Case Reports in Orthopedics
Volume 2014 (2014), Article ID 856853, 5 pages
http://dx.doi.org/10.1155/2014/856853

Case Report

Retrograde Intramedullary Nailing with a Blocking Pin Technique for Reduction of Periprosthetic Supracondylar Femoral Fracture after Total Knee Arthroplasty: Technical Note with a Compatibility Chart of the Nail to Femoral Component

Ichiro Tonogai, Daisuke Hamada, Tomohiro Goto, Tomoya Takasago, Takahiko Tsutsui, Naoto Suzue, Tetsuya Matsuura, and Koichi Sairyo

Department of Orthopedics, Institute of Health Biosciences, University of Tokushima Graduate School, 3-18-15 Kuramoto, Tokushima 770-8503, Japan

Received 25 August 2014; Accepted 23 November 2014; Published 11 December 2014

Academic Editor: Werner Kolb

Copyright © 2014 Ichiro Tonogai et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Periprosthetic fractures after total knee arthroplasty (TKA) present a clear management challenge, and retrograde intramedullary nails have recently gained widespread acceptance in treatment of these fractures. In two cases, we found a blocking screw technique, first reported by Krettek et al., was useful in the reduction of the fractures. Both patients attained preinjury mobility after intramedullary nailing. Moreover, we present a chart summarizing the notch designs of various femoral components because some prosthetic knee designs are not amenable to retrograde nailing. We hope this will be helpful in determining indications for retrograde nailing in periprosthetic fractures after TKA.

1. Introduction

The number of periprosthetic supracondylar femoral fractures is increasing due to more total knee arthroplasties (TKAs) being performed on increasingly elderly patients, and postoperative activity and survival are also increasing. Other risk factors for these fractures include steroid use, rheumatoid arthritis, neurological disorders [1], and possibly anterior notching during surgery [2]. The incidence of these fractures ranges from 0.3% to 2.5% [3], and some problems associated with them include a short distal segment for fixation, osteoporotic bone, nonunion, malunion, and malalignment, all of which make treatment challenging [4].

Rorabeck’s classification of periprosthetic supracondylar fractures is commonly used to evaluate fracture displacement and prosthetic stability [4]. If there is no evidence of TKA loosening, the main treatment option for supracondylar femoral fractures is plating [5–9] or intramedullary nailing [10–13]. The conventional open plating technique results in vascular disruption, which increases the risk of malunion and mechanical failure [14]. Furthermore, the failure rate of plating is twice that of intramedullary nail fixation [15]. However, intramedullary nailing for these fractures can be technically difficult; obtaining a satisfactory reduction is especially challenging.

To achieve anatomical reduction of supracondylar fractures, in 1999 Krettek et al. [16, 17] reported the Poller (blocking) screw technique as an important adjunct for intramedullary nailing. This technique has subsequently been shown to be effective in aiding fracture reduction [18, 19], but there have been no reports of this technique being applied specifically for the reduction of periprosthetic supracondylar fracture. Here we report 2 cases of such fracture treated with intramedullary nailing and the blocking screw technique that achieved excellent reduction.

Although most modern knee prostheses allow insertion of a retrograde supracondylar nail, it is important to evaluate whether the femoral component can allow it [20]. Therefore, we also reviewed the notch designs of various femoral components and summarize the compatibility of the supracondylar nails and femoral components that can be used.

