. Kravetz, C. Dendy, G. Wang, K. D. Tyler, and W. M. Johnson, “Investigation of the 1994-5 Ukrainian vibrio cholerae epidemic using molecular methods,” Epidemiology and Infection, vol. 121, no. 1, pp. 15–29, 1998.

N. M. Patel, M. Wong, E. Little et al., “Vibrio cholerae non-O1 infection in cirrhotics: case report and literature review,” Transplant Infectious Disease, vol. 11, no. 1, pp. 54–56, 2009.

W. C. Ko, Y. C. Chuang, G. C. Huang, and S. Y. Hsu, “Infections due to non-O1 Vibrio cholerae in southern Taiwan: predominance in cirrhotic patients,” Clinical Infectious Diseases, vol. 27, no. 4, pp. 774–780, 1999.

M. V. Arnett, S. L. Fraser, and P. E. McFadden, “Non-O1 Vibrio cholerae epidural brain infection in a 12-year-old boy after a depressed skull fracture,” Pediatric Infectious Disease Journal, vol. 27, no. 3, pp. 284–285, 2008.

W. Rozemeijer, L. A. Korswagen, A. E. Voskuyl, and A. E. Budding, “Vibrio cholerae non-O1 non-O139 infection in an immunocompromised patient returning from Spain, July 2009,” Eurosurveillance, vol. 14, no. 32, p. 19298, 2009.

J. A. Crump, C. A. Bopp, K. D. Greene et al., “Toxigenic Vibrio cholerae serogroup O141—associated cholera-like diarrhea and bloodstream infection in the United States,” Journal of Infectious Diseases, vol. 187, no. 5, pp. 866–868, 2003.

M. Tobin-D'Angelo, A. R. Smith, S. N. Bulens et al., “Severe diarrhea caused by cholera toxin-producing Vibrio cholerae serogroup O75 infections acquired in the southeastern United States,” Clinical Infectious Diseases, vol. 47, no. 8, pp. 1035–1040, 2008.