Disease Markers
Volume 2016 (2016), Article ID 8246839, 7 pages
http://dx.doi.org/10.1155/2016/8246839

Research Article

Redox Status of β ₂GPI in Different Stages of Diabetic Angiopathy

Jun Ma,¹ Jing-Yun Zhang,¹ Yan Liu,² De-Min Yu,¹ and Pei Yu¹

¹Key Laboratory of Hormones and Development (Ministry of Health), Tianjin Key Laboratory of Metabolic Diseases, Tianjin Metabolic Diseases Hospital & Tianjin Institute of Endocrinology, Tianjin Medical University, Tianjin 300070, China
²Tianjin Haibin People’s Hospital, Tianjin, China

Received 16 June 2016; Accepted 9 August 2016

Academic Editor: Giuseppe Murdaca

Copyright © 2016 Jun Ma et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

We explored the redox status of beta 2 glycoprotein I (β ₂GPI) in different stages of diabetic angiopathy. Type 2 diabetes mellitus (T2DM) had a significantly lower proportion of reduced β ₂GPI as compared to healthy controls (). There was a trend that the mild coronal atherosclerosis heart disease (CAD) had higher proportion of reduced β ₂GPI than non-CAD and severe-CAD groups, however without significances (). The mild-A-stenosis group and mild-diabetic retinopathy (DR) groups had higher proportion of reduced β ₂GPI than their severely affected counterparts. The mild-slow nerve conduction velocity (NCVS) group had higher proportion of reduced β ₂GPI than normal nerve conduction velocity (NCVN group) and severe-NCVS groups. The proportion of reduced β ₂GPI was in positive correlation with 24 h urine microalbumin and total urine protein, and the proportion of reduced β ₂GPI was in negative correlation with serum and skin advanced glycation end products (AGEs). Taken together, our data implicate that the proportion of reduced β ₂GPI increased in the early stage of angiopathy and decreased with the aggravation of angiopathy.

1. Introduction

Cardiovascular disease (CVD), blindness, renal failure, and amputation caused by diabetic angiopathy contribute to healthy burden in modern society. The pathological mechanism of diabetic angiopathy is still unclear, although oxidative stress (ROS) is one of the critical initiating factors in diabetic complications [1].

Beta 2 glycoprotein I (β ₂GPI) is a type of single-strand protein that contains five structural domains (DI-DV). As the major autoantigen of antiphospholipid syndrome (APS), β ₂GPI is closely associated with thrombotic events in patients with APS [2]. The Cys288 to Cys326 disulfide bond in domain V can be reduced by oxidoreductase enzymes thioredoxin (TRX-1) and protein disulfide isomerase (PDI). Free thiol-containing β ₂GPI was discovered in 2010 [3] and this reduced β ₂GPI, in contrast to oxidized β ₂GPI, can protect endothelial cells from oxidative stress [4]. Research shows that the APS patients have significantly higher serum oxidized β ₂GPI level than that in healthy controls, and reduced β ₂GPI level is significantly reduced in APS patients. Our previous work has shown that reduced β ₂GPI could inhibit the formation of foam cells and macrophage apoptosis [5], protect endothelial cells from oxidative stress-induced cell injury [4], inhibit retinal angiogenesis in diabetic rats, and reduce expression of collagen type IV in diabetic kidney. Conversely, an imbalanced redox state of β ₂GPI may be important to increase thrombotic events in APS, and β ₂GPI levels could form the basis of thrombosis risk [2].

Diabetics tend to be exposed to high oxidative stress state due to elevated radical ROS production caused by increased advanced glycation end products (AGEs), polyol pathway, and other factors. However, there is no report regarding the redox balance of β ₂GPI in diabetic patients. Therefore, this study aimed to explore the relationship between the redox states of β ₂GPI in diabetics and at different stages of angiopathy.

2. Materials and Methods

2.1. Ethics Statement

This study was approved by the ethics committee of Metabolic Disease Hospital, Tianjin Medical University, and written informed consents were obtained from all subjects before their enrollment into the study. Assays were performed under blind condition.