2. Case Report

Case 1. A 58-year-old woman with rheumatoid arthritis underwent TKA (Omnifit 3000; Stryker, Kalamazoo, MI) 18 years before presentation. The intercondylar width of the femoral component was 19.5 mm, but the distance from the anterior femoral osteotomy phase to the open box anterior edge of the component was not noted. She presented to us at age 76 with a displaced supracondylar fracture of the left femur, just proximal to the implant (Rorabeck type II) after tripping and falling (Figure 1(a)). We, arthroplasty surgeons, performed fixation using a retrograde femoral nail. A 5 cm vertical skin incision was made just medial to the patellar tendon, and the soft tissues were spread. The entry for the nail was made using a guide wire. Initially, we could not achieve satisfactory reduction with the distal fragment extended in sagittal plane when the nail was inserted between the condyles of the femoral prosthesis. Next, a K-wire of 2.4 mm diameter × 300 mm length was inserted on the lateral side of the distal fragment as a blocking pin to prevent extension deformity and to guide the nail to the center of the distal fragment (Figure 1(b)). Then, a 13 mm diameter × 170 mm length T2 supracondylar femoral nail (Stryker) was inserted with a satisfactory reduction (Figure 1(c)). After the nail was locked, the blocking pin was removed and no cross lock screw was used after fixation. Although recurrent pyogenic spondylitis delayed rehabilitation, the supracondylar femur fracture healed, with and angles, which indicate the coronal and sagittal alignments of the femoral component on the postoperative radiographs, of 97° and 0°, respectively. At the final followup 2 years after surgery for fracture, she had regained her preinjury mobility.

(a)

(b)

(c)

Figure 1: (a) Radiographs of the left displaced periprosthetic supracondylar fracture. (b) A 2.4 mm block pin inserted on the lateral side of the distal fragment. (c) The nail inserted with excellent repositioning of the fracture site.

Case 2. A 71-year-old woman underwent right TKA for treatment of osteoarthritis (LCS; Depuy, Warsaw, IN) 6 years before presentation. The intercondylar width of this femoral component was 17.5 mm, and the distance from the anterior femoral osteotomy phase to the anterior edge of the open box component was 16.3 mm. She presented to our team, which was the same surgical team including the same supervising senior surgeon as with Case 1, at age 77 with a fracture above the prosthesis (Rorabeck type II) after a minor fall (Figure 2(a)). The patient underwent retrograde femoral nail placement with a 13 mm diameter × 200 mm length T2 supracondylar femoral nail (Stryker). Initially the nail did not provide a satisfactory reposition; we inserted two K-wires of 2.4 mm diameter × 300 mm length into the distal and proximal fragments from lateral to medial to prevent a sagittal plane deformity (Figure 2(b)). The fracture site was repositioned well without gap and extension deformity, and the blocking pin was removed after the nail was locked (Figure 2(c)). No cross lock screw was added after fixation. Her recovery was uneventful. The right supracondylar femoral fracture healed, with and angles of 98° and 3°, respectively. At the final followup 2 years after surgery for fracture, she was able to walk without any aids on a stable knee with a range of movement of 0–90°.

(a)

(b)

(c)

Figure 2: (a) Radiographs of a fracture located proximal to the right femoral component of TKA. (b) On the lateral side, 2.4 mm blocking pins inserted into the distal and proximal fragments. (c) Acceptable reduction and fixation of the fracture with a nail.

3. Discussion

Managing periprosthetic supracondylar fractures is complicated by several factors, including osteoporotic bone in the distal femoral metaphyseal region, distal segments that are short for adequate fixation, nonunion, malunion, and malalignment [4]. A retrograde femoral intramedullary nail is the ideal choice because it provides adequate stabilization of the periprosthetic supracondylar fracture, with minimal disturbance of the fracture hematoma and minimal soft tissue stripping. However, anatomical reduction may not always be possible with standard closed intramedullary nailing because the distal medulla of the femur is wider than the middle diaphysis, and the intramedullary nail cannot completely fill the intramedullary canal [18, 21, 22].

Blocking screws are designed to guide the intramedullary nail to the desired direction by narrowing the intramedullary canal and obtaining better reduction [18, 19]. In our cases, we inserted a 2.4 mm K-wire into the fragment from lateral to medial to prevent a hyperextension deformity and guided the intramedullary nail using the Poller screw technique. This procedure resulted in excellent fracture reduction. Furthermore, the fracture healed without displacement, even though the blocking pins were removed after fixation. To our knowledge, this is the first report demonstrating the efficacy of the blocking pin technique for correcting deformities encountered during intramedullary nailing of periprosthetic supracondylar fractures.

