Cardiology Research and Practice
Volume 2017 (2017), Article ID 9849425, 10 pages
https://doi.org/10.1155/2017/9849425

Clinical Study

Recurrent Stroke after Transcatheter PFO Closure in Cryptogenic Stroke or Tia: Long-Term Follow-Up

Elisabetta Mariucci, Andrea Donti, Luisa Salomone, Marta Marcia, Marta Guidarini, Roberto Formigari, Daniela Prandstraller, Anna Balducci, Gabriele Bronzetti, and Marco Bonvicini

Pediatric Cardiology and GUCH Unit, S. Orsola-Malpighi Hospital, University of Bologna, 9 Massarenti Street, 40100 Bologna, Italy

Correspondence should be addressed to Elisabetta Mariucci; elisabettamariucci@gmail.com

Received 1 October 2017; Accepted 26 November 2017; Published 21 December 2017

Academic Editor: Antonis S. Manolis

Copyright © 2017 Elisabetta Mariucci et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Background. There are few data on the mechanism of recurrent neurological events after transcatheter closure of patent foramen ovale (PFO) in cryptogenic stroke or TIA. Methods. We retrospectively reviewed PFO closure procedures for the secondary prevention of cryptogenic stroke/TIA performed between 1999 and 2014 in Bologna, Italy. Results. Written questionnaires were completed by 402 patients. Mean follow-up was 7 ± 3 years. Stroke recurred in 3.2% (0.5/100 patients-year) and TIA in 2.7% (0.4/100 patients-year). Ninety-two percent of recurrent strokes were not cryptogenic. Recurrent stroke was noncardioembolic in 69% of patients, AF related in 15% of patients, device related in 1 patient, and cryptogenic in 1 patient. AF was diagnosed after the procedure in 21 patients (5.2%). Multivariate Cox’s proportion hazard model identified age ≥ 55 years at the time of closure (OR 3.16, ) and RoPE score < 7 (OR 3.21, ) as predictors of recurrent neurological events. Conclusion. Recurrent neurological events after PFO closure are rare, usually noncryptogenic and associated with conventional vascular risk factors or AF related. Patients older than 55 years of age and those with a RoPE score < 7 are likely to get less benefit from PFO closure. After transcatheter PFO closure, lifelong strict vascular risk factor control is warranted.

1. Introduction

Stroke is the second most common cause of death and the leading cause of disability worldwide. Approximately 87% of all strokes are ischemic [1]. According to the TOAST classification [2], about 30% of strokes are due to large artery atherosclerosis, 20% are cardioembolic, 15% are due to small artery occlusion (lacunar), 5% have other determined etiology (such as nonatherosclerotic vasculopathies, hypercoagulable states, or hematologic disorders), and about 30% of strokes have no identifiable cause even after extensive evaluation and are designated cryptogenic stroke (CS).

Establishing the etiology of a stroke has profound implications for subsequent treatment and the risk of recurrent events.

The reported rate of recurrent stroke in patients with CS varies widely, averaging 3–6% per year [3]. Young patients with CS associated to a patent foramen ovale (PFO) have stroke recurrence rates of 1–2% per year when given aspirin [4, 5]. The recurrence rate is substantially higher in older patients (14% per year in one report), suggesting the roles of other causes in addition to paradoxical embolism [6].

The rate of recurrent stroke after transcatheter closure of PFO in the RESPECT trial was 0.66% per year [7]. Stroke or TIA recurrence was 1.06% per year in the PC trial [8] and 2.6% per year in the CLOSURE I trial [9]. Recently, Taggart et al. [10] reported an annualized recurrence rate of stroke of 0.5% per year and an annualized recurrence rate of either stroke or TIA of 1.0% per year.

There are few data on the mechanism of recurrent neurological events after transcatheter closure of PFO in CS or TIA. RESPECT investigators in the extended follow-up analysis observed that nearly 1/3 of recurrent strokes in the Amplatzer PFO Occluder arm were not cryptogenic but of known origin.

The aim of our study was to establish the mechanism of recurrent neurological events during long-term follow-up after transcatheter closure of PFO in CS or TIA.

2. Methods

All PFO closure procedures performed between April 1999 and March 2014 for the secondary prevention of CS/TIA at the Pediatric Cardiology and GUCH Unit of S. Orsola-Malpighi Hospital in Bologna, Italy, were retrospectively reviewed. Demographic, clinical, procedural, and follow-up data were evaluated. Questionnaires and written consent forms were sent to all patients. All patients who gave written informed consent were subsequently contacted by telephone and included in the study. The study was approved by the S. Orsola-Malpighi Hospital Institutional Review Board. Patients who underwent PFO closure for reasons other than the secondary prevention of stroke/TIA and those who did not provide written informed consent were not included in this study.

All patients with recurrent stroke/TIA or a diagnosis of atrial fibrillation (AF) were invited to return to the clinic for an examination. Clinical history, hospitalization reports, neurological examination reports, and imaging studies were obtained. The etiology of recurrent neurological events was investigated, and data were analyzed to identify risk factors. We retrospectively applied the RoPE score [11] to our study population to evaluate the relationship of recurrent events to the likelihood that the index event was PFO related. We also retrospectively applied to our population other scores used for patients with AF (CHA2DS2-VASc score [12], HATCH score [13], and ATRIA score [14]) to evaluate any relationship with recurrent neurological events.

