Case Reports in Obstetrics and Gynecology
Volume 2019 (2019), Article ID 6025938, 1 page
https://doi.org/10.1155/2019/6025938

Retraction

Retracted: Extreme Anemia (Hemoglobin 1.8 g/dL) Secondary to Abnormal Uterine Bleeding

Case Reports in Obstetrics and Gynecology

Received 9 April 2019; Accepted 9 April 2019; Published 24 April 2019

Copyright © 2019 Case Reports in Obstetrics and Gynecology. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

At the request of the authors, the article titled “Extreme Anemia (Hemoglobin 1.8 g/dL) Secondary to Abnormal Uterine Bleeding” [1] has been retracted. The article was found to contain a substantial amount of material from the following published article, cited as :

R. E. Schmitt and C. J. Buckley II, “Extreme Anemia (Hemoglobin 1.8 G/Dl) Secondary to Colon Cancer,” Baylor University Medical Center Proceedings, 29:4, 393-394, 2016. [2]

The article was also found to contain a substantial amount of material, without citation, from the following published article:

B. Ma, “Excessive Uterine Bleeding in a Non-Compliant Patient with Profound Hypothyroidism: A Case Report and Review of the Literatures,” Journal of Medical Cases, North America, 2016. [3]

References

K. Panse, R. Regn, and J. May, “Extreme anemia (hemoglobin 1.8 g/dL) secondary to abnormal uterine bleeding,” Case Reports in Obstetrics and Gynecology, vol. 2017, Article ID 5179265, 3 pages, 2017.

R. E. Schmitt and C. J. Buckley, “Extreme anemia (hemoglobin 1.8 g/dL) secondary to colon cancer,” Baylor University Medical Center Proceedings, vol. 29, no. 4, pp. 393-394, 2017.

B. Ma, “Excessive uterine bleeding in a non-compliant patient with profound hypothyroidism: a case report and review of the literatures,” Journal of Medical Cases, vol. 7, no. 6, pp. 234–238, 2016.