Case Reports in Obstetrics and Gynecology

Volume 2013 (2013), Article ID 658902, 2 pages

http://dx.doi.org/10.1155/2013/658902

Case Report

Pyometra Perforation Caused by Actinomyces without Intrauterine Device Involvement

Hideharu Hagiya

Emergency Unit and Critical Care Center, Tsuyama Central Hospital, 1756 Kawasaki, Tsuyama, Okayama 708-0841, Japan

Received 8 March 2013; Accepted 28 April 2013

Academic Editors: P. De Franciscis, C.-C. Liang, I. MacKenzie, E. F. C. Murta, and B. Piura

Copyright © 2013 Hideharu Hagiya. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

An 86-year-old woman with diabetes mellitus and severe decubitus at the sacral and calcaneal regions stemming from poor daily activity was diagnosed with pyometra perforation caused by Actinomyces. No foreign materials, including an IUD, were found inside the uterus. Pyometra is usually caused by Enterobacteriaceae or anaerobes derived from the gastrointestinal tract. The virulence of Actinomyces is rather low, and, in almost all the reported cases of Actinomyces-related pyometra, an intrauterine device (IUD) was involved. Although rare, Actinomyces may be ascribed as a virulent pathogen that causes pyometra in the absence of foreign materials.

1. Introduction

Pyometra is caused by bacterial infection of the uterus, which frequently occurs in postmenopausal women. It can vex physicians by causing fever of unknown origin, or sometimes, panperitonitis due to perforation. Pathogens considered common are Enterobacteriaceae or anaerobes derived from the gastrointestinal tract. Actinomyces has been reported as the causative pathogen; however, in almost all reported cases, an intrauterine device (IUD) was involved [1–4]. I describe a case of panperitonitis caused by Actinomyces-induced pyometra perforation without IUD involvement.

2. Case

An 86-year-old woman with diabetes mellitus and severe decubitus at the sacral and calcaneal regions stemming from poor daily activity showed altered mental status. She has never used IUD previously. On arrival at our hospital, she was in shock, and physical examination revealed tenderness over the lower abdomen. A laboratory examination revealed pleocytosis (white blood cell count, 24,400/μL) and a high inflammatory activity (C-reactive protein level, 8.5 mg/dL). Her serum glucose level was 425 mg/dL and hemoglobin A₁c level was 8.2%. Ultrasonography showed fluid retention at Douglas’ pouch, and abdominal computed tomography revealed gas production inside her distended uterus and intra-abdominal fluid retention (Figure 1). Under a diagnosis of pyometra perforation, an emergent total abdominal hysterectomy and bilateral salpingo-oophorectomy was performed. Purulent ascites accounted for intraperitoneal space and the perforation site was found at the fundus of the edematous, swollen, and fragile uterine. Microscopic examination showed an infiltration of many neutrophils with necrotic changes; phlegmonous or gangrenous inflammatory changes, but no malignant findings were obtained. No IUD was detected inside the uterus. Gram staining of intraperitoneal and uterine pus revealed a polymicrobial pattern containing a filamentous organism, but bacterial culture detected only Actinomyces. The patient was successfully treated with meropenem for 8 days, followed by cefmetazole for 7 days, and was discharged on hospital day 27. A detailed identification of the Actinomyces was not performed.

Figure 1: Emphysematous changes inside the wall of the distended uterus.

3. Discussion

Actinomyces is a nonmotile, nonspore-forming, nonacid-fast, Gram-positive, pleomorphic, anaerobic-to-microaerophilic filamentous bacillus [5]. It is prominent among the normal flora of the oral cavity but is less common in the lower gastrointestinal tract and female genital tract. Because the growth rate and virulence of Actinomyces are low, this organism requires the presence of broken or damaged mucous membranes or tissues to invade deeper structures and cause disease in humans.

Although many cases of abscess formation caused by Actinomyces at other sites of the body have been reported, only a few cases of Actinomyces-induced pyometra in humans that did not involve foreign materials or IUDs have been reported [6, 7]. The presence of foreign materials such as an IUD inside the uterus could promote the proliferation of Actinomyces through damage of the endometrial tissue. Malignant cells invade the endometrial tissue and can be a predisposing factor of Actinomyces infection; however, pathological examination did not reveal such a condition in the present case.

Actinomyces usually causes a polymicrobial infection, with isolates containing as many as 5–10 bacterial species [8]. In this case, only Actinomyces was isolated, but Gram staining revealed other Gram-positive or Gram-negative organisms. Coinfection with other obligate anaerobes was considered to have occurred, and the presence of these companion bacteria could have enhanced the relatively low virulence of Actinomyces, causing pyometra and the eventual perforation without IUD involvement.

Although rare, Actinomyces may be ascribed as a virulent pathogen that causes pyometra in the absence of foreign materials.

Conflict of Interests

The author states that he has no conflict of interests.

References

A. Kriplani, K. Buckshee, S. Relan, and K. Kapila, “‘Forgotten’ intrauterine device leading to actinomycotic pyometra—13 years after menopause,” European Journal of Obstetrics Gynecology and Reproductive Biology, vol. 53, no. 3, pp. 215–216, 1994.

D. Dharmadhikari, R. Dharmadhikari, J. Macdonald, and R. Beukenholdt, “Intrauterine contraceptive device-related actinomycosis infection presenting as an incarcerated inguinal hernia,” Journal of Obstetrics and Gynaecology Research, vol. 33, no. 4, pp. 595–597, 2007.

V. Phupong, T. Sueblinvong, K. Pruksananonda, S. Taneepanichskul, and S. Triratanachat, “Uterine perforation with Lippes loop intrauterine device-associated actinomycosis. A case report and review of the literature,” Contraception, vol. 61, no. 5, pp. 347–350, 2000.

R. J. Lely and H. W. Van Es, “Case 85: pelvic actinomycosis in association with an intrauterine device,” Radiology, vol. 236, no. 2, pp. 492–494, 2005.

V. T. De Montpréville, N. Nashashibi, and E. M. Dulmet, “Actinomycosis and other bronchopulmonary infections with bacterial granules,” Annals of Diagnostic Pathology, vol. 3, no. 2, pp. 67–74, 1999.

M. Charnock and T. J. Chambers, “Pelvic actinomycosis and intrauterine contraceptive devices,” The Lancet, vol. 1, no. 8128, pp. 1239–1240, 1979.

A. S. Fiorino, “Intrauterine contraceptive device-associated actinomycotic abscess and Actinomyces detection on cervical smear,” Obstetrics and Gynecology, vol. 87, no. 1, pp. 142–149, 1996.

W. C. Weese and I. M. Smith, “A study of 57 cases of actinomycosis over a 36 year period. A diagnostic ‘failure’ with good prognosis after treatment,” Archives of Internal Medicine, vol. 135, no. 12, pp. 1562–1568, 1975.