Intramedullary devices are not applicable to all designs of TKA. Retrograde intramedullary nail techniques generally require an open box femoral prosthesis. Figure 3 and Table 1 give a summary of the notch designs of various femoral components, including intercondylar width and distance from the anterior femoral osteotomy phase to the anterior edge of the open box component. As Currall et al. and Heckler et al. reported, we believe that the intercondylar width is one of the most important factors when determining nail compatibility [23, 24]. Because the smallest distal diameter of retrograde nails is 11.5 mm for the T2 supracondylar nail (Stryker) and the TRIGEN short knee nail (Smith & Nephew, Memphis, TN), the intercondylar distance must be more than 12 mm to accommodate the nail [12]. Moreover, the distance from the anterior femoral osteotomy phase to the anterior edge of the open box of the component is also of major importance. If it is long, a deformity may occur in extension of the femoral prosthetic component produced by an overly posterior nail entry point in the intercondylar notch. On the other hand, we also have to be aware that the inserted postcum in the posterior stabilized type may interfere with the nail end, and the peg of the femoral implant may interfere with the most distal locking screw [25]. Note that the compatibility chart shown in Table 1 may not be applicable if the femoral component is placed in an incorrect position or direction.

Table 1: Intercondylar notch designs of the inserted TKAs and their compatibility with supracondylar nails. All these dimensions were officially provided by the manufactures.

Manufacture & model name of the component
Size of the component
Intercondylar width of the component (mm)
Distance from the anterior femoral osteotomy phase to the open box anterior edge of the component (mm)

Senko Medical (Tokyo, Japan)

    Quest CR
1–5
15–18.6
18.9–24.7

Smith & Nephew (Memphis, TN)

    Genesis II CR
1–8
16.5–19
16–19.9

    Genesis II PS
1–6
16.5
11–23

    Legion CR
1–8
16.5–19
16–19.9

    Legion PS
1–6
16.5
9.5–17

    Profix CR
All
20
N/A

    Profix PS
All
15
N/A

Zimmer (Warsaw, IN)

    Nexgen CR-Flex
A–G
11.9–13.3
18.9–27

    Nexgen LPS
A–G
13.7–21.2
15.3–20

    Nexgen LPS-Flex
A–G
13.7–21.2
15.3–20

    MG I CR
S–large plus
11–14
N/A

    MG II CR
All
12
N/A

    IB I PS
All
16
N/A

    IB II PS
54–64
15–18
N/A

Stryker (Kalamazoo, MI)

    Scorpio CR, PS
3–13
16.5–20.5
8–17.1

    NRG CR
3–13
18–22.2
15.8–26.8

    NRG PS
3–13
18–22.2
5.9–17.1

    Kinemax Plus CR, PS
X small–large
17–21
9.9–21.6

    Omnifit 3000 CR, PS
3–11
19.5
N/A

    Delta Fit 7000 CR, PS
3–13
19.5
17.9–20.8

    Triathlon CR
1–7
16.1
10–16.5

    Triathlon PS
1–7
20.8
10–16.5

Depuy (Warsaw, IN)

    Sigma CR
1.5–5
17.8
12–16.7

    LCS RP CR
Small–large plus
14.4–21.9
12.7–20.9

Biomet (Warsaw, IN)

    ACG CR
55–75
18.1–23.9
N/A

    Maxim CR
55–75
13.3–15.3
N/A

    Maxim PS
55–75
15.2
N/A

    Vanguard CR
55–75
13.3–15.3
13.9–20.1

    Vanguard PS
55–75
16.3
10.8–17.7

    Vanguard RP CR, PS
55–70
16.3
3–3.8

Kyocera Medical (Osaka, Japan)

    Bisurface PS
X small–X large
16.5
4.5–9.5

    LFA CR
1–4
18–22.5
19.5–24.5

    LFA PS
1–4
18
9.4–14.4

CR, cruciate retaining; PS, posterior stabilized; N/A, not available.

