Disease Markers
Volume 2016 (2016), Article ID 4093870, 9 pages
http://dx.doi.org/10.1155/2016/4093870

Research Article

Plasma Cathepsin S and Cathepsin S/Cystatin C Ratios Are Potential Biomarkers for COPD

Takahiro Nakajima,¹ Hidetoshi Nakamura,1,2 Caroline A. Owen,³ Shuichi Yoshida,¹ Keishi Tsuduki,¹ Shotaro Chubachi,¹ Toru Shirahata,¹ Shuko Mashimo,¹ Miho Nakamura,¹ Saeko Takahashi,¹ Naoto Minematsu,¹ Hiroki Tateno,¹ Seitaro Fujishima,⁴ Koichiro Asano,⁵ Bartolome R. Celli,³ and Tomoko Betsuyaku¹

¹Division of Pulmonary Medicine, Department of Medicine, Keio University School of Medicine, 35 Shinanomachi, Shinjuku-ku, Tokyo 160-8582, Japan
²Department of Respiratory Medicine, Saitama Medical University, 38 Morohongo, Moroyama-machi, Iruma-gun, Saitama 350-0495, Japan
³Division of Pulmonary and Critical Care Medicine, Brigham and Women’s Hospital and Harvard Medical School, 75 Francis Street, Boston, MA 02115, USA
⁴Center for General Internal Medicine and Education, Keio University School of Medicine, 35 Shinanomachi, Shinjuku-ku, Tokyo 160-8582, Japan
⁵Division of Pulmonary Medicine, Department of Medicine, Tokai University School of Medicine, 143 Shimokasuya, Isehara-shi, Kanagawa 259-1193, Japan

Received 12 August 2016; Accepted 17 October 2016

Academic Editor: Massimiliano M. Corsi Romanelli

Copyright © 2016 Takahiro Nakajima et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Purpose. This study aimed to examine whether plasma levels of cathepsin S or its inhibitor, cystatin C, may serve as biomarkers for COPD. Patients and Methods. We measured anthropometrics and performed pulmonary function tests and chest CT scans on 94 patients with COPD and 31 subjects with productive cough but no airflow obstruction (“at risk”; AR). In these subjects and in 52 healthy nonsmokers (NS) and 66 healthy smokers (HS) we measured plasma concentrations of cathepsin S and cystatin C using an ELISA. Data were analyzed using simple and logistic regression and receiver operating characteristic analyses. Results. Cathepsin S and cystatin C plasma levels were significantly higher in the COPD and AR groups than in the NS and HS groups (). Among the COPD patients and AR subjects, plasma cathepsin S levels and cathepsin S/cystatin C ratios, but not cystatin C levels, were negatively related to severe airflow limitation (% FEV₁ predicted < 50%; ) and severe emphysema as assessed by low attenuation area (LAA) score on chest CT scans (LAA 8.0; ). Conclusion. Plasma cathepsin S and cathepsin S/cystatin C ratios may serve as potential biomarkers for COPD.

1. Introduction

COPD is characterized by narrowing of small airways and lung parenchymal destruction, partly caused by chronic lung inflammation including increased numbers of neutrophils, macrophages, and CD8-positive T lymphocytes, oxidative stress, and alveolar septal cell apoptosis [1–3]. Changes in the % FEV₁ predicted and clinical parameters such as exacerbation rates are currently the most commonly used endpoints for monitoring responses to therapies in COPD patients, but these measures have limitations including a relatively long duration of treatment and large number of subjects needed for study in order to detect the changes in response to therapy. Consequently, there is an urgent need to identify and validate sensitive and reliable biomarkers for COPD in compartments that are easy to sample, such as blood, to more quickly assess the efficacy of novel therapies for COPD in clinical trials. In particular, it will be crucially important to identify reliable biomarkers for early stage COPD, the stage at which novel therapies might have the most impact on successfully modifying the course of the disease and preserving lung function.

Recent research has identified a number of potential molecules and pathways that could serve as potential biomarkers and be targeted to develop novel therapies [4]. One such group of molecules is proteinases. There is compelling evidence that an imbalance between the levels of proteinases and their inhibitors in the lung contributes to emphysema development. Proteinases such as neutrophil elastase, matrix metalloproteases, and cysteine proteases contribute to emphysema development and/or small airway remodeling in COPD [5]. Another proteinase that has been implicated in COPD pathogenesis is cathepsin S, a lysosomal acidic proteinase which is highly expressed by cells implicated in COPD pathogenesis including macrophages and dendritic cells [6]. Cathepsin S level and activity in bronchoalveolar lavage fluid from COPD patients are higher than those from healthy volunteers [7]. Additionally, cathepsin S is a potent elastin-degrading proteinase and participates in the adaptive immune response [8]. Studies of murine models of emphysema have implicated cathepsin S in promoting lung inflammation and destruction [9]. The major inhibitor of cathepsin S in extracellular fluids including plasma is cystatin C which is expressed by alveolar macrophages, bronchioepithelial cells, and endothelial cells [10–12]. However, this inhibitor has not been well studied in the context of COPD and neither cathepsin S nor cystatin C levels have been measured in plasma samples from human COPD patients.

