Case Reports in Urology
Volume 2016 (2016), Article ID 3181869, 1 page
http://dx.doi.org/10.1155/2016/3181869

Erratum

Erratum to “Primary Desmoplastic Melanoma of the Penis”

Julia T. Chu,¹ Michael A. Liss,² William W. Wu,³ Atreya Dash,⁴ and Di Lu¹

¹Department of Pathology and Laboratory Medicine, University of California, Irvine, Orange, CA 92868, USA
²Department of Urology, University of Texas Health Science Center San Antonio, San Antonio, TX 78229, USA
³Department of Pathology, Weill Cornell Medical College and New York Presbyterian Hospital, New York, NY 10065, USA
⁴Department of Urology, University of Washington, Seattle, WA 98195, USA

Received 6 May 2016; Accepted 17 July 2016

Copyright © 2016 Julia T. Chu et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Primary Desmoplastic Melanoma of the Penis” [1], the photomicrograph of S-100 immunohistochemical stain did not appear within the black box outline in Figure in the PDF version. The revised figure is shown below.

Figure 2

References

J. T. Chu, M. A. Liss, W. W. Wu, A. Dash, and D. Lu, “Primary desmoplastic melanoma of the penis,” Case Reports in Urology, vol. 2015, Article ID 706572, 3 pages, 2015.