Canadian Respiratory Journal
Volume 2018 (2018), Article ID 3654251, 6 pages
https://doi.org/10.1155/2018/3654251

Research Article

Variation of Risk Factors for Cause-Specific Reintubation: A Preliminary Study

Emi Fujii,¹ Kazunori Fujino,¹ Sachiko Tanaka-Mizuno,² and Yutaka Eguchi¹

¹Department of Critical and Intensive Medicine, Shiga University of Medical Science, Seta-tsukinowa-cho, Otsu-shi, Shiga 527-8505, Japan
²Department of Medical Statistics, Shiga University of Medical Science, Seta-tsukinowa-cho, Otsu-shi, Shiga 527-8505, Japan

Correspondence should be addressed to Emi Fujii; riki1020@belle.shiga-med.ac.jp

Received 28 May 2018; Revised 21 September 2018; Accepted 4 October 2018; Published 28 October 2018

Academic Editor: Andrea S. Melani

Copyright © 2018 Emi Fujii et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Unexpected reintubation may occur, even if the risk factors are considered and a spontaneous breathing trial is successful. Reintubation is thought to be caused by various factors. Several studies have investigated the risk factors of reintubation, but most did not classify reintubation by cause. We retrospectively classified patients undergoing reintubation at intensive care unit by cause (respiratory insufficiency vs. nonrespiratory insufficiency) to examine the cause-specific risk factors of reintubation. A total of 262 patients were included; reintubation within 48 hours after extubation was performed in 12 patients (reintubation rate, 4.5%). After classification by cause of reintubation, the pressure of arterial oxygen to fractional inspired oxygen concentration (P/F) ratio exhibited a significant association with reintubation only in the respiratory insufficiency group (odds ratio (OR) 0.989, 95% confidence interval (CI) 0.980 to 0.999, , and OR 0.989, 95% CI 0.979 to 0.999, , in the univariate and multivariate analyses, respectively). In the propensity score analysis, a P/F ratio ≤ 200 may be a risk factor for reintubation in the respiratory insufficiency group (OR 7.811, 95% CI 1.345 to 45.367, ). In the nonrespiratory insufficiency group, intubation duration was significantly related to reintubation (OR 1.165, 95% CI 1.012 to 1.342, , and OR 1.163, 95% CI 1.004 to 1.348, , in the univariate and multivariate analyses, respectively). In conclusion, a low P/F ratio at extubation may be a risk factor for reintubation due to respiratory insufficiency. In the nonrespiratory insufficiency group, intubation duration may be significantly related to reintubation. The risk factors for reintubation may differ by the cause of reintubation. Further large-scale randomized controlled trials are required.

1. Introduction

In the intensive care unit (ICU), approximately 30% of all patients require mechanical ventilation to assist respiration [1]. Long-term ventilation can lead to complications such as ventilator-associated pneumonia and ventilator-associated lung injury, which greatly affect the length of stay and mortality in the ICU. Moreover, ventilator days are an independent risk factor of mortality in the ICU [2, 3]. However, extubation failure is associated with poor outcomes, including high mortality [4–8].

The use of a ventilator weaning protocol for the performance of a spontaneous breathing trial (SBT) [9] has been widely recommended for extubation from ventilation. Although this strategy is generally successful, reintubation is required in ≥15% of patients [6, 10, 11]. To reduce the rate of reintubation, it is necessary to accurately evaluate the risk factors.

Reintubation is thought to be caused by various factors. To reduce reintubation rates, several studies have been conducted, and several risk factors (age, Acute Physiology and Chronic Health Evaluation II (APACHE II) scores [12], intubation duration [12], rapid shallow breathing index (RSBI) [13], and positive fluid balance on the day before extubation [10]) have been reported. However, to the best of our knowledge, no study has investigated the risk factors of reintubation after classifying the reintubation cases by cause. The predominant causes of reintubation are respiratory insufficiency, upper airway factors such as laryngeal complications, lowered level of consciousness, and haemodynamic instability. To assess upper airway factors, the cuff leak test is commonly performed; however, this procedure has low sensitivity and cannot predict reintubation [14].