2.2. Materials and Reagents

N-(3-maleimidylpropionyl) biocytin (MPB) was purchased from Invitrogen (USA). Alkaline phosphatase- (AP-) conjugated anti-mouse IgG was purchased from Boster (China). TRX-1 was purchased from R&D (USA). TRXR (Thioredoxin Reductase) was from Sigma (USA). NADPH was from Calbiochem Merck (USA). Affinity purified murine IgG2 anti-β ₂GPI monoclonal antibody (mAb) 4B2E7 and affinity purified rabbit anti-β ₂GPI polyclonal antibody were from Department of Immunology, Allergy, and Infectious Diseases and Department of Medicine, University of New South Wales, Sydney, Australia [6, 7]. High-binding 96-well plates were from JETBIOFIL, Guangzhou (China). The human AGEs ELISA Kit was from Cusabio Biotech, Wilmington, DE (USA).

2.3. Patients and Their Clinical Information

230 T2DM patients and 80 healthy controls were enrolled from July 2013 to December 2013. Subjects were excluded if they had autoimmune disease [2, 8], acute inflammation, pregnancy or had surgery recently [9–11]. Diabetic ketoacidosis, hyperosmolar hyperglycemia, acute lactic acidosis, and the use of drugs that could change redox state of the body were also excluded from the study [12].

Age, sex, Body Mass Index (BMI), Waist-Hip Ratio (WHR), systolic blood pressure (SBP), diastolic blood pressure (DBP), history of cardiovascular disease and hypertension, diabetic history, and diabetic duration were obtained from the patients’ medical records. Fasting blood glucose (FBG), P2BG, HbA1c, platelet (PLT), red blood cell (RBC), hemoglobin, FIB, D-Dimer, blood urea nitrogen (BUN), creatinine (SCR), hepatic function, total cholesterol (CHO), triglyceride (TG), high-density lipoprotein cholesterol (HDL-c), low-density lipoprotein cholesterol (LDL-c), 24 h urine microalbumin (UMA), and 24 h urine total protein (UTP) were all determined by standard clinical biochemical assays. Nerve Conduction Velocity Test (NCVT) was done using Electromyography/Evoked Potentials Equipment (NDI-200P+, Shanghai). Lower limb arteries were tested by Color Doppler Ultrasound (JYQ TCD-2000). The Ocular Fundus Test was performed using an ophthalmoscope (TOP-CON TRC-NW7SF), and skin AGEs were measured by AGEs Reader (The Netherlands). The relations between complications of CAD, artery stenosis, abnormal nerve conduction velocity, diabetic retinopathy, and abnormal urinary albumin excretory rate and β ₂GPI were analyzed. CAD was diagnosed based on one or more of the following criteria: electrocardiogram, echocardiogram, and myocardial perfusion imaging showing myocardial ischemia or infarction. Coronary angiogram or CTA revealed one or more main brunches of coronary artery with more than 50% stenosis.

2.4. Determination of Reduced β ₂GPI and Total β ₂GPI in Serum

We adopted double-antibody sandwich ELISA to quantify total β ₂GPI in serum samples [2]. Briefly, high-binding 96-well plates were coated overnight at 4°C with rabbit polyclonal anti-human β ₂GPI (10 nM). Plates were washed 4 times with PBS-0.1% Tween and then blocked with 2% BSA/PBS-0.1% Tween for 1 hour at room temperature (RT). Following washing, 100 μL of anti-human β ₂GPI mouse mAb was added (10 nM) and then 100 μL of the patient sample (diluted 4,000-fold in PBS-0.05% Tween) was coincubated for 1 hour at RT. After washing 4 times, AP-conjugated goat anti-mouse IgG was added (1 : 1,500) and incubated for 1 hour at RT. Five serum samples were randomly mixed to create a standard serum (internal control), which was used to construct an in-house standard curve for every ELISA. The mixture was aliquoted into Eppendorf tubes, snap frozen, and stored at −80°C. The level of total β ₂GPI in standard serum was defined as 100%. Samples were read at 450 nm after addition of chromogenic substrate. Samples were assayed in duplicate.

