Disease Markers
Volume 2018 (2018), Article ID 6292396, 13 pages
https://doi.org/10.1155/2018/6292396

Review Article

Systematic Review and Meta-Analysis of Diagnostic Accuracy of miRNAs in Patients with Pancreatic Cancer

Xiao Sun,¹ Xiaobin Zhou,¹ Yuan Zhang,² Xiaoyan Zhu,¹ and Haihua Liu¹

¹Department of Epidemiology and Health Statistics, College of Public Health, Qingdao University, Qingdao, Shandong 266021, China
²Department of Cardiac Surgery, Qingdao Municipal Hospital, Qingdao, Shandong 266021, China

Correspondence should be addressed to Xiaobin Zhou; xiaobin_zhou@126.com

Received 15 January 2018; Accepted 23 April 2018; Published 15 May 2018

Academic Editor: Nelson Yee

Copyright © 2018 Xiao Sun et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Background. It is reported that miRNAs are aberrantly expressed in patients with pancreatic cancer. However, the diagnostic value of miRNAs in pancreatic cancer remains controversial. The meta-analysis was to access diagnostic accuracy of miRNAs in pancreatic cancer. Methods. PubMed, Scopus, Web of Science, Chinese National Knowledge Infrastructure (CNKI), WANFANG Data, China Biomedical Literature Database (CBM), and VIP databases were retrieved up to June 30, 2016, to collect articles concerning the diagnosis of miRNAs in pancreatic cancer. The methodological quality of each study was assessed by the Quality Assessment of Diagnostic Accuracy Studies (QUADAS-2). This meta-analysis was conducted using RevMan5.0, MetaDiSc 1.4, and Stata 12.0 software. Results. There are 40 articles including 109 studies. The pooled SEN was 0.81 (95% CI, 0.80–0.82), the pooled SPE was 0.78 (95% CI, 0.77–0.79), the pooled +LR was 3.32 (95% CI, 2.92–3.80), the pooled −LR was 0.27 (95% CI, 0.24–0.31), the pooled DOR was 14.56 (95% CI, 11.55–18.34), and pooled AUC was 0.86 (95% CI, 0.84–0.88). Discussion. This meta-analysis demonstrated that miRNA makes a significant impact in the pancreatic cancer diagnosis with a high SEN and SPE, particularly using multiple miRNAs.

1. Introduction

Pancreatic cancer (PaC) is one of the most malignant human cancers, with a 5-year survival rate of less than 8% and a survival time of less than 6 months [1, 2]. The surgical resection is an effective treatment for PaC. But the absence of validity for diagnosis at the early stage can lead to low five-year survival rates. The low diagnostic accuracy is caused by insidious onset at the early stage, and the postmortem diagnostics causes a low resection rate and unfavourable prognosis. In addition, PaC and other noncancerous pancreatic diseases (such as chronic pancreatitis (CP)) may show similar symptoms and similar imaging features, which usually lead to erroneous explanation. Therefore, the PaC diagnosis is still a significant clinical challenge. The imaging technologies, such as positron emission tomography (PET), endoscopic ultrasound (EUS), endoscopic ultrasonography, and fine needle aspiration biopsy (FNAB), have high cost and technical difficulty resulting in poor diagnosis [3]. Currently, the most widespread used biomarkers in PaC are CA19-9, CA-125, carcinoembryonic antigen (CEA), MMP-9, K-ras, and p53, but these biomarkers often lead to inadequate specificity (SPE) and unreliable sensitivity (SEN) of PaC and are not recommended for primary screening tools and early disease diagnosis [4]. However, it is a clinically challenging to identify sensitive and specific biomarkers in diagnosis of PaC, especially incipient tumors. Therefore, it has clear clinical significance to develop the effective, credible biomarkers for the early detection and monitoring of PaC.

