Canadian Respiratory Journal
Volume 2017 (2017), Article ID 7894631, 8 pages
https://doi.org/10.1155/2017/7894631

Clinical Study

Effect of High-Flow Nasal Cannula versus Conventional Oxygen Therapy for Patients with Thoracoscopic Lobectomy after Extubation

Yuetian Yu,¹ Xiaozhe Qian,² Chunyan Liu,³ and Cheng Zhu⁴

¹Department of Critical Care Medicine, Ren Ji Hospital, School of Medicine, Shanghai Jiao Tong University, Shanghai, China
²Department of Thoracic Surgery, Ren Ji Hospital, School of Medicine, Shanghai Jiao Tong University, Shanghai, China
³Department of Emergency Medicine, Min Hang Central Hospital, School of Medicine, Fu Dan University, Shanghai, China
⁴Department of Emergency, Rui Jin Hospital, School of Medicine, Shanghai Jiao Tong University, Shanghai, China

Correspondence should be addressed to Cheng Zhu; zhucheng1203@163.com

Received 25 October 2016; Revised 11 December 2016; Accepted 22 January 2017; Published 19 February 2017

Academic Editor: Wan-Jie Gu

Copyright © 2017 Yuetian Yu et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Objective. To investigate whether high-flow nasal cannula (HFNC) oxygen therapy is superior to conventional oxygen therapy for reducing hypoxemia and postoperative pulmonary complications (PPC) in patients with thoracoscopic lobectomy after extubation. Methods. Patients with intermediate to high risk for PPC were enrolled in this study. Subjects were randomly assigned to HFNC group (HFNCG) or conventional oxygen group (COG) following extubation. Arterial blood samples were collected after extubation at 1, 2, 6, 12, 24, 48, and 72 h. Patients with postoperative hypoxemia and PPC were recorded. Adverse events were also documented. Results. Totally 110 patients were randomly assigned to HFNCG () and COG (). The occurrence rate of hypoxemia in COG was twice more than that in HFNCG (29.62% versus 12.51%, ) and PaO₂, PaO₂/FiO₂, and SaO₂/FiO₂ were significantly improved in HFNCG () in the first 72 h following extubation. Respiratory rate and incidence of reintubation as well as needing noninvasive ventilation were also decreased in HFNCG (), whereas the incidence of pneumonia and atelectasis were similar (). Adverse effects as throat and nasal pain occurred more frequently in COG. Conclusions. HFNC application improves oxygenation and reduces the risk of reintubation following thoracoscopic lobectomy but cannot decrease the incidence of PPC.

1. Introduction

Postextubation respiratory failure following major surgery is common, and a substantial proportion of the patients requires prolonged mechanical ventilation and prolonged intensive care unit (ICU) or hospital stay. Postoperative pulmonary complications (PPC) such as hypercapnia, atelectasis, and pneumonia which increase mortality are particularly attributable to adverse prognosis in patients with thorax surgery specially with lobectomy [1].

Respiratory support and oxygen therapy after tracheal extubation are of major importance to prevent hypoxemia and subsequent respiratory failure or reintubation in patients under general anaesthesia operation. Although conventional oxygen therapy via nasal prongs or a facemask can supplement oxygen administration, in some of the patients specially those who have lobectomy it is ineffective in compensating for loss in lung volume or in maintaining gas exchange [2]. High-flow nasal cannula oxygen (HFNC) mainly delivers a flow-dependent positive airway pressure and improves oxygenation by increasing end-expiratory lung volume, which can provide a maximum flow of 60 L/min [3]. It is considered to have a number of physiological advantages compared with other standard oxygen therapies, including the provision of positive end-expiratory pressure (PEEP), constant FiO₂, and good humidification. More importantly, it can reduce the anatomical dead space [4].

