Case Reports in Surgery

Volume 2012 (2012), Article ID 695250, 3 pages

doi:10.1155/2012/695250

Case Report

True Giant Posterior Tibial Artery Aneurysm

Alessandro Robaldo, Giacomo Di Iasio, Gabriele Testi, and Patrizio Colotto

Vascular and Endovascular Surgery Unit, Imperia Hospital, Via Sant'Agata 57, 18100 Imperia, Italy

Received 31 October 2012; Accepted 21 November 2012

Academic Editors: I. Hassan, S. Sultan, and F. Turégano

Copyright © 2012 Alessandro Robaldo et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

We report an unusual case of true atherosclerotic posterior tibial artery (PTA) aneurysm without any apparent causative history. To our knowledge, in the English Literature only seven previously cases of true PTA aneurysms are reported. Due to its location, this lesion may require surgical intervention and removal. The presentation, the diagnostic evaluation, and the surgical management of the aneurysm are discussed.

1. Clinical History

We report the diagnostic and therapeutic images of a true atherosclerotic posterior tibial artery (PTA) aneurysm without any apparent causative history. A 52-year-old male patient presented himself with a pulsatile painful mass of the right lower leg. The patient’s medical history was completely negative and the clinical condition was good. No fever was detected. The CPR and blood culture results were negative. The duplex scan (DS) revealed a giant PTA aneurysm (about 50 mm in diameter). The angio-CT scan detected the patent saccular aneurysm at the proximal segment of the posterior tibial artery with a transversal maximum diameter of 53 mm and concentric mural thrombus. No abnormalities of the bones, namely, sharp spikes that could damage the tibial artery, were recognized. No other aneurysm sites were detected (Figure 1). A selective angiography scan (AS) confirmed the diagnosis (Figure 1) and showed the patency of the tibial and peroneal arteries (Figure 2). Under spinal anesthesia, through a medial surgical approach, the aneurysm was repaired successfully by resection and interposition of a reversed saphenous vein segment. The aneurysm wall (Figure 3), sent for the histologic examination, showed a partially thrombosed true atherosclerotic aneurysm without signs of connective tissue disorders, arteritis, vasculitis, or infection. The patient was discharged in good general condition with a complete pain relief, regular pulse, and life-long mono-antiplatelet treatment (acetylsalicylic acid 300 mg). At the 12-month followup, no foot or digital ischemia, complain of paresthesias, pain, discomfort, or walking limitation has been observed. Duplex scan showed a good patency in the absence of stenosis, pseudoaneurysms, or recurrent aneurysms.

Figure 1: The giant posterior tibial artery aneurysm was diagnosed by angio-CT scan.

(a)

(b)

Figure 2: Posterior tibial artery aneurysm detected by angiography scan.

(a)

(b)

(c)

Figure 3: Intraoperative image of the true giant posterior tibial artery aneurysm. On the left, the aneurysm is opened with a large thrombus. On the right, resection and interposition of a reversed saphenous vein segment.

2. Comments

The majority of the PTA aneurysms are not frequent and usually they are secondary to trauma, infection, or iatrogenic injury. In the English Literature, few cases of true atherosclerotic PTA aneurysm had previously been reported [1–6]. The indications for treating these lesions are debated, but usually symptomatic aneurysms such as asymptomatic large aneurysms or those with laminated thrombus should be treated [2, 6]. The choice of treatment (surgical/endovascular) depends on the location, shape, and size of the aneurysm, as well as the patient’s general condition [3, 5]. The surgical repair is typically achieved with autogenous vein bypass grafting; artery direct suture is described with good success for focal lesions. When there is an adequate collateral circulation, artery ligation can be a second option [1, 5, 6]. The endovascular treatment (coil embolization, thrombin glue injection, covered stent) is a good alternative to surgery and is preferred in case with high-risk patients [3]. In this case, considering the large dimension of the aneurysm, we preferred surgical option to excise the aneurysm sac which determined a compartment pain in the leg and to prevent endovascular embolization in the tibial vessels. Treatment should be individualized time by time by evaluating patients’ comorbidities and aneurysm conformation.

References

H. Murakami, N. Izawa, S. Miyahara et al., “A true aneurysm of posterior tibial artery,” Annals of Vascular Surgery, vol. 25, no. 7, pp. 980.e1–980.e2, 2011.

B. Barbano, A. Gigante, A. Zaccaria et al., “True posterior tibial artery aneurysm in a young patient: surgical or endovascular treatment?” BMJ Case Reports. In press

F. Zaraca, A. Ponzoni, C. Stringari, J. A. Ebner, R. Giovannetti, and H. Ebner, “The posterior approach in the treatment of popliteal artery aneurysm: feasibility and analysis of outcome,” Annals of Vascular Surgery, vol. 24, no. 7, pp. 863–870, 2010.

E. Ferrero, M. Ferri, A. Viazzo et al., “Rupture of a true giant aneurysm of the posterior tibial artery: a huge size of 6 cm on diameter,” Annals of Vascular Surgery, vol. 24, no. 8, pp. 1134.e9–1134.e13, 2010.

Y. Tshomba, M. Papa, E. M. Marone, A. Kahlberg, N. Rizzo, and R. Chiesa, “A true posterior tibial artery aneurysm: a case report,” Vascular and Endovascular Surgery, vol. 40, no. 3, pp. 243–249, 2006.

D. Mukherjee, “Posterior approach to the peroneal artery,” Journal of Vascular Surgery, vol. 19, no. 1, pp. 174–178, 1994.