The relative amount of reduced β ₂GPI in patient samples was assayed as previously described [2]. MPB (4 mM) was added to 50 μL of patient plasma or serum and incubated for 30 minutes at RT in dark and then the mixture was diluted 50-fold in 20 mM HEPES buffer (pH 7.4) and incubated for another 10 min at RT in dark. Proteins were then acetone precipitated. Protein pellets were resuspended in PBS-0.05% Tween. The samples were diluted 4000-fold and then added, in duplicate, to a streptavidin-coated 96-well plate (100 μL/well), followed by incubation for 90 minutes at RT. Before adding MPB-labeled serum samples, streptavidin-coated plates were washed 3 times with PBS-0.05% Tween and blocked with 2% BSA/PBS-0.1% Tween. After washing 3 times with PBS-0.1% Tween, the murine anti-β ₂GPI mAb was added (25 nM) and incubated for 1 hour at RT. After washing 3 times with PBS-0.1% Tween, alkaline phosphatase-conjugated goat anti-mouse IgG (1 : 1,500) was added for 1 hour at RT and samples were read at 405 nm after adding chromogenic substrate. HAS, non-MPB-labeled serum and ox-β ₂GPI were used as controls. The pooled in-house standard used for the above-described β ₂GPI quantification ELISA was used as an internal control and standard. The proportion of reduced β ₂GPI was expressed as a percentage of that observed with the pooled in-house standard, after correction for the total amount of β ₂GPI.

2.5. Statistical Analyses

The data were presented as mean and standard deviation. Statistical analyses were performed using SPSS20.0. For normal distribution data, we used independent-samples -test and ANOVA. Nonnormal distribution variables were expressed as medians and interquartile ranges (IQRs) and analyzed by rank sum test. Differences in frequency of categorical variables were assessed by the chi-square test. All reported values were two-sided and values of were considered statistically significant.

3. Results

3.1. Different Stages of Diabetic Complications in the Patients

In this study, 90 patients did not have CAD (non-CAD group), 56 patients suffered from asymptomatic myocardial ischemia or stable angina (mild-CAD group), and 84 patients had unstable angina or a demonstrated Myocardial Infarction (severe-CAD group). According to Doppler ultrasonography, 108 patients were free of artery stenosis of lower limbs (non-A-stenosis group), 63 patients had less than 50% artery stenosis (mild-A-stenosis group), and 59 patients had more than 50% artery stenosis (severe-A-stenosis group). 47 patients had normal nerve conduction velocity (NCVN group), 99 patients had slow nerve conduction velocity, as judged by the slowing of nerve conduction velocity less than 30% of the control (mild-NCVS group), and 84 patients had slow NCVS by more than 30% of the controls (severe-NCVS group). According to the Diabetic Retinopathy Disease Severity Scale, 138 patients did not have diabetic retinopathy (non-DR group), 56 patients suffered from mild-moderate nonproliferative diabetic retinopathy (mild-DR group), and 36 patients had severe NPDR-proliferative diabetic retinopathy (severe-DR group). According to Mogensen staging criteria, 163 patients had normal urinary albumin excretory rate (DN < III group), 44 patients had stage III-DN (DN-III group), and 23 patients had stage IV-V-DN (DN-IV-V group). Demographic and clinical details of the study groups are summarized in supplemental Tables (see Supplementary Material available online at http://dx.doi.org/10.1155/2016/8246839).

3.2. The Proportion of Reduced β ₂GPI Is Decreased in T2DM

The proportion of reduced β ₂GPI was significantly lower in T2DM group than in healthy control group () (Figure 1).

Figure 1: The proportion of reduced β ₂GPI decreased in T2DM.

3.3. Reduced β ₂GPI Was Elevated at Early Stage of Diabetic Macroangiopathy but Decreased at the Late Stage

Given that the redox state of β ₂GPI in T2DM was different from healthy controls, we kept asking whether this level was the same in patients with various degrees of angiopathy. We found that there was a trend that the mild-CAD group had higher proportion of reduced β ₂GPI than non-CAD and severe-CAD groups (Figure 2(a)), however without significant difference (). The mild-A-stenosis group had higher proportion of reduced β ₂GPI than severe-A-stenosis group () and non-A-stenosis group () (Figure 2(b)).

(a)

(b)

Figure 2: β ₂GPI and macroangiopathy.

The mild-NCVS group had a higher proportion of reduced β ₂GPI than NCVS group () and severe-NCVS group () (Figure 3(a)). Mild-DR group had higher proportion of reduced β ₂GPI than severe-DR group () and the proportion of reduced β ₂GPI in non-DR group was almost equal to that in mild-DR group () (Figure 3(b)). For DN, the proportion of reduced β ₂GPI showed no difference between any two groups, as shown in Figure 3(c). However, there was a trend that DN at I or II status had a higher proportion of reduced β ₂GPI [82.89% (66.05–162.53)] than DN-III group [79.93% (44.44–127.57)] and DN-IV and V group [79.24% (58.28–236.42)] (). Additionally, the proportion of reduced β ₂GPI was in positive correlation with 24 h UMA () and 24 h UTP () ().