We hypothesized that plasma concentrations of cathepsin S and cystatin C would differ between COPD patients, subjects with cough and sputum, and healthy smokers and nonsmokers. To test this hypothesis, we measured the plasma concentrations of cathepsin S and cystatin C and explored the association between levels of these biomarkers with degree of airflow obstruction and emphysema severity as assessed by low attenuation areas on chest CT scans and diffusing capacity of the lung for carbon monoxide measurements.

2. Materials and Methods

2.1. Study Populations

This study subjects included 125 patients suggestive of COPD consecutively visiting the outpatient clinic of Keio University Hospital from 2000 through 2003 and also included 118 healthy volunteers (age 50 years). All patients underwent pulmonary function tests (PFT) and chest CT. The patients suspected of having clinically stable COPD fulfilled the following criteria: (1) smoking history of 10 pack-years or more; (2) age 40 years old; and (3) having chronic respiratory symptoms including cough, sputum, and dyspnea on exertion. The patients were excluded if they were (1) having any pulmonary disease other than COPD; (2) having serum creatinine level > 1.5 mg/dL with renal dysfunction; (3) having serious comorbidities including unstable cardiovascular or cerebral diseases and treated malignant tumors; (4) having self-reported asthma; and (5) having an exacerbation for at least one month prior to recruitment or being treated with oral corticosteroids. The COPD patients () were diagnosed based on airflow obstruction as defined by a ratio of forced expiratory volume in 1 second to forced vital capacity (FEV₁/FVC) lower than 0.7 and an % FEV₁ predicted value lower than the 95% confidence interval for this population by PFT. One group of 31 subjects (at risk of developing COPD; AR) was defined as having chronic respiratory symptoms (cough, sputum, and dyspnea on exertion) but no airflow limitation as assessed by PFT. Enrolled healthy volunteers were classified into two groups by smoking history: 52 healthy nonsmokers (NS) and 66 healthy smokers (HS). This study was approved by the Ethics Committee of Keio University Hospital and informed consent was obtained from each subject.

2.2. Measurement of Concentrations of Cathepsin S and Cystatin C

Plasma concentrations of total cathepsin S were measured in duplicate using the enzyme-linked immunosorbent assay (ELISA) kit (R&D systems, Inc. Minneapolis, MN, USA) after diluting the samples 1 : 100 using the diluent supplied by the kit manufacturer. The lower detectable limit of cathepsin S using these kits was 15.6 pg/mL. Plasma concentrations of cystatin C were determined in duplicate using a sandwich ELISA as previously described [13]. GT 13 was used as a mouse anti-cystatin C monoclonal antibody. Plasma was also 100 times diluted with phosphate buffered saline before the assay. The lower detectable limit of cystatin C using this assay was 1.9 ng/mL.

2.3. Assessment of Clinical Parameters

Spirometry was performed in all patients of the COPD and AR groups using an electronic spirometer (MFR-8200; Nihon Kohden, Tokyo, Japan). Regular treatment was not changed prior to spirometric testing. was estimated by 10 s breath holding in most patients of the COPD () and AR () groups () (Chestac-55V; Chest, Tokyo, Japan). Chest CT was also performed in all patients of the COPD and AR groups (Proseed, GE; Yokogawa Medical Systems, Tokyo, Japan).

To calculate emphysema severity, the entire lung was divided into six zones (i.e., left and right zones in the upper, middle, and lower lung fields). Low attenuation areas (LAA) were visually scored in each zone on a scale from 0 to 4: 0, no LAA; 1, 1–25%; 2, 26–50%; 3, 51–75%; 4, 76–100%. The total (0–24) was assessed by three pulmonologists in a blinded manner and the mean score was defined as the LAA score, a quantitative indicator of emphysematous change [14, 15]. Diameters of main pulmonary artery and abdominal aorta at the celiac artery were also measured on the chest CT images [16].

2.4. Statistical Analysis

Data were expressed as the mean ± SD. Plasma cathepsin S and cystatin C levels were compared among the groups by analysis of variance and the Scheffé test. Correlations between the plasma concentrations of cathepsin S and cystatin C and clinical parameters were examined using simple linear regression analysis. Independent associations between the plasma concentrations of cathepsin S and cystatin C and severe airflow limitation (% FEV₁ predicted < 50%) or emphysematous change (LAA 8.0) were determined using logistic regression analysis. Logistic regression analysis models were prepared to avoid the influence of potential confounders, including age, sex, body mass index (BMI), smoking status, serum creatinine levels, the presence of hypertension, and treatment with inhaled corticosteroid (ICS). Inclusion of variables was based on existing knowledge of risk factors for COPD and on the factors related to plasma cystatin C levels according to previous reports [17, 18]. We followed standard method to estimate sample size for logistic regression analysis, with at least ten outcomes needed for each included independent variable. Receiver operating characteristic (ROC) analyses of plasma cathepsin S and cystatin C levels and the cathepsin S/cystatin C ratio were performed to examine the sensitivity and specificity of plasma cathepsin S and cystatin C levels as biomarkers for COPD in all participants. values < 0.05 were considered statistically significant.

