Case Reports in Medicine

Volume 2012 (2012), Article ID 216345, 2 pages

doi:10.1155/2012/216345

Case Report

Acquired Umbilico-Inguinal Fistula with Persistent Discharge due to Suture Reaction: A Case Report and Review of the Literature

Muazez Cevik

Department of Pediatric Surgery, Faculty of Medicine, Harran University, 63100 Sanliurfa, Turkey

Received 7 May 2012; Accepted 11 September 2012

Academic Editor: Peter P. Karpawich

Copyright © 2012 Muazez Cevik. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

The aim of this paper is to stay a very rare umbilico-inguinal fistula (UIF) resulting from a delayed suture reaction after the use of silk suture to repair an inguinal hernia. A 3-year-old boy presented with persistent umbilical discharge. The initial diagnosis was omphalitis and he was treated with broad-spectrum antibiotics but a UIF was subsequently diagnosed. Surgery was performed to ascertain the cause of the UIF. This case demonstrates that silk suture used in inguinal hernia repair can lead to a UIF, which should be considered in the differential diagnosis of a patient presenting with persistent umbilical discharge.

1. Introduction

Umbilical discharge is common in infants and children and its major causes include urachus, omphalomesenteric duct remnants, granuloma, and infection of the umbilical artery. However, more rare causes exist that can be difficult to diagnose. When persistent umbilical discharge does not respond to conservative treatment, surgical exploration becomes necessary [1–3]. Inguinal hernia repair is the most common elective operation performed by paediatric surgeons, and an umbilico-inguinal fistula (UIF) is an extremely rare complication that can be caused by the use of nonabsorbable silk suture material during the procedure, which is still used at a few centres. The present study documents an unusual case of UIF and highlights the importance of selecting the correct suture material.

2. Case Report

A 3-year-old boy presented with umbilical discharge of 2 months’ duration. The umbilicus was slightly inflamed with yellowish discharge. A scar from an inguinal hernia repair was seen on the right groin. Urinalysis and blood biochemistry were normal. Direct abdominal radiography and abdominal ultrasound were normal. During followup, swelling was noticed at the incision site and recurrent hernia was suspected. Purulent discharge was drained from the umbilicus and the swelling was treated, after which surgery was performed to lance and flush the abscess. Under general anaesthesia, an incision was made at the previous incision site. Surgical exploration showed silk suture material below the Scarpa’s fascia at the level of the external inguinal ring (Figure 1). The fistula tract opened at the umbilicus over the fascia and was not connected to the peritoneum. The fistula tract was washed with copious physiologic serum until the discharge ran clear, after which a Penrose drain was placed and the incision was closed. Operative signs were consistent with fistula formation associated with delayed foreign body reaction. Appropriate antibiotic therapy was initiated and the drain was removed once the discharge resolved. The patient remained asymptomatic during the following year.

Figure 1: The view of foreign body as material of stitch.

3. Discussion

Surgeons usually select a suture material based on their knowledge, experience, and the available materials. Suture materials have a varying risk of infection due to different physical properties and structure [4], and every suture material causes a severe inflammatory reaction in the first 7 days [5–7]. The reaction against absorbable sutures continues until the sutures are completely broken down. The major disadvantages of silk and other multifilament suture materials are that they often remain in the tissues for years as foreign bodies, allowing capillary penetration of bacteria, which can cause an acute or delayed infection by initiating an inflammatory process together with other fluids in the tissue. Consequently, they may cause abscess, granuloma, and fistula at the incision site in the early period or in other regions of the body in the late period [1, 2, 8]. However, such complications are rare in the umbilicus. In the previous study claimed the patient who had UIF the lateral umbilical ligament guided the fistula tract [9]. Because of that ligament runs alongside the inferior epigastric artery and becomes fibrotic after birth. It extends from the inguinal ring to the arcuate line, which allows the passage of the ductus deferens, testicular artery, and other components of the spermatic cord in the male, or the round ligament of the uterus in the female. Abnormal regression of fetal anatomical structures may predispose to an inguinal fistula. Another factor that may lead to formation of a fistula is weakened connective tissue resulting from an inguinal hernia.