Figure 3: Intercondylar width of the femoral component (a) and distance from the anterior femoral osteotomy phase to the anterior edge of the open box component (b).

It is important to plan whether the femoral component will accommodate the nail before surgery. We hope that the chart provided can help plan treatment for periprosthetic supracondylar fractures by providing a quick, easy, and reliable reference of prostheses commonly used for surgeons managing periprosthetic supracondylar femoral fractures when the femoral component is placed in a correct position or direction.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

References

E. T. Su, H. DeWal, and P. E. Di Cesare, “Periprosthetic femoral fractures above total knee replacements,” The Journal of the American Academy of Orthopaedic Surgeons, vol. 12, no. 1, pp. 12–20, 2004.

R. W. Culp, R. G. Schmidt, G. Hanks, A. Mak, J. L. Esterhai Jr., and R. B. Heppenstall, “Supracondylar fracture of the femur following prosthetic knee arthroplasty,” Clinical Orthopaedics and Related Research, no. 222, pp. 212–222, 1987.

M. Wick, E. J. Müller, and G. Muhr, “Supracondylar femoral fractures in knee endoprostheses. Stabilizing with retrograde interlocking nail,” Unfallchirurg, vol. 104, no. 5, pp. 410–413, 2001.

C. H. Rorabeck and J. W. Taylor, “Periprosthetic fractures of the femur complicating total knee arthroplasty,” Orthopedic Clinics of North America, vol. 30, no. 2, pp. 265–277, 1999.

P. L. Althausen, M. A. Lee, C. G. Finkemeier, J. P. Meehan, and J. J. Rodrigo, “Operative stabilization of supracondylar femur fractures above total knee arthroplasty: a comparison of four treatment methods,” The Journal of Arthroplasty, vol. 18, no. 7, pp. 834–839, 2003.

R. E. Anakwe, S. A. Aitken, and L. A. K. Khan, “Osteoporotic periprosthetic fractures of the femur in elderly patients: outcome after fixation with the LISS plate,” Injury, vol. 39, no. 10, pp. 1191–1197, 2008.

T. J. Hockertz, A. Gruner, and H. Reilmann, “Treatment of femoral fracture after total knee arthroplasty with the LIS system: a new method,” Unfallchirurg, vol. 102, no. 10, pp. 811–814, 1999.

M. J. Kääb, U. Stöckle, M. Schütz, J. Stefansky, C. Perka, and N. P. Haas, “Stabilisation of periprosthetic fractures with angular stable internal fixation: a report of 13 cases,” Archives of Orthopaedic and Trauma Surgery, vol. 126, no. 2, pp. 105–110, 2006.

W. M. Ricci, T. Loftus, C. Cox, and J. Borrelli, “Locked plates combined with minimally invasive insertion technique for the treatment of periprosthetic supracondylar femur fractures above a total knee arthroplasty,” Journal of Orthopaedic Trauma, vol. 20, no. 3, pp. 190–196, 2006.

A. C. McLaren, J. A. Dupont, and D. C. Schroeber, “Open reduction internal fixation of supracondylar fractures above total knee arthroplasties using the intramedullary supracondylar rod,” Clinical Orthopaedics and Related Research, no. 302, pp. 194–198, 1994.

W. M. Iannacone, F. S. Bennett, W. G. DeLong Jr., C. T. Born, and R. M. Dalsey, “Initial experience with the treatment of supracondylar femoral fractures using the supracondylar intramedullary nail: a preliminary report,” Journal of Orthopaedic Trauma, vol. 8, no. 4, pp. 322–327, 1994.

