Case Reports in Neurological Medicine

Volume 2013 (2013), Article ID 636070, 3 pages

http://dx.doi.org/10.1155/2013/636070

Case Report

Native Valve Endocarditis due to Enterococcus hirae Presenting as a Neurological Deficit

Renato Anghinah,1,2,3 Rafael Gustavo Sato Watanabe,1,2 Mateus Mistieri Simabukuro,1,2 Carla Guariglia,1,2 Lécio Figueira Pinto,1,2 and Daniella Costa de Menezes e Gonçalves⁴

¹Neurology Department at Hospital Samaritano, São Paulo, SP, Brazil

²Neurology Department at Clinic Hospital of Medicine School, University of São Paulo (HCFMUSP), São Paulo, SP, Brazil

³University of São Paulo Medical School, Division of Neurology of the Medicine School, Rua Itacolomi 333/83, São Paulo, SP, Brazil

⁴Infectology Department at Hospital Samaritano, São Paulo, SP, Brazil

Received 11 July 2013; Accepted 19 August 2013

Academic Editors: F. C. Henderson and F. T. Mangano

Copyright © 2013 Renato Anghinah et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Enterococcus hirae is a rare isolate in clinical specimens. We describe a case of native aortic valve endocarditis in a 56-year-old man. This is the third reported case of endocarditis due to this organism, the first without recurrence of endocarditis and the first presenting as a neurological deficit.

1. Introduction

Enterococci are Gram-positive bacteria that are established as major nosocomial pathogens and really important due to the development and transmission of antibiotic resistance traits [1]. The enterococci are the third most common cause of infective endocarditis, accounting for 5 to 15% of cases, and associated with a mortality of 20 to 30% [1]. The majority of enterococcal strains isolated from human specimens belong to the Enterococcus faecalis (80%) and Enterococcus faecium (10%) species. E. hirae accounts for less than 1% of enterococcal species in human clinical samples [2]. This species is known to cause infections in a range of young farmed species and psittacine birds [3, 4], but it is very rare in humans. The first description of E. hirae infection in humans, by Gilad et al. in 1998, reported a case of septicemia in a patient with end-stage renal disease undergoing hemodialysis [5]. We describe a case of native aortic valve endocarditis in a 56-year-old man. This is the first reported case of endocarditis presenting as a neurological deficit.

2. Case Presentation

In August 2011, a 56-year-old man presented with a symptom of slurred speech from the moment he woke up. He had a previous medical history of hypertension, diabetes, hypercholesterolemia, cardiac arrhythmia with surgical ablation, and surgical removal of a gastric leiomyoma. In the previous month he lost 8 Kg and felt generalized fatigue, depressive symptoms, and evening fever (but not measured at home). On examination, our patient was dysarthric and dysphagic, associated with a complete left hemiparesis (grade IV). His temperature was 38°C, and pulse rate was 80 beats per min; blood pressure was 110/70 mmHg and cardiac examination was normal, without cardiac murmurs. The initial brain MRI (Figure 1) showed hyperintensity in T2/FLAIR and diffusion-weighted images at the right insula, compatible with ischemic lesion. Transesophageal echocardiogram revealed patent foramen ovale and the presence of an irregular vegetative image between the commissures of the aortic valve at its maximal extension with 34 mm. The patient was initially treated with oxacillin (150 mg/Kg/day) plus gentamicin (3 mg/Kg/day). Cerebrospinal fluid revealed 35 cells, 75% neutrophils, protein 52, glucose 62, and lactate 23; then ampicillin was associated (150 mg/Kg/day) considering the diagnosis of listeria. After 10 days of investigation and treatment, blood culture was positive for Enterococcus hirae. Therefore the antibiotic regimen was altered to ampicillin plus rifampin (7.5 mg/Kg/day).

Figure 1

In a control brain MRI in the diffusion-weighted image a new lesion was found in the right parietal cortex (Figure 2); a new transesophageal echocardiogram showed aortic valve reflux of moderate to important intensity, vegetative image at its maximal extension with 23 mm, and mitral valve with moderate reflux associated with an image compatible with a vegetation of 16 to 21 mm. He promptly underwent a successful cardiac surgery for the replacement of the aortic valve by a biological valve, plastic of the mitral valve, and correction of the foramen ovale. The patient improved his clinical condition and laboratory markers, with minimal alteration on neurological exam; he completed a total of 4 weeks of intravenous antibiotic (ampicillin plus rifampicin) and was discharged with amoxicillin plus rifampin for another 2 weeks. At last followup in February, 2012, he had resumed work and was asymptomatic.

Figure 2

3. Discussion

Enterococcus is Gram-positive bacteria. They belong to the microbiota of animals and humans as commensal colonization. Nonetheless, both E. faecalis and E. faecium are frequently associated with human infection such as bacteremia, endocarditis, and urinary tract infections. E. hirae is a pathogen frequently associated with infections in animal species such as birds. In humans the enterococci are usually commensals of the digestive tract causing infections in less than 1% [5–7]. The first report of human infection caused by E. hirae was described by Gilad et al. [5] in 1998 in a case of septicemia in a patient with end-stage renal disease under hemodialysis. Regarding endocarditis caused by E. hirae our patient is the third case described so far. We believe that the importance of this case is due to the fact that it was the first treated without recurrence.

