Case Reports in Infectious Diseases
Volume 2018 (2018), Article ID 6548482, 1 page
https://doi.org/10.1155/2018/6548482

Corrigendum

Corrigendum to “Community-Acquired Cavitary Pseudomonas Pneumonia Linked to Use of a Home Humidifier”

Eric C. Woods,¹ Gabriel M. Cohen,² Eric Bressman,³ David Lin,¹ Nathalie E. Zeitouni,⁴ Colleen Beckford,⁴ Camille Hamula,⁴ Harm van Bakel,⁴ Mitchell Sullivan,⁴ Deena R. Altman,2,4 and Daniel Caplivski²

¹Icahn School of Medicine at Mount Sinai, New York, NY, USA
²Division of Infectious Diseases, Icahn School of Medicine at Mount Sinai, New York, NY, USA
³Department of Medicine, Icahn School of Medicine at Mount Sinai, New York, NY, USA
⁴Icahn Institute for Genomics and Multiscale Biology, Icahn School of Medicine at Mount Sinai, New York, NY, USA

Correspondence should be addressed to Gabriel M. Cohen; gabriel.cohen@mountsinai.org

Received 2 April 2018; Accepted 10 April 2018; Published 5 June 2018

Copyright © 2018 Eric C. Woods et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Community-Acquired Cavitary Pseudomonas Pneumonia Linked to Use of a Home Humidifier” [1], the names of the first and the second authors were given incorrectly as Eric Woods and Gabriel Cohen. The authors’ names should have been written as Eric C. Woods and Gabriel M. Cohen. The revised author list is shown above.

References

E. Woods, G. Cohen, E. Bressman et al., “Community-acquired cavitary Pseudomonas pneumonia linked to use of a home humidifier,” Case Reports in Infectious Diseases, vol. 2017, Article ID 5474916, 4 pages, 2017.