In this study, we classified reintubation subjects into those with respiratory insufficiency and those with nonrespiratory insufficiency and retrospectively investigated the risk factor of reintubation by cause.

2. Materials and Methods

2.1. Ethical Approval

This study was approved by the Ethics Committee of the Shiga University, Medical Science Hospital, Shiga, Japan. Informed consent of the patients was obtained (approval number: 28-17). The work complied with the Helsinki Declaration of 1975 and its subsequent revisions.

2.2. Setting

We retrospectively examined adult patients admitted to the ICU of the Shiga University, Medical Science Hospital, Shiga, Japan, between April 2013 and July 2015. In this ICU, both medical and surgical patients are admitted. Cases of cardiovascular surgery were excluded. We investigated 262 patients who were intubated, invasively mechanically ventilated for more than 24 hours, and extubated.

2.3. Extubation Criteria

In our hospital’s ICU, the extubation criteria include a successful SBT and a confirmed negative cuff leak test. The method and period of the SBT are left to the discretion of the attending physician. The respiratory settings of the SBT include a continuous positive airway pressure with a positive end-expiratory pressure of 4 cm H₂O and a pressure support of 4 cm H₂O; sometimes, T-pieces are used.

2.4. Reintubation Criteria

When the attending physician decided that reintubation is necessary, reintubation was carried out. Deterioration of mental state such as agitation, haemodynamic instability (tachycardia, arrhythmia, and elevation of blood pressure), increased respiratory rate, use of respiratory support muscle, decrease in partial pressure of arterial oxygen (PaO₂), and increase in partial pressure of arterial carbon dioxide (PaCO₂) were considered to be indicators for the requirement of reintubation [15].

2.5. Measures and Classification

We examined the subjects’ age, sex, Acute Physiology and Chronic Health Evaluation II (APACHE II) and Sequential Organ Failure Assessment (SOFA) scores at admission, the intubation duration, pressure of arterial oxygen to fractional inspired oxygen concentration ratio (PaO₂/FiO₂ ratio or P/F ratio), PaCO₂, rapid shallow breathing index (RSBI) at extubation, and positive fluid balance on the day before extubation. Moreover, we investigated the use of noninvasive ventilation (NIV) after extubation and the prognoses (28- and 90-day mortality) associated with reintubation.

Subjects in whom reintubation was required within 48 hours after extubation were defined as reintubation cases. Subsequently, the reintubation cases were divided into two groups, according to the cause of reintubation. Respiratory muscle fatigue, excessive airway secretion, a weak cough, hypoxaemia, and hypercapnia were defined as respiratory insufficiency, whereas upper airway factors (laryngeal oedema, mucosal ulcers, granulation, and vocal cord paralysis), haemodynamic instability, and lowered level of consciousness were defined as nonrespiratory insufficiency (Table 1).

Table 1: Classification of the causes of reintubation.

Respiratory insufficiency group

Respiratory muscle fatigue

Excessive airway secretion

Weak cough

Hypoxaemia

Hypercapnia

Nonrespiratory insufficiency group
Upper airway factors
Laryngeal oedema

Mucosal ulcer, granulation

Vocal cord paralysis

Lowered level of consciousness

Haemodynamic instability

2.6. Statistical Analyses

The baseline characteristics of the subjects are shown as means and standard deviations for continuous variables and numbers and proportions for categorical variables. We compared the baseline characteristics between the successful extubation and reintubation groups using the chi-square and Mann–Whitney U-tests. The reintubation group was further classified into the respiratory insufficiency and nonrespiratory insufficiency subgroups. We conducted univariate and age-adjusted multivariate logistic regression to identify the risk factors for reintubation. Odds ratios (ORs) and 95% confidence intervals (CIs) were calculated; was considered significant.