A few studies comparing HFNC and conventional oxygen therapy in patients with cardiac or abdominal surgery have been published in the last five years. However, the results remained controversial due to sample heterogeneity and there was no study reported in lobectomy patients. We therefore hypothesized that HFNC treatment might be superior to conventional oxygen therapy in reducing the incidence of hypoxemia and PPC for patients with lobectomy after extubation.

2. Methods

2.1. Research Briefs

The present study was a multicenter (total of 155 ICU beds from three teaching hospitals) prospective interventional trial which was approved by the Review Board and Ethics Committee of Shanghai Jiaotong University School of Medicine (number: 2015-Clinical-Res-005). The study was unblinded and noncrossover. Informed consent was obtained for all patients, either from the patient or from the next of kin. The study took place from January 2015 to June 2016. One month before the start of this study, a standardized weaning protocol and statistics procedure were set by 9 investigators from these centers after 2 days’ learning and discussion. All of the centers carefully followed this procedure during the study time.

2.2. Study Population

Consecutive sampling was used to recruit the patients who underwent planned thoracoscopic lobectomy because of lung tumor. Patients with intermediate to high risk for postoperative pulmonary complications (PPC) were eligible for participation. To identify such patients, the Assess Respiratory Risk in Surgical Patients in Catalonia (ARISCAT) score was used (Supplement in Supplementary Material, available online at https://doi.org/10.1155/2017/7894631). ARISCAT score ≥ 26 is associated with an intermediate to high risk for PPC [5, 6]. Patients were excluded from the study if they were immunocompromised; were pregnant; converted to an open thoracotomy because of poor visualization or bleeding; or were aged <18 or >80 years or if informed consent could not be obtained.

2.3. Randomization, Intervention, and Weaning Protocol

All the patients eligible were transferred to ICU for postoperative monitoring and ventilator weaning at the end of the thoracoscopic lobectomy procedure. Patients were classified into two groups by random figure table following extubation. A random number sequence was generated with STATA statistical software version 12.1. HFNC oxygen therapy group (HFNCG) received a flow rate of 35 to 60 L/min and FiO₂ was titrated (from 45% to 100%) by the treating clinician to maintain a peripheral oxygen saturation (SpO₂) of 95% or more. The conventional oxygen therapy group (COG) received oxygen via either nasal prongs or facemask with oxygen flow titrated (from 45% to 100%) by the bedside clinician to maintain a SpO₂ of 95% or more. HFNC oxygen therapy was delivered by the Optiflow™ system (Fisher & Paykel Healthcare Ltd, Auckland, New Zealand) using a MR850 heated humidifier and a RT202 breathing circuit. Natural air includes about 21% oxygen. If a patient is wearing a nasal cannula or a simple facemask, each additional liter/min of oxygen adds about 4 percentage points for the first 3 liters and only 3 percentage points for every liter thereafter to their FiO₂.

Following the guideline of Difficult Airway Society Extubation Guidelines Group [7], the patients were ready for scheduled extubation after tolerating a spontaneous breathing trial in ICU. The decision to extubate was at the discretion of the treating doctors in ICU and no mandatory extubation variables were set.

2.4. Clinical Assessment and Outcomes

Baseline assessment included the evaluation of age, gender, body mass index (BMI), acute physiology and chronic health evaluation (APACHE) II score, ARISCAT score, baseline PaO₂, arterial oxygen tension to inspiratory oxygen fraction ratio (PaO₂/FiO₂), oxygen saturation to FiO₂ ratio (SaO₂/FiO₂), and PaCO₂ before operation. Asthma, chronic obstructive pulmonary disease (COPD), and smoke history were also recorded. Lung function before operation was measured as well and the value of functional residual capacity (FRC) and forced expiratory volume in one second (FEV1)/forced vital capacity (FVC) were recorded.

