Case Reports in Radiology
Volume 2018 (2018), Article ID 6852737, 1 page
https://doi.org/10.1155/2018/6852737

Corrigendum

Corrigendum to “Metastatic Renal Cell Carcinoma Presenting as Prolonged Pyrexia and Stauffer’s Syndrome: Can a Routine Ultrasound Scan Fail to Detect a Renal Cell Carcinoma?”

C. L. Fonseka,1,2 A. G. T. A. Kariyawasam,² S. D. A. L. Singhapura,² C. M. de Silva,² T. E. Kanakkahewa,² I. G. T. M. Senarathna,² and C. K. Bodinayake1,2

¹University Medical Unit, Teaching Hospital Karapitiya, Galle, Sri Lanka
²Department of Internal Medicine, Faculty of Medicine, University of Ruhuna, Sri Lanka

Correspondence should be addressed to C. L. Fonseka; lakmalfonseka@med.ruh.ac.lk

Received 28 August 2018; Accepted 30 August 2018; Published 29 October 2018

Copyright © 2018 C. L. Fonseka et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Metastatic Renal Cell Carcinoma Presenting as Prolonged Pyrexia and Stauffer’s Syndrome: Can a Routine Ultrasound Scan Fail to Detect a Renal Cell Carcinoma?” [1], the name of the third author was given incorrectly as S. A. G. L. Singhapura. The author's name should have been written as S. D. A. L. Singhapura. The revised authors' list is shown above.

The author’s Contribution section should also be updated to “C. L. Fonseka, A. G. T. A. Kariyawasam, S. D. A. L. Singhapura, I. G. T. M. Senarathna, and C. K. Bodinayake investigated the case. C. M. de Silva, T. E. Kanakkahewa, and C. K. Bodinayake planned radiological investigation and prepared the manuscript. All authors were involved in editing the content and approved the final version for publication.”

References

C. L. Fonseka, A. G. T. A. Kariyawasam, S. A. G. L. Singhapura et al., “Metastatic renal cell carcinoma presenting as prolonged pyrexia and stauffer’s syndrome: can a routine ultrasound scan fail to detect a renal cell carcinoma?” Case Reports in Radiology, vol. 2018, Article ID 4215041, 4 pages, 2018.