miRNAs are small noncoding RNA with a length of 18–24 nucleotides, whose main function is to adjust the stability and translation of nuclear mRNA transcripts [5, 6]. A large body of evidence suggests that miRNAs are actively involved in carcinogenesis, as tumor suppressor genes or oncogenes; they have great effects on diagnosis, prognosis, and treatment [7]. Aberrant expression of miRNAs is common in human cancers, including PaC, which are candidate biomarkers for PaC [8]. PaC exhibits higher expression of miR-21, miR-155, miR-146a, miR-196a, miR-196b, miR-200a/b/c, and miR-217. miRNAs are relatively stable in tissues, feces, cyst fluids, plasma, or serum for extraction and test [9, 10]. Hence, the existence of miRNAs may become a biomarker for the early detection of cancer.

Even though the diagnostic accuracy of miRNAs has been confirmed and some studies have achieved promising results, the application of miRNAs in the PaC diagnosis is still disputable and unsatisfactory because of the extensive SEN and SPE values of these studies, which may cause different results dependent on subjects’ race, controls’ sources, miRNAs’ types, and samples tested. For instance, Wang et al. reported 0.64 SEN and 0.89 SPE in Caucasian to determine the diagnostic accuracy of miR-21 [11]. But the results of Liu et al. showed that the diagnostic accuracy of miR-21 for PaC in Asian was 0.71 SEN and 0.69 SPE [12]. Moreover, several studies found that application of single-miRNA profiling for diagnosing PaC performs low diagnostic accuracy. For instance, Liu et al. discovered the value of miR-155 expression as a biomarker for diagnosing PaC in Caucasian. They showed that the sensitivity and specificity of miR-155 expression in plasma were 0.63 and 0.84, respectively, indicating that the accuracy of discriminating pancreatic cancer from chronic pancreatitis was relatively low [13]. However, Ganepola et al. reported a set of miRNAs (miR-642b-3p, miR-885-5p, and miR-22-3p) as biomarkers for the early PaC diagnosis with 0.91 SEN and 0.91 SPE [14]. So far, many studies have confirmed the diagnostic value of miRNAs in PaC [15–17]. However, there is still heterogeneity or inconsistency in the diagnostic accuracy of miRNAs, and its diagnostic value in PaC needs to be confirmed. In view of these discordant results, we performed a meta-analysis to develop the overall diagnostic accuracy of miRNAs in PaC.

2. Material and Methods

2.1. Search Strategy

The documents that met inclusion criteria were identified by searching the following electronic databases: PubMed, Scopus, Web of Science, China Biomedical Literature Database (CBM), Chinese National Knowledge Infrastructure (CNKI), WANFANG Data, and VIP data up to June 30, 2016. The language was limited to Chinese and English. We identified the studies with search terms: “microRNA” or “miRNA”; “pancreatic cancer” or “pancreatic carcinoma” or “pancreatic tumor” or “pancreatic neoplasm” or “pancreatic ductal adenocarcinom” or “pancreatic adenocarcinoma” or “intraductal papillary mucinous neoplasms”; and “diagnosis” or “sensitivity” or “specificity” or “ROC curve”. Combined with Google Scholar and Baidu Scholar, we also scanned the reference lists manually reviewed from included literatures to recognize other relevant studies. The search strategies are shown in Figure 1.

Figure 1: PubMed search strategy.

2.2. Inclusion and Exclusion Criteria

Eligible studies included in this study must meet the following inclusion criteria: (1) studies concerning the diagnostic value of miRNAs in PaC; (2) sufficient information being reported to construct a four-fold contingency table; and (3) published in English language and Chinese language. The exclusion criteria were as follows: (1) duplicate publications; (2) reviews, abstracts, letters, comments, and case reports; (3) incomplete data to construct a four-fold contingency table; (4) zoopery and other fundamental research; and (5) number of sample in each group < 10.