(a)

(b)

(c)

Figure 3: The levels of β ₂GPI in different NCVS (a), DR (b), and DN (c).

3.4. Correlation Analysis

The proportion of reduced β ₂GPI was in negative correlation with skin AGEs (, ) (Figure 4(a)), serum AGEs (, ) (Figure 4(b)), hs-CRP (, ) (Figure 4(c)), FIB (, ) (Figure 4(d)), and D-Dimer (, ) (Figure 4(e)). Serum hs-CRP was in negative correlation with serum AGEs (, ) (Figure 4(f)).

(a)

(b)

(c)

(d)

(e)

(f)

Figure 4: Correlation analysis. Correlation of β ₂GPI with skin AGES (a) or with serum AGEs (b). Correlation of β ₂GPI with hs-CRP (c). Correlation of hs-CRP with AGEs (d). Correlation of β ₂GPI with FIB (e) and D-Dimer (f).

4. Discussion

4.1. Type 2 Diabetes Mellitus and Redox State of β ₂GPI

The conformation and function of reduced β ₂GPI are quite different from those of the oxidized form [13, 14]. Therefore, ROS is likely to play a direct role in the regulation of β ₂GPI status. APS, which is characterized by increased oxidative stress and vascular thrombosis, has elevated β ₂GPI and a decreased proportion of reduced β ₂GPI [2]. Similarly, diabetics are in a high oxidative stress state due to massive ROS production caused by increased AGEs, the polyol pathway, and other factors. Indeed, our study showed that T2DM patients had significantly lower proportion of reduced β ₂GPI. Serum AGEs were in positive correlation with hs-CRP which is an important inflammatory marker and one of the strongest independent predictors of cardiovascular disease, and the proportion of reduced β ₂GPI was in negative correlation with hs-CRP, serum and skin AGEs, D-Dimer, and FIB.

4.2. Reduced β ₂GPI and Diabetes Macroangiopathy

Atherosclerosis (AS) is a complex chronic disease caused by various factors. β ₂GPI plasma concentrations are strongly associated to vascular disease in type 2 diabetic patients and have been proposed as a clinical marker of cardiovascular risk [15]. β ₂GPI/CRP, oxLDL/β ₂GPI, and LP(a)/β ₂GPI complexes in serum can accelerate progress of atherosclerosis [16, 17]. β ₂GPI can also induce a cellular immune response in a subpopulation of patients with carotid atherosclerosis thus contributing to the inflammatory responses involved in carotid atherosclerotic disease [18]. The T-cell recognition site of β ₂GPI is around Cys288-Cys326 disulfide bond and the redox state of this could affect cellular immune processes mediated by β ₂GPI. Thus, it can be inferred that β ₂GPI in its oxidized form has the potential to be one of the significant pathogenic factors of atherosclerosis.

Reduced β ₂GPI can inhibit the formation of foam cells, reduce macrophage apoptosis [5], and protect endothelial cells from oxidative stress-induced cell injury [4]. Our results implicated that the change of redox state of β ₂GPI would affect its functions. Reduced β ₂GPI could be a protective factor from atherosclerosis, while the oxidized β ₂GPI could accelerate the disease. In the present study, we have found that the proportion of reduced β ₂GPI appeared a rising trend in the early stage of diabetes macroangiopathy due to the compensatory mechanism and showed a decreasing trend in the late stage of CAD and arterial stenosis, although it was not statistically different. More samples are still needed to clarify the difference.

4.3. Reduced β ₂GPI and Diabetes Microangiopathy

β ₂GPI combines with the A1 domain of vWF, subsequently inhibiting vWF mediated adhesion and aggregation of platelets. Obviously, β ₂GPI has the anticoagulant effect by clearing vWF. In addition, anti-β ₂GPI autoantibodies can eliminate this effect of β ₂GPI [19, 20]. Accordingly, Passam et al. found that reduced β ₂GPI had greater affinity with vWF in vitro [21].