2.1. Patient Selection for Device Closure

Patients were eligible for device closure if they had a cryptogenic ischemic stroke or TIA and a PFO identified by transesophageal echocardiography (TEE). Ischemic stroke and TIA were defined according to the AHA/ACC guidelines [15].

Patent foramen ovale was defined on the basis of transesophageal echocardiographic evidence of a separation between the septum primum and septum secundum, with the demonstration of right-to-left shunt by contrast injection [16]. Detecting right-to-left shunt by contrast was defined as echocardiographic evidence of infused microbubbles in the left atrium within three cardiac cycles after their appearance in the right atrium, at rest or during Valsalva release. The shunt size was graded as conventionally accepted [16]. Atrial septal aneurysm (ASA) was defined as a protrusion of septal tissue of >10 mm from the plane of the atrial septum into either the right or the left atrium evaluated by means of TEE.

From 2003 onwards, all patients (307) underwent transcranial Doppler (TCD) ultrasonography to quantify right-to-left shunt before and after device closure. Shunt size was graded on a modified scale based on the “Venice Consensus Conference” and more recently available literature reports [17–20]: 0 to 10 microbubbles indicating no shunt, 10 to 25 microbubbles mild shunt, 26 to 50 microbubbles moderate shunt, and more than 50 microbubbles or a shower or curtain of microbubbles severe shunt. Before 2003, right-to-left shunt was evaluated by means of contrast TEE before device closure and contrast transthoracic echocardiography (TTE) after device closure and maximum shunt size was reported (95 patients).

All patients with ischemic stroke or TIA underwent an extensive neurologic and cardiological evaluation in order to diagnose CS or TIA. The examinations carried out were brain CT and MRI, ultrasonography of cervical arteries plus TCD ultrasonography of intracranial vessels or magnetic resonance angiography (MRA) or computerized tomographic angiography (CTA) of the head and neck, 24-hour Holter monitoring to exclude atrial fibrillation, TTE and TEE to exclude potential causes of cardioembolism, and screening for thrombophilic states. Patients complaining of palpitations underwent prolonged intermittent ECG monitoring with an external event recorder and were invited to record their ECG during symptoms. The decision to proceed with device closure was made by the cardiologist after consultation with the neurologist. Patients were excluded from the analysis if a mechanism of the index ischemic event other than paradoxical embolization could be identified.

2.2. Procedure

The implantation procedures were performed under general anesthesia and transesophageal guidance. All patients received oral aspirin (100 mg/day) plus clopidogrel (75 mg/day) or ticlopidine (250 mg twice a day), starting at least three days prior to the procedure. During the procedure, all patients underwent anticoagulation with intravenous heparin (100 U/kg) and received antibiotic prophylaxis with cefuroxime (1.5–2 g IV). Device type and size were selected according to PFO anatomy at the discretion of the cardiologist performing the procedure. Contrast TEE was performed at the end of the procedure to assess residual shunt.

The devices used were Amplatzer PFO occluder, Amplatzer septal occluder, and Amplatzer cribriform devices (St. Jude Medical), Gore HELEX septal occluder (W.L. Gore & Associates), Premere PFO occluder (St. Jude Medical), CardioSEAL septal occluder and BioSTAR septal occluder (NMT Medical), Cardia Star and Atriasept septal occluder (Cardia), Occlutech Figulla flex II (Occlutech), and Nit-Occlud PFO occluder (pfm medical). The CardioSEAL and BioSTAR device were no longer implanted after 2005.

Postprocedure TTE was performed prior to hospital discharge, usually the day after the procedure, to confirm device position and exclude pericardial effusion. All patients received oral aspirin (100 mg/day) plus clopidogrel (75 mg/day) or ticlopidine (250 mg twice a day) for the first 3 months, followed by aspirin alone for 9 months. Subsequently, antiplatelet therapy was administered to all patients with a residual shunt. Most of the patients with no residual shunt but with vascular risk factors continued aspirin. Patients who needed oral anticoagulation for other reasons continued this therapy. In accordance with ESC guidelines [21, 22], prophylaxis for bacterial endocarditis was recommended after defect closure.

2.3. Follow-Up

Cardiological follow-up examinations were performed 3 and 12 months after procedure and yearly thereafter. All patients underwent TCD ultrasonography or TTE with saline contrast injection 3 and 12 months after procedure to quantify residual right-to-left shunt. If a significant residual shunt was detected at 1 year, TEE was performed to check whether a second device was needed. Patients who experienced a recurrent neurological event underwent TEE to evaluate device position, residual shunt, and intracardiac thrombus. Two years after PFO closure, patients not residing in Bologna continued cardiology follow-up at home.

Follow-up events were recurrent neurological or peripheral thromboembolic events, the need for reintervention in the case of a significant residual shunt or device misalignment, device erosion or embolization, and the onset of tachyarrhythmias. Tachyarrhythmias after PFO closure were detected by 12-lead ECG (performed at each follow-up visit), 24-hour ECG Holter monitoring, and external intermittent event recorder in patients complaining of palpitations or with recurrent stroke/TIA.

2.4. Statistical Analysis

Continuous descriptors were expressed as mean and standard deviation (SD) and compared by using the two-sided unpaired Student’s t-test. The categorical descriptors were summarized as frequencies and percentages and compared by using the two-tailed chi-square test.