L. R. Rolston, D. J. Christ, A. Halpern, P. L. O'Connor, T. G. Ryan, and W. M. Uggen, “Treatment of supracondylar fractures of the femur proximal to a total knee arthroplasty. A report of four cases,” The Journal of Bone & Joint Surgery, vol. 77, no. 6, pp. 924–931, 1995.

J. Gliatis, P. Megas, E. Panagiotopoulos, and E. Lambiris, “Midterm results of treatment with a retrograde nail for supracondylar periprosthetic fractures of the femur following total knee arthroplasty,” Journal of Orthopaedic Trauma, vol. 19, no. 3, pp. 164–170, 2005.

A. T. Johnston, E. Tsiridis, K. S. Eyres, and A. D. Toms, “Periprosthetic fractures in the distal femur following total knee replacement: a review and guide to management,” Knee, vol. 19, no. 3, pp. 156–162, 2012.

R. M. Meneghini, B. J. Keyes, K. K. Reddy, and D. C. Maar, “Modern retrograde intramedullary nails versus periarticular locked plates for supracondylar femur fractures after total knee arthroplasty,” The Journal of Arthroplasty, vol. 29, no. 7, pp. 1478–1481, 2014.

C. Krettek, T. Miclau, P. Schandelmaier, C. Stephan, U. Möhlmann, and H. Tscherne, “The mechanical effect of blocking screws (“poller screws”) in stabilizing tibia fractures with short proximal or distal fragments after insertion of small-diameter intramedullary nails,” Journal of Orthopaedic Trauma, vol. 13, no. 8, pp. 550–553, 1999.

Krettek C, C. Stephan, P. Schandelmaier, M. Richter, H. C. Pape, and T. Miclau, “The use of Poller screws as blocking screws in stabilising tibial fractures treated with small diameter intramedullary nails,” The Journal of Bone and Joint Surgery, vol. 81, no. 6, pp. 963–968, 1999.

W. M. Ricci, C. Bellabarba, B. Evanoff, D. Herscovici, T. DiPasquale, and R. Sanders, “Retrograde versus antegrade nailing of femoral shaft fractures,” Journal of Orthopaedic Trauma, vol. 15, no. 3, pp. 161–169, 2001.

S. G. Kulkarni, A. Varshneya, S. Kulkarni et al., “Intramedullary nailing supplemented with Poller screws for proximal tibial fractures,” Journal of Orthopaedic Surgery, vol. 20, no. 3, pp. 307–311, 2012.

P. McGraw and A. Kumar, “Periprosthetic fractures of the femur after total knee arthroplasty,” Journal of Orthopaedics and Traumatology, vol. 11, no. 3, pp. 135–141, 2010.

R. F. Ostrum and J. P. Maurer, “Distal third femur fractures treated with retrograde femoral nailing and blocking screws,” Journal of Orthopaedic Trauma, vol. 23, no. 9, pp. 681–684, 2009.

H.-W. Stedtfeld, T. Mittlmeier, P. Landgraf, and A. Ewert, “The logic and clinical applications of blocking screws,” Journal of Bone and Joint Surgery A, vol. 86, no. 2, pp. 17–25, 2004.

V. A. Currall, M. Kulkarni, and W. J. Harries, “Retrograde nailing for supracondylar fracture around total knee replacement: a compatibility study using the Trigen supracondylar nail,” The Knee, vol. 14, no. 3, pp. 208–211, 2007.

M. W. Heckler, G. S. Tennant, P. Williams, and J. D. DiCicco III, “Retrograde nailing of supracondylar periprosthetic femur fractures: a surgeon's guide to femoral component sizing,” Orthopedics, vol. 30, no. 5, pp. 345–348, 2007.

X. Pelfort, R. Torres-Claramunt, P. Hinarejos, J. Leal, S. Gil-González, and L. Puig, “Extension malunion of the femoral component after retrograde nailing: no sequelae at 6 years,” Journal of Orthopaedic Trauma, vol. 27, no. 3, pp. 158–161, 2013.