After dividing the subjects into the two groups according to the cause of reintubation, we used the propensity score method to adjust for possible confounders. First, to investigate the risk factors of reintubation due to respiratory insufficiency, we added the candidate confounders age, APACHE II score, intubation duration, and RSBI to a logistic regression model with reintubation as the dependent variable. These confounders were previously reported to be risk factors for reintubation [8, 10, 12, 16–18]. In the final model, we conducted logistic regression including a P/F ratio ≤ 200, the propensity scores as covariates, and reintubation as the dependent variable. In past reports, a P/F ratio > 150 was recommended as the SBT initiation criterion [19–22]; thus, we used a P/F ratio ≤ 200 as a covariate in this study. Since the number of cases in the nonrespiratory insufficiency groups was small, we did use propensity score analysis for this group. All statistical analyses were performed with SPSS Statistics Version 22 (IBM Japan, Tokyo, Japan).

3. Results

3.1. Subject Characteristics and Causes of Reintubation

During the study period, 262 patients were admitted to the ICU and extubated. Of these, 250 were successfully extubated, and 12 were reintubated within 48 hours after extubation (reintubation rate, 4.5%; Figure 1).

Figure 1: Flowchart.

There were no significant differences in age, sex, APACHE II scores, and SOFA scores between the successful extubation and reintubation groups. The intubation duration was significantly longer (4.5 days vs. 1.0 day, respectively; ), and the RSBI was significantly higher (63.0 breaths/min/L vs. 43.0 breaths/min/L, respectively; ) in the reintubation group than in the extubation group (Table 2). There were no significant differences in PaCO₂ at extubation between the groups. Noninvasive ventilation was performed in 28 out of all patients and 4 patients from all reintubation groups (2 from the respiratory insufficiency group and 2 from the nonrespiratory insufficiency group). In the reintubation group, we did not observe any complications such as ventilator-associated pneumonia or ventilator-associated lung injury. Moreover, no deterioration of the prognoses (28- and 90-day mortality) was observed.

Table 2: Characteristics of the subjects.

All
Successful extubation group
Reintubation group

Total
value
Respiratory insufficiency group
value
Nonrespiratory insufficiency group
value

Patients, (%)
262
250 (95.4)
12 (4.5)

7 (2.6)

5 (1.9)

Age
64.0 ± 16.2
65.0 ± 16.1
60.0 ± 16.8
0.151
62.0 ± 18.2
0.808
43.0 ± 13.3
0.053

Sex (male : female)
149 : 113
144 : 106
5 : 7
0.276
4 : 3
0.981
1 : 4
0.093

APACHE score
12.5 ± 7.7
12.0 ± 7.5
17.5 ± 9.1
0.257
17.0 ± 8.2
0.626
18.0 ± 11.1
0.230

SOFA score
6.0 ± 2.9
6.0 ± 2.9
5.0 ± 2.9
0.979
7.0 ± 2.7
0.960
5.0 ± 3.5
0.988

Intubation duration (days)
1.0 ± 4.0
1.0 ± 3.9
4.5 ± 5.0
0.006
4.0 ± 6.0
0.253
9.0 ± 2.9
0.003

P/F ratio
350.0 ± 89.2
360.0 ± 88.3
341.0 ± 106.8
0.327
252.0 ± 106.6
0.056
350.0 ± 81.2
0.440

RSBI
43.0 ± 17.0
43.0 ± 16.6
63.0 ± 20.6
0.03
58.0 ± 19.0
0.106
68.0 ± 24.7
0.175

The positive fluid balance (ml)
85.0 ± 1082.5
103.1 ± 1088.6
−291.5 ± 902.7
0.141
67.0 ± 580.6
0.734
−793.4 ± 1093.3
0.056

PaCO₂ (mmHg)
39.7 ± 5.0
39.5 ± 4.9
42.8 ± 6.4
0.119
42.6 ± 8.2
0.478
42.9 ± 3.7
0.108

28-day mortality, (%)
2 (0.7)
2 (0.7)
0 (0)
0.756
0 (0)
0.812
0 (0)
0.842

90-day mortality, (%)
14 (5.3)
14 (5.3)
0 (0)
0.399
0 (0)
0.520
0 (0)
0.592

Values are expressed as means ± standard deviations or numbers (percentages). The value of each group is described in comparison to the successful extubation group. APACHE: acute physiology and chronic health evaluation; SOFA: sequential organ failure assessment; P/F ratio: pressure of arterial oxygen to fractional inspired oxygen concentration ratio; RSBI: rapid shallow breathing index; PaCO₂: partial pressure of arterial carbon dioxide.

3.2. Risk Factors of Reintubation by Cause

Among 12 subjects requiring reintubation, the cause was respiratory insufficiency and nonrespiratory insufficiency in 7 and 5 cases (4 due to upper airway factors and 1 due to lowered level of consciousness), respectively (Figure 1).

In both univariate and multivariate analyses, after adjustment for age, intubation duration and RSBI were significantly associated with reintubation in the total reintubation group (univariate analyses: intubation duration: OR 1.128, 95% CI 1.018 to 1.249, and RSBI: OR 1.034, 95% CI 1.006 to 1.063; multivariate analyses: intubation duration: OR 1.123, 95% CI 1.013 to 1.246, and RSBI: OR 1.033, 95% CI 1.005 to 1.061; Table 3). Moreover, the P/F ratio exhibited a significant association with reintubation, but only in the respiratory insufficiency group ( and in the univariate and multivariate analyses, respectively). Intubation duration was significantly related to reintubation in the nonrespiratory insufficiency group only ( and in the univariate and multivariate analyses, respectively; Table 3).

Table 3: Univariate and age-adjusted multivariate logistic regression analysis by cause of reintubation.

Univariate logistic regression
Multivariate regression (age-adjusted)

OR
95% CI
value
OR
95% CI
value

Reintubation group

Age
0.977
0.944 to 1.011
0.185

APACHE score
1.055
0.986 to 1.129
0.120
1.066
0.996 to 1.141
0.066

Intubation duration
1.128
1.018 to 1.249
0.022
1.123
1.013 to 1.246
0.028

P/F ratio
0.996
0.989 to 1.003
0.228
0.994
0.987 to 1.001
0.105

RSBI
1.034
1.006 to 1.063
0.017
1.033
1.005 to 1.061
0.023

Respiratory insufficiency group

Age
0.995
0.950 to 1.041
0.820

APACHE score
1.062
0.967 to 1.165
0.208
1.068
0.972 to 1.173
0.173

Intubation duration
1.088
0.947 to 1.250
0.232
1.088
0.946 to 1.250
0.236

P/F ratio
0.989
0.980 to 0.999
0.036
0.989
0.979 to 0.999
0.026

RSBI
1.030
0.994 to 1.067
0.106
1.030
0.994 to 1.067
0.108

Nonrespiratory insufficiency group

Age
0.959
0.913 to 1.007
0.092

APACHE score
1.083
0.982 to 1.195
0.111
1.108
0.998 to 1.229
0.054

Intubation duration
1.165
1.012 to 1.342
0.033
1.163
1.004 to 1.348
0.044

P/F ratio
1.004
0.994 to 1.013
0.449
1.002
0.992 to 1.012
0.734

RSBI
1.038
0.998 to 1.080
0.065
1.033
0.994 to 1.074
0.097

APACHE, acute physiology and chronic health evaluation; CI, confidence interval; OR, odds ratio; P/F ratio, pressure of arterial oxygen to fractional inspired oxygen concentration ratio; RSBI, rapid shallow breathing index.

3.3. Propensity Score Analysis

In the reintubation group, a P/F ratio ≤ 200 at extubation was not associated with reintubation in the propensity score analysis after adjustments for age, APACHE score, intubation duration, and RSBI. However, in the respiratory insufficiency group, a P/F ratio ≤ 200 showed a significant association with reintubation (P/F ratio ≤ 200 at extubation: OR 7.811, 95% CI 1.345 to 45.367; Table 4). In the nonrespiratory insufficiency group, no patient had a P/F ratio ≤ 200.

Table 4: Propensity score analysis in the respiratory insufficiency group.