Recurrent stroke and TIA and rates of AF detection during follow-up were shown by means of Kaplan–Meier plots and were compared by means of a log-rank test.

The association of recurrent stroke and TIA or AF detection during follow-up with baseline characteristics was tested by computing their odds ratio (OR) and compared by two-tailed Fisher’s exact test. The multivariate Cox’s proportion hazard model (with forward stepwise option) was used to select independent predictors of events and to calculate their Hazard Ratio.

Statistical significance was based on a two-sided type I error rate of 0.05. All statistical tests were performed by means of IBM-SPSS, version 21.0 (IBM-SPSS, Chicago, Illinois, USA, 2012).

3. Results

3.1. Baseline Characteristics

Between April 1999 and March 2014, 525 patients underwent device PFO closure for the secondary prevention of CS/TIA at the Pediatric Cardiology and GUCH Unit of S. Orsola-Malpighi Hospital in Bologna, Italy. Long-term follow-up data were obtained by means of written questionnaires in 402 patients.

All but one patient with recurrent stroke/TIA or AF diagnosis returned to the clinic for examination.

The primary indication for PFO closure was stroke in 78%, TIA in 15%, systemic peripheral embolism in 1%, and silent brain infarction in 6%. Neuroimaging revealed multiple infarcts in 28% of patients and bilateral lesions in 25%. Mean age at the time of the index event was 47 ± 13 years. Sixty-one patients had had a previous stroke or TIA (15%) and 1 patient had a previous systemic peripheral embolism episode. Mean RoPE score at the baseline evaluation in the PFO clinic was 6 ± 2; 38% of patients presented a RoPE score ≥ 7. Baseline clinical characteristics of this cohort are shown in Table 1.

Table 1: Baseline clinical characteristics of patients before PFO closure (n = 402).

N
%

Male
209
52.0

Family history of ASCVD
91
22.6

Cigarette smoking
88
21.4

Former smoker
85
21.1

Dyslipidemia
141
35.1

Hypertension
117
29.1

Diabetes mellitus
8
2.0

Overweight or obesity
47
11.7

ASCVD
51
12.7

Oral contraceptives
36
9.0

Thrombophilia
114
28.6

Prior PE and/or DVT
19
4.7

Prior stroke/TIA (before index event)
61
15.0

Migraine headache
130
32.3

Migraine headache with aura
88
21.9

Palpitations
10
3.6

Index event of stroke
314
78

Cortical infarct on imaging
185
46

RoPE score ≥ 7
152
38

CHA2DS2-Vasc score ≥ 3
251
62

HATCH score ≥ 3
111
28

ATRIA score ≥ 9
244
61

AF, atrial fibrillation; ASCVD, atherosclerotic cardiovascular disease; ATRIA score, Anticoagulation and Risk Factors in AF score [14]; CHA2DS2-VASc score, Congestive heart failure, Hypertension, Age ≥75 years (doubled), Diabetes mellitus, Prior Stroke or TIA or thromboembolism (doubled), Vascular disease, Age 65–74 years, Sex category score [12]; DVT, deep vein thrombosis; HATCH score, Risk Factors for Progression to Persistent AF score [13]; n, number; PE, pulmonary embolism; PFO, patent foramen ovale; RoPE score, Risk of Paradoxical Embolism score [11].

Baseline TEE evaluation documented an ASA in 210 patients (52%). Preclosure right-to-left shunt was severe in 95% of patients, as summarized in Table 2.

Table 2: Preclosure and residual right-to-left shunt grade at 12-month follow-up (n = 402).

Baseline right-to-left shunt grade
Preclosure, N (%)
Residual, N (%)

Absent
114 (28)
360 (90)

Mild
99 (25)
33 (8)

Moderate
59 (15)
7 (1.6)

Severe
130 (32)
2 (0.4)

Valsalva right-to-left shunt grade
N (%)
N (%)

Absent
0
281 (70)

Mild
0
96 (24)

Moderate
20 (5)
11 (2.6)

Severe
382 (95)
14 (3.4)

Baseline evaluation revealed severe right-to-left shunt before device closure in 95% of patients. Significant (moderate or severe) residual right-to-left shunt was observed in 6% of patients. N, number; TCD, transcranial Doppler; TEE, transesophageal echocardiography; TTE, transthoracic echocardiography.

3.2. Procedure

Mean age at the time of the procedure was 48 ± 13 years. The most frequently used device was the Amplatzer PFO occluder (209 patients, 52%). The mean diameter of the device implanted was 25 ± 5 mm (range 10–35 mm). Contrast TEE performed at the end of the procedure revealed residual right-to-left shunt in 26% of patients: it was mild in 85% of cases and moderate in 15%.

Procedure- and device-related complications occurred in 31 patients (7.7%): major complications occurred in 0.2% of patients and minor complications in 7.5%.

There were no strokes or deaths associated with device placement. No device embolization was observed. Four patients had a device implanted and released which was then felt to be inadequately seated: in 3 cases the device was successfully removed and replaced with a larger device, whereas 1 patient needed surgical explantation of the device. Two patients (0.5%) developed AF or flutter during hospitalization.

On discharge, 78% of patients received dual antiplatelet therapy, 17% received oral anticoagulants, and 5% received a single antiplatelet agent. Single antiplatelet therapy was administered only to patients with aspirin allergy, groin hematoma, postprocedural epistaxis, or hemoptysis and the patient who was submitted to surgical operation.