β ₂GPI has the effect to inhibit angiogenesis [22]. β ₂GPI DN I-IV can inhibit proliferation, migration of RF/6A cell, and the function of lumen formation induced by AGEs. AGEs upregulate the expression of vascular endothelial growth factor (VEGF) and VEGF receptor. Reduced β ₂GPI functions to inhibit retinal angiogenesis by downregulating the expression of VEGF, VEGFR-1, and VEGFR-2 and inhibiting phosphorylation of ERK1/2 and Akt through Ras/Raf/MEK/ERK and PI3K/Akt/Gsk3β pathways.

In our previous study, reduced β ₂GPI treated STZ-BALB/c mice had a lower urinary albumin excretion rate (UAER) and a less pronounced pathological damage of kidney compared with control mice [16]. Western blots showed that reduced β ₂GPI treated group had less expression of phosphorylated p38MAPK, TGF-β1, and type IV collagen. Reduced β ₂GPI eliminates vWF, inhibits retinal angiogenesis, and inhibits glomerular fibrosis, thereby inhibiting the development of DR and DN. In our study, the proportion of reduced β ₂GPI increased in the early stage of diabetes microangiopathy and then decreased with aggravating of diabetes microangiopathy. Therefore, reduced β ₂GPI may be a protective factor in diabetes microangiopathy.

The redox state of β ₂GPI changed in T2DM patients. The proportion of reduced β ₂GPI increased in the early stage of angiopathy possibly as a compensatory mechanism and then decreased as angiopathy aggravated. This may implicate that reduced β ₂GPI is a protective factor in diabetes angiopathy. Testing the amount and proportion of reduced B₂GPI periodically in “at-risk” patients may offer the potential to better predict the occurrence and development of diabetic angiopathy.

Competing Interests

The authors declare that they have no competing interests.

Authors’ Contributions

All authors were involved in drafting the article or revising it critically for important intellectual content, and all authors approved the final version to be published. Jun Ma and Jing-Yun Zhang participated in the design of the study and collection of the samples, carried out the immunoassays, performed the statistical analysis, and drafted the manuscript. Yan Liu participated in the sample collection. De-Min Yu and Pei Yu conceived of the study, participated in its design and coordination, and helped to draft the manuscript. Jun Ma and Jing-Yun Zhang contributed equally to the paper.

Acknowledgments

The authors gratefully acknowledge the financial support from the National Natural Science Foundation of China (no. 81070645 and no. 81300665), the Tianjin Natural Science Fund (no. 10JCYBJC12000), the Science and Technology Fund of the Tianjin Health Bureau (no. 2012KG135), the Science and Technology Fund of Tianjin Medical University (no. 2009ky25), and the Science and Technology Support Plan Key Project of Tianjin (no. 13ZCZDSY01300).

References

M. Brownlee, “Biochemistry and molecular cell biology of diabetic complications,” Nature, vol. 414, no. 6865, pp. 813–820, 2001.

Y. Ioannou, J.-Y. Zhang, M. Qi et al., “Novel assays of thrombogenic pathogenicity in the antiphospholipid syndrome based on the detection of molecular oxidative modification of the major autoantigen β2-glycoprotein i,” Arthritis and Rheumatism, vol. 63, no. 9, pp. 2774–2782, 2011.

F. H. Passam, S. Rahgozar, M. Qi et al., “Beta 2 glycoprotein I is a substrate of thiol oxidoreductases,” Blood, vol. 116, no. 11, pp. 1995–1997, 2010.

Y. Ioannou, J.-Y. Zhang, F. H. Passam et al., “Naturally occurring free thiols within β2-glycoprotein I in vivo: nitrosylation, redox modification by endothelial cells, and regulation of oxidative stress-induced cell injury,” Blood, vol. 116, no. 11, pp. 1961–1970, 2010.

W.-L. Wang, Z.-X. Meng, S.-J. Zhou et al., “Reduced beta2-glycoprotein i protects macrophages from ox-LDL-induced foam cell formation and cell apoptosis,” Lipids in Health and Disease, vol. 12, no. 1, article 174, 2013.

Y. Sheng, J. G. Hanly, S. W. Reddel et al., “Detection of ‘antiphospholipid’ antibodies: a single chromogenic assay of thrombin generation sensitively detects lupus anticoagulants, anticardiolipin antibodies, plus antibodies binding β ₂-glycoprotein I and prothrombin,” Clinical and Experimental Immunology, vol. 124, no. 3, pp. 502–508, 2001.