The incidence of hypoxemia (defined as PaO₂/FiO₂ of 300 mmHg or less [8]) was recorded in the first 72 h after extubation and the differences of PaO₂, PaO₂/FiO₂, SaO₂/FiO₂, and PaCO₂ between the two groups were compared. Secondly, the rates of PPC like suspected pneumonia (patient receives antibiotics and meets at least one of the following criteria: new or changed sputum, new or changed lung opacities on chest X-ray when clinically indicated, tympanic temperature >38.3°C, and white blood cell (WBC) count >12 10⁹/L in the absence of other infectious focus) and atelectasis (opacification of the lung with shift of the mediastinum, hemidiaphragm toward the affected area, and compensatory overinflation in the adjacent nonatelectatic lung) [5] were also documented. Acute hypoxemic respiratory failure was defined by one of the hypoxemic criteria (SpO₂ < 92% while breathing at least 10 L/min oxygen, PaO₂ < 60 mmHg on air or PaO₂ < 80 mmHg while breathing any supplemental oxygen) and at least one of the following: severe respiratory distress with dyspnoea, accessory muscle recruitment and paradoxical abdominal or thoracic motion, respiratory rate >25 breaths/min, respiratory acidosis with pH < 7.30, and arterial carbon dioxide partial pressure (PaCO₂) >50 mmHg [8]. Once a patient after extubation was found with acute hypoxemic respiratory failure, noninvasive ventilation (NIV) (Bipap Vision with humidification, Respironics Inc, USA) was adopted. If the symptoms of respiratory distress did not improve within 2 hours, then reintubation might be considered. The incidence of NIV requirement and reintubation were also compared.

Adverse effects related to HFNC application and oxygen therapy (air leak, throat or nasal pain, and abdominal distension) were also recorded. As the previous studies indicated that it was with high incidence of PPC within 72 h following thoracoscopic lobectomy [1, 9], the arterial blood gases were consecutively collected and checked at 1, 2, 6, 12, 24, 48, and 72 h after extubation.

2.5. Statistical Analysis

Review of data from the three study centers over a 3-year period (20122014) revealed about 30% of patients with hypoxemia who underwent thoracoscopic lobectomy after extubation. A sample size of 117 for each group provided 80% power to detect a reduction in hypoxemia from 30% to 15% (alpha = 0.05).

Statistical analysis was performed using SPSS version 19.0. Data were initially assessed for normality and were subject to log-transformation where appropriate [10]. Data between the HFNCG and COG were compared using Chi-square test for equal proportion or Fisher exact test where numbers were small with results presented as the number and percentage. Continuous variables with normal distribution were compared using Student’s -test and presented as means (standard deviations), whereas skewed data was compared using Wilcoxon rank-sum test and reported as medians (interquartile range). Two-way analysis of variance (ANOVA) for repeated measures with Bonferroni post hoc analysis was used for analysis of the modification of variables over time in the two groups. All analyses were performed on an intention-to-treat basis and a two-sided was considered to be statistically significant. Figures were drawn using Graphpad prism version 6.0.

3. Results

3.1. Characteristics of the Patients

Over the study period, a total of 141 patients were screened and 110 eligible patients were recruited for the study. A total of 56 patients were assigned to HFNCG and 54 patients to COG. Thirty-one patients who met the exclusion criteria were excluded from the study. All patients included were followed until discharge home (Figure 1). The baseline characteristics of the 110 eligible patients are shown in Table 1. There were no significant differences between patients in two groups in all aspects (). Lung squamous cell carcinoma was the most prevalent type in both groups (57.14% versus 59.26%, ).

Table 1: Demographic characteristics of the patients who participated in the study (mean SD).

