Case Reports in Radiology

Volume 2014 (2014), Article ID 493515, 1 page

http://dx.doi.org/10.1155/2014/493515

Erratum

Erratum to “Abdominal Wall Abscess due to Acute Perforated Sigmoid Diverticulitis: A Case Report with MDCT and US Findings”

Vasileios Rafailidis, Anna Gavriilidou, Christos Liouliakis, Asimina Tsimitri, Sofia Paschaloudi, and Vasiliki Karadimou

Department of Radiology, General Hospital of Katerini, 6 Km Katerini-Arona, 60100 Katerini, Greece

Received 10 February 2014; Accepted 17 February 2014; Published 12 March 2014

Copyright © 2014 Vasileios Rafailidis et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the paper, the authors’ names were mistakenly cited in a wrong format (family name first, first name second). We herein cite the authors’ names in the correct format (first name first, family name second).