Case Reports in Obstetrics and Gynecology
Volume 2015 (2015), Article ID 170978, 1 page
http://dx.doi.org/10.1155/2015/170978

Corrigendum

Corrigendum to “The Treatment of Giant Periurethral Condyloma in Pregnancy Using an Ultrasonic Thermal Scalpel: A Case Report and New Single Session Treatment Option”

Ali Yavuzcan,¹ Mete Çağlar,¹ Hakan Turan,² Ali Tekin,³ Gizem Yavuzcan,² Seren Topuz,¹ Serdar Dilbaz,¹ Yusuf Üstün,¹ Cihangir Aliağaoğlu,² and Selahattin Kumru¹

¹Department of Obstetrics & Gynaecology, Düzce University Faculty of Medicine, 81000 Düzce, Turkey
²Department of Dermatology, Düzce University Faculty of Medicine, 81000 Düzce, Turkey
³Department of Urology, Düzce University Faculty of Medicine, 81000 Düzce, Turkey

Received 19 October 2015; Accepted 20 October 2015

Copyright © 2015 Ali Yavuzcan et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the paper “The Treatment of Giant Periurethral Condyloma in Pregnancy Using an Ultrasonic Thermal Scalpel: A Case Report and New Single Session Treatment Option” [1], the authors’ order is corrected as above.

References

A. Yavuzcan, M. Çağlar, H. Turan et al., “The treatment of giant periurethral condyloma in pregnancy using an ultrasonic thermal scalpel: a case report and new single session treatment option,” Case Reports in Obstetrics and Gynecology, vol. 2015, Article ID 792412, 4 pages, 2015.