3. Results

3.1. Characteristics of Study Populations

As shown in Table 1, the mean age in the COPD group was older than the other three groups. The COPD group consisted of 14 Stage I, 40 Stage II, 29 Stage III, and 11 Stage IV patients defined by the Global Initiative for Chronic Obstructive Lung Disease (GOLD) 2014. The mean pack-year cigarette consumption in the COPD group (mean ± SD ) was greater than that in both the HS (   versus COPD) and AR groups (   versus COPD). As expected, both airflow obstruction and emphysema severity were more severe in the COPD group than in the AR group but there were no significant differences in BMI, serum creatinine levels, frequencies of hypertension, or the use of ICS.

Table 1: Study populations.

Healthy nonsmoker (NS)
Healthy smoker (HS)
COPD at risk (AR)
COPD

52
66
31
94

Male/female
50/2
65/1
27/4
89/5

Age

Current/Ex
0/0
40/26
14/17

Pack-Years
0

BMI
NA
NA

Serum Cr
NA
NA

FEV₁/FVC (%)
NA
NA

% FEV₁ predicted
NA
NA

LAA
NA
NA

HT ()
0/52
0/66
5/26
17/77

ICS ()
0/52
0/66
1/30
16/78

versus NS, HS, AR; versus HS; versus HS, < 0.05 versus AR; versus AR. COPD: chronic obstructive pulmonary disease; BMI: body mass index; Cr: creatinine; FEV₁/FVC (%): ratio of forced expiratory volume in 1 second to forced vital capacity; LAA: low attenuation area; HT: hypertension; ICS: inhaled corticosteroid.

3.2. Plasma Concentrations of Cathepsin S and Cystatin C

The mean value and the distribution of plasma concentrations of cathepsin S, cystatin C, and cathepsin S/cystatin C ratios among the four groups are shown in Figure 1. Plasma cathepsin S and cystatin C levels were significantly higher in the AR and COPD groups than those in the NS and HS groups. The cathepsin S/cystatin C ratio was also significantly higher in the AR and COPD groups than in the NS and HS groups. Cathepsin S levels in the HS group were higher than those in the NS group. When we compared plasma cathepsin S and cystatin C levels in GOLD stages I to IV COPD patients, we found no significant differences in the levels of these proteins.

(a)

(b)

(c)

Figure 1: Comparison of plasma levels of cathepsin S (a), cystatin C (b), and cathepsin S/cystatin C (c) between healthy nonsmokers (NS), healthy smokers (HS), subjects at risk (AR), and COPD patients. Distribution of cathepsin S, cystatin C, and cathepsin S/cystatin C among the groups is displayed along with mean ± SD values. Cut points were set at 16.2 ng/mL, 2.1 μg/mL, and , respectively, and displayed as dotted lines, based on the ROC analyses in Figure 2. Mean ± SD is presented. indicates ; versus NS, , , and versus HS.

(a)

(b)

(c)

Figure 2: ROC curves for cathepsin S (a), cystatin C (b), and cathepsin S/cystatin C (c). AUC was 0.831, 0.806, and 0.710, respectively. Dotted arrows indicate the best cutpoints for both sensitivity and specificity. Better sensitivities (98% and 97%, resp.) were obtained when the cut points were set at cathepsin S 12.1 ng/mL and cathepsin S/cystatin , indicated by the solid arrows in (a) and (c), and the specificities were 62% and 55%, respectively.

3.3. ROC Curves

The ROC curves are shown in Figure 2. For plasma cathepsin S, the best threshold for discriminating between patients with versus without COPD was 16.2 ng/mL (80% sensitivity and 74% specificity). For plasma cystatin C, a threshold of 2.1 μg/mL had a 77% sensitivity and 71% specificity, whereas for the plasma cathepsin S/cystatin C ratio a value of 6.4 × 10⁻³ had 78% sensitivity and 64% specificity. Because the ROC curves for plasma cathepsin S and cathepsin S/cystatin C ratios were not symmetrical for sensitivity and specificity (Figure 2), another threshold was determined to improve the sensitivity. A cathepsin S level of 12.1 ng/mL offered a sensitivity of 98% with 62% specificity. When the plasma cathepsin S/cystatin C ratio was 4.2 × 10⁻³, the sensitivity was 97% with 55% specificity.

