Case Reports in Urology
Volume 2016 (2016), Article ID 3012941, 1 page
http://dx.doi.org/10.1155/2016/3012941

Corrigendum

Corrigendum to “A Case of In-Bore Transperineal MRI-Guided Prostate Biopsy of a Patient with Ileal Pouch-Anal Anastomosis”

Michael Kongnyuy,¹ Thomas Frye,¹ Arvin K. George,¹ Amichai Kilchevsky,¹ Amogh Iyer,¹ Meet Kadakia,¹ Akhil Muthigi,¹ Baris Turkbey,² Bradford J. Wood,³ and Peter A. Pinto1,3

¹Urologic Oncology Branch, National Cancer Institute, National Institute of Health, Bethesda, MD 20892, USA
²Molecular Imaging Program, National Cancer Institute, National Institute of Health, Bethesda, MD 20892, USA
³Center for Interventional Oncology, National Cancer Institute, National Institute of Health, Bethesda, MD 20892, USA

Received 7 April 2016; Accepted 19 April 2016

Copyright © 2016 Michael Kongnyuy et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “A Case of In-Bore Transperineal MRI-Guided Prostate Biopsy of a Patient with Ileal Pouch-Anal Anastomosis,” [1] the name of the ninth author was given incorrectly as Brad J. Wood. The author’s name should have been written Bradford J. Wood. The revised author list is shown above.

References

M. Kongnyuy, T. Frye, A. K. George et al., “A case of in-bore transperineal MRI-guided prostate biopsy of a patient with ileal pouch-anal anastomosis,” Case Reports in Urology, vol. 2015, Article ID 676930, 3 pages, 2015.