3.3. Echocardiographic Follow-Up

The last clinical and echocardiographic follow-up examination in Bologna was performed 2 ± 0.5 years after procedure. No patient experienced device embolization or malpositioning or device-related valve dysfunction.

Significant (moderate or severe) residual right-to-left shunt was observed in 6% of patients. Residual right-to-left shunt grade at 12-month follow-up examination is summarized in Table 2.

All patients with evidence of a severe residual shunt at 12 months were scheduled for reintervention. Twelve patients underwent implantation of a second device, and 1 patient was diagnosed with an arteriovenous pulmonary fistula which was embolized.

Of the 12 patients who underwent second device implantation, 7 presented complete shunt closure, 3 mild residual shunt, and 2 moderate residual shunt on 12-month follow-up examination.

One patient presented a mild pericardial effusion which spontaneously resolved in few weeks.

3.4. Short-Term Follow-Up

One patient suffered a recurrent stroke 2 weeks after PFO closure: TCD ultrasonography showed no residual right-to-left shunt, TEE revealed no left atrium or left disk thrombosis, and no arrhythmias were documented by prolonged ECG monitoring. He had stopped dual antiplatelet therapy the day after PFO closure because of copious epistaxis related to nasogastric tube positioning during the procedure, and restarted aspirin only 2 days later. Device thrombosis was suspected, and the patient was treated with oral anticoagulation for 6 months; subsequently, on single antiplatelet therapy, he did not suffer further recurrent neurological events.

One patient who had undergone Cardio-SEAL device implantation was studied with a TEE 1 month after the procedure as part of an internal protocol and was found to have a thrombus on the left disk. He was treated with oral anticoagulation for 12 months and subsequently with single antiplatelet therapy for residual shunt. He did not present neurological events on follow-up.

One patient on oral anticoagulation developed subdural hematoma 4 months after the procedure.

3.5. Long-Term Clinical Follow-Up

Mean long-term follow-up was 7 ± 3 years (range 2–16). Figure 1 is a flowchart demonstrating events at follow-up.

Figure 1: Flowchart demonstrating events at follow-up.

There were 6 deaths, none due to a device-related complication. Four deaths were attributed to cancer, one to infection, and one to lacunar ischemic stroke. No device-related complications (embolization, erosion, and pericarditis) were recorded.

Recurrent neurological events occurred in 24 patients (6%): stroke in 13(3.2%) and TIA in 11 (2.7%). Recurrent stroke/TIA occurred 4 ± 3.7 years after PFO closure (range 2 weeks–13 years).

The recurrence rate of stroke was 0.5/100 patients-year, that of TIA was 0.4/100 patients-year, and that of either stroke or TIA was 0.86/100 patients-year. Freedom from recurrent stroke was 99.5% at 1 year, 97.9% at 5 years, and 96.1% at 10 years. Kaplan–Meier plot showing freedom from recurrent stroke or TIA is reported in Figure 2.

Figure 2: Kaplan–Meier plot showing freedom from stroke or TIA over a 10-year time frame.

Patients with recurrent neurological events were older at the time of PFO closure (54 ± 12 versus 48 ± 13 years old, ) and more frequently had hypertension (69% versus 39%; ). Sixty-nine percent of patients with recurrent stroke presented a basal RoPE score < 7 before PFO closure.

Recurrent neurological events were more frequent in subjects with RoPE score (risk of paradoxical embolism) < 7 than in those with ≥7 (8% versus 2.6%; OR 3.21, ) as summarized in Table 3.

Table 3: Subgroup analysis of incidence of recurrent ischemic neurological events.

Risk score category
Recurrent stroke/TIA (n)
Recurrent stroke/TIA (%)
HR (95% CI)
value

RoPE 7–10
4
2.6
3.21
0.03

RoPE 0–6
20
8

CHA2DS2-Vasc 0–2
6
4
1.87
0.27

CHA2DS2-Vasc 3–7
18
7.2

HATCH 0–2
11
4.5
2.35
0.06

HATCH 3–4
13
9.9

ATRIA 0–8
6
3.8
2.02
0.19

ATRIA 9–15
18
7.4

Recurrent neurological events were more frequent in subjects with RoPE (Risk of Paradoxical Embolism) score < 7 than those with ≥ 7 (OR 3.21, ).

Multivariate Cox’s proportion hazard model identified age ≥ 55 years at the time of closure (OR 3.16, ) and RoPE score < 7 (OR 3.21, ) as predictors of recurrent neurological events (Table 4). PFO closure performed with the Amplatzer device resulted a protective factor (OR 0.39, ). No association was observed between residual shunt and recurrent events.

Table 4: Predictors of recurrent ischemic neurological events.