3.4. Regression Analyses

We then examined the associations between plasma concentrations of cathepsin S or cystatin C and FEV₁/FVC or the LAA score in the COPD and AR groups. Unexpectedly, both cathepsin S levels and cathepsin S/cystatin C ratios correlated modestly but significantly with FEV₁/FVC and inversely with the LAA score, while cystatin C levels did not correlate significantly with either of these parameters (Figure 3).

(a)

(b)

(c)

(d)

(e)

(f)

Figure 3: The correlation of cathepsin S, cystatin C, or cathepsin S/cystatin C with either FEV₁% or LAA score in the AR and COPD groups (). Cathepsin S levels correlated modestly but significantly with FEV₁/FVC (a) and inversely with the LAA score (d) (, ; , , resp.); also cathepsin S/cystatin C ratios correlated modestly but significantly with FEV₁/FVC (c) and inversely with the LAA score (f) (, ; , , resp.). In contrast, cystatin C levels did not correlate with either FEV₁/FVC (b) or LAA (e).

Table 2 shows that cathepsin S correlated with % FEV₁ predicted () and %   predicted (). Cystatin C levels correlated positively with age (), creatinine levels (), %   predicted (), diameter of the abdominal aorta (), and male gender (). The cathepsin S/cystatin C ratios correlated positively with % FEV₁ predicted (), peak expiratory flow rate (PEF) (), (), %   predicted (), and %   predicted ().

Table 2: Simple regression analysis.

Cathepsin S
Cystatin C
Cat S/Cys C (/10³)

Age
0.033
0.72
0.226

0.16

Pack-Year
0.099
0.27
0.096
0.29

0.99

BMI
0.175
0.052

0.65
0.132
0.14

Serum Cr
0.164
0.07
0.266

0.30

% VC

0.997

0.55
0.076
0.40

FEV₁/FVC
0.261

0.88
0.242

% FEV₁ predicted
0.179

0.83
0.188

PEF
0.083
0.36

0.07
0.199

0.131
0.15

0.23
0.187

%   predicted
0.089
0.37

0.277

%  
0.197

0.23
0.244

LAA

0.033
0.71

mPA
0.112
0.24
0.139
0.14

0.58

abAo
0.181
0.06
0.267

0.045
0.64

Current/Ex (51/74)
24.8/22.8
0.17
2.78/2.65
0.44
9.77/9.42
0.65

HT () (22/103)
24.5/23.4
0.57
2.74/2.70
0.57
9.68/9.54
0.85

ICS () (17/108)
20.1/24.2
0.06
2.59/2.72
0.59
8.36/9.75
0.21

(116/9)
23.7/23.4
0.93
2.66/3.32

9.69/7.90
0.22

; . Cat: cathepsin; Cys: cystatin; BMI: body mass index; Cr: creatinine; VC: vital capacity; FEV₁/FVC: ratio of forced expiratory volume in 1 second to forced vital capacity; FEV₁: forced expiratory volume in 1 second; PEF: peak expiratory flow rate; : the air flow rate at 50% vital capacity; : diffusing capacity of the lung for carbon monoxide; : diffusing capacity of the lung for carbon monoxide divided by the alveolar volume; LAA: low attenuation area; mPA: main pulmonary artery; abAo: abdominal aorta; Ex: ex-smoker; HT: hypertension; ICS: inhaled corticosteroid; : male; : female.

Tables 3 and 4 show that after normalizing for the effects of age, BMI, pack-year, creatinine, gender, smoking status, hypertension, and ICS, cathepsin S levels and age were significantly correlated with the development of severe airflow obstruction [, odds ratio (OR) = 0.32, and , OR = 3.82, resp.]. Also, the cathepsin S/cystatin C ratio (, OR = 0.87) and age (, OR = 3.02) correlated to severe airway obstruction (Table 3). Serum creatinine levels were also associated with severity of airflow obstruction (Table 3). On the other hand, cathepsin S (. OR = 0.28) and the cathepsin S/cystatin C ratio (, OR = 0.82) were the strongest factors associated inversely with the presence of severe emphysema (Table 4).

Table 3: Logistic regression analysis for severe airflow limitation (% FEV₁ predicted < 50).

⁢Cathepsin S and % FEV₁predicted < 50
Cat S/Cys C (/10³) and % FEV₁ predicted < 50

OR
95% CI

OR
95% CI

Cat S (10 increments)
7.82

0.32
0.14–0.71
—
—
—
—

Cat S/Cys C (/10³)
—
—
—
—
5.19

0.87
0.77–0.98

Age (10 increments)
12.14

3.82
1.80–8.12
10.76

3.02
1.56–5.84

BMI
2.28
0.13
0.90
0.79–1.03
2.77
0.10
0.89
0.77–1.02

PY (10 increments)
2.46
0.12
1.11
0.97–1.27
1.21
0.27
1.07
0.95–1.22

Serum Cr
5.05

0.02
0.001–0.60
6.35

0.014
0.0005–0.39

Male
3.35
0.07
11.93
0.84–169.5
4.10

15.13
1.09–209.5

Ex-smoker
1.44
0.23
1.88
0.67–5.28
2.97
0.09
2.45
0.88–6.79

HT (−)
2.18
0.14
0.40
0.12–1.35
2.09
0.15
0.42
0.13–1.36

ICS (−)
0.001
0.97
1.03
0.26–4.07
0.044
0.83
0.87
0.23–3.23

; . FEV₁: forced expiratory volume in 1 second; Cat: cathepsin; Cys: cystatin; OR: odds ratio; CI: confidence interval; BMI: body mass index; PY: pack-years; Cr: creatinine; HT: hypertension; ICS: inhaled corticosteroid.