Characteristics
HFNCG ()
COG ()

Age, yrs
56.31 7.03
55.82 7.92
0.732

Male gender, (%)
30 (53.57)
28 (51.85)
1.000

BMI, kg/m²
26.32 4.73
25.19 5.02
0.226

APACHE II
26.32 4.73
25.19 5.02
0.226

ARISCAT
31.12 3.74
32.36 3.08
0.071

COPD, (%)
8 (14.29)
7 (12.96)
0.840

Asthma, (%)
5 (8.93)
4 (7.41)
1.000

Smoking history, (%)
12 (21.43)
8 (14.81)
0.369

Hemoglobin, g/L
108.29 17.31
105.43 22.06
0.450

Lactate, mmol/L
0.32 0.07
0.33 0.06
0.424

Respiratory, /min
18.43 3.45
17.98 3.87
0.521

PaO₂, mmHg
95.37 12.42
92.59 18.49
0.355

PaCO₂, mmHg
41.73 6.33
43.52 4.93
0.102

PaO₂/FiO₂, mmHg
350.35 33.87
340.98 40.65
0.191

SaO₂/FiO₂
210.37 52.77
222.51 48.65
0.213

FRC, L
2.08 0.32
2.12 0.41
0.567

FEV1/FVC, %
78.63 11.52
75.52 13.45
0.195

Postsurgical ventilation durations, h
2.13 0.43
2.18 0.32
0.492

Figure 1: Flow chart of the study.

3.2. Outcomes Comparison

Although lung tumor was removed by thoracoscopic surgery in a relatively less invasive way, the incidence of hypoxemia was still high during the study period due to the high risk of the patients included. The occurrence rate of hypoxemia in COG was 29.62%, two times more than that in HFNCG (12.51%), . The rate of needing NIV was still high in COG as well as the rate of reintubation (). There was no significant difference in the rate of hypercapnia, atelectasis, and suspected pneumonia (Table 2).

Table 2: Occurrence rates for outcomes in COG compared with HFNCG 72 h following extubation, (%).

Characteristics
HFNCG ()
COG ()

Hypoxemia
7 (12.50)
16 (29.63)
0.027

Hypercapnia
3 (5.36)
8 (14.81)
0.121

Reintubation
0 (0)
5 (9.26)
0.026

Needing NIV
2 (3.57)
9 (16.67)
0.027

Atelectasis
2 (3.57)
5 (9.26)
0.266

Suspected pneumonia
2 (3.57)
2 (3.70)
1.000

Throat or nasal pain
1 (1.79)
7 (12.96)
0.030

Abdominal distension
3 (5.36)
0 (0)
0.243

Air leak
0 (0)
0 (0)
1.000

Because there were two different oxygen supplement strategies (via prongs or facemask) in COG, the outcomes between nasal prongs and facemask patients were also compared. It was indicated that different ways of oxygen therapy in COG did not affect the outcomes 72 h following extubation () (Table 3). Because all subjects included in our study had intermediate to high risk for PPC, different oxygen concentrations were supplied following extubation. It revealed that hypoxemia, reintubation, and needing NIV were more likely to occur in higher oxygen concentrations patients in COG () while there was no difference in HFNCG () (Table 4).

Table 3: Occurrence rates for outcomes in nasal prongs patients compared with facemask patients 72 h following extubation, (%).

Characteristics
Nasal prongs ()
Facemask ()

Hypoxemia
9 (31.03)
7 (28.00)
0.808

Hypercapnia
4 (13.79)
4 (16.00)
1.000

Reintubation
3 (10.34)
2 (8.00)
1.000

Needing NIV
4 (13.79)
5 (20.00)
0.718

Atelectasis
2 (6.89)
3 (12.00)
0.653

Suspected pneumonia
1 (3.45)
1 (4.00)
1.000

Throat or nasal pain
3 (10.34)
4 (16.00)
0.692

Abdominal distension
0 (0)
0 (0)
1.000

Air leak
0 (0)
0 (0)
1.000

Table 4: Occurrence rates for outcomes in HFNC patients compared with COG patients with different oxygen concentrations 72 h following extubation, (%).

