Case Reports in Veterinary Medicine
Volume 2018 (2018), Article ID 2976795, 8 pages
https://doi.org/10.1155/2018/2976795

Case Report

Use of the Minimally Invasive Reduction Instrumentation System for Facilitating Alignment and Reduction When Performing Minimally Invasive Plate Osteosynthesis in Three Dogs

Sarah Townsend and Daniel D. Lewis

Department of Small Animal Clinical Sciences, College of Veterinary Medicine, University of Florida, Gainesville, FL, USA

Correspondence should be addressed to Daniel D. Lewis; lewisda@ufl.edu

Received 21 November 2017; Revised 22 February 2018; Accepted 4 March 2018; Published 15 April 2018

Academic Editor: Sheila C. Rahal

Copyright © 2018 Sarah Townsend and Daniel D. Lewis. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

The Minimally Invasive Reduction Instrumentation System (MIRIS) was utilized to facilitate minimally invasive plate osteosynthesis (MIPO) of distal limb diaphyseal comminuted fractures (2 crural, 1 antebrachial) in three dogs. The MIRIS facilitated efficient MIPO in all three fractures. Radial and tibial lengths were restored within 2% of the length of the intact bone and postoperative frontal and sagittal plane angulation were within 3° of the normal contralateral limb for each of the fractures. Fixation failed in one of the tibial fractures when the plates bent a week following surgery. The implants were removed and the fracture was restabilized via MIPO facilitated by the MIRIS. Inappropriate implant selection was considered the primary reason for implant failure. All three fractures achieved union by 10 weeks following surgery. The dog that underwent revision surgery developed a surgical site infection 5 months following revision surgery, which necessitated implant removal. All three dogs had excellent limb function at the time of the final evaluation. This system resulted in reductions that were near anatomic, with acceptable restoration of length and alignment and excellent limb function.

1. Introduction

Minimally invasive plate osteosynthesis (MIPO) is utilized in both human and veterinary orthopedics and embraces the principles of biological fracture stabilization [1–9]. Iatrogenic soft tissue trauma and disturbance of the fracture environment are limited as implants are applied via small plate insertion incisions made remote to the fracture site [1–7]. Purported advantages afforded by this technique include reduced operative times compared to open anatomic fracture reconstruction [2, 10], low infection rates due to the shorter duration of surgery and limited exposure of the fracture site [8, 11–14], and shorter times to union ascribed to maintenance of the fracture hematoma and preservation of periosteal blood supply [15–17].

Several indirect reduction techniques have been described to aid MIPO applications in dogs [7, 18–22]. The Minimally Invasive Reduction Instrumentation System [MIRIS] (DePuy Synthes, Paoli, PA) is a unilateral, linear fixator system marketed for use during MIPO applications in human patients (Figure 1). A recent canine cadaveric study was performed comparing the use of the MIRIS and a two-ring circular construct to facilitate alignment and reduction during MIPO applications using a comminuted radius and ulna fracture model [23]. The MIRIS allowed for shorter reduction times and simplified plate placement, without compromise to fracture reduction and alignment [23]. The objective of this case series was to report our initial clinical results using the MIRIS to facilitate MIPO applications in three dogs with diaphyseal appendicular fractures.

Figure 1: The Minimally Invasive Reduction Instrumentation System. A: 8 mm wrench; B: 2.8 mm partially threaded half-pins; C: cannulated reduction handles; D: connecting clamps; E: connecting rods.

2. Case Description

Three dogs were presented for stabilization of long bone fractures (Table 1). All dogs had closed diaphyseal spiral fractures: one radius and ulnar fracture (Figure 2) and two tibial and fibular fractures with comminution (Figures 3 and 4). Prior to surgery, all dogs underwent digital radiography, with orthogonal views obtained of the fractured and contralateral limb segment. The time elapsed from when each dog sustained the fracture to initial surgical stabilization ranged from 2 to 3 days. Dogs were given intermittent methadone (0.1–0.2 mg/kg) boluses every 4–6 hours for pain control prior to surgery.

Table 1: Clinical information for three dogs with fractures stabilized via minimally invasive plate osteosynthesis facilitated by the use of the Minimally Invasive Reduction Instrumentation System.

Dog
Age (months)
Weight (kg)
Breed
Fracture limb segment
Fracture configuration
Fixation method

1
56
11.5
Mixed-breed dog
Left radius and ulna
Spiral, middiaphyseal (radius)
Oblique, middiaphyseal (ulna)
9 holes, 2.7 mm LCP

2
60
17.8
Australian sheepdog
Right tibia and fibula
Comminuted, spiral mid- to distal diaphyseal (tibia)
Oblique, distal diaphyseal (fibula)
12 holes, 2.7 mm LCP
10 holes, 2.7 mm SOP plate

3
48
16.2
Mixed-breed dog
Right tibia and fibula
Comminuted, spiral mid- to distal diaphyseal (tibia)
Transverse, middiaphyseal (fibula)
Initial surgery  
12 holes, 2.7 mm LCP
12 holes, 2.0 mm SOP plate
Revision surgery  
11 holes, 3.5 mm LCP

: locking compression plate; = String of Pearls interlocking plate.

(a)

(b)

Figure 2: Craniocaudal and mediolateral preoperative radiographs of dog #1’s left radius and ulna fractures (a). Initial postoperative radiographs following primary surgical stabilization with a 9-hole, 2.7 mm locking compression plate (b).

(a)

(b)

Figure 3: Craniocaudal and mediolateral preoperative radiographs of dog #2’s right tibial and fibula fractures (a). Initial postoperative radiographs following primary surgical stabilization with a 12-hole, 2.7 mm locking compression plate and a 10-hole, 2.7 mm String of Pearls plate (b).

(a)

(b)

(c)

(d)

(e)

Figure 4: Craniocaudal preoperative radiographs of dog #3’s right tibial fracture (a). Initial postoperative radiographs following primary surgical stabilization with a 12-hole, 2.7 mm locking compression plate and a 10-hole, 2.0 mm String of Pearls plate (b). Implant failure was documented 7 days after surgery (c). The fracture was restabilized via application of an 11-hole, 3.5 mm LCP plate (d). Radiographs obtained 3 weeks after implant removal necessitated by infection (e).

All three dogs were anesthetized using the same anesthetic protocol. Premedication consisted of intravenous dexmedetomidine (3–5 μg/kg) and methadone (0.1 mg/kg); induction was performed with propofol (4–6 mg/kg). Dogs were maintained with inhalant (isoflurane 1.5–2%). Postoperatively, dogs were given intermittent intravenous methadone (0.1–0.2 mg/kg) boluses every 4–6 hours for 24 hours following surgery. Colorado pain scores were assessed every 4 hours following surgery to discharge and used to direct the analgesic protocol.

The MIRIS was used, as previously described by Gilbert et al. [23], to reduce and align the fractures prior to MIPO. Partially threaded 2.8 mm diameter half-pins were inserted in the lateral metaphyseal region of the proximal and distal radius or tibia, allowing for cranial plate application on the radius and medial and cranial plate application on the tibia. Difficulty in seating the half-pin in the proximal radius necessitated placement of the pin in the proximal olecranon in dog #1. The cannulated reduction handles were then slid over the protruding portion of the half-pins until the blunt end of each handle was in direct contact with the cortex of the secure bone segment. The set screw was tightened and the connecting clamps and connecting rod were used to articulate the reduction handles.

Distraction and alignment of the major fracture segments were achieved through manipulation of the MIRIS reduction handles, as traction was applied to the paw. Fracture reduction was initially assessed through palpation, and when reduction was deemed acceptable, the connecting clamps securing the carbon fiber rod and reduction handles were tightened. Sagittal and frontal plane alignment and reduction were then assed intraoperatively using fluoroscopy (Hologic®, Marlborough, MA) and, if necessary, adjustments were subsequently made by loosening the connecting clamps and repositioning the handles on the connecting rod to ensure appropriate fracture reduction and alignment.

In dog #1, the radius and ulna were initially underreduced and the distal segment was displaced caudally and proximally. The clamps were loosened and the fracture was toggled into position as greater force was applied to separate the reduction handle with traction applied simultaneously to the manus. The clamps were tightened and the ends of both the radial and the ulnar fracture segments were reduced, although mild procurvatum was present. Dog #2’s tibia was initially reduced by applying traction to the reduction handles and pes. Reduction was improved by applying reduction forceps with points (DePuy Synthes, Paoli, PA) through two 5 mm incisions to compress the fracture (Figure 5). When reduction was considered acceptable, two percutaneous cranial-to-caudal interfragmentary Kirschner wires were placed, allowing the point-to-point reduction forceps to be removed (Figure 5). Dog #3’s tibial fracture was reduced in a similar fashion to dog #2’s, but a single 1.0 mm cranial-to-caudal interfragmentary Kirschner wire was used to maintain the reduction as the plate was placed.

Figure 5: Intraoperative fluoroscopic images demonstrating the use of percutaneous point-to-point reduction forceps and interfragmentary Kirschner wires to maintain temporary fracture stabilization prior to plate placement.

Once reduction was considered acceptable, a 2.7 mm locking compression plate (LCP) (DePuy Synthes Vet, Chester, PA) was placed using a MIPO technique to stabilize each of the fractures [24]. The plates were precontoured using radiographs of the intact contralateral limb. Proximal and distal plate insertional incisions were made, cranially over the radius and medially over the tibia, based on the length of the contoured plate, and an epiperiosteal tunnel was created using Metzenbaum scissors. The plates were inserted via the proximal insertion incision and advanced until the end of the plate was positioned in the distal insertion incision. A cortical screw was placed in one proximal and one distal hole in the plate which improved alignment by drawing the engaged bone segments toward the plate. Locking screws were placed in the remaining screw holes except in instances in which a screw needed to be angulated relative to the plate to avoid placing the screw in the fracture (dogs #1 and #3) or the talocrural joint (dog #2). Supplemental String of Pearls (SOP) interlocking plates (Orthomed, Vero Beach, FL) were applied cranially in the two tibial fractures (Table 1) via the original insertional incisions.

All three fractures were well reduced and aligned on the immediate postoperative radiographs (Table 2). Restoration of radial and tibial frontal and sagittal plane alignment was assessed based on measurements obtained from the contralateral intact bone [25]. There was slight varus angulation of both dog #1 and #2’s stabilized limb segment. Dog #1’s radius was stabilized in slight recurvatum and dog #2’s tibia stabilized in slight procurvatum. Radial or tibial length was restored to within 2% of the contralateral intact bone [26, 27].

Table 2: Radiographic parameters assessed from the immediate postoperative radiographs in three dogs in which fractures were stabilized via minimally invasive plate osteosynthesis facilitated by the use of the Minimally Invasive Reduction Instrumentation System.

Dog
Fracture span (%)
Radial or tibial length (mm)
Frontal plane angulation (°)
Sagittal plane angulation (°)
Plate bridging ratio (%)
Plate span ratio (%)
Plate working length (%)
Time to union (weeks)

1
4
120/120
2 (varus)
2 (recurvatum)
70
6
13
10

2
18
170/173
3 (varus)
2 (procurvatum)
66
32
20
9

3
Initial Surgery
29
150/152
None
None
71
40
41
NA

Revision Surgery
37
150/152
3 (valgus)
5 (recurvatum)
97
38
32
8

bone length/intact bone length; NA: not applicable.

Plate bridging ratio, calculated as the proportion of plate length over tibial or radial length and expressed as a percentage [27], ranged from 66 to 71%. The plate span ratio, defined as plate length divided by the length of the fracture [19, 27], ranged from 6 to 40%. Plate working length, calculated by measuring the distance between the proximal and distal screws closest to the fracture divided by the length of the stabilized bone segment and expressed as a percentage, ranged from 13 to 41% [27]. The fracture span, the % of the bone length affected by the fracture [19, 26, 27], ranged from 4 to 29%.

All three dogs were placing substantial weight on the stabilized limb when discharged from the hospital 2 days following surgery. Owners were instructed to enforce strict confinement for 1 month, allowing short walks on a leash for purposes of urination and defecation. Dogs were prescribed 7 days of tramadol (3-4 mg/kg q8–12 h), 7 days of cephalexin (30 mg/kg q12h), and 5 days of carprofen (2.2 mg/kg q12h).

Dog #3 returned to the hospital a week following surgery when the owner noted an acute increase in lameness and angulation of the dog’s right crus. On examination, the dog had a pronounced right hind limb weight-bearing lameness. The right crus was swollen with obvious valgus angulation. Radiographs showed that the LCP had bent and the SOP plate had broken over the fracture site, resulting in a loss of reduction, valgus angulation, and further fracture comminution (fracture span increased to 37%) (Figure 4). Revision surgery was performed on the following day and the implants were removed through the original plate insertion incisions. The MIRIS was reapplied laterally and the proximal plate insertion incision was extended proximally. After satisfactory reduction and alignment had been obtained using the MIRIS, a contoured 3.5 mm LCP was applied in MIPO fashion (Figure 4). Cortical screws were placed in the third hole from the proximal end of the plate and the hole at the distal end of the plate, drawing the tibia to the contoured plate, which improved frontal plane alignment. To improve craniocaudal fracture alignment, pointed reduction forceps with serrated jaws (DePuy Synthes, Paoli, PA) were placed through the proximal plate insertional incision with one jaw positioned along the cranial cortex of the proximal tibial segment and the tip of the other jaw placed on the caudal border of the plate [22]. The screw in the proximal portion of the plate was loosened and closing the forceps improved alignment by pivoting the distal end of the proximal segment caudally. Four locking screws were placed in the proximal portion of the plate and one locking and one additional cortical screw were placed in the distal portion of the plate. Postoperative radiographs showed that tibial length had been restored to within 1% of the contralateral intact tibia; however, there were 3° of residual valgus and 5° of residual recurvatum angulation.

All three fractures subsequently went on to reach radiographic union without loss of reduction or fixation by 10 weeks following surgery; however, dog #3 developed a draining tract 5 months following surgery, which necessitated plate removal. Serratia marcescens was cultured from the plate and screws, and enrofloxacin (5 mg/kg q12h for 14 days) was administered based on the sensitivity results. The draining tract resolved within 5 days of surgery. The owners of all three dogs were asked to return their dogs for reevaluation between 3 and 8 months following surgery and all three dogs had excellent limb function at the time of the final evaluation (median: 237 days; range: 92–238 days). Force plate analysis performed at the final recheck evaluation identified that all three dogs had slight reductions in peak vertical force (PVF) and peak vertical impulse (PVI) in the fractured limb when compared to the contralateral limb (Table 3); however, these reductions were not found to be significant (PVF: ; PVI: ) when compared using Student’s -test.

Table 3: Clinical parameters assessed at the time of final evaluation in the three dogs in which fractures were stabilized via minimally invasive plate osteosynthesis facilitated by the use of the Minimally Invasive Reduction Instrumentation System.

Force plate (N)
Limb circumference (mm)
Goniometry (degrees)

PVF
PVI
Brachium
Antebrachium
Thigh
Crus
Shoulder
Elbow
Carpus
Hip
Stifle
Hock

F
E
F
E
F
E
F
E
F
E
F
E

Dog 1
Fractured
123.64
11.16
151
92
-
-
54
132
23
145
42
184
-
-
-
-
-
-

Contralateral
131.77
11.92
155
89
-
-
55
130
20
140
35
180
-
-
-
-
-
-

Dog 2
Fractured
74.66
7.94
-
-
330
138
-
-
-
-
-
-
38
168
42
159
38
162

Contralateral
89.59
13.75
-
-
329
137
-
-
-
-
-
-
32
172
41
152
38
160

Dog 3
Fractured
66.63
6.78
-
-
260
134
-
-
-
-
-
-
24
175
30
165
48
165

Contralateral
67.02
8.17
-
-
262
136
-
-
-
-
-
-
29
175
23
168
25
169

Goniometry [28] and circumferential [29] measurements of muscle mass were performed at the final evaluation for each dog (Table 3). Flexion was slightly decreased (median: 5°; range: 3 to 7°) in the joints adjacent to the fracture in all three dogs, with the exception of a moderate decrease of flexion with a difference of 23° identified in dog #3’s hock. A mild decrease in extension was measured in the stifle and hock (3° and 4°, resp.) of dog #3. None of these alterations in the range of motion limited limb function. Mild muscle atrophy (range: 2–4 mm) was identified in the brachial and thigh musculature of the fractured limb in dogs #1 and #3, respectively; otherwise contralateral limb muscle mass was symmetrical at other locations measured.

3. Discussion

We found that the use of the MIRIS efficiently facilitated MIPO applications in these three fractures. The instrumentation was easy to use and apply and afforded good reduction, with minimal impedance to plate placement. Similar to findings in a cadaveric study [23], seating of the half-pin in the markedly convex, proximal radius can be difficult and proved problematic in dog #1. The half-pin was subsequently placed in the olecranon which allowed effective indirect reduction of the fracture. A smaller version of the MIRIS is available which utilizes 1.6 mm diameter half-pins (DePuy Synthes, Paoli, PA). The smaller system may reduce the problems associated with seating the half-pin in the proximal radius and may expand the use of the MIRIS to include diaphyseal long bone fractures in small dogs, as well as certain metaphyseal fractures which afford a limited area of bone for seating the half-pin.

We inserted the half-pins laterally so the MIRIS would not interfere with plate placement. Lateral application required placing the proximal half-pins through substantial muscle mass, especially in the two dogs with tibial fractures. Liberal release incisions were made to simplify pin placement. The laterally positioned MIRIS primarily facilitated reduction in the frontal plane. With lateral application of the MIRIS, unilateral traction, which occurs when manipulating the reduction handles, has the propensity to induce varus angulation within the limb. In contrast, prior studies evaluating the use of a two-ring circular fixator construct during MIPO application found a tendency to create a slight valgus angulation [7, 23]. The induced varus was 3° or less and did not have appreciable clinical ramifications, but ideally frontal plane angulation should be avoided. To prevent creating varus angulation, particular attention should be paid to ensure the reduction handles do not diverge as traction is applied to the limb. Applying simultaneous traction to the paw was helpful in restoring normal alignment.

All three dogs had spiral fractures which we were able to effectively reduce in an indirect, closed fashion. While the MIRIS is effective in restoring alignment of the fractured limb segment, this device is less adept at providing precise anatomic reduction. Percutaneously applied reduction forceps were used to improve reduction of the two tibial fractures and interfragmentary Kirschner wires were subsequently placed to maintain reduction during plate application [22]. The Kirshner wires were placed in a cranial to caudal orientation so as not to interfere with the medial and craniomedial plate placement. Accurate contouring of the plate and initial placement of a cortical screw in each of the major fracture segments further improved reduction [18–20, 22].

The implant failure that occurred in dog #3 was ascribed to using an undersized, 2.7 mm plate. We had concerns at surgery that the plate was undersized and a second orthogonal SOP plate was applied to increase construct stability [30, 31], but ultimately this fixation was not sufficient. At the revision surgery, a longer 3.5 mm plate, with a consequently larger area moment of inertia and therefore higher bending stiffness [32] than the combined 2.7 mm LCP and 2.0 mm SOP plates, was placed. In addition, during application of the 3.5 mm plate, the screws were placed closer to the fracture, decreasing the plate working length and therefore decreasing plate strain [33, 34]. Use of a 3.5 mm plate at the time of the initial surgery would have likely allowed the fracture to reach union without implant failure and reduced the risk of a surgical site infection. The incidence of surgical site infection following MIPO applications is historically low and has been ascribed to the mitigation of iatrogenic soft tissue trauma and shorter duration of surgery [11–13, 27].

The MIRIS system again provided efficient fracture reduction during dog #3’s revision surgery, despite the fracture having been sustained 9 days prior to revision. The system did not impede placement of a longer and larger plate. The fracture was reasonably well aligned following application of the MIRIS. Accurate plate contouring, based on radiographs of the intact contralateral tibia, facilitated frontal plane alignment. Reduction forceps, placed in the proximal plate insertion incision, were used to leverage the proximal fracture segment against the plate and further improve alignment in the sagittal plane. The mild residual valgus and recurvatum present following revision were ascribed to our inability to completely overcome craniolateral soft tissue constraints inherent to reducing a fracture that was sustained 9 days previously.

These cases document our initial clinical experience using the MIRIS for MIPO application in dogs. The MIRIS was easy to apply and consistently resulted in reductions that were near anatomic, with acceptable restoration of length and alignment. Plate and screw placement was unimpeded by the MIRIS, facilitating implant application. Inappropriate implant selection was considered the primary reason for the implant failure experienced by dog #3 and was unrelated to the use of the MIRIS system, as demonstrated by its use during revision surgery with adequate fracture reduction and lack of impedance to a larger plate. Despite initial implant failure and eventual surgical site infection in dog #3, all three dogs had excellent clinical outcomes at the time of final evaluation. Further investigation is required to assess the use of this system for different fracture configurations and locations. Use of the MIRIS system with smaller diameter half-pins and reduction handles for the treatment of fractures in small dogs warrants investigation.

Disclosure

This paper was presented at the 2017 Veterinary Orthopedic Society’s Annual Conference, Snowbird, Utah, USA.

Conflicts of Interest

The authors declare that they have no conflicts of interest.

Acknowledgments

Financial support was provided by discretionary funds from the University of Florida Comparative Orthopaedics and Biomechanics Laboratory. Instrumentation was provided by DePuy Synthes Vet, West Chester, PA.

References

H. G. Schmokel, K. Hurter, and P. Schawalder, “Percutaneous plating of tibial fractures in two dogs,” Veterinary and Comparative Orthopaedics and Traumatology, vol. 16, pp. 191–195, 2003.

H. G. Schmökel, S. Stein, H. Radke, K. Hurter, and P. Schawalder, “Treatment of tibial fractures with plates using minimally invasive percutaneous osteosynthesis in dogs and cats: Paper,” Journal of Small Animal Practice, vol. 48, no. 3, pp. 157–160, 2007.

C. Hudson, A. Pozzi, and D. Lewis, “Minimally invasive plate osteosynthesis: Applications and techniques in dogs and cats,” VCOT, vol. 22, pp. 175–182, 2009.

F. Baumgaertel, M. Buhl, and B. A. Rahn, “Fracture healing in biological plate osteosynthesis,” Injury, vol. 29, no. 3, pp. S3–S6, 1998.

R. H. Palmer, “Biological Osteosynthesis,” Veterinary Clinics of North America: Small Animal Practice, vol. 29, no. 5, pp. 1171–1185, 1999.

S. Garofolo and A. Pozzi, “Effect of Plating Technique on Periosteal Vasculature of the Radius in Dogs: A Cadaveric Study,” Veterinary Surgery, vol. 42, no. 3, pp. 255–261, 2013.

A. Pozzi, C. C. Hudson, C. M. Gauthier, and D. D. Lewis, “Retrospective Comparison of Minimally Invasive Plate Osteosynthesis and Open Reduction and Internal Fixation of Radius-Ulna Fractures in Dogs,” Veterinary Surgery, vol. 42, no. 1, pp. 19–27, 2013.

Y. Li, X. Jiang, Q. Guo, L. Zhu, T. Ye, and A. Chen, “Treatment of distal tibial shaft fractures by three different surgical methods: A randomized, prospective study,” International Orthopaedics, vol. 38, no. 6, pp. 1261–1267, 2014.

C. Collinge and R. Protzman, “Outcomes of minimally invasive plate osteosynthesis for metaphyseal distal tibia fractures,” Journal of Orthopaedic Trauma, vol. 24, no. 1, pp. 24–29, 2010.

D. Gülabi, H. İ. Bekler, F. Sağlam, Z. Taşdemir, G. S. Çeçen, and N. Elmalı, “Surgical treatment of distal tibia fractures: Open versus MIPO,” Ulusal Travma ve Acil Cerrahi Dergisi, vol. 22, no. 1, pp. 52–57, 2016.

M. Wagner, “General principles for the clinical use of the LCP,” Injury, vol. 34, supplement 2, pp. 31–42, 2003.

S. Eugster, P. Schawalder, F. Gaschen, and P. Boerlin, “A prospective study of postoperative surgical site infections in dogs and cats,” Veterinary Surgery, vol. 33, no. 5, pp. 542–550, 2004.

S. Arens, C. Kraft, U. Schlegel, G. Printzen, S. M. Perren, and M. Hansis, “Susceptibility to local infection in biological internal fixation. Experimental study of open vs minimally invasive plate osteosynthesis in rabbits,” Archives of Orthopaedic and Trauma Surgery, vol. 119, no. 1-2, pp. 82–85, 1999.

D. J. Redfern, S. U. Syed, and S. J. M. Davies, “Fractures of the distal tibia: Minimally invasive plate osteosynthesis,” Injury, vol. 35, no. 6, pp. 615–620, 2004.

O. Farouk, C. Krettek, T. Miclau, P. Schandelmaier, and H. Tscherne, “Effects of percutaneous and conventional plating techniques on the blood supply to the femur,” Archives of Orthopaedic and Trauma Surgery, vol. 117, no. 8, pp. 438–441, 1998.

J. Borrelli Jr., W. Prickett, E. Song, D. Becker, and W. Ricci, “Extraosseous blood supply of the tibia and the effects of different plating techniques: A human cadaveric study,” Journal of Orthopaedic Trauma, vol. 16, no. 10, pp. 691–695, 2002.

O. Farouk, C. Krettek, T. Miclau, P. Schandelmaier, P. Guy, and H. Tscherne, “Minimally invasive plate osteosynthesis: does percutaneous plating disrupt femoral blood supply less than the traditional technique?” Journal of Orthopaedic Trauma, vol. 13, no. 6, pp. 401–406, 1999.

L. P. Guiot and L. M. Déjardin, “Prospective evaluation of minimally invasive plate osteosynthesis in 36 nonarticular tibial fractures in dogs and cats,” Veterinary Surgery, vol. 40, no. 2, pp. 171–182, 2011.

A. Pozzi, M. Risselada, and M. D. Winter, “Assessment of fracture healing after minimally invasive plate osteosynthesis or open reduction and internal fixation of coexisting radius and ulna fractures in dogs via ultrasonography and radiography,” Journal of the American Veterinary Medical Association, vol. 241, no. 6, pp. 744–753, 2012.

C. C. Hudson, D. D. Lewis, and A. Pozzi, “Minimally Invasive Plate Osteosynthesis in Small Animals. Radius and Ulna Fractures,” Veterinary Clinics of North America - Small Animal Practice, vol. 42, no. 5, pp. 983–996, 2012.

T. H. Witsberger, D. A. Hulse, S. C. Kerwin, and W. B. Saunders, “Minimally invasive application of a radial plate following placement of an ulnar rod in treating antebrachial fractures: Technique and case series,” VCOT, vol. 23, no. 6, pp. 459–467, 2010.

A. Boero Baroncelli, B. Peirone, M. D. Winter, D. J. Reese, and A. Pozzi, “Retrospective comparison between minimally invasive plate osteosynthesis and open plating for tibial fractures in dogs,” VCOT, vol. 25, no. 5, pp. 410–417, 2012.

E. D. Gilbert, D. D. Lewis, S. Townsend, and S. E. Kim, “Comparison of two external fixator systems for fracture reduction during minimally invasive plate osteosynthesis in simulated antebrachial fractures,” Veterinary Surgery, vol. 46, no. 7, pp. 971–980, 2017.

A. Pozzi and D. D. Lewis, “Surgical approaches for minimally invasive plate osteosynthesis in dogs,” VCOT, vol. 22, no. 4, pp. 316–320, 2009.

D. J. Fox and J. L. Tomlinson, “Principles of angular limb deformity correction,” in Veterinary Surgery: Small Animal, K. M. Tobias and S. A. Johnston, Eds., pp. 657–668, W. B. Saunders, Philadelphia, Pa, USA, 1st edition, 2012.

G. M. Anderson, D. D. Lewis, R. M. Radasch, D. J. Marcellin-Little, M. Tommasini Degna, and A. R. Cross, “Circular external skeletal fixation stabilization of antebrachial and crural fractures in 25 dogs,” Journal of the American Animal Hospital Association, vol. 39, no. 5, pp. 479–498, 2003.

A. P. Morris, A. A. Anderson, D. M. Barnes et al., “Plate failure by bending following tibial fracture stabilisation in 10 cats,” Journal of Small Animal Practice, vol. 57, no. 9, pp. 472–478, 2016.

G. Jaegger, D. J. Marcellin-Little, and D. Levine, “Reliability of goniometry in Labrador Retrievers,” American Journal of Veterinary Research, vol. 63, no. 7, pp. 979–986, 2002.

S. G. Baker, J. K. Roush, M. D. Unis, and T. Wodiske, “Comparison of four commercial devices to measure limb circumference in dogs,” VCOT, vol. 23, no. 6, pp. 406–410, 2010.

D. L. Helfet and R. N. Hotchkiss, “Internal fixation of the distal humerus: A biomechanical comparison of methods,” Journal of Orthopaedic Trauma, vol. 4, no. 3, pp. 260–264, 1990.

I. F. Rubel, P. Kloen, D. Campbell et al., “Open reduction and internal fixation of humeral nonunions: A biomechanical and clinical study,” The Journal of Bone & Joint Surgery, vol. 84, no. 8, pp. 1315–1322, 2002.

P. Muir, K. A. Johnson, and M. D. Markel, “Area moment of inertia for comparison of implant cross-sectional geometry and bending stiffness,” Veterinary and Comparative Orthopaedics and Traumatology, vol. 8, pp. 146–152, 1995.

T. Pearson, M. R. Glyde, R. E. Day, and G. L. Hosgood, “The effect of intramedullary pin size and plate working length on plate strain in locking compression platerod constructs under axial load,” VCOT, vol. 29, no. 6, pp. 451–458, 2016.

P. J. Delisser, G. P. McCombe, R. S. Trask et al., “Ex vivo evaluation of the biomechanical effect of varying monocortical screw numbers on a plate-rod canine femoral gap model,” VCOT, vol. 26, no. 3, pp. 177–185, 2013.