Table 4: Logistic regression analysis for significant emphysematous change (LAA 8.0).

Cathepsin S and LAA 8.0
Cat S/Cys C (/10³) and LAA 8.0

OR
95% CI

OR
95% CI

Cat S (10 increments)
12.21

0.28
0.14–0.57
—
—
—
—

Cat S/Cys C (/10³)
—
—
—
—
9.83

0.82
0.72–0.93

Age (10 increments)
5.72

2.08
1.14–3.78
3.76
0.052
1.72
0.99–2.98

BMI
3.45
0.06
0.87
0.75–1.01
4.36

0.85
0.73–0.99

PY (10 increments)
1.92
0.17
1.09
0.96–1.24
0.74
0.39
1.05
0.94–1.19

Serum Cr
0.37
0.54
0.40
0.02–7.71
1.55
0.21
0.16
0.009–2.88

Male
1.28
0.26
3.17
0.43–23.4
2.51
0.11
4.71
0.69–32.1

Ex-smoker
0.31
0.58
1.30
0.51–3.29
1.46
0.23
1.76
0.70–4.42

HT (−)
0.84
0.36
0.58
0.18–1.86
0.77
0.38
0.60
0.20–1.87

ICS (−)
0.07
0.79
0.85
0.25–2.89
0.21
0.65
0.76
0.23–2.51

; . LAA: low attenuation area; Cat: cathepsin; Cys: cystatin; OR: odds ratio; CI: confidence interval; BMI: body mass index; PY: pack-years; Cr: creatinine; HT: hypertension; ICS: inhaled corticosteroid.

4. Discussion

This study shows for the first time that plasma cathepsin S level and cathepsin S/cystatin C ratios are significantly higher in COPD patients compared with healthy smokers and healthy nonsmokers. This suggests that cathepsin S participates in COPD pathogenesis in humans and that plasma cathepsin S and cathepsin S/cystatin C ratios might be potential biomarkers for COPD. It is also intriguing that plasma cathepsin S and cathepsin S/cystatin C ratios tend to be higher in patients with mild airflow limitation and emphysema than those in patients with severe impairment.

Previous studies of animal models of emphysema have implicated cathepsin S in promoting airspace enlargement in mice [9, 19]. Cathepsin S is produced by activated macrophages and dendritic cells. Cathepsin S is also produced by smooth muscle cells and endothelial cells in human atherosclerotic lesions [20] and by adipose tissue [21]. Cathepsin S is a potent elastin-degrading proteinase which retains substantial activity at neutral pH. Thus, cathepsin S could promote airspace enlargement by degrading lung elastin fibers. Cathepsin S is also expressed by antigen-presenting cells such as macrophages and dendritic cells and has crucial activities in processing antigens during MHC class II-mediated immune processes [8, 22]. In this respect, it is noteworthy that a recent hypothesis has suggested that COPD is an autoimmune disease in which anti-elastin, epithelial, and endothelial cell antibodies promote disease progression especially in patients with severe disease [23]. Studies of transgenic mice that overexpress IL-13 and IFN-γ in an inducible- and lung-specific manner develop lung inflammation and emphysema due, in part, to increased lung levels of cysteine proteinases including cathepsin S [9, 24]. Cathepsin S contributes to emphysema development in IFN-γ overexpressing transgenic mice by promoting epithelial cell apoptosis [19]. Geraghty et al. have suggested a potential contribution of IFN-γ-induced cathepsin S expression in macrophages to the development of COPD [7]. However, cathepsin S has not been well studied in humans. Plasma cystatin C levels are increased by renal dysfunction [17] and decreased in patients with aortic aneurysm [18] and COPD patients often have comorbidities including cardiovascular and renal disease, hypertension, and cachexia. Consistent with the protease-antiprotease imbalance hypothesis for COPD, we anticipated that COPD patients would have increased plasma levels of cathepsin S along with reduced plasma levels of its cognate inhibitor, cystatin C [5].