Characteristics
HFNCG ()
P
COG ()
P

FiO₂ (45~60%)
FiO₂ (6080%)
FiO₂ (80~100%)
FiO₂ (45~60%)
FiO₂ (60~80%)
FiO₂ (80~100%)

()
()
()
()
()
()

Hypoxemia
2 (11.11)
2 (9.09)
3 (18.75)
0.658
2 (11.76)
5 (23.81)
9 (56.25)
0.015

Hypercapnia
1 (5.56)
1 (4.55)
1 (6.25)
0.973
2 (11.76)
4 (19.05)
2 (12.50)
0.782

Reintubation
0 (0)
0 (0)
0 (0)
1.000
0 (0)
1 (4.76)
4 (25.00)
0.031

Needing NIV
0 (0)
0 (0)
2 (12.5)
0.075
0 (0)
3 (14.29)
6 (37.50)
0.014

Atelectasis
1 (5.56)
0 (0)
1 (6.25)
0.508
1 (5.88)
2 (9.52)
2 (12.50)
0.806

Suspected pneumonia
0 (0)
1 (4.55)
1 (6.25)
0.588
0 (0)
1 (4.76)
1 (6.25)
0.603

Throat or nasal pain
0 (0)
1 (4.55)
0 (0)
0.455
0 (0)
2 (9.52)
5 (31.25)
0.024

Abdominal distension
0 (0)
0 (0)
3 (18.75)
0.019
0 (0)
0 (0)
0 (0)
1.000

Air leak
0 (0)
0 (0)
0 (0)
1.000
0 (0)
0 (0)
0 (0)
1.000

We also found that there was no difference in mortality, length of ICU stay, and length of hospital stay between the two groups (). However, the total hospitalization expenditures in COG was higher than that in HFNCG (Table 5).

Table 5: Comparison of hospitalizations between two groups (mean ± SD).

Characteristics
HFNCG ()
COG ()
P

Mortality
0
0
1.000

Length of ICU stay, days

0.553

Length of hospital stay, days

0.433

Total hospitalization expenditures,

0.001

According to ANOVA for repeated measures, the values of PaCO₂ and lactate were similar within the two groups throughout the entire study period in all time points (). PaO₂ values were higher in the HFNC group at all time points, respectively (), as well as the PaO₂/FiO₂ ratio and SaO₂/FiO₂ ratio. We also found that the respiratory rate in HFNC was not that high in COG during the 72 h after extubation (Figure 2).

(a)

(b)

(c)

(d)

(e)

(f)

Figure 2: Comparison of variables between two groups in different time points. (a) Arterial PaO₂ values; (b) arterial PaCO₂ values; (c) the PaO₂/fractional inspired oxygen (FiO₂) ratio; (d) oxygen saturation/FiO₂ ratio; (e) lactate values; (f) respiratory rate. P < 0.05.

3.3. Adverse Effects Comparison

In three patients in HFNCG abdominal distension occurred during the time of oxygen therapy but the HFNC therapy could still be continued, while there was none in COG. Throat or nasal pain seems to have a high morbidity in COG (12.96%) for lack of proper humidity. No other adverse effects related to oxygen therapy, such as nasal trauma or intolerance of the therapy, need for supplemental sedation, and air leak, were found during our study period (Table 5).

4. Discussion

In this multicenter randomized interventional trial, we found that the application of HFNC oxygen therapy in patients with thoracoscopic lobectomy after extubation could reduce the risk of hypoxemia and reintubation as well as improve oxygenation represented by PaO₂, PaO₂/FiO₂, and SaO₂/FiO₂. Despite extensive physiological data, there are few data on the use of HFNC in preventing the worsening of respiratory function following lobectomy. To the best of our knowledge, this study is the first randomized, controlled trial exploring the use of HFNC in adult thoracoscopic lobectomy patients.