2.3. Data Extraction and Quality Assessment

Two investigators independently evaluated the selected articles. Discrepancies and unobtainable data were resolved by group discussion between at least three investigators. The following data from the included articles was extracted: first author; year of publication; country; subjects’ race; total number of cases and controls; source of cases and controls; type of miRNA profiling; and SEN, SPE, true-positive (TP), false-positive (FP), false-negative (FN), and true-negative (TN) values of tested miRNAs. Two authors assessed the risk of bias in each study by using the Quality Assessment of Diagnostic Accuracy Studies (QUADAS-2), which is an efficient tool for evaluating the quality of diagnostic studies [18].

2.4. Statistical Methods

The STATA 12.0, RevMan5, and Meta-DiSc 1.4 were used to conduct meta-analysis. We extracted the numbers of all subjects with TP, TN, FP, and FN with their 95% confidence intervals (95% CIs) from each included study. And the pooled SEN, SPE, PLR (positive likelihood ratio), NLR (negative likelihood ratio), and DOR (diagnostic odds ratio) were used for calculation. The summary receiver operating characteristic (SROC) curves were plotted by SEN and SPE, respectively, and the area under the SROC curve (AUC) and 95% CIs were calculated. The AUC shows an analytical summary of test performance and displays the trade-off between SEN and SPE. An AUC of 1.0 (100%) signifies perfect discriminatory ability to distinguish cases from noncases [19]. To evaluate heterogeneity between study, the test and ² statistics were calculated. for test or ² value > 50% indicates substantial heterogeneity, and the random effects model was adopted; otherwise, fixed-effects model was adopted [20]. In addition, we also performed subgroup and metaregression analyses to explore potential sources of heterogeneity in the studies. Deeks’ funnel plot asymmetry test was used to evaluate publication bias, and was deemed to be statistically significant.

3. Results

3.1. Literature Search

The process of literature retrieval was shown in a flow diagram (Figure 2). From electronic databases, we identified 641 potential related studies that used miRNAs for diagnosis in patients with pancreatic cancer and an additional 21 eligible studies included by scanning these documents in our initial study, of which 197 studies were deleted as duplicates. After titles and abstracts were reviewed, 417 studies were further excluded. After reviewing the full-text, we further excluded 8 studies for not about lacking necessary data (), each group contains less than 10 patients (). Ultimately, there are a total of 40 articles for data extraction and analysis.

Figure 2: Literature screening process and results. The specific database and the number of retrieved documents are as follows: PubMed (), Web of Science (), Scopus (), CBM (), CNKI (), VIP (), and WANFANG Data ().

3.2. Characteristic of the Selected Studies

The principal characteristics of these included studies were outlined in Table 1. In this study, we found 40 articles, in which 109 studies were conducted for meta-analysis. There were 2878 patients and 2269 controls. Additionally, we showed that 65 studies were conducted in Asian [3, 12, 13, 21–40] and the other 44 studies were conducted in Caucasian [11, 14, 41–53]. There were 80 studies that detected miRNAs in the blood (such as whole blood [14, 46, 53, 54], serum [24, 27, 28, 30, 32, 39, 40, 50, 51], and plasma samples [3, 11–13, 21, 23, 26, 33, 34, 36–38, 52]), and 29 studies detected miRNA in nonblood samples (including tissues [41–43, 45, 47–49, 55], pancreatic juice [44], and stool [22, 25, 31, 35]). We included 71 studies to evaluate the diagnostic efficacy of single miRNAs [12, 13, 21, 22, 26–29, 33, 34, 36, 38, 39, 41–43, 47, 54, 55] and multiple miRNAs [11, 14, 23–25, 30–32, 35, 37, 40, 44–46, 48–53] for distinguishing patients with PaC from controls in 38 studies. The selected studies adopted the reverse transcription polymerase chain reaction (RT-PCR) or immunohistochemistry (IHC) method to detect miRNA expression. The risk of bias and applicability of the studies were evaluated based on QUADAS-2 summarized in Figures 3 and 4.