P/F ≤ 200
Logistic regression using propensity scores (adjusted for age, APACHE score, intubation duration, and RSBI)

OR
95% CI
value

Reintubation group
4.004
0.776 to 20.664
0.098

Respiratory insufficiency group
7.811
1.345 to 45.367
0.022

APACHE, acute physiology and chronic health evaluation; CI, confidence interval; OR, odds ratio; P/F ratio, pressure of arterial oxygen to fractional inspired oxygen concentration ratio; RSBI, rapid shallow breathing index.

4. Discussion

We retrospectively investigated patients who required reintubation despite a successful SBT and cuff leak test at extubation. To clarify the cause-specific risk factors of reintubation, we divided the reintubation subjects into the respiratory insufficiency and nonrespiratory insufficiency groups. We used propensity score analysis to adjust for confounding factors. The odds of reintubation significantly increased with a P/F ratio ≤ 200 at extubation in the respiratory insufficiency group. In the nonrespiratory insufficiency group, intubation duration may be related to reintubation. Larger-scale studies are needed, but when classified by cause, reintubation seems to have a different risk factor.

The reason a low P/F ratio at extubation has not been considered as a predictor of reintubation is likely that reintubation cases have previously not been classified by the cause of reintubation. The P/F ratio at extubation has been disregarded as a risk factor for reintubation [10, 12, 16]. Thille et al. examined 168 patients who were extubated as scheduled and reported that although the P/F ratio was investigated, there were no significant differences between successful and failed extubation [17]. In our study, the P/F ratio at extubation was not associated with reintubation in the total reintubation group in the multivariate analysis. This is consistent with the results of previous studies.

However, a low P/F ratio significantly increased the risk of reintubation when the cause was respiratory insufficiency. Because a deterioration in the P/F ratio at extubation was not often observed in the nonrespiratory insufficiency group, the P/F ratio at extubation may not be associated with reintubation when a simultaneous analysis was performed.

Only in the nonrespiratory insufficiency group, the intubation duration significantly increased the risk of reintubation. Penuelas et al. reported that a long duration of intubation at extubation increased the risk of reintubation [12]. In our study, the intubation duration in the reintubation group was longer than that in successful extubation groups, but we observed no significant differences between the successful extubation groups and the respiratory insufficiency group, and the intubation duration was significantly longer in the nonrespiratory insufficiency group than in the successful extubation group. The intubation duration has also been reported as a risk factor of laryngeal injuries after intubation [23], which may explain why the intubation duration was a risk factor for reintubation in the nonrespiratory insufficiency group.

RSBI may not be a risk factor of reintubation when stratified by cause. It was reported that RSBI has high reliability as a predictor of weaning [24], but it is affected by the ventilator support setting [25], so RSBI alone may be insufficient as a predictor. In our survey, a significant difference in the RSBI was found between the reintubation and successful extubation groups. However, when we further classified the reintubation groups into two subgroups by cause, we observed no significant differences in the RSBI between the groups. This is possibly because classification into two groups decreases the number of subjects in each group; this may attenuate the effects of differences observed. It is necessary to investigate by increasing the number of cases.

In this study, it was suggested that cause-specific risk factors might exist upon classifying the cause of reintubation. Although it may be done empirically, there is a possibility that, by classifying the cause, effective treatment for preventing reintubation can be provided. For example, in the nonrespiratory insufficiency group, for the prevention of postextubation laryngeal oedema if corticosteroids administration is provided not to all intubation patients, but only to the patients with long intubation duration, it may be more effective and side effects may be reduced. Patients which need reintubation due to upper airway factors in nonrespiratory insufficiency may be difficult to intubate and should be prepared for difficult airway. Although it was reported that NIV was not effective for postextubation respiratory failure [26], there are reports that early NIV was effective for the prevention of respiratory failure after extubation [27]. Even in patients with a low P/F ratio at extubation, reintubation may be avoided by providing NIV after extubation. By increasing the number of cases and classifying them according to the cause, the risk factors of reintubation will become clearer. It will also contribute to the development of a treatment regimen corresponding to each disease condition.

Our study has several limitations. First, the number of reintubations was low initially and further decreased due to the cause-specific classification. Second, since reintubation was caused by a variety of factors, an accurate classification was difficult. There was no case in this study, but there may be patients with both respiratory insufficiency and upper airway factors.

Third, while we examined and adjusted for age, APACHE II score, intubation duration, and RSBI, airway secretions and a weak cough reflex, which are also risk factors of reintubation, were difficult to investigate, and an objective evaluation of these factors was difficult. Fourth, this study had a single-centre retrospective design. Finally, all subjects were of Asian descent; thus, possible differences associated with ethnicity could not be considered.

5. Conclusions

When we investigated the risk factors of reintubation by cause, we found that a low P/F ratio at extubation in patients with respiratory insufficiency was a predictor of reintubation. Moreover, the intubation duration might be a risk factor in patients with nonrespiratory insufficiency. This was a small-scale retrospective study; although large studies may show different results, our results indicate that the risk factors vary between reintubation due to respiratory failure and reintubation due to nonrespiratory failure. By increasing the sample size and examining the cause-specific risks of reintubation, the risk of reintubation can be predicted with a higher accuracy. This can aid in the development of treatment strategies corresponding to each pathophysiology.

Data Availability

The data used to support the findings of this study are available from the corresponding author upon request.

Conflicts of Interest

The authors declare that that there are no conflicts of interest regarding the publication of this paper.

Acknowledgments

The authors would like to thank A. Suzuki for her help in collecting the data.

References

A. Esteban, A. Anzueto, F. Frutos et al., “Characteristics and outcomes in adult patients receiving mechanical ventilation: a 28-day international study,” JAMA, vol. 287, no. 3, pp. 345–355, 2002.

J. Mancebo, “Weaning from mechanical ventilation,” European Respiratory Journal, vol. 9, no. 9, pp. 1923–1931, 1996.

D. J. Dries, “Weaning from mechanical ventilation,” Journal of Trauma: Injury, Infection, and Critical Care, vol. 43, no. 2, pp. 372–384, 1997.

S. K. Epstein, R. L. Ciubotaru, and J. B. Wong, “Effect of failed extubation on the outcome of mechanical ventilation,” Chest, vol. 112, no. 1, pp. 186–192, 1997.

A. W. Thille, J. C. Richard, and L. Brochard, “The decision to extubate in the intensive care unit,” American Journal of Respiratory Critical Care Medicine, vol. 187, no. 12, pp. 1294–1302, 2013.

A. Esteban, I. Alia, F. Gordo et al., “Extubation outcome after spontaneous breathing trials with T-tube or pressure support ventilation,” American Journal of Respiratory Critical Care Medicine, vol. 156, no. 2, pp. 459–465, 1997.

S. K. Epstein and R. L. Ciubotaru, “Independent effects of etiology of failure and time to reintubation on outcome for patients failing extubation,” American Journal of Respiratory Critical Care Medicine, vol. 158, no. 2, pp. 489–493, 1998.

A. Upadya, L. Tilluckdharry, V. Muralidharan, Y. Amoateng-Adjepong, and C. A. Manthous, “Fluid balance and weaning outcomes,” Intensive Care Medicine, vol. 31, no. 12, pp. 1643–1647, 2005.

B. Blackwood, F. Alderdice, K. Burns, C. Cardwell, G. Lavery, and P. O’Halloran, “Use of weaning protocols for reducing duration of mechanical ventilation in critically ill adult patients: cochrane systematic review and meta-analysis,” BMJ, vol. 342, no. 2, Article ID c7237, 2011.

F. Frutos-Vivar, N. D. Ferguson, A. Esteban et al., “Risk factors for extubation failure in patients following a successful spontaneous breathing trial,” Chest, vol. 130, no. 6, pp. 1664–1671, 2006.

A. W. Thille, F. Boissier, H. Ghezala, K. Razazi, A. Mekontso-Dessap, and C. Brun-Buisson, “Risk factors for and prediction by caregivers of extubation failure in ICU patients: a prospective study,” Critical Care Medicine, vol. 43, no. 3, pp. 613–620, 2015.

O. Penuelas, F. Frutos-Vivar, C. Fernandez et al., “Characteristics and outcomes of ventilated patients according to time to liberation from mechanical ventilation,” American Journal of Respiratory Critical Care Medicine, vol. 184, no. 4, pp. 430–437, 2011.

K. L. Yang and M. J. Tobin, “A prospective study of indexes predicting the outcome of trials of weaning from mechanical ventilation,” New England Journal of Medicine, vol. 324, no. 21, pp. 1445–1450, 1991.

M. E. Ochoa, C. Marin Mdel, F. Frutos-Vivar et al., “Cuff-leak test for the diagnosis of upper airway obstruction in adults: a systematic review and meta-analysis,” Intensive Care Medicine, vol. 35, no. 7, pp. 1171–1179, 2009.

J. M. Boles, J. Bion, A. Connors et al., “Weaning from mechanical ventilation,” European Respiratory Journal, vol. 29, no. 5, pp. 1033–1056, 2007.

B. Mokhlesi, A. Tulaimat, T. J. Gluckman, Y. Wang, A. T. Evans, and T. C. Corbridge, “Predicting extubation failure after successful completion of a spontaneous breathing trial,” Respiratory Care, vol. 52, no. 12, pp. 1710–1717, 2007.

A. W. Thille, A. Harrois, F. Schortgen, C. Brun-Buisson, and L. Brochard, “Outcomes of extubation failure in medical intensive care unit patients,” Critical Care Medicine, vol. 39, no. 12, pp. 2612–2618, 2011.

M. Y. Bien, S. S. Hseu, H. W. Yien et al., “Breathing pattern variability: a weaning predictor in postoperative patients recovering from systemic inflammatory response syndrome,” Intensive Care Medicine, vol. 30, no. 2, pp. 241–247, 2004.

E. W. Ely, A. M. Baker, D. P. Dunagan et al., “Effect on the duration of mechanical ventilation of identifying patients capable of breathing spontaneously,” New England Journal of Medicine, vol. 335, no. 25, pp. 1864–1869, 1996.

M. H. Kollef, S. D. Shapiro, P. Silver et al., “A randomized, controlled trial of protocol-directed versus physician-directed weaning from mechanical ventilation,” Critical Care Medicine, vol. 25, no. 4, pp. 567–574, 1997.

G. P. Marelich, S. Murin, F. Battistella, J. Inciardi, T. Vierra, and M. Roby, “Protocol weaning of mechanical ventilation in medical and surgical patients by respiratory care practitioners and nurses: effect on weaning time and incidence of ventilator-associated pneumonia,” Chest, vol. 118, no. 2, pp. 459–467, 2000.

L. Rose, J. J. Presneill, L. Johnston, and J. F. Cade, “A randomised, controlled trial of conventional versus automated weaning from mechanical ventilation using SmartCare/PS,” Intensive Care Medicine, vol. 34, no. 10, pp. 1788–1795, 2008.

J. M. Tadie, F. Behm, L. Lecuyer et al., “Post-intubation laryngeal injuries and extubation failure: a fiberoptic endoscopic study,” Intensive Care Medicine, vol. 36, no. 6, pp. 991–998, 2010.

M. Meade, G. Guyatt, D. Cook et al., “Predicting success in weaning from mechanical ventilation,” Chest, vol. 120, no. 6, pp. 400S–424S, 2001.

M. F. El-Khatib, S. M. Zeineldine, and G. W. Jamaleddine, “Effect of pressure support ventilation and positive end expiratory pressure on the rapid shallow breathing index in intensive care unit patients,” Intensive Care Medicine, vol. 34, no. 3, pp. 505–510, 2008.

R. Agarwal, A. N. Aggarwal, D. Gupta, and S. K. Jindal, “Role of noninvasive positive-pressure ventilation in postextubation respiratory failure: a meta-analysis,” Respiratory Care, vol. 52, no. 11, pp. 1472–1479, 2007.

M. Ferrer, M. Valencia, J. M. Nicolas, O. Bernadich, J. R. Badia, and A. Torres, “Early noninvasive ventilation averts extubation failure in patients at risk: a randomized trial,” American Journal of Respiratory and Critical Care Medicine, vol. 173, no. 2, pp. 164–170, 2006.