The present case and five cases from the literature are illustrated in Table 1. All the patients were boys who underwent surgery in the first year of life and developed an infection of their incision. However, the case described here had no postoperative complications. In the other cases, the fistula tract was removed, but in our case, the fistula tract was left in place and washed with copious saline, and a drain was placed to allow drainage during recovery. Under these conditions, the lateral umbilical ligament may fibrose. Swelling and/or infection in the inguinal region may cause opening of this structure, leading to a fistula. The ligament usually closes later in the male than the female, which explains why the majority of cases are male.

Table 1: The cases of acquired umbilical fistula after repair of inguinal hernia with the present case.

Case no.
Publication
Age
Sex
Side
Age of initial operation
Wound infection
Treatment

1
Yokomori et al. (1979) [5]
3 y
Male
Right
1 mnt
Yes
Fistulectomy

2
Yokomori et al. (1979) [5]
1 y
Male
Left
3 mnt
Yes
Fistulectomy

3
Okuyama et al. (1998) [6]
2 y
Male
Right
8 mnt
Yes
Fistulectomy

4
Daglı and Sehiraltı (1990) [9]
7 y
Male
Left
3 mnt
No
Fistulectomy

5
Daglı and Sehiraltı (1990) [9]
4 y
Male
Right
36 mnt
No
Fistulectomy

6
Present Case
3 y
Male
Right
10 mnt
No
Placed the drain in the fistula tract

In conclusion, when persistent umbilical discharge is observed following an inguinal hernia repair, a foreign body reaction against the suture material should be considered in the differential diagnosis.

References

M. İmamoglu, A. Cay, H. Sarihan, A. Ahmetoǧlu, and O. Özdemir, “Paravesical abscess as an unusual late complication of inguinal hernia repair in children,” Journal of Urology, vol. 171, no. 3, pp. 1268–1270, 2004.

H. Kise, T. Shibahara, N. Hayashi, K. Arima, M. Yanagawa, and J. Kawamura, “Paravesical granuloma after inguinal herniorrhaphy. Case report and review of the literature,” Urologia Internationalis, vol. 62, no. 4, pp. 220–222, 1999.

P. M. Mshelbwala, L. Sabiu, L. B. Chirdan, E. A. Ameh, and P. T. Nmadu, “Persistent umbilical discharge in infants and children,” Annals of Tropical Paediatrics, vol. 26, no. 2, pp. 133–135, 2006.

C. M. Calkins, S. D. S. Peter, A. Balcom, and P. J. Murphy, “Late abscess formation following indirect hernia repair utilizing silk suture,” Pediatric Surgery International, vol. 23, no. 4, pp. 349–352, 2007.

K. Yokomori, T. Hori, H. Nozawa, et al., “Acquired umbilical fistula following operation for indirect inguinal hernia,” The Japanese Society of Pediatric Surgeons, vol. 15, p. 425, 1979.

H. Okuyama, M. Fukuzawa, H. Nakai, and A. Okada, “Acquired umbilical fistula after repair of inguinal hernia: a case report,” Journal of Pediatric Surgery, vol. 33, no. 5, pp. 737–738, 1998.

S. Katz, M. Izhar, and D. Mirelman, “Bacterial adherence to surgical sutures. A possible factor in suture induced infection,” Annals of Surgery, vol. 194, no. 1, pp. 35–41, 1981.

J. Cahill, A. D. Northeast, P. E. Jarret, and R. D. Leach, “Sutures for inguinal herniorrhaphy—a comparison of monofilaments with PTFE,” Annals of the Royal College of Surgeons of England, vol. 71, no. 2, pp. 128–130, 1989.

T. Daglı and V. Sehiraltı, “İnguinal herni onarımının nadir bir komplikasyonu: umbilikal akıntı,” Pediatrik Cerrahi Dergisi, vol. 4, 1990.