Table 1: The main characteristics of included studies in meta-analysis.

Reference
Country
Ethnicity
Patient spectrum
Source of control
Sample size
miRNA profiling
Specimen
TP
FP
FN
TN
QUADAS-2

Cases
Controls

[3]
Japan
Asian
PDAC
DC
32
42
miR-483-3p, miR-21
Plasma
31
2
1
40
8

[41]
USA
Caucasian
PaC
CP + HC
28
21
A set of 9 miRNAs
Tissue
28
4
0
17
8

[42]
USA
Caucasian
PaC
DC
80
57
miR-21
Tissue
63
13
17
44
6

[55]
USA
Caucasian
PaC
HC
64
54
miR-155, miR-21
Tissue
52
1
12
53
8

[11]
USA
Caucasian
PDAC
HC
39
29
miR-21, miR-210, miR-155, miR-196a
Plasma
18
2
10
23
7

[43]
France
Caucasian
PDAC
CP
39
20
miR-148a
Tissue
18
2
21
18
8

[21]
China
Asian
PaC
HC
36
30
miR-18a
Plasma
34
7
2
29
9

[44]
USA
Caucasian
PaC
HC
24
16
miR-21, miR-221, miR-17-3p
Pancreatic juice
19
4
5
12
10

[45]
South America
Spain
Middle East
Caucasian
PDAC
DC
157
29
A set of 7 miRNAs
Tissue
148
5
9
24
8

[13]
China
Asian
PaC
CP + HC
62
97
miR-155
Plasma
39
15
23
82
7

[12]
China
Asian
PDAC
CP + HC
45
75
miR-21
Plasma
32
23
13
52
6

[22]
China
Asian
PaC
CP
29
22
miR-181b, miR-196b, miR-210
Fecal
20
13
9
9
7

[46]
Germany
Caucasian
PDAC
CP
45
38
A set of 100 miRNAs
Blood
35
18
10
20
7

[24]
China
Asian
PaC
CP + HC
138
175
miR-16, miR-196a
Plasma
89
37
49
138
8

[23]
China
Asian
PaC
CP + HC
95
81
A set of 7 miRNAs
Serum
90
6
5
75
8

[47]
Germany
Caucasian
PDAC
CP
42
33
miR-135b
Tissue
39
2
3
31
6

[48]
USA
Caucasian
PDAC
DC
26
11
miR-21, miR-221, miR-155, miR-100, miR-196a, miR-181b
Tissue
24
3
2
8
9

[25]
China
Asian
PaC
HC
29
13
miR-181b, miR-210, miR-196a
Fecal
25
6
4
7
7

[49]
Denmark
Caucasian
PDAC
HC
160
28
A set of 9 miRNAs
Tissue
158
8
2
20
6

[26]
China
Asian
PaC
HC
24
24
miR-451, miR-409-3p
Plasma
22
2
2
22
6

[50]
USA
Caucasian
PDAC
CP
41
35
miR-1290, miR-146a
Serum
34
11
7
24
7

[27]
China
Asian
PaC
DC
129
163
miR-27a-3p
Blood
106
34
23
129
7

[28]
China
Asian
PDAC
HC
70
40
miR-192
Serum
53
18
17
22
5

[29]
China
Asian
PaC
DC
22
27
miR-21, miR-17-5p
Serum
21
5
1
22
8

[51]
Germany
Caucasian
PaC
DC
75
53
miR-1246, miR-4644, miR-3976, miR-4306
Serum
61
5
14
48
7

[14]
USA
Caucasian
PaC
HC
11
11
miR-885-5p, miR-22-3p, miR-642b-3p
Blood
10
1
1
10
5