Surprisingly, our data showed that, in addition to plasma cathepsin S levels, plasma levels of cystatin C were also higher in COPD patients compared with the control groups. We show that the differences in plasma levels of cathepsin S and cathepsin S/cystatin C ratios between the COPD patients and the control groups were not due to differences in BMI, and prevalence of cardiovascular disease, as assessed by measuring the diameters of the abdominal aorta and main pulmonary artery, systemic hypertension, or renal dysfunction, as assessed by serum creatinine levels. We also show that age and treatment with ICS, which can influence inflammatory cell activation, were not responsible for the observed differences. The ROC analyses showed that the sensitivity of plasma cathepsin S levels for the diagnosis of COPD was very high (98%) when the threshold was set at 12.1 ng/mL. The specificity improved from 62% to 80% if the threshold was set at 16.2 ng/mL but the sensitivity decreased to 74%. These additional analyses suggest that plasma cathepsin S levels may serve as a useful biomarker for COPD. Rokadia et al. also reported that active smokers with COPD had significantly higher plasma levels of cystatin C than healthy controls in accordance with our results [25]. These observations might imply that elevated plasma levels of cystatin C partly reflect the defensive reaction against the effect of increased cathepsin S induced by smoking, still representing an imbalance between the enhanced protease activity and inhibitory effects of cystatin C in patients with COPD.

An unexpected result from our study was that, among the COPD patients and AR subjects, plasma cathepsin S and cathepsin S/cystatin C ratios were inversely correlated with the extent of airflow obstruction and emphysema severity, as assessed by LAA on CT scans, even after normalizing for various confounding factors including age, gender, BMI, renal function, smoking history, the presence of hypertension, and treatment with ICS. Thus, plasma cathepsin S levels, but not cystatin C levels, were significantly increased in patients with AR and with mild COPD when compared with patients with severe airflow limitation and emphysema. One possible explanation for the inverse correlation between plasma cathepsin S and severity of disease among the COPD patients is that cathepsin S is produced in lung tissue including activated macrophages [6], and as COPD severity increases there is progressive destruction of the alveolar walls with loss of source of cathepsin S. Other cellular sources of cathepsin S such as adipose tissue [21] could also be altered quantitatively and qualitatively between the early and late stages of COPD. Chronic airflow limitation assessed by FEV₁/FVC and % FEV₁ predicted is positively associated with BMI and malnutrition in a large number of COPD patients [26], and plasma cathepsin S levels are reduced on surgery-related weight loss, linking to reduction of cathepsin S expression in subcutaneous adipose tissue mass [21]. Also, proinflammatory stimuli that differ in expression levels in the lung during the course of COPD differentially regulate cathepsin S mRNA levels and protein secretion by cells [27]. Additionally, the main inhibitor of cathepsin S, cystatin C, inhibits various cysteine proteinases including cathepsins L and K, and lung production of these other cysteine proteinases is also increased in COPD patients [10]. A prior study reported that, unlike COPD patients, patients with asthma have significantly reduced plasma cathepsin S levels when compared to healthy control subjects [28].

Taken together, we speculate that the inverse correlation between plasma cathepsin S and cathepsin S/cystatin C ratios and severity of airflow limitation and emphysema in patients suggestive of COPD that we observed in this study might reflect these complex processes in the pathophysiology of this disease. However, additional cohorts of COPD and asthma will be needed to confirm these findings. Symptomatic smokers without pulmonary function decline are classified as Stage 0 disease and reported to have an increased susceptibility to COPD in GOLD 2001. AR, that is Stage 0 disease, develops COPD in 50% [29]. In addition, productive cough is associated with hastening lung function decline for 5-year follow-up when compared with COPD patients without productive cough [30]. However, there is still little evidence that cough is an important predictor of future progression in Stage 0 patients. Plasma cathepsin S and cathepsin S/cystatin C ratios may be clinically useful biomarkers to discriminate susceptible individuals from nonsusceptible ones and asthmatics prior to development of airflow limitation in COPD. The mechanisms by which cathepsin S may contribute to COPD pathogenesis are beyond the scope of the current study. Although our study did not address any of these potential mechanisms, the observation that these biomarkers are elevated in patients with COPD, especially in early stages, compared with healthy smokers and nonsmokers should help us direct more efforts in this area.

There are several limitations in our study. First, it was impossible to obtain pulmonary function data from subjects in the NS and HS groups. The healthy volunteers (NS and HS) were differentiated from the patients (COPD and AR) since they had no chronic respiratory symptoms leading to visiting hospitals. Second, the mean age of the COPD group was significantly higher than AR and the healthy subjects. However, our results indicate that cathepsin S levels are not affected by age (Table 2). Third, it is not clear which subjects within the AR group will subsequently develop COPD and whether plasma cathepsin S levels and cathepsin S/cystatin C ratios will predict this progression. Longitudinal studies of the AR group would be required to answer these questions. It is also uncertain to what extent the plasma levels of cathepsin S and cystatin C reflect the expression of these proteins in the lung versus other origins such as adipose tissue.