HFNC is widely employed for patients of all age groups in several types of respiratory failure from preterm infants to adults [11] and is broadly used in ICU because of the ease of use, tolerability, and safety [3]. It has been reported to improve oxygenation after extubation in infants [12]. One clinical study indicated that HFNC might have benefit in patients with abdominal surgery [13]. However, after two years of research, they failed to identify beneficial effect of HFNC therapy after extubation in terms of the reduction of either reintubation or NIV application. Another multicenter randomized clinical trial showed that, in low risk patients, HFNC reduced the risk of reintubation within 72 hours [14]. Collectively, current literature cannot provide definitive evidence on whether HFNC treatment is superior to conventional oxygen therapy. Among the reasons, the most important factor was that patients involved in these studies were mixed populations which leaded to high heterogeneity. In our study, only patients with thoracoscopic lobectomy following extubation were included, which reduced the heterogeneity of sample and avoided misinterpreting the results.

One observational trial by Sztrymf et al. [15] demonstrated that HFNC was associated with significant reductions in respiratory rate and thoracoabdominal asynchrony and a significant improvement in arterial oxygen saturation. Our findings are consistent with this study. In the first 72 h after extubation, respiratory rate in HFNCG was lower than that in COG at any time point. The total medical costs in COG were much higher. In our opinion, relatively more NIV and reintubation in COG may help to explain the increased medical costs, since either reintubation or NIV application will prolong ICU and hospital stay. However, we could not reach the conclusion in our study. First of all, the percentage of patients with COPD or asthma was relatively low in both of the two groups (<15%), leading to a short duration of NIV usage (less than 3 days). Secondly, we acknowledged that a comparatively small sample size in our study might compromise the statistical power of the study.

In our study, the patients enrolled were those who underwent lobectomy and the occurrence of hypoxemia in HFNCG was relatively lower than that in COG, as well as the rate of needing NIV and the rate of reintubation ( which reflected the advantage of HFNC.

Although several approaches for providing supplemental oxygen have been suggested, the best option for patients with postoperation extubation remains unclear. HFNC delivers some level of continuous positive airway pressure (CPAP) via high-flow ventilation. However, the value of CPAP is unstable (from 1 to 7 cm H₂O) because of the leak around the nasal cannula and a closed mouth of the patients cannot always be guaranteed [16]. Due to the provision of distending pressure and increase in end-expiratory lung volume, some researchers proposed that it decreased airway resistance and flushed nasopharyngeal dead space, thereby contributing to the reduced work of breathing [17, 18]. Considering the suspected induced effects of HFNC on lung volumes [19], we hypothesized that early initiation of HFNC could minimize in part lung derecruitment after extubation. Itagaki et al. reported better thoracoabdominal synchrony, measured using respiratory inductance plethysmography, in patients with mild to moderate respiratory failure when comparing high-flow nasal cannulas to standard oxygen therapy [20]. In this respect, our results support the findings of previous studies [21, 22], which suggest that HFNC oxygen therapy may favorably decrease the respiratory rate both in infants and in adult patients.

Several studies [17, 20] have demonstrated that HFNC could accelerate the elimination of CO₂ and bronchial secretions which indicated that it might decrease the incidence of hypercapnia and pneumonia. Accordingly, we speculated that the increased flow of HFNC was able to reduce the work of breathing by flushing the nasopharyngeal space and improve CO₂ elimination after extubation after lobectomy. However, there was no difference in the incidence of hypercapnia and pneumonia between the groups in our study which was due to few patients with severe COPD or with muscle fatigue who were included in study period.

Dry or poorly humidified medical gas may elicit patient complaints, such as dry nose, dry throat, and nasal pain, and consequent poor tolerance of oxygen therapy. Better patient comfort, a reduction in respiratory rate with a similar arterial carbon dioxide, and a higher oxygenation were reported during high-flow nasal cannula support in Roca et al.’s study [23]. However, abdominal distension which was a major complication caused by HFNC in our study is a problem that cannot be ignored. HFNC is an open ventilation system, yet it is still able to increase end-expiratory pressure. Pharyngeal pressure is affected by mouth-opening or closing, delivered flow, and size of nasal prongs. Usually, pharyngeal pressure is less than 5 cm H₂O; however, pressure is not predictable or sustained, so we shall apply HFNC with caution in gastrointestinal surgery patients. In addition, with high flow there is an increase in the airway pressure which may make the population of our study at risk of air leak following thoracic surgery. During the study period, no patients of air leak were reported due to the pressure generated by HFNC being relatively low.