[52]
USA
Caucasian
PDAC
DC
40
54
A set of 5 miRNAs
Plasma
38
0
2
54
8

[30]
China
Asian
PaC
HC
49
27
miR-492, miR-663a
Serum
42
5
7
22
6

[53]
Denmark
Caucasian
PaC
HC
180
199
A set of 10 miRNAs
Blood
153
29
27
170
8

[35]
China
Asian
PDAC
HC
30
15
miR-21, miR-155, miR-216
Fecal
28
5
2
10
8

[32]
China
Asian
PDAC
HC
70
40
miR-192, miR-194
Serum
59
10
11
30
7

[33]
China
Asian
PaC
HC
30
26
miR-210, miR-25
Plasma
22
7
8
19
6

[34]
China
Asian
PaC
CP + HC
60
30
miR-155, miR-196a
Plasma
46
9
14
21
6

[31]
China
Asian
PDAC
HC
30
15
miR-21, miR-155, miR-216
Fecal
25
2
5
13
6

[36]
Japan
Asian
PaC
HC
71
67
Circulating miR-223
Plasma
44
4
27
63
7

[54]
USA
Caucasian
PaC
HC
42
24
A set of 30 miRNAs
Plasma
34
11
8
13
7

[37]
China
Asian
PaC
CP + HC
60
30
miR-155, miR-21, miR-196a, miR-210
Plasma
57
2
3
28
6

[38]
China
Asian
PaC
HC
43
21
miR-21, miR-155
Plasma
38
3
5
18
5

[39]
China
Asian
PDAC
CP
110
70
miR-155
Serum
83
14
27
56
8

[40]
China
Asian
PaC
DC
16
20
miR-21, miR-29a, miR-210
Serum
13
9
3
11
6

PaC: pancreatic cancer; PDAC: pancreatic ductal adenocarcinoma; HC: healthy control; CP: chronic pancreatitis; DC: disease control; TP: true positive; FP: false positive; FN: false negative; TN: true negative.

Figure 3: Summary of bias risk assessment results for QUADAS-2.

Figure 4: Quality of included studies according to QUADAS-2 guidelines.

3.3. Diagnostic Accuracy of miRNAs in PaC

By heterogeneity analysis, ² of SEN and SPE was 82.8% () and 80.8% () (Figure 5), respectively, implicating significant heterogeneity of the studies. Thus, the random effects model was applied. To verify whether the heterogeneity could be explained by a threshold effect, we used the Spearman approach for further analysis. Spearman correlation coefficient of these 40 articles was −0.186 (), indicating that there was no significant threshold effect.

(a) Forest plot of sensitivity

(b) Forest plot of specificity

Figure 5: Forest plots of sensitivity (a) and specificity (b) with corresponding heterogeneity statistics for miRNA in pancreatic cancer diagnosis.

The pooled estimates of pancreatic cancer for the diagnostic accuracy of miRNAs were shown in Table 2 and Figure 5. The results were as follows: the pooled SEN was 0.81 (95% CI, 0.80–0.82), the pooled SPE was 0.78 (95% CI, 0.77–0.79), the pooled +LR was 3.32 (95% CI, 2.92–3.801), the pooled −LR was 0.27 (95% CI, 0.24–0.31), and the pooled DOR was 14.56 (95% CI, 11.55–18.34). These results indicated that miRNAs were a valid diagnostic marker for pancreatic cancer. In this meta-analysis, the summary receiver operating characteristic (SROC) results showed that AUC was 0.86, which showed a moderate and perfect level of overall accuracy (Figure 6(a)).

Table 2: Summary estimates of subgroup analysis for miRNA in pancreatic cancer diagnosis.