5. Conclusion

We have demonstrated significantly elevated plasma levels of cathepsin S and cystatin C, and plasma cathepsin S/cystatin C ratios, in COPD patients versus healthy subjects. Our results suggest that plasma cathepsin S concentrations and cathepsin S/cystatin C ratios may serve as potential biomarkers for COPD.

Abbreviations

abAo: | Abdominal aorta
AR: | At risk
BMI: | Body mass index
Cat: | Cathepsin
CI: | Confidence interval
COPD: | Chronic obstructive pulmonary disease
Cr: | Creatinine
Cys: | Cystatin
| Diffusing capacity of the lung for carbon monoxide
| Diffusing capacity of the lung for carbon monoxide divided by the alveolar volume
ELISA: | Enzyme-linked immunosorbent assay
Ex: | Ex-smoker
| Female
| Forced expiratory volume in 1 second
| Ratio of forced expiratory volume in 1 second to forced vital capacity
FVC: | Forced vital capacity
GOLD: | Global initiative for chronic obstructive lung disease
HS: | Healthy smoker
HT: | Hypertension
ICS: | Inhaled corticosteroid
LAA: | Low attenuation area
| Male
mPA: | Main pulmonary artery
NS: | Nonsmoker
OR: | Odds ratio
PEF: | Peak expiratory flow rate
PFT: | Pulmonary function tests
PY: | Pack-years
ROC: | Receiver operating characteristic
VC: | Vital capacity
| The air flow at the 50% vital capacity.

Competing Interests

Tomoko Betsuyaku has participated in advisory board for GlaxoSmithKline. The other authors declare that there are no competing interests regarding the publication of this paper. This study was supported in part by a grant to the Respiratory Failure Research Group from the Ministry of Health, Labour and Welfare of Japan and KAKENHI (14770277).

Authors’ Contributions

All authors contributed toward data analysis and drafting and revising the paper and agree to be accountable for all aspects of the work.

Acknowledgments

The authors thank Professor Kazuhiro Yamaguchi (Tokyo Women’s Medical University) and the late Professor Akitoshi Ishizaka (Keio University) for their insightful comments about this study.

References

J. C. Hogg, F. Chu, S. Utokaparch et al., “The nature of small-airway obstruction in chronic obstructive pulmonary disease,” The New England Journal of Medicine, vol. 350, no. 26, pp. 2645–2653, 2004.

W. MacNee and I. Rahman, “Oxidants and antioxidants as therapeutic targets in chronic obstructive pulmonary disease,” American Journal of Respiratory and Critical Care Medicine, vol. 160, no. 5, part 2, pp. S58–S65, 1999.

Y. Kasahara, R. M. Tuder, L. Taraseviciene-Stewart et al., “Inhibition of VEGF receptors causes lung cell apoptosis and emphysema,” Journal of Clinical Investigation, vol. 106, no. 11, pp. 1311–1319, 2000.

P. J. Barnes, “New therapies for chronic obstructive pulmonary disease,” Medical Principles and Practice, vol. 19, no. 5, pp. 330–338, 2010.

C. A. Owen, “Roles for proteinases in the pathogenesis of chronic obstructive pulmonary disease,” International Journal of Chronic Obstructive Pulmonary Disease, vol. 3, no. 2, pp. 253–268, 2008.

G.-P. Shi, J. S. Munger, J. P. Meara, D. H. Rich, and H. A. Chapman, “Molecular cloning and expression of human alveolar macrophage cathepsin S, an elastinolytic cysteine protease,” Journal of Biological Chemistry, vol. 267, no. 11, pp. 7258–7262, 1992.

P. Geraghty, C. M. Greene, M. O'Mahony, S. J. O'Neill, C. C. Taggart, and N. G. McElvaney, “Secretory leucocyte protease inhibitor inhibits interferon-γ-induced cathepsin S expression,” Journal of Biological Chemistry, vol. 282, no. 46, pp. 33389–33395, 2007.

R. J. Riese, P. R. Wolf, D. Brömme et al., “Essential role for cathepsin S in MHC class II-associated invariant chain processing and peptide loading,” Immunity, vol. 4, no. 4, pp. 357–366, 1996.

Z. Wang, T. Zheng, Z. Zhu et al., “Interferon γ induction of pulmonary emphysema in the adult murine lung,” Journal of Experimental Medicine, vol. 192, no. 11, pp. 1587–1599, 2000.

K. Takeyabu, T. Betsuyaku, M. Nishimura et al., “Cysteine proteinases and cystatin C in bronchoalveolar lavage fluid from subjects with subclinical emphysema,” European Respiratory Journal, vol. 12, no. 5, pp. 1033–1039, 1998.

G. K. Sukhova, G.-P. Shi, D. I. Simon, H. A. Chapman, and P. Libby, “Expression of the elastolytic cathepsins S and K in human atheroma and regulation of their production in smooth muscle cells,” The Journal of Clinical Investigation, vol. 102, no. 3, pp. 576–583, 1998.