Poyart et al. [8] in 2002 described a case of a patient with infectious endocarditis in a native aortic valve by E. hirae treated initially with the association of ampicillin (200 mg/Kg/day) plus gentamicin (3 mg/Kg/day) for 4 weeks, and 2 weeks after the initiation of antibiotics, rifampin (25 mg/Kg/day) was associated for 2 weeks. The patient was released from the hospital in use of oral ampicillin and rifampin for another 3 weeks. These antibiotics were ineffective in sterilizing the aortic vegetation and 3 months after suspension of antibiotics there was a relapse of the infectious endocarditis. A different antibiotic program was initiated: vancomicin 60 mg/Kg/day plus gentamicin 3 mg/Kg/day for 6 weeks; it was associated with valve exchange after 10 days of antibiotics and followed by oral amoxicillin 6 g/day for a total of 8 weeks. A similar outcome was reported by Talarmin et al. [9] in 2011; first amoxicillin 200 mg/Kg/day (IV) plus gentamicin 3 mg/Kg/day (IV) for 2 weeks was introduced followed by amoxicillin 200 mg/Kg/day (IV) plus rifampin 20 mg/Kg/day for a total of 6 weeks. After 4 months of the treatment ended, the endocarditis in the prosthetic valve relapsed; it was then restarted amoxicillin 200 mg/Kg/day IV for 6 weeks plus gentamicin 3 mg/Kg/day (IV) for 2 weeks associated with rifampin for 4 weeks. Rifampin seems to be indicated in the treatment of Staphylococcus aureus in prosthetic valve, probably by its ability to penetrate the biofilm of the bacteria [10] although this was not extensively studied for the Enterococcus species. The ideal therapeutic for E. hirae infections remains unknown, but as we demonstrated, the hypothesis that rifampin is beneficial to the treatment regimens seems plausible. According to previous data the infectious endocarditis by E. hirae seemed to cause severe endocarditis [8, 9] with bad prognosis (valve exchange, recurrence); because our patient needed valve exchange by neurological cause (new lesions in MRI, despite the lack of symptoms), we cannot be sure that it would not relapse without the valve exchange. Therefore the procedure of valve exchange should be considered in endocarditis caused by this pathogen.

Conflict of Interests

The authors declare that they do not have conflict of interests.

References

B. E. Murray, “The life and times of the Enterococcus,” Clinical Microbiology Reviews, vol. 3, no. 1, pp. 46–65, 1990.

P. Vandamme, E. Vercauteren, C. Lammens et al., “Survey of enterococcal susceptibility patterns in Belgium,” Journal of Clinical Microbiology, vol. 34, no. 10, pp. 2572–2576, 1996.

L. A. Devriese, J. I. Cruz Colque, F. Haesebrouck, M. Desmidt, E. Uyttebroek, and R. Ducatelle, “Enterococcus hirae in septicaemia of psittacine birds,” Veterinary Record, vol. 130, no. 25, pp. 558–559, 1992.

L. A. Devriese and F. Haesebrouck, “Enterococcus hirae in different animal species,” Veterinary Record, vol. 129, no. 17, pp. 391–392, 1991.

J. Gilad, A. Borer, K. Riesenberg, N. Peled, A. Shnaider, and F. Schlaeffer, “Enterococcus hirae septicemia in a patient with end-stage renal disease undergoing hemodialysis,” European Journal of Clinical Microbiology and Infectious Diseases, vol. 17, no. 8, pp. 576–577, 1998.

T.-S. Chan, M. Wu, F. Suk et al., “Enterococcus hirae-related acute pyelonephritis and cholangitis with bacteremia: an unusual infection in humans,” Kaohsiung Journal of Medical Sciences, vol. 28, no. 2, pp. 111–114, 2012.

E. Canalejo, R. Ballesteros, J. Cabezudo, M. I. García-Arata, and J. Moreno, “Bacteraemic spondylodiscitis caused by Enterococcus hirae,” European Journal of Clinical Microbiology and Infectious Diseases, vol. 27, no. 7, pp. 613–615, 2008.

C. Poyart, T. Lambert, P. Morand et al., “Native valve endocarditis due to Enterococcus hirae,” Journal of Clinical Microbiology, vol. 40, no. 7, pp. 2689–2690, 2002.

J. P. Talarmin, S. Pineau, A. Guillouzouic et al., “Relapse of Enterococcus hirae prosthetic valve endocarditis,” Journal of Clinical Microbiology, vol. 49, no. 3, pp. 1182–1184, 2011.

R. Saginur, M. St. Denis, W. Ferris et al., “Multiple combination bactericidal testing of staphylococcal biofilms from implant-associated infections,” Antimicrobial Agents and Chemotherapy, vol. 50, no. 1, pp. 55–61, 2006.