Canadian Respiratory Journal
Volume 2018 (2018), Article ID 9270329, 6 pages
https://doi.org/10.1155/2018/9270329

Research Article

Comparing REM- and NREM-Related Obstructive Sleep Apnea in Jordan: A Cross-Sectional Study

K. Al Oweidat,¹ S. A. AlRyalat,² M. Al-Essa,³ and N. Obeidat¹

¹Respiratory and Sleep Medicine, The University of Jordan, Amman, Jordan
²Department of Ophthalmology, The University of Jordan, Amman, Jordan
³Internal Medicine, The University of Jordan, Amman, Jordan

Correspondence should be addressed to S. A. AlRyalat; saifryalat@yahoo.com

Received 29 April 2018; Accepted 15 July 2018; Published 12 August 2018

Academic Editor: Alice M. Turner

Copyright © 2018 K. Al Oweidat et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Obstructive sleep apnea (OSA) is a common disorder that includes an intermittent mechanical obstruction of the upper airway during sleep, which can occur either during rapid eye movement (REM) phase or non-REM (NREM) phase. In this study, we aim to evaluate the differences in demographic and polysomnographic features between REM- and NREM-related OSA in a Jordanian sample, using both the broad and the restricted definitions of REM-related OSA. All patients who were referred due to clinical suspicion of OSA and underwent sleep study were screened. We included patients with a diagnosis of OSA who had Apnea-Hypopnea Index (AHI) greater than or equal to five. We classified patients into REM-related OSA according to either the broad definition (AHIREM/AHINREM ≥ 2) or the strict definition (AHIREM > 5 and AHINREM < 5 with a total REM sleep duration of at least 30 minutes), and patients with AHIREM/AHINREM less than two were classified as NREM-related OSA. A total of 478 patients were included in this study with a mean age of 55.3 years (±12.6). According to the broad definition of REM-related OSA, 86 (18%) of OSA patients were classified as having REM-related OSA compared to only 13 (2.7%) patients according to the strict definition. Significant differences were found between both NREM-related OSA and REM-related OSA according to the broad and to the strict definitions for arousal index ( and ), respectively, duration of saturation below 90% ( for both), and saturation nadir ( and ), respectively. No significant differences were found between this group and other OSA patients regarding age, BMI, ESS, and snoring. Our study showed that the stricter the definition for REM-related OSA, the milder the associated clinical changes.

1. Introduction

Sleep disordered breathing (SDB) spans a spectrum of disorders that includes obstructive sleep apnea (OSA), which implies an intermittent mechanical obstruction of the upper airway during sleep, leading to reduced airflow to the lungs [1]. Obstructive sleep apnea (OSA) is a common disorder affecting between 6% and 13% of the industrialized world [2, 3]. Daytime sleepiness, fatigue, snoring, early morning headache, and witnessed apnea are the most common presenting symptoms [4, 5]. Among the risk factors for OSA, obesity is the most important [6], as OSA is present in 40% of obese individuals and 70% of OSA patients are obese [7].

In patients with SDB, OSA events may occur throughout nonrapid eye movement (NREM) and rapid eye movement (REM) sleep. In REM sleep, hypotonia of upper airway muscles increases the risk for upper airway obstruction [8]. This hypothesis led to the emergence of the term “REM-related OSA” and increased the interest in studying this subtype of OSA. Although a lot of research was recently done on REM-related OSA, there is still no universally accepted definition for it, as a result of that, the prevalence of REM‐related OSA among the total number of patients with OSA undergoing polysomnography varies between 10% and 36% [9–12]. The most common criterion used in the literature for diagnosis of REM-related OSA is based on the ratio of Apnea-Hypopnea Index (AHI) during REM and NREM sleep (AHIREM/AHINREM), where a value of two or more denotes REM‐related OSA. This definition is criticized for being broad, thus falsely including more patients under the category of REM‐related OSA. A more recent definition has emerged to restrict the criteria for diagnosing REM‐related OSA to having AHIREM > 5 and AHINREM < 5 with at least 30 minutes duration of REM sleep [13]. Despite the findings of numerous studies concerning REM-related SDB, little is currently known about this type of SDB in Arab populations, since most reports have focused only on the features of REM-related SDB in Caucasian African American and recently Asian populations. In this study, we aim to evaluate the differences of demographic and polysomnographic features between REM‐ and NREM‐related OSA in a Jordanian sample, using both the broad and the restricted definitions of REM-related OSA.

2. Methods

This study was approved by the institutional review board (IRB) of the Jordan University Hospital, and it was conducted in accordance with the declaration of Helsinki latest update (2013).

2.1. Patients

During the period between June 2016 and April 2018, a total of 516 patients were referred to the sleep lab at the Jordan University Hospital; the indication for their referral was clinical suspicion of OSA suggested by symptoms such as snoring, increased daytime sleepiness, witnessed apnea, and early morning headache. Only patients who had an AHI greater than five were diagnosed to have OSA and were included in this study; accordingly, 38 patients were excluded.

2.2. Measurements

The overnight study consisted of continuous recordings of an electrocardiographic lead, right and left electrooculographic leads, submental, and two electroencephalographic leads. Respiration was monitored throughout the night with thermocouples at the nose and mouth, and with thoracic and abdominal strain gauges. Recording of the oxyhaemoglobin saturation (SaO₂) and duration of saturation below 90% SpO₂ (minutes) were obtained. The biophysiological changes on the polysomnography (PSG) device were evaluated using the 2.4 version of the American Academy of Sleep Medicine (AASM) Manual for the Scoring of Sleep and Associated Events [14]. Apnea was defined as a reduction in airflow by greater than 90% with a duration of at least 10 seconds in which there was a persistent respiratory effect. Hypopnea was defined as reduction of more than 30% in the airflow that was associated with an electroencephalographic arousal or a 3% or more drop in the SaO₂. The Apnea-Hypopnea Index (AHI) was calculated as the total number of apneas and hypopneas per hour of total sleep time. Sleep state-dependent indices (i.e., NREM‐AHI and REM‐AHI) were also determined by dividing the number of events in NREM and REM sleep by the amount of NREM and REM time, respectively. Total snoring time was recorded throughout the study. The following demographic information was obtained: age, gender, and body mass index (BMI). Daytime sleepiness was assessed by a translated Arabic version of the Epworth Sleepiness Scale (ESS) completed by the patient himself/herself [15]. We validated the translated version of ESS before its use.

Definitions

 REM‐related OSA:

 The broad definition: AHIREM/AHINREM at least 2. The restricted definition: AHIREM ≥ 5 and AHINREM <  5, with a total REM sleep duration of at least 30 minutes.

 NREM‐related OSA:

 AHIREM/AHINREM less than 2.

Comparison of patient’s characteristics between the three groups, NREM‐related SDB and broad and strict types of REM‐related SDB, was done. We compared patient's demographics, snoring, desaturation time below 90%, nadir of O₂%, and Epworth Sleepiness Scale (ESS).

2.3. Statistical Analysis

We used SPSS 21.0 (Chicago, USA) in our statistical analysis. We used mean (±standard deviation) to describe age, BMI, and other continuous variables. We used frequency (percentage) to describe gender, severity, and other nominal variables.

The independent sample t-test was used to compare the mean differences between REM‐related and NREM‐related OSA patient groups where we described the results in mean differences and a 95% confidence interval (95% CI). We used the chi-square test followed by Z-test for proportions (with Bonferroni correction) to assess gender differences in REM‐related and NREM‐related OSA patients and to study the difference in severity between REM-related and NREM-related OSA using the different definitions. A value less than 0.05 was used as the significance threshold.

3. Results

A total of 478 patients were included in this study with a mean age of 55.3 years (±12.6), and there were 265 (55.4%) men and 213 (44.6%) women. Demographic (age, gender, and BMI) and polysomnographic (AHI severity, inclusion in either old or new definitions of REM-related OSA, ESS, arousal index, saturation below 90%, and saturation nadir) details of the included sample are shown in Table 1. According to AHI, 74 (15.5%) were classified as having mild OSA, 67 (14%) were moderate, and 337 (70.5%) were severe. Severity was significantly associated with gender (), as 77% of men had severe OSA compared to 62.4% of women. Table 2 details the characteristics for each grade of OSA.

Table 1: Demographic (age, gender, and BMI) and polysomnographic (AHI severity, inclusion in either old or new definitions of REM-related OSA, ESS, arousal index, saturation below 90%, and saturation nadir) details of the included sample.

Mean
Standard deviation
Count
Percentage

Age
55
13

Gender

    Male

265
55.4

    Female

213
44.6

BMI
36.62
7.61

AHI severity

    Mild

74
15.5

    Moderate

67
14.0

    Severe

337
70.5

Old definition

    No

392
82.0

    Yes

86
18.0

New definition

    No

465
97.3

    Yes

13
2.7

ESS
10.67
6.13

Arousal index
41.92
22.89

Saturation below 90%
32.31
32.85

Saturation nadir
70.00
16.04

AHI: Apnea-Hypopnea Index, BMI: body mass index, ESS: Epworth Sleepiness Scale.

Table 2: Comparing different severities of OSA (mild, moderate, and severe) regarding age, BMI (body mass index), ESS (Epworth Sleepiness Scale), arousal index, saturation nadir, and percentage snoring from total sleep.

value
Mean
Standard deviation
95% confidence interval

Lower bound
Upper bound

Age

    Mild
<0.001
49.42
13.8
46.23
52.61

    Moderate

54.85
12.1
51.89
57.81

    Severe

56.63
12.1
55.33
57.92

    Total

55.26
12.6
54.13
56.40

BMI

    Mild
<0.001
33.31
7.6
31.55
35.07

    Moderate

35.27
6.4
33.72
36.82

    Severe

37.61
7.6
36.80
38.43

    Total

36.62
7.6
35.93
37.30

ESS

    Mild
0.005
9.01
5.9
7.64
10.39

    Moderate

9.61
6.0
8.14
11.08

    Severe

11.25
6.1
10.59
11.90

    Total

10.67
6.1
10.13
11.22

Arousal index

    Mild
<0.001
15.24
11.0
12.68
17.80

    Moderate

23.33
11.9
20.42
26.23

    Severe

51.48
19.3
49.41
53.55

    Total

41.92
22.9
39.87
43.98

Saturation nadir

    Mild
<0.001
82.92
9.3
80.76
85.08

    Moderate

79.13
8.5
77.06
81.21

    Severe

65.34
16.0
63.63
67.06

    Total

70.00
16.0
68.56
71.44

Duration of saturation below 90% (minutes)

    Mild
<0.001
10.01
21.01
5.14
14.88

    Moderate

13.04
23.63
7.27
18.80

    Severe

41.03
32.66
37.53
44.53

    Total

32.31
32.85
29.35
35.26

% snoring

    Mild
0.342
21.64
21.4
16.67
26.61

    Moderate

18.10
19.1
13.44
22.76

    Severe

22.00
19.8
19.88
24.11

    Total

21.39
19.9
19.60
23.19

According to the broad definition of REM‐related OSA, 86 (18%) of OSA patients were classified as having REM-related OSA compared to only 13 (2.7%) patients according to the strict definition. All patients who were classified as having REM-related OSA were included in the broad definition of REM-related OSA. 73 (15.3%) patients were REM‐related OSA included in the broader, but not in the strict definition. Upon comparing the severity of OSA between the broad, strict, and those satisfying the broad but not the strict, significant differences were found between REM‐related OSA and NREM‐related OSA, as shown in Table 3.

Table 3: The difference in severity between REM-related OSA and NREM-related OSA according to different definitions of REM-related OSA. value indicates the significance of difference between REM-related OSA and NREM-related OSA in each definition.

Definition
Type of OSA
OSA severity
Total number
value

Mild (%)
Moderate (%)
Severe (%)

Broad
NREM-OSA
8.7
10.7
80.6
392
<0.001

REM-OSA
46.5
29.1
24.4
86

Strict
NREM-OSA
13.1
14.4
72.5
465
<0.001

REM-OSA
100
0
0
13

Broad without strict
NREM-OSA
11.6
10.4
78
405
<0.001

REM-OSA
37
34.2
28.8
73

For patients with REM-related OSA according to the broad definition, the mean age was 52.2 years (±13.5). For gender differences, women had significantly () higher percentage of REM‐related OSA (31%) compared to men (7.5%). Significant differences were found for arousal index (, mean difference between NREM‐related OSA (46.5 ± 21.9) and REM-related OSA (21.1 ± 14.5) of 25.4 with a 95% CI from 20.5 to 30.2), for duration of saturation below 90% (, mean difference between NREM-related OSA (35.4 ± 33.2) and REM-related OSA (18.2 ± 27.2) of 17.2 with a 95% CI from 9.7 to 24.8), and for saturation nadir (, mean difference between NREM-related OSA (68.9 ± 16.3) and REM-related OSA (75 ± 14.1) of −6.1 with a 95% CI from −9.8 to −2.4). No significant differences were found between this group and other OSA patients regarding age, BMI, ESS, and snoring.

For patients with REM‐related OSA according to the strict definition, the mean age was 44.2 years (±14.1). For gender differences, women had significantly () higher percentage of REM‐related OSA (5.2%) compared to men (0.8%). Significant differences were found for arousal index (, mean difference between NREM-related OSA (42.6 ± 22.7) and REM-related OSA (18.2 ± 14.4) of 24.4 with a 95% CI from 11.9 to 36.8), for duration of saturation below 90% (, mean difference between NREM‐related OSA (33.0 ± 33.0) and REM‐related OSA (8.6 ± 17.6) of 24.4 with a 95% CI from 6.4 to 42.4), and for saturation nadir (, mean difference between NREM‐related OSA (69.6 ± 16) and REM‐related OSA (83.9 ± 7.5) of −14.1 with a 95% CI from −23.1 to −5.5). No significant differences were found between this group and other OSA patients regarding age, BMI, ESS, and snoring.

For REM-related OSA included in the broader but not in the strict definition, the mean age was 53.6 years (±13). For gender differences, women had significantly () higher percentage of REM-related OSA (25.8%) compared to men (6.8%). Significant differences were found for arousal index (, mean difference between NREM‐related OSA (45.6 ± 22.2) and REM-related OSA (21.6 ± 14.5) of 23.9 with a 95% CI from 18.6 to 29.2) and for duration of saturation below 90% (, mean difference between NREM‐related OSA (34.5 ± 33.1) and REM‐related OSA (19.9 ± 28.3) of 14.7 with a 95% CI from 6.6 to 22.8). No significant differences were found between this group and other OSA patients regarding age, BMI, ESS, snoring, or saturation nadir.

4. Discussion

In this study, we showed different characteristics for patients with REM-related OSA based on which definition is applied for diagnosis (broad versus strict). We found a milder nadir saturation reached and a lower duration of saturation below 90% when applying the strict definition of REM-related OSA compared to the broad definition. Moreover, the strict definition of REM‐related OSA yielded a lower arousal index compared to the broad definition. Upon comparing mean ESS and snoring duration, the mean ESS score or snoring duration for REM‐related OSA patients did not differ significantly from that for NREM‐related OSA patients. Finally, we showed frequency and characteristics of OSA and REM‐related OSA in Jordanians, a poorly studied population regarding this subject from the Middle Eastern ethnicity.

A previous large, community-based study on middle-aged adults did not find significant difference in daytime sleepiness on ESS and multiple sleep latency test (MSLT) between REM- and NREM-related OSA [16], a finding that is also appreciated in our study regardless of which REM-related OSA definition is used. This finding was also shown in a previous study where an increase in NREM AHI was found to be associated with daytime sleepiness as assessed by MSLT [17]. NREM-related OSA was also associated with poorer health-related outcomes, including mental health, compared to REM‐related OSA [16].

The stricter the definition of REM-related OSA, the lower the arousal index, and the milder the severity of OSA (according to AHI); these findings are also appreciated in a Japanese study that analyzed the features of REM‐related OSA according to the different definitions compared to NREM‐related OSA, and they found that REM‐related OSA is generally associated with lower arousal index along with milder severity of OSA.

In contrast to our study, they found a lower mean BMI among REM-related OSA patients compared to those with NREM-related OSA [18].

An earlier study that used the broad definition of REM-related OSA showed less disruption during sleep in REM-related OSA patients [16]. The use of saturation nadir was previously shown to correlate with disease outcome and was also demonstrated to possibly replace AHI in predicting OSA outcomes, including hypertension [19]. Duration of saturation below 90% was also studied and was found to correlate with OSA severity [20]. In our study, we investigated the effect of using broad and strict definitions of REM-related OSA on saturation nadir and duration of saturation below 90%, and we showed that the broad definition of REM-related OSA is associated with a higher mean difference in oxygen saturation nadir and a lower duration of saturation below 90% compared to NREM-related OSA.

The prevalence of OSA among middle-aged adults is estimated to be 2% in women and 4% in men in a large Canadian study [21]. A previous study in Jordan that used a Berlin questionnaire to screen for OSA showed that OSA is generally common among Jordanian population, with an overall higher risk in older men [22]. In our study that was conducted on Jordanian sample as well, we found an overall higher percentage of OSA among men. We also found that severer OSA is found mainly in NREM-related OSA and in older men who have higher BMI. The severer the OSA, the higher the arousal index and the ESS score, and the lower the saturation. However, snoring duration was not found to be associated with OSA severity.

This study has several limitations that should be considered in the future work. Common comorbidities, such as hypertension and diabetes, should be considered upon comparing the outcomes of patients with REM-related and NREM-related OSA. Moreover, majority of our sample had a severe form of OSA, which could raise a concern for a potential bias in representing OSA patients.

5. Conclusion

In this study, we found significant differences between both NREM-related OSA and REM-related OSA according to the broad and REM-related OSA according to the strict definitions for arousal index, duration of saturation below 90%, and saturation nadir, where REM-related OSA patients had milder findings. Generally, using the strict definition of REM-related OSA yields a milder OSA-related arousal index and a milder effect on oxygen saturation.

Data Availability

The data used to support the findings of this study are available from the corresponding author upon request.

Conflicts of Interest

The authors declare that they have no conflicts of interest.

Authors’ Contributions

K. Al Oweidat was responsible for research idea, study design, data collection, reviewing literature, manuscript writing, and approving the final version of the study. M. Al-Essa was responsible for reviewing the literature, data collection, manuscript writing, and approving the final version of the study. S. A. AlRyalat was responsible for reviewing the literature, statistical analysis and results, manuscript writing, and approving the final version of the study. N. Obeidat was responsible for research idea, manuscript writing, and approving the final version of the study.

Acknowledgments

The authors would like to thank Mr. Eyad Mufleh from the Jordan University Hospital sleep lab for his assistance during patients’ assessment at the sleep lab.

References

O. C. Ioachimescu and N. A. Collop, “Sleep-disordered breathing,” Neurologic Clinics, vol. 30, no. 4, pp. 1095–1136, 2012.

P. E. Peppard, T. Young, J. H. Barnet, M. Palta, E. W. Hagen, and K. M. Hla, “Increased prevalence of sleep-disordered breathing in adults,” American Journal of Epidemiology, vol. 177, no. 9, pp. 1006–1014, 2013.

E. O. Bixler, A. N. Vgontzas, T. T. Have, K. Tyson, and A. Kales, “Effects of age on sleep apnea in men,” American Journal of Respiratory and Critical Care Medicine, vol. 157, no. 1, pp. 144–148, 1998.

M. Partinen and T. Telakivi, “Epidemiology of obstructive sleep apnea syndrome,” Sleep, vol. 15, no. 6, pp. S1–S4, 1992.

W. W. Flemons and W. T. McNicholas, “Clinical prediction of the sleep apnea syndrome,” Sleep Medicine Reviews, vol. 1, no. 1, pp. 19–32, 1997.

R. Wolk, A. S. Shamsuzzaman, and V. K. Somers, “Obesity, sleep apnea, and hypertension,” Hypertension, vol. 42, no. 6, pp. 1067–1074, 2003.

A. N. Vgontzas, T. L. Tan, E. O. Bixler, L. F. Martin, D. Shubert, and A. Kales, “Sleep apnea and sleep disruption in obese patients,” Archives of Internal Medicine, vol. 154, no. 15, pp. 1705–1711, 1994.

K. P. Grace, S. W. Hughes, and R. L. Horner, “Identification of the mechanism mediating genioglossus muscle suppression in REM sleep,” American Journal of Respiratory and Critical Care Medicine, vol. 187, no. 3, pp. 311–319, 2013.

J. H. Rubio, J. P. Janssens, T. Rochat, and E. Sforza, “Rapid eye movement-related disordered breathing,” Chest, vol. 128, no. 5, pp. 3350–3357, 2005.

B. Koo, J. Dostal, O. Ioachimescu, and K. Budur, “The effects of gender and age on REM-related sleep-disordered breathing,” Sleep and Breathing, vol. 12, no. 3, pp. 259–264, 2008.

B. Koo, S. Patel, K. Strohl, and V. Hoffstein, “Rapid eye movement-related sleep-disordered breathing,” Chest, vol. 134, no. 6, pp. 1156–1161, 2008.

O. Resta, G. E. Carpanano, D. Lacedonia et al., “Gender difference in sleep profile of severely obese patients with obstructive sleep apnea (OSA),” Respiratory Medicine, vol. 99, no. 1, pp. 91–96, 2005.

B. Mokhlesi and N. M. Punjabi, “REM-related” obstructive sleep apnea: an epiphenomenon or a clinically important entity?” Sleep, vol. 35, no. 1, pp. 5–7, 2012.

R. B. Berry, R. Brooks, C. Gamaldo et al., “AASM scoring manual updates for 2017 (version 2.4),” Journal of Clinical Sleep Medicine, vol. 13, no. 5, pp. 665-666, 2017.

M. W. Johns, “A new method for measuring daytime sleepiness: the Epworth sleepiness scale,” Sleep, vol. 14, no. 6, pp. 540–545, 1991.

H. A. Chami, C. M. Baldwin, A. Silverman et al., “Sleepiness, quality of life, and sleep maintenance in REM versus non-REM sleep-disordered breathing,” American Journal of Respiratory and Critical Care Medicine, vol. 181, no. 9, pp. 997–1002, 2010.

N. M. Punjabi, K. Bandeen-Roche, J. J. Marx, D. N. Neubauer, P. L. Smith, and A. R. Schwartz, “The association between daytime sleepiness and sleep-disordered breathing in NREM and REM sleep,” Sleep, vol. 25, no. 3, pp. 307–314, 2002.

S. Sakao, T. Sakurai, M. Yahaba et al., “Features of REM-related sleep disordered breathing in the Japanese population,” Internal Medicine, vol. 54, no. 12, pp. 1481–1487, 2015.

P. Lavie, P. Herer, and V. Hoffstein, “Obstructive sleep apnoea syndrome as a risk factor for hypertension: population study,” BMJ, vol. 320, no. 7233, pp. 479–482, 2000.

A. Bostanci, M. Turhan, and S. Bozkurt, “Factors influencing sleep time with oxygen saturation below 90% in sleep-disordered breathing,” The Laryngoscope, vol. 125, no. 4, pp. 1008–1012, 2015.

Health Quality Ontario, “Polysomnography in patients with obstructive sleep apnea: an evidence-based analysis,” Ontario Health Technology Assessment Series, vol. 6, no. 13, pp. 1–38, 2006.

B. Khassawneh, M. Ghazzawi, Y. Khader et al., “Symptoms and risk of obstructive sleep apnea in primary care patients in Jordan,” Sleep and Breathing, vol. 13, no. 3, pp. 227–232, 2009.