A. H. Warfel, D. Zucker-Franklin, B. Frangione, and J. Ghiso, “Constitutive secretion of cystatin C (gamma-trace) by monocytes and macrophages and its downregulation after stimulation,” Journal of Experimental Medicine, vol. 166, no. 6, pp. 1912–1917, 1987.

H. Ishiguro, I. Ohkubo, M. Mizokami, K. Titani, and M. Sasaki, “The use of monoclonal antibodies to define levels of cystatin C in normal human serum,” Hybridoma, vol. 8, no. 3, pp. 303–313, 1989.

P. R. Goddard, E. M. Nicholson, G. Laszlo, and I. Watt, “Computed tomography in pulmonary emphysema,” Clinical Radiology, vol. 33, no. 4, pp. 379–387, 1982.

N. Minematsu, H. Nakamura, M. Iwata et al., “Association of CYP2A6 deletion polymorphism with smoking habit and development of pulmonary emphysema,” Thorax, vol. 58, no. 7, pp. 623–628, 2003.

E. S. Crawford and E. S. Cohen, “Aortic aneurysm: a multifocal disease,” Archives of Surgery, vol. 117, no. 11, pp. 1393–1400, 1982.

M. Mussap, M. D. Vestra, P. Fioretto et al., “Cystatin C is a more sensitive marker than creatinine for the estimation of GFR in type 2 diabetic patients,” Kidney International, vol. 61, no. 4, pp. 1453–1461, 2002.

G.-P. Shi, G. K. Sukhova, A. Grubb et al., “Cystatin C deficiency in human atherosclerosis and aortic aneurysms,” The Journal of Clinical Investigation, vol. 104, no. 9, pp. 1191–1197, 1999.

T. Zheng, M. J. Kang, K. Crothers et al., “Role of cathepsin S-dependent epithelial cell apoptosis in IFN-γ-induced alveolar remodeling and pulmonary emphysem,” Journal of Immunology, vol. 174, no. 12, pp. 8106–8115, 2005.

G. K. Sukhova, B. Wang, P. Libby et al., “Cystatin C deficiency increases elastic lamina degradation and aortic dilatation in apolipoprotein E-null mice,” Circulation Research, vol. 96, no. 3, pp. 368–375, 2005.

S. Taleb, R. Cancello, C. Poitou et al., “Weight loss reduces adipose tissue cathepsin S and its circulating levels in morbidly obese women,” The Journal of Clinical Endocrinology & Metabolism, vol. 91, no. 3, pp. 1042–1047, 2006.

D. Maurer, E. Fiebiger, B. Reininger et al., “Fcε receptor I on dendritic cells delivers IgE-bound multivalent antigens into a cathepsin S-dependent pathway of MHC class II presentation,” Journal of Immunology, vol. 161, no. 6, pp. 2731–2739, 1998.

M. G. Cosio, M. Saetta, and A. Agusti, “Immunologic aspects of chronic obstructive pulmonary disease,” The New England Journal of Medicine, vol. 360, no. 23, pp. 2396–2454, 2009.

T. Zheng, Z. Zhu, Z. Wang et al., “Inducible targeting of IL-13 to the adult lung causes matrix metalloproteinase- and cathepsin-dependent emphysema,” Journal of Clinical Investigation, vol. 106, no. 9, pp. 1081–1093, 2000.

H. K. Rokadia and S. Agarwal, “Serum cystatin C and emphysema: results from the National Health and Nutrition Examination Survey,” Lung, vol. 190, no. 3, pp. 283–290, 2012.

E. Ischaki, G. Papatheodorou, E. Gaki, I. Papa, N. Koulouris, and S. Loukides, “Body mass and fat-free mass indices in COPD: relation with variables expressing disease severity,” Chest, vol. 132, no. 1, pp. 164–169, 2007.

J. P. Liuzzo, S. S. Petanceska, D. Moscatelli, and L. A. Devi, “Inflammatory mediators regulate cathepsin S in macrophages and microglia: a role in attenuating heparan sulfate interactions,” Molecular Medicine, vol. 5, no. 5, pp. 320–333, 1999.

N. Cimerman, P. M. Brguljan, M. Krašovec, S. Šuškovič, and J. Kos, “Circadian and concentration profile of cathepsin S in sera from healthy subjects and asthmatic patients,” Pflugers Archiv, vol. 442, no. 6, supplement 1, pp. R204–R206, 2001.

N. M. Siafakas, P. Vermeire, N. B. Pride et al., “Optimal assessment and management of chronic obstructive pulmonary disease (COPD),” The European Respiratory Journal, vol. 8, no. 8, pp. 1398–1420, 1995.

V. Kim, H. Zhao, A. M. Boriek et al., “Persistent and newly developed chronic bronchitis are associated with worse outcomes in chronic obstructive pulmonary disease,” Annals of the American Thoracic Society, vol. 13, no. 7, pp. 1016–1025, 2016.