S. Kouts, M.-X. Wang, S. Adelstein, and S. A. Krilis, “Immunization of a rabbit with β2-glycoprotein I induces charge-dependent crossreactive antibodies that bind anionic phospholipids and have similar reactivity as autoimmune anti-phospholipid antibodies,” Journal of Immunology, vol. 155, no. 2, pp. 958–966, 1995.

P. G. Vlachoyiannopoulos, S. A. Krilis, J. E. Hunt, M. N. Manoussakis, and H. M. Moutsopoulos, “Patients with anticardiolipin antibodies with and without antiphospholipid syndrome: their clinical features and β2-glycoprotein-I plasma levels,” European Journal of Clinical Investigation, vol. 22, no. 7, pp. 482–487, 1992.

F. Lin, R. Murphy, B. White et al., “Circulating levels of β2-glycoprotein I in thrombotic disorders and in inflammation,” Lupus, vol. 15, no. 2, pp. 87–93, 2006.

Ç. Agar, P. G. de Groot, M. Mörgelin et al., “β2-glycoprotein I: a novel component of innate immunity,” Blood, vol. 117, no. 25, pp. 6939–6947, 2011.

J. H. Rand, “A new fish for the β2GPI hook: LPS!,” Blood, vol. 117, no. 25, pp. 6743–6744, 2011.

B. Buttari, E. Profumo, V. Mattei et al., “Oxidized β ₂-glycoprotein I induces human dendritic cell maturation and promotes a T helper type 1 response,” Blood, vol. 106, no. 12, pp. 3880–3887, 2005.

K. M. Cook and P. J. Hogg, “Post-translational control of protein function by disulfide bond cleavage,” Antioxidants and Redox Signaling, vol. 18, no. 15, pp. 1987–2015, 2013.

I. Azimi, J. W. H. Wong, and P. J. Hogg, “Control of mature protein function by allosteric disulfide bonds,” Antioxidants and Redox Signaling, vol. 14, no. 1, pp. 113–126, 2011.

A. Castro, I. Lázaro, D. M. Selva et al., “APOH is increased in the plasma and liver of type 2 diabetic patients with metabolic syndrome,” Atherosclerosis, vol. 209, no. 1, pp. 201–205, 2010.

R. Zhang, S.-J. Zhou, C.-J. Li et al., “C-reactive protein/oxidised low-density lipoprotein/β2-glycoprotein i complex promotes atherosclerosis in diabetic BALB/c mice via p38mitogen-activated protein kinase signal pathway,” Lipids in Health and Disease, vol. 12, article 42, 2013.

D. Steinberg, S. Parthasarathy, T. E. Carew, J. C. Khoo, and J. L. Witztum, “Beyond cholesterol: modifications of low-density lipoprotein that increase its atherogenicity,” The New England Journal of Medicine, vol. 320, no. 14, pp. 915–924, 1989.

E. Profumo, B. Buttari, C. Alessandri et al., “Beta2-glycoprotein I is a target of t cell reactivity in patients with advanced carotid atherosclerotic plaques,” International Journal of Immunopathology and Pharmacology, vol. 23, no. 1, pp. 73–80, 2010.

V. X. Du, G. van Os, J. A. Kremer Hovinga et al., “Indications for a protective function of beta2-glycoprotein I in thrombotic thrombocytopenic purpura,” British Journal of Haematology, vol. 159, no. 1, pp. 94–103, 2012.

J. J. J. Hulstein, P. J. Lenting, B. De Laat, R. H. W. M. Derksen, R. Fijnheer, and P. G. De Groot, “β2-Glycoprotein I inhibits vonWillebrand factor-dependent platelet adhesion and aggregation,” Blood, vol. 110, no. 5, pp. 1483–1491, 2007.

F. H. Passam, S. Rahgozar, M. Qi et al., “Redox control of β2-glycoprotein I-von Willebrand factor interaction by thioredoxin-1,” Journal of Thrombosis and Haemostasis, vol. 8, no. 8, pp. 1754–1762, 2010.

F. H. Passam, J. C. Qi, K. Tanaka, K. I. Matthaei, and S. A. Krilis, “In vivo modulation of angiogenesis by beta 2 glycoprotein I,” Journal of Autoimmunity, vol. 35, no. 3, pp. 232–240, 2010.