No. ischemic recurrence n (%)
Ischemic recurrence n (%)
OR
value

Age at PFO closure ≥ 55 years
116 (30.7)
14 (58.3)
3.16
0.007

Male
197 (52.1)
12 (50.0)
0.91
1.00

Cigarette smoking
156 (41.3)
15 (62.5)
2.37
0.054

Dyslipidemia
130 (34.4)
11 (45.8)
1.60
0.27

Hypertension
106 (28.0)
11 (45.8)
2.17
0.10

Diabetes mellitus
8 (2.1)
0
—
1.00

BMI > 25 Kg/m²
43 (11.4)
4 (16.7)
1.56
0.51

ASCVD
46 (12.2)
5 (20.8)
1.53
0.21

Index stroke
348 (92.1)
24 (100)
—
1.0

AF diagnosis at follow-up
19 (5.0)
2 (8.3)
1.72
0.36

Atrial septal aneurysm
195 (51.6)
15 (62.5)
1.56
0.40

Severe R→L shunt before device closure
373 (98.7)
24 (100)
1.10
1.00

Residual significant R→L shunt
14 (3.7)
0
0.92
1.00

RoPE score < 7
230 (60.8)
20 (83.3)
3.21
0.03

CHA2DS2-Vasc score ≥ 3
233 (61.6)
18 (75.0)
1.87
0.28

HATCH score ≥ 3
100 (26.5)
11 (45.8)
2.35
0.06

ATRIA score ≥ 9
226 (59.8)
18 (75.0)
2.02
0.19

Amplatzer devices
228 (60.3)
9 (37.5)
0.39
0.03

Multivariate Cox’s proportion hazard model identified age ≥ 55 years at the time of closure and RoPE score < 7 as predictors of recurrent neurological events. PFO closure performed with Amplatzer device resulted a protective factor. No association was observed between residual shunt and recurrent events. Residual significant (moderate or severe) R→L shunt: the last TCD ultrasonography or TTE with saline contrast injection was used to investigate the association between residual shunt and recurrent events. AF, atrial fibrillation; ASCVD, atherosclerotic cardiovascular disease; BMI, body mass index; L, left; R, right; TIA, transient ischemic attack.

The Kaplan–Meier plot showing freedom from recurrent stroke and/or TIA over a 10-year time frame in patients aged ≥ 55 years versus <55 years at the time of the procedure is reported in Figure 3. The Kaplan–Meier plot showing freedom from recurrent stroke and/or TIA over a 10-year time frame in patients with RoPE score < 7 versus those with RoPE score ≥ 7 at the time of the procedure is reported in Figure 4.

Figure 3: Kaplan–Meier plot showing freedom from recurrent stroke and/or TIA over a 10-year time frame in patients aged ≥ 55 years versus < 55 years at the time of the procedure. by log-rank test.

Figure 4: Kaplan–Meier plot showing freedom from recurrent stroke and/or TIA over a 10-year time frame in patients with RoPE score < 7 versus those with RoPE score ≥ 7 at the time of the procedure. by log-rank test.

All patients with recurrent stroke or TIA returned to the clinic for examination, except one, for whom only the brain imaging report was available, and the etiology of recurrent stroke could not be investigated (patient number 3). Patient characteristics of recurrent stroke group are shown in Table 5. Recurrent stroke was noncardioembolic (lacunar or atheroembolic) in 69% of patients, AF related in 15%, device related in 1 patient, and possibly cryptogenic in 1 patient (patient number 3, who had no residual shunt, inadequate control of multiple vascular risk factors, and in whom AF was not investigated). Device-related stroke occurred in the patient who stopped dual antiplatelet therapy the day after the procedure because of copious epistaxis (patient number 9).

Table 5: Patient characteristics of recurrent stroke group (n = 13).

Age on recurrent event (years)
Timing of recurrent stroke (years)
Index event brain lesion topography
Recurrent brain lesion topography
Therapy on recurrent stroke
Basal RoPE score
RoPE score on recurrent stroke
No. of vascular risk factors
Residual shunt
Residual shunt grade
Stroke etiology

1
66
8.2
Single subcortical
Lacunar
Single antiplatelet
4
2
4
No
—
Not cardioembolic

2
47
13.3
None
Lacunar
None
7
6
0
No
—
Not cardioembolic

3
60
0.6
Multiple subcortical
Cortical
None
2
3
3
No
—
CS

4
49
2.2
Multiple cortico-subcortical
Lacunar
Single antiplatelet
7
5
3
Yes
Moderate
Not cardioembolic

5
46
5.1
Single cortico-subcortical
Multiple cortico-subcortical
Single antiplatelet
7
4
2
No
—
Atheroembolic (homolateral carotid stenosis)

6
54
3.0
Multiple subcortical
Lacunar
None
5
3
4
No
—
Not cardioembolic

7
72
6.2
Multiple cortico-subcortical
Lacunar
Single antiplatelet
5
3
2
Yes
Mild
Not cardioembolic

8
61
5.2
Single subcortical
Lacunar
Single antiplatelet
5
3
3
Yes
Mild
Not cardioembolic

9
22
0
Multiple cortico-subcortical
Multiple cortico-subcortical
Single antiplatelet
10
9
0
No
—
Cardioembolic (presumed LA thrombosis)

10
62
2.3
Multiple cortico-subcortical
Multiple cortico-subcortical
Single antiplatelet
4
4
3
No
—
Cardioembolic (AF)

11
75
1.5
Multiple cortico-subcortical
Lacunar
None
4
3
2
No
—
Not cardioembolic

12
60
1.6
Single cortico-subcortical
Multiple cortico-subcortical
Single antiplatelet
6
4
2
No
—
Atheroembolic (homolateral carotid stenosis)

13
71
2.0
Multiple cortico-subcortical
Multiple cortico-subcortical
Single antiplatelet
3
3
3
Yes
Mild
Cardioembolic (AF)

All patients with recurrent stroke returned to the clinic for examination, except one patient, for whom only brain imaging was available, and the etiology of recurrent stroke could not be investigated (patient number 3). Recurrent stroke was noncardioembolic (lacunar or atheroembolic) in 69% of patients, AF related in 15% of patients, device related in 1 patient, and possibly cryptogenic in 1 patient (patient number 3, who had no residual shunt, inadequate control of multiple vascular risk factors, and in whom AF was not investigated). Device-related stroke occurred in patient number 9 who stopped dual antiplatelet therapy the day after the procedure because of copious epistaxis. AF, atrial fibrillation; CS, cryptogenic stroke, LA, left atrium, N, number.

