Case Reports in Ophthalmological MedicineVolume 2012 (2012), Article ID 720201, 2 pagesdoi:10.1155/2012/720201

Case Report

Asymptomatic Intracorneal Graphite Deposits following Graphite Pencil Injury

Swetha Sara Philip, Deepa John, and Sheeja Susan John

Department of Ophthalmology, Christian Medical College and Hospital, Tamil Nadu, Vellore 632001, India

Received 25 November 2011; Accepted 26 February 2012

Academic Editors: A. A. Bialasiewicz and H. Y. Chen

Copyright © 2012 Swetha Sara Philip et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Reports of graphite pencil lead injuries to the eye are rare. Although graphite is considered to remain inert in the eye, it has been known to cause severe inflammation and damage to ocular structures. We report a case of a 12-year-old girl with intracorneal graphite foreign bodies following a graphite pencil injury.

1. Introduction

Ocular injuries with graphite pencil lead are rare. There is only one case report of intracorneal graphite foreign bodies following graphite pencil lead injury in literature to date [1]. We report a case of a 12-year-old girl with intracorneal graphite foreign bodies, which remained inert in the eye for the past three years.

2. Case Report

A 12-year-old girl came to our outpatient clinic for a routine ophthalmological checkup. She had been using glasses for the past three years. She did not complain of any other problems in her eyes. On examination, her best corrected visual acuity (BCVA) was found to be 6/6 J1 with myopic astigmatism in both eyes. Examination of the anterior segment of the right eye showed a linear anterior stromal corneal scar, which was located at the inferior pupillary margin. The scar measured about 4.5 mm and was studded with refractile particles along its entire length (Figure 1). There was no evidence of any damage to any intraocular structures. There was no evidence of past or present inflammation in the eye. The left eye was normal.

Figure 1: Graphite particles seen within the corneal stroma of the right eye.

When questioned regarding any past ocular injury, the parents told us that the patient had been accidentally poked in the right eye with a graphite pencil about three years ago. There was mild redness and pain in the eye soon after the injury. This was treated with some topical antibiotics and lubricants. The symptoms resolved with this treatment and she has been entirely asymptomatic to date.

Since there was no evidence of active inflammation or progressive damage to the ocular structures, we decided against any further intervention. The patient is currently on followup.

3. Discussion

Graphite pencils are made of graphite and clay, mixed with animal oils and fats, with a wooden surround [2]. Although graphite pencils are universally used in classrooms and homes across the world by young children, there are not many reports of injuries to the eye and adnexa with these pencils [3–8]. In the reported cases of ocular injury with graphite pencil lead, the commonly injured sites are the eyelids and orbit [3, 4]. This could be due to the fact that when an object is brought close to the eye, there is sudden closure of both eyes as part of the protective “menace reflex.” Consequently, there is less chance of injury to the eye itself.

There are only nine reports of injury to the eye with graphite pencil lead in literature [4–10]. Graphite is generally known to remain inert in the eye [4]. However, there have been reports of severe inflammatory reaction and endophthalmitis following graphite pencil lead injury [5]. It has been suggested that the other components of the pencil like wood or aluminium may have been the cause of severe ocular inflammatory reaction in these cases [5]. A case in which a graphite foreign body in the conjunctiva simulated a melanoma, resulting in surgical intervention, has also been reported [7]. There has only been one report of intracorneal graphite foreign bodies in literature [1]. As in our case, the patient was totally asymptomatic and had good visual acuity in the involved eye.

There is paucity of data regarding ocular injuries with graphite pencil lead. It is possible that many such injuries go unnoticed and unreported as the patients are often totally asymptomatic. However, in view of the fact that graphite pencil lead injuries have on rare occasions, been reported to cause severe ocular inflammatory reaction and endophthalmitis, resulting in poor vision, it is imperative that all such cases be reported.

Disclosure

None of the authors has any affiliations with or involvement in any organisation or entity with a direct financial interest in the subject matter or materials discussed in the paper.

References

B. H. Jeng, J. P. Whitcher, and T. P. Margolis, “Intracorneal graphite particles,” Cornea, vol. 23, no. 3, pp. 319–320, 2004.

Y. Nishimura, “How to make pencil lead,” Chemistry, vol. 39, p. 401, 1984.

R. C. Nayar, R. L. Kanton, and J. D. Kingham, “Graphite pencil as unsuspected intraocular foreign body,” Journal of Ocular Therapy and Surgery, vol. 4, no. 4, pp. 130–134, 1985.

Y. Honda and K. Asayama, “Intraocular graphite pencil lead without reaction,” American Journal of Ophthalmology, vol. 99, no. 4, pp. 494–495, 1985.

N. Hamanaka, T. Ikeda, N. Inokuchi, S. Shirai, and Y. Uchihori, “A case of an intraocular foreign body due to graphite pencil lead complicated by endophthalmitis,” Ophthalmic Surgery and Lasers, vol. 30, no. 3, pp. 229–231, 1999.

E. R. Han, W. R. Wee, J. H. Lee, and J. Y. Hyon, “A case of retained graphite anterior chamber foreign body masquerading as stromal keratitis,” Korean Journal of Ophthalmology, vol. 25, no. 2, pp. 128–131, 2011.

J. R. Guy and N. A. Rao, “Graphite foreign body of the conjunctiva simulating melanoma,” Cornea, vol. 4, no. 4, pp. 263–265, 1985.

A. Amritanand, S. S. John, S. S. Philip, D. John, and S. David, “Unusual case of a graphite foreign body in the anterior chamber,” Clinics and Practice, vol. 1, article e73, 2011.

N. Seider, M. Gilboa, E. Lautman, and B. Miller, “Delayed presentation of orbito—cerebral abscess caused by pencil—tip injury,” Ophthalmic Plastic and Reconstructive Surgery, vol. 22, no. 4, pp. 316–317, 2006.

D. A. Paine, P. B. Pruett, and J. B. Randleman, “Occult perforating corneal injury from mechanised pencil graphite,” Ophthalmic Surgery, Lasers & Imaging, vol. 2, pp. 1–3, 2010.