Case Reports in Urology

Volume 2013 (2013), Article ID 913953, 1 page

http://dx.doi.org/10.1155/2013/913953

Erratum

Erratum to “IgG4 Inflammatory Pseudotumor of the Kidney”

Ahmad Alkhasawneh and Robert W. Allan

Department of Pathology, Immunology and Laboratory Medicine, College of Medicine, University of Florida, P.O. Box 100275, Gainesville, FL 32610, USA

Received 5 April 2013; Accepted 14 April 2013

Copyright © 2013 Ahmad Alkhasawneh and Robert W. Allan. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

The first name of the first author appeared as Ahmad N. Alkhasawneh. The correct spelling should be Ahmad Alkhasawneh.