Case Reports in Surgery
Volume 2015 (2015), Article ID 714196, 1 page
http://dx.doi.org/10.1155/2015/714196

Retraction

Retracted: Fitz-Hugh-Curtis Syndrome in a Male Patient: A Case Report and Literature Review

Case Reports in Surgery

Received 5 October 2015; Accepted 5 October 2015

Copyright © 2015 Case Reports in Surgery. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

The paper titled “Fitz-Hugh-Curtis Syndrome in a Male Patient: A Case Report and Literature Review” [1] has been retracted as it was found to have been published before by the same authors in Journal of Surgical Case Reports (J Surg Case Rep. 2012 Mar; 2012(3): 12).

References

S. Saurabh, E. Unger, and C. Pavlides, “Fitz-hugh-curtis syndrome in a male patient: a case report and literature review,” Case Reports in Surgery, vol. 2012, Article ID 457272, 3 pages, 2012.