Case Reports in Pediatrics
Volume 2016 (2016), Article ID 5353012, 1 page
http://dx.doi.org/10.1155/2016/5353012

Corrigendum

Corrigendum to “Multiple Congenital Colonic Stenosis: A Rare Gastrointestinal Malformation”

Elisa Zambaiti,¹ Cinzia Chiaramonte,¹ Sergio Salerno,² Giuseppe Li Voti,¹ and Fortunato Siracusa¹

¹Pediatric Surgical Unit, Department of Mother and Child Care, AOU Policlinico Paolo Giaccone, Via Giordano 3, 90127 Palermo, Italy
²Section of Radiological Sciences, Department of Radiology, AOU Policlinico Paolo Giaccone, Via del Vespro 127, 90127 Palermo, Italy

Received 16 May 2016; Accepted 1 June 2016

Copyright © 2016 Elisa Zambaiti et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Multiple Congenital Colonic Stenosis: A Rare Gastrointestinal Malformation” [1], the authors’ first and last names were reversed. The correct author list is shown above.

References

Z. Elisa, C. Cinzia, S. Sergio, L. V. Giuseppe, and S. Fortunato, “Multiple congenital colonic stenosis: a rare gastrointestinal malformation,” Case Reports in Pediatrics, vol. 2016, Article ID 6329793, 4 pages, 2016.