4.1. Study Limitation

We acknowledge that there are limitations in the study. We calculated the sample size by using a historical review of extubation data from 2012 to 2014 before the study initiated. The sample size expected in each group was 117. However, during our 18-month (January 2015 to June 2016) study period, the patients eligible were not as much as we expected because the majority of patients with lobectomy were at low risk which might have been attributable to overall improvements in perioperative surgical care. This might lead to compromised statistical power to detect a significant difference between groups in the primary outcome. In addition, postoperative changes in pulmonary function were not recorded and compared. Anyway, our study did show a clear clinical benefit of high-flow nasal cannula oxygen therapy.

4.2. Conclusion

HFNC application improves oxygenation and reduces the risk of reintubation. It should be used as an alternative to the conventional oxygen therapy especially for patients receiving thoracoscopic lobectomy following extubation.

Abbreviations

APACHE: | Acute physiology and chronic health evaluation
ARISCAT: | Assess Respiratory Risk in Surgical Patients in Catalonia
BMI: | Body mass index
COPD: | Chronic obstructive pulmonary disease
CPAP: | Continuous positive airway pressure
FEV1: | Forced expiratory volume in one second
FRC: | Functional residual capacity
FVC: | Forced vital capacity
HFNC: | High-flow nasal cannula oxygen
ICU: | Intensive care unit
NIV: | Noninvasive ventilation
PEEP: | Positive end-expiratory pressure
PPC: | Postoperative pulmonary complications.

Competing Interests

The authors have declared that no competing interests exist.

Authors’ Contributions

Yuetian Yu and Cheng Zhu both helped in drafting and editing the article. Chunyan Liu revised the language of the manuscript. Xiaozhe Qian and Cheng Zhu revised and approved the final manuscript. Yuetian Yu and Xiaozhe Qian contributed equally to this work.

References

C.-C. Tu and P.-K. Hsu, “Global development and current evidence of uniportal thoracoscopic surgery,” Journal of Thoracic Disease, vol. 8, pp. S308–S318, 2016.

M. Licker, M. De Perrot, A. Spiliopoulos et al., “Risk factors for acute lung injury after thoracic surgery for lung cancer,” Anesthesia and Analgesia, vol. 97, no. 6, pp. 1558–1565, 2003.

L. Papazian, A. Corley, D. Hess et al., “Use of high-flow nasal cannula oxygenation in ICU adults: a narrative review,” Intensive Care Medicine, vol. 42, no. 9, pp. 1336–1349, 2016.

M. Nishimura, “High-flow nasal cannula oxygen therapy in adults: physiological benefits, indication, clinical benefits, and adverse effects,” Respiratory Care, vol. 61, no. 4, pp. 529–541, 2016.

V. Mazo, S. Sabaté, J. Canet et al., “Prospective external validation of a predictive score for postoperative pulmonary complications,” Anesthesiology, vol. 121, no. 2, pp. 219–231, 2014.

J. Canet, L. Gallart, C. Gomar et al., “Prediction of postoperative pulmonary complications in a population-based surgical cohort,” Anesthesiology, vol. 113, no. 6, pp. 1338–1350, 2010.

M. Popat, V. Mitchell, R. Dravid, A. Patel, C. Swampillai, and A. Higgs, “Difficult Airway Society Guidelines for the management of tracheal extubation,” Anaesthesia, vol. 67, no. 3, pp. 318–340, 2012.

J. G. Toffaletti and C. R. Rackley, “Monitoring oxygen status,” Advances in Clinical Chemistry, vol. 77, pp. 103–124, 2016.

T. Kammerer, E. Speck, and V. von Dossow, “Anesthesia in thoracic surgery,” Anaesthesist, vol. 65, no. 5, pp. 397–412, 2016.

Z. Zhang, “Univariate description and bivariate statistical inference: the first step delving into data,” Annals of Translational Medicine, vol. 4, no. 5, article no. 91, 2016.

J. H. Lee, K. J. Rehder, L. Williford, I. M. Cheifetz, and D. A. Turner, “Use of high flow nasal cannula in critically ill infants, children, and adults: a critical review of the literature,” Intensive Care Medicine, vol. 39, no. 2, pp. 247–257, 2013.

C. L. Collins, J. R. Holberton, C. Barfield, and P. G. Davis, “A randomized controlled trial to compare heated humidified high-flow nasal cannulae with nasal continuous positive airway pressure postextubation in premature infants,” Journal of Pediatrics, vol. 162, no. 5, pp. 949.e1–954.e1, 2013.

E. Futier, C. Paugam-Burtz, T. Godet et al., “Effect of early postextubation high-flow nasal cannula vs conventional oxygen therapy on hypoxaemia in patients after major abdominal surgery: a French multicentre randomised controlled trial (OPERA),” Intensive Care Medicine, vol. 42, no. 12, pp. 1888–1898, 2016.

G. Hernández, C. Vaquero, P. González et al., “Effect of postextubation high-flow nasal cannula vs conventional oxygen therapy on reintubation in low-risk patients: a randomized clinical trial,” JAMA, vol. 315, no. 13, pp. 1354–1361, 2016.

B. Sztrymf, J. Messika, F. Bertrand et al., “Beneficial effects of humidified high flow nasal oxygen in critical care patients: a prospective pilot study,” Intensive Care Medicine, vol. 37, no. 11, pp. 1780–1786, 2011.

Z. J. Kubicka, J. Limauro, and R. A. Darnall, “Heated, humidified high-flow nasal cannula therapy: yet another way to deliver continuous positive airway pressure?” Pediatrics, vol. 121, no. 1, pp. 82–88, 2008.

G. Testa, F. Iodice, Z. Ricci et al., “Comparative evaluation of high-flow nasal cannula and conventional oxygen therapy in paediatric cardiac surgical patients: a randomized controlled trial,” Interactive Cardiovascular and Thoracic Surgery, vol. 19, no. 3, pp. 456–461, 2014.

J. W. Shepard Jr. and C. D. Burger, “Nasal and oral flow-volume loops in normal subjects and patients with obstructive sleep apnea,” American Review of Respiratory Disease, vol. 142, no. 6, part 1, pp. 1288–1293, 1990.

G. Spoletini, M. Alotaibi, F. Blasi, and N. S. Hill, “Heated humidified high-flow nasal oxygen in adults: Mechanisms of action and clinical implications,” Chest, vol. 148, no. 1, pp. 253–261, 2015.

T. Itagaki, N. Okuda, Y. Tsunano et al., “Effect of high-flow nasal cannula on thoraco-abdominal synchrony in adult critically Ill patients,” Respiratory Care, vol. 59, no. 1, pp. 70–74, 2014.

A. Corley, L. R. Caruana, A. G. Barnett, O. Tronstad, and J. F. Fraser, “Oxygen delivery through high-flow nasal cannulae increase end-expiratory lung volume and reduce respiratory rate in post-cardiac surgical patients,” British Journal of Anaesthesia, vol. 107, no. 6, pp. 998–1004, 2011.

J. Riera, P. Pérez, J. Cortés, O. Roca, J. R. Masclans, and J. Rello, “Effect of high-flow nasal cannula and body position on end-expiratory lung volume: A Cohort Study Using Electrical Impedance Tomography,” Respiratory Care, vol. 58, no. 4, pp. 589–596, 2013.

O. Roca, J. Riera, F. Torres, and J. R. Masclans, “High-flow oxygen therapy in acute respiratory failure,” Respiratory Care, vol. 55, no. 4, pp. 408–413, 2010.