3.6. AF after PFO Closure

During the follow-up period, 21 patients (5.2%) developed AF. AF was persistent in 2 patients and paroxysmal in the others and was discovered after a median time of 3 months (range 0 days–8 years). The mean age on arrhythmia diagnosis was 61 ± 10 years (range 44–73 years). Patients who developed AF were older at the time of PFO closure (60 ± 10 versus 47 ± 13 years, ) and more frequently had hypertension (69% versus 39%; ). Multivariate Cox’s proportional hazards analysis showed age ≥ 55 years at the time of closure (OR 7.49, ) as the main risk factor for AF diagnosis on follow-up, as summarized in Table 6. Also, atherosclerotic cardiovascular disease (OR 2.99, ) and HATCH score ≥ 3 at the time of closure (OR 3.09, ) resulted risk factors for AF diagnosis on follow-up.

Table 6: Predictors of AF or atrial flutter diagnosis on follow-up.

No AF/Fla, n (%)
AF/Fla, n (%)
OR
value

Age at PFO closure ≥ 55 years
114 (29.9)
16 (76.2)
7.49
0.001

Male
199 (52.2)
10 (47.6)
0.83
0.82

Cigarette smoking
163 (42.8)
8 (38.1)
0.83
0.83

Dyslipidemia
131 (34.4)
10 (47.6)
1.73
0.27

Hypertension
107 (28.1)
10 (47.6)
2.33
0.08

Diabetes mellitus
7 (1.8)
1 (4.8)
2.67
0.35

BMI > 25 Kg/m²
45 (11.8)
2 (9.5)
0.79
1.0

ASCVD
45 (11.8)
6 (28.6)
2.99
0.04

Index stroke
351 (92.1)
21 (100)
—
1.0

Atrial septal aneurysm
196 (51.4)
14 (66.7)
1.89
0.19

Severe R→L shunt before device closure
376 (98.7)
21 (100)
1.06
1.00

Residual significant R→L shunt
14 (3.7)
0
0.95
1.00

RoPE score < 7
233 (61.2)
17 (81.0)
2.70
0.10

CHA2DS2-Vasc score ≥ 3
234 (61.4)
17 (81.0)
2.67
0.10

HATCH score ≥ 3
100 (26.2)
11 (52.4)
3.09
0.02

ATRIA score ≥ 9
227 (59.6)
17 (81.0)
2.88
0.06

Amplatzer devices
226 (59.3)
11 (52.4)
0.75
0.65

Multivariate Cox’s proportional hazards analysis showed age ≥ 55 years at the time of closure (OR 7.49, ) as the main risk factor for AF diagnosis on follow-up. Also, atherosclerotic cardiovascular disease (OR 2.99, ) and HATCH score ≥ 3 at the time of closure (OR 3.09, ) resulted risk factors for AF diagnosis on follow-up. AF, atrial fibrillation; ASCVD, atherosclerotic cardiovascular disease; BMI, body mass index; Fla, atrial flutter; L, left; R, right; TIA, transient ischemic attack.

Eleven patients (2.7%) developed AF within 12 months after PFO closure: 6 received antiarrhythmic therapy for 12 months and suffered no further recurrence, 4 were treated with chronic antiarrhythmic therapy, and 1 patient with permanent AF underwent chronic pharmacological rate control.

The remaining 10 patients (2.5%) developed AF more than 12 months after PFO closure (range 18 months–8 years).

The Kaplan–Meier plot showing freedom from AF is reported in Figure 5. Freedom from AF was 97.3% at 1 year, 95.3% at 5 years, and 94.7% at 10 years. The Kaplan–Meier plot showing freedom from AF over a 10-year time frame in patients aged ≥ 55 years versus < 55 years at the time of the procedure is shown in Figure 6.

Figure 5: Kaplan–Meier plot showing freedom from AF over a 10-year time frame.

Figure 6: Kaplan–Meier plot showing freedom from AF over a 10-year time frame in patients aged ≥ 55 years versus < 55 years at the time of the procedure. by log-rank test.

4. Discussion

We investigated the etiology of recurrent neurological events in our single-center cohort of patients who had undergone transcatheter PFO closure for the secondary prevention of CS/TIA. The recurrence rate of stroke or TIA that we observed is relatively low being less than 1% per year. Moreover, as recently shown in other reports and in the extended follow-up analysis of the Respect trial, recurrent neurological ischemic events were usually noncryptogenic, mainly lacunar, and were associated with conventional vascular risk factors or AF related.

A good rate of functional PFO closure was observed, with an incidence of significant (moderate or severe) residual right-to-left shunt of 6%.

Our analysis shows a higher risk of recurrent neurological events after PFO closure in patients aged 55 years or older at the time of the procedure and those with a basal RoPE score < 7. This finding strongly suggests that in older patients with risk factors for cerebrovascular disease the probability that neurological events could be due to paradoxical embolism across a PFO is low. Therefore, these patients should not undergo PFO closure as they are very likely to get less benefit from the procedure.

Like other investigators [11, 23], we observed that the individuals most likely to benefit from PFO closure were younger (<55 years old), with a RoPE score ≥ 7, meaning they have no other identifiable stroke risk factor, and with a neurological imaging strongly in favour of a cardioembolic event. As 95% of all our patients had a severe right-to-left shunt prior to PFO closure, we cannot demonstrate any possible impact of shunt size on recurrent neurological events.

Of note, AF was rather common in the follow-up of our patients after PFO closure (5.2%). Only a minority of the cases are probably directly due to the device as many patients developed AF more than 12 months after the procedure or needed prolonged antiarrhythmic therapy to avoid recurrences. Moreover, AF was more common in older and hypertensive patients, suggesting that patient’s features are more relevant than device implantation in AF occurrence. As we did not routinely screen for AF with prolonged ECG monitoring before PFO closure, we cannot rule out AF as the possible cause of the index event too. Nevertheless, we recognize the crucial potential role of prolonged ECG monitoring before PFO closure, and we are currently screening all patients in such a way.

5. Limitations

Our study was retrospective, and our long-term clinical follow-up data after PFO closure were obtained by means of written questionnaires. Although we used telephone interviews to verify the accuracy of the data obtained, this approach introduces the potential for a recall bias.

Moreover, the patients’ baseline RoPE scores were calculated retrospectively, which may have caused an underestimation of the true scores.

Patient selection was carried out before the publication of the RoPE score, and we realize that some patients who underwent PFO closure may have had an incidental PFO and not a PFO-mediated stroke.

In addition, as patient selection for PFO closure was undertaken before the publication of strong evidence of the utility of prolonged ECG monitoring to detect silent AF after CS [15, 24–27], a thorough search for atrial arrhythmias was not performed. Some patients may therefore have been misclassified as having had a CS, while a more complete evaluation may have revealed the underlying silent AF.

We identified PFO closure performed with Amplatzer device as a protective factor against recurrent neurological events. We could not demonstrate any possible impact of other devices on recurrent neurological events because of the low number of devices implanted.

Finally, the main limitation of our study, as in the case of many similar studies, is the small number of recurrent neurological events, in which yielded a low statistical power to identify potential risk factors for recurrences.

6. Conclusion

Recurrent neurological events after PFO closure are rare, usually noncryptogenic and associated to conventional vascular risk factors or AF related. Patients older than 55 years of age and those with a RoPE score < 7 are likely to get less benefit from PFO closure. After transcatheter PFO closure, lifelong strict vascular risk factor control is warranted.

Conflicts of Interest

The authors report no financial relationships or conflicts of interest regarding the content herein.

References

Writing Group Members, D. Mozaffarian, E. J. Benjamin et al., “Heart disease and stroke statistics—2016 update: a report from the American Heart Association,” Circulation, vol. 133, no. 4, pp. e38–e360, 2016.

H. P. Adams, B. H. Bendixen, L. J. Kappelle et al., “Classification of subtype of acute ischemic stroke. Definitions for use in a multicenter clinical trial. TOAST. Trial of Org 10172 in Acute Stroke Treatment,” Stroke, vol. 24, no. 1, pp. 35–41, 1993.

R. G. Hart, H. C. Diener, S. B. Coutts et al., “Embolic strokes of undetermined source: the case for a new clinical construct,” The Lancet Neurology, vol. 13, no. 4, pp. 429–438, 2014.

J.-L. Mas, C. Arquizan, C. Lamy et al., “Recurrent cerebrovascular events associated with patent foramen ovale, atrial septal aneurysm, or both,” New England Journal of Medicine, vol. 345, no. 24, pp. 1740–1746, 2001.

M. A. Almekhlafi, S. B. Wilton, D. M. Rabi, W. A. Ghali, D. L. Lorenzetti, and M. D. Hill, “Recurrent cerebral ischemia in medically treated patent foramen vale: a meta-analysis,” Neurology, vol. 73, no. 2, pp. 89–97, 2009.

S. Homma, M. R. DiTullio, R. L. Sacco, R. R. Sciacca, J. P. Mohr, and The PICSS Investigators, “Age as a determinant of adverse events in medically treated cryptogenic stroke patients with patent foramen ovale,” Stroke, vol. 35, no. 9, pp. 2145–2149, 2004.

J. D. Carroll, J. L. Saver, D. E. Thaler et al., “Closure of patent foramen ovale versus medical therapy after cryptogenic stroke,” New England Journal of Medicine, vol. 368, no. 12, pp. 1092–1100, 2013.

B. Meier, B. Kalesan, H. P. Mattle et al., “Percutaneous closure of patent foramen ovale in cryptogenic embolism,” New England Journal of Medicine, vol. 368, no. 12, pp. 1083–1091, 2013.

A. J. Furlan, M. Reisman, J. Massaro et al., “Closure or medical therapy for cryptogenic stroke with patent foramen ovale,” New England Journal of Medicine, vol. 366, no. 11, pp. 991–999, 2012.