Subgroups
Number of studies
SEN (95% CI)
SPE (95% CI)
+LR (95% CI)
−LR (95% CI)
DOR (95% CI)
AUC (95% CI)

Source of patients

    PDAC
46
0.81 (0.79, 0.83)
0.78 (0.76, 0.80)
3.19 (2.54, 4.02)
0.27 (0.21, 0.34)
14.35 (9.62, 21.40)
0.86 (0.82, 0.89)

    PaC
63
0.81 (0.79, 0.82)
0.78 (0.76, 0.79)
3.42 (2.89, 4.05)
0.27 (0.23, 0.31)
14.98 (11.31, 19.84)
0.87 (0.84, 0.89)

Source of control

    Healthy control
58
0.82 (0.81, 0.83)
0.76 (0.74, 0.78)
3.21 (2.66, 3.87)
0.26 (0.22, 0.31)
14.29 (10.41, 19.60)
0.86 (0.83, 0.88)

    Disease control
51
0.79 (0.78, 0.81)
0.79 (0.78, 0.81)
3.46 (2.84, 4.23)
0.28 (0.23, 0.33)
14.96 (10.63, 21.05)
0.86 (0.83, 0.89)

Ethnicity

    Asian
65
0.78 (0.77, 0.80)
0.76 (0.74, 0.78)
3.02 (2.55, 3.57)
0.30 (0.26, 0.34)
11.95 (9.05, 15.78)
0.84 (0.81, 0.86)

    Caucasian
44
0.84 (0.82, 0.85)
0.80 (0.78, 0.82)
3.91 (3.10, 4.92)
0.23 (0.18, 0.29)
20.23 (13.61, 30.09)
0.88 (0.85, 0.91)

miRNA profiles

    Single miRNA
71
0.75 (0.74, 0.77)
0.76 (0.74, 0.77)
2.82 (2.41, 3.29)
0.34 (0.30, 0.39)
9.48 (7.44, 12.08)
0.82 (0.79, 0.84)

    Multiple miRNAs
38
0.87 (0.86, 0.88)
0.81 (0.79, 0.82)
4.65 (3.62, 5.97)
0.16 (0.13, 0.21)
35.88 (22.92, 56.16)
0.92 (0.89, 0.94)

Source of miRNA

    Blood
80
0.79 (0.78, 0.80)
0.78 (0.76, 0.79)
3.35 (2.92, 3.84)
0.29 (0.25, 0.33)
13.64 (10.74, 17.33)
0.85 (0.83, 0.87)

    Tissue
13
0.90 (0.88, 0.92)
0.90 (0.87, 0.92)
7.14 (4.43, 11.50)
0.09 (0.05, 0.19)
96.13 (39.20, 235.77)
0.96 (0.93, 0.98)

    Fecal
13
0.80 (0.76, 0.84)
0.57 (0.49, 0.63)
1.77 (1.28, 2.44)
0.35 (0.23, 0.55)
5.52 (2.67, 11.42)
0.75 (0.66, 0.85)

    Pancreatic juice
3
0.79 (0.68, 0.88)
0.60 (0.45, 0.74)
1.87 (1.31, 2.68)
0.34 (0.21, 0.57)
5.77 (2.53, 13.15)
0.76 (0.66, 0.85)

miRNA-21

    Yes
24
0.85 (0.83, 0.87)
0.83 (0.80, 0.86)
4.76 (2.96, 7.66)
0.19 (0.13, 0.28)
30.24 (15.44, 59.21)
0.91 (0.87, 0.95)

    No
85
0.80 (0.78, 0.81)
0.77 (0.75, 0.78)
3.06 (2.67, 3.50)
0.29 (0.25, 0.33)
12.31 (9.69, 15.65)
0.84 (0.82, 0.86)

Overall
109
0.81 (0.80, 0.82)
0.78 (0.77, 0.79)
3.32 (2.90, 3.80)
0.27 (0.24, 0.31)
14.56 (11.55, 18.34)
0.86 (0.84, 0.88)

SEN: sensitivity; SPE: specificity; +LR: positive likelihood ratio; −LR: negative likelihood ratio; DOR: diagnostic odds ratio; AUC: area under the curve; PDAC: pancreatic ductal adenocarcinoma.

(a) Overall

(b) PDAC

(c) Single miRNA

(d) Multiple miRNAs

Figure 6: Summary ROC curve with confidence and prediction regions around mean operating sensitivity and specificity point.

3.4. Subgroup Analysis

Considering the significant heterogeneity across studies, we conducted subgroup analysis to explore the source of heterogeneity. The subgroup analysis results were listed in Table 2. Race, patients’ types, control source, miRNA profiling, and specimen subgroups showed divergences. Different types of patient subgroup analysis showed that in the 63 studies for the accuracy of miRNAs to distinguish patients with PaC from healthy controls, the pooled SEN was 0.81 (95% CI, 0.79–0.83), the pooled SPE was 0.78 (95% CI, 0.76–0.79), the pooled +LR was 3.42 (95% CI, 2.89–4.05), the pooled −LR was 0.27 (95% CI, 0.23–0.31), the pooled DOR was 14.98 (95% CI, 11.31–19.84), and the AUC was 0.87 (95% CI, 0.84–0.89). Moreover, in the 46 studies for patients with pancreatic ductal adenocarcinoma (PDAC), the pooled SEN was 0.81 (95% CI, 0.79–0.83), the pooled SPE was 0.78 (95% CI, 0.76–0.80), the pooled +LR was 3.19 (95% CI, 2.54–4.02), the pooled −LR was 0.27 (95% CI, 0.21–0.34), the pooled DOR was 14.35 (95% CI, 9.62–21.40), and the AUC was 0.86 (95% CI, 0.82–0.89) (Figure 6(b)). It was suggested that miRNAs had a high diagnostic value in PaC and PDAC. In PDAC, the pooled SEN, SPE, and AUC for 7 studies in which miRNA was measured in tissue were 0.93 (95% CI, 0.90–0.94), 0.85 (95% CI, 0.79–0.90), and 0.93 (95% CI, 0.90–0.94), respectively; the pooled SEN, SPE, and AUC for 30 studies in which miRNA was measured in blood were 0.75 (95% CI, 0.72–0.77), 0.75 (95% CI, 0.72–0.77), and 0.82 (95% CI, 0.81–0.83), respectively; the pooled SEN, SPE, and AUC for 7 studies in which miRNA was measured in feces were 0.87 (95% CI, 0.81–0.91), 0.67 (95% CI, 0.57–0.77), and 0.89 (95% CI, 0.85–0.93), respectively, displaying that miRNA is useful for the diagnosis of PDAC. Due to only 2 studies in pancreatic juice were included, we did not perform a meta-analysis. The DOR in Caucasian populations was higher [20.23, 95% CI (13.61, 30.09)] than Asian populations [11.95, 95% CI (9.05, 15.78)]. Similarly, the AUC in the tissue [0.96, 95% CI (0.93, 0.98)] was higher than the blood [0.85, 95% CI (0.83, 0.87)], but was better than pancreatic juice or fecal miRNAs, revealing that Caucasian populations and detection in the tissue were more accurate in PaC diagnosis. Compared with the detection results with unhealthy controls, detection results from the healthy control group performed a higher level of overall accuracy, indicating that miRNAs were more exact in discriminating patients with PaC from healthy people than from unhealthy people. For the diagnostic accuracy of multiple miRNAs, we found that the AUC was 0.92 (95% CI, 0.89–0.94) (Figure 6(c)); for the diagnostic accuracy of single miRNAs, we found that the AUC was 0.82 (95% CI, 0.79–0.84) (Figure 6(d)), which showed that multiple miRNA profiling is more accurate for the diagnosis of PaC.

3.5. Metaregression and Publications Bias

A metaregression was conducted to explore the potential heterogeneity within the selected studies. We found that the combination of miR-21 [RDOR = 1.98, 95% CI (1.05, 3.75), ] and multiple miRNA profiling [RDOR = 3.07, 95% CI (1.73, 5.44), ] was source of interstudy heterogeneity. In this meta-analysis, we also conducted sensitivity analysis to further explore heterogeneity of included studies, which showed that the results of studies were relatively stable and reliable. The Deeks’ test performed a statistically nonsignificant value (bias = −3.17, ) (Figure 7), and the funnel plots were almost symmetric, which showed that there was no potential publication bias.

Figure 7: Deeks’ funnel plot of miRNA in PaC diagnosis.

4. Discussion

Pancreatic cancer is a highly malignant tumor with rising incidence and mortality all over the world [56, 57]. The PaC diagnosis remains an urgent clinical challenge, which is due to the relatively absence of symptoms earlier and similar symptoms and imaging features in PaC and other noncancerous pancreatic diseases such as chronic pancreatitis, pancreatic cyst, and IPMN that leads to low accuracy of early diagnosis and incorrect interpretations [58]. miRNAs have clinical potential as diagnostic and predictive markers and as novel molecular targets in PDAC [59]. Jamieson et al. found that expression patterns of miRNAs associated with reduced survival of PDAC, including overexpression of miR-21 and underexpression of miR-34a [60]. Similarly, Frampton et al. focused on meta-analyses that included 1525 patients in PDAC and showed that overall survival OS was significantly shortened in patients with high tumoral miR-21 (adjusted HR = 2.48; 1.96–3.14), indicating that tumoral miR-21 overexpression emerged as an important predictor of poor prognosis in PDAC [61]. Thus, we performed a meta-analysis to access the diagnostic and clinical value of miRNAs as novice biomarkers in PaC.

The conclusions of the current meta-analysis were similar to that of three previous meta-analysis reported by Wan et al. [15], Ding et al. [16], and Pei et al. [17]. Compared with three previous meta-analysis above, there are a number of advantages in the meta-analysis which are as follows: (1) 40 articles with 109 studies are selected in this meta-analysis, which were more studies and participants than three previous meta-analysis; (2) more subgroup analyses than any other reported meta-analysis are performed, especially the article by Wan et al. [15], including race, source of control, miRNA profiling, and the combination of miR-21; and (3) to further demonstrate the potential heterogeneity within the selected studies, our review conducted a metaregression.

In this meta-analyses, we found that the pooled SEN was 0.81 (95% CI, 0.80–0.82), the pooled SPE was 0.78 (95% CI, 0.77–0.79), and the pooled DOR was 14.56 (95% CI, 11.55–18.34), which showed a relatively high level of overall accuracy. LR is widely used for diagnostic criteria of determining or excluding disease [62]. We found that the pooled +LR was 3.32 (95% CI, 2.92–3.801) and the pooled −LR was 0.27 (95% CI, 0.24–0.31). Due to inclusion of early pancreatic cancer in the case group and choosing more healthy subjects in the control group, the diagnostic efficacy of miRNAs was reduced. Therefore, it is necessary to carry out a reasonable design, high-quality, large-sample, prospective study of long-term follow-up to accurately reflect the miRNA diagnostic efficacy. The DOR, which is a diagnostic test evaluation indicator, describes the probability of positive results in patients with the disease compared to the results in patients without disease. In the present analysis, the pooled DOR was 14.56 (95% CI, 11.55–18.34), indicating that patients who tested positive for miRNAs have a 14.56 chances of developing PaC compared to those testing negative, indicating that miRNAs have a higher DOR than the traditional markers in serum such as CEA and CA19-9. Frampton et al. [63] have performed a miRNA metasignature in PDAC and defined a 10-miRNA (upregulated: miR-21, miR-23a, miR-31, miR-100, miR-143, miR-155, and miR-221; downregulated: miR-148a, miR-217, and miR-375) metasignature for PDAC diagnosis.

Due to the significant heterogeneity, we explored potential sources of interstudy heterogeneity, which leads to undermine reliability of study to some degree. It is noteworthy that multiple miRNAs were more accurate in PaC diagnