Disease Markers

Volume 2014 (2014), Article ID 180132, 1 page

http://dx.doi.org/10.1155/2014/180132

Erratum

Erratum to “Evaluation of the Expression of C-Kit (CD117) in Ependymomas and Oligodendrogliomas”

Lisiane Silveira Zavalhia,¹ Mirian Romitti,² Gabriel Corteze Netto,¹ Giovana Tavares dos Santos,¹ Rosalva Thereza Meurer,³ Arlete Hilbig,⁴ Mariana Bohns Michalowski,⁵ Ligia Maria Barbosa Coutinho,¹ and Marlise de Castro Ribeiro⁴

¹Programa de Pós Graduação em Patologia da Universidade Federal de Ciências da Saúde de Porto Alegre (UFCSPA), 90050-170 Porto Alegre, Brazil

²Programa de Pós Graduação em Ciências Médicas da Universidade Federal do Rio Grande do Sul (UFRGS), 90040-060 Porto Alegre, Brazil

³Laboratório de Pesquisa em Patologia da Universidade Federal de Ciências da Saúde de Porto Alegre (UFCSPA), 90050-170 Porto Alegre, Brazil

⁴Departamento de Clínica Médica da Irmandade Santa Casa de Misericórdia de Porto Alegre, Porto Alegre, 90020-090 Porto Alegre, Brazil

⁵Departamento de Pediatria da Irmandade Santa Casa de Misericórdia de Porto Alegre, Porto Alegre, 90020-090 Porto Alegre, Brazil

Received 25 November 2013; Accepted 26 November 2013; Published 30 January 2014

Copyright © 2014 Lisiane Silveira Zavalhia et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

We came through this erratum and declare that we are aware that the author Ligia Maria Barbosa Coutinho, Professor at the Graduate Program in Pathology of Universidade Federal de Ciências da Saúde de Porto Alegre (UFCSPA), Brazil, was a part of the implementation of this paper, and, by our mistake, was absent from the list of authors. We would like to add Ligia Maria Barbosa Coutinho as a coauthor.