Disease Markers

Volume 2014 (2014), Article ID 246751, 1 page

http://dx.doi.org/10.1155/2014/246751

Erratum

Erratum to “Molecular Targeted Approaches for Advanced BRAF V600, N-RAS, c-KIT, and GNAQ Melanoma”

Giovanni Ponti,¹ Giovanni Pellacani,² Aldo Tomasi,¹ Pietro Loschi,³ Gabriele Luppi,⁴ Fabio Gelsomino,⁴ and Caterina Longo⁵

¹Department of Clinical and Diagnostic Medicine and Public Health, University of Modena and Reggio Emilia, Via del Pozzo 71, 41100 Modena, Italy

²Department of Dermatology, University of Modena and Reggio Emilia, Via del Pozzo 71, 41100 Modena, Italy

³Department of Plastic and Reconstructive Surgery, University of Modena and Reggio Emilia, Via del Pozzo 71, 41100 Modena, Italy

⁴Department of Medical Oncology, University of Modena and Reggio Emilia, Via del Pozzo 71, 41100 Modena, Italy

⁵Dermatology & Skin Cancer Unit, Arcispedale Santa Maria Nuova, IRCCS, 42123 Reggio Emilia, Italy

Received 26 April 2014; Accepted 11 May 2014; Published 2 June 2014

Copyright © 2014 Giovanni Ponti et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

The authors’ names were incorrectly listed. This error is corrected here.