N. W. Taggart, G. S. Reeder, R. J. Lennon et al., “Long-term follow-up after PFO device closure: outcomes and complications in a single-center experience,” Catheterization and Cardiovascular Interventions, vol. 89, no. 1, pp. 124–133, 2017.

D. E. Thaler, R. Ruthazer, C. Weimar et al., “Recurrent stroke predictors differ in medically treated patients with pathogenic vs other PFOs,” Neurology, vol. 83, no. 3, pp. 221–226, 2014.

G. Y. Lip, R. Nieuwlaat, R. Pisters, D. A. Lane, and H. J. Crijns, “Refining clinical risk stratification for predicting stroke and thromboembolism in atrial fibrillation using a novel risk factor-based approach: the euro heart survey on atrial fibrillation,” Chest, vol. 137, no. 2, pp. 263–272, 2010.

C. B. de Vos, R. Pisters, R. Nieuwlaat et al., “Progression from paroxysmal to persistent atrial fibrillation clinical correlates and prognosis,” Journal of the American College of Cardiology, vol. 55, no. 8, pp. 725–731, 2010.

M. H. Eckman, D. E. Singer, J. Rosand, and S. M. Greenberg, “Moving the tipping point: the decision to anticoagulate patients with atrial fibrillation,” Circulation: Cardiovascular Quality and Outcomes, vol. 4, no. 1, pp. 14–21, 2011.

W. N. Kernan, B. Ovbiagele, H. R. Black et al., “Guidelines for the prevention of stroke in patients with stroke and transient ischemic attack: a guideline for healthcare professionals from the American Heart Association/American Stroke Association,” Stroke, vol. 45, no. 7, pp. 2160–2236, 2014.

F. E. Silvestry, M. S. Cohen, L. B. Armsby et al., “Guidelines for the echocardiographic assessment of atrial septal defect and patent foramen ovale: from the American Society of Echocardiography and Society for Cardiac Angiography and Interventions,” Journal of the American Society of Echocardiography, vol. 28, no. 8, pp. 910–958, 2015.

M. Jauss and E. Zanette, “Detection of right-to-left shunt with ultrasound contrast agent and transcranial Doppler sonography,” Cerebrovascular Diseases, vol. 10, no. 6, pp. 490–496, 2000.

E. K. Kerut, W. T. Norfleet, G. D. Plotnick, and T. D. Giles, “Patent foramen ovale: a review of associated conditions and the impact of physiological size,” Journal of the American College of Cardiology, vol. 38, no. 3, pp. 613–623, 2001.

M. P. Spencer, M. A. Moehring, J. Jesurum, W. A. Gray, J. V. Olsen, and M. Reisman, “Power m-mode transcranial Doppler for diagnosis of patent foramen ovale and assessing transcatheter closure,” Journal of Neuroimaging, vol. 14, no. 4, pp. 342–349, 2004.

S. Sastry, G. Riding, J. Morris et al., “Young adult myocardial infarction and ischemic stroke: the role of paradoxical embolism and thrombophilia (The YAMIS Study),” Journal of the American College of Cardiology, vol. 48, no. 4, pp. 686–691, 2006.

G. Habib, P. Lancellotti, M. J. Antunes et al., “2015 ESC guidelines for the management of infective endocarditis: the task force for the management of infective endocarditis of the European Society of Cardiology (ESC). Endorsed by: European Association for Cardio-Thoracic Surgery (EACTS), the European Association of Nuclear Medicine (EANM),” European Heart Journal, vol. 36, no. 44, pp. 3075–3128, 2015.

H. Baumgartner, P. Bonhoeffer, N. M. De Groot et al., “ESC guidelines for the management of grown-up congenital heart disease (new version 2010),” European Heart Journal, vol. 31, no. 23, pp. 2915–2957, 2010.

S. Elmariah, A. J. Furlan, M. Reisman et al., “Predictors of recurrent events in patients with cryptogenic stroke and patent foramen ovale within the CLOSURE I (evaluation of the STARFlex septal closure system in patients with a stroke and/or transient ischemic attack due to presumed paradoxical embolism through a patent foramen ovale) trial,” JACC: Cardiovascular Interventions, vol. 7, no. 8, pp. 913–920, 2014.

T. Sanna, H. C. Diener, R. S. Passman et al., “Cryptogenic stroke and underlying atrial fibrillation,” New England Journal of Medicine, vol. 370, no. 26, pp. 2478–2486, 2014.

D. J. Gladstone, M. Spring, P. Dorian et al., “Atrial fibrillation in patients with cryptogenic stroke,” New England Journal of Medicine, vol. 370, no. 26, pp. 2467–2477, 2014.

C. Dussault, H. Toeg, M. Nathan, Z. J. Wang, J. F. Roux, and E. Secemsky, “Electrocardiographic monitoring for detecting atrial fibrillation after ischemic stroke or transient ischemic attack: systematic review and meta-analysis,” Circulation: Arrhythmia and Electrophysiology, vol. 8, no. 2, pp. 263–269, 2015.

P. Kirchhof, S. Benussi, D. Kotecha et al., “2016 ESC guidelines for the management of atrial fibrillation developed in collaboration with EACTS: the task force for the management of atrial fibrillation of the European Society of Cardiology (ESC) developed with the special contribution of the European Heart Rhythm Association (EHRA) of the ESC endorsed by the European Stroke Organisation (ESO),” European Heart Journal, vol. 37, no. 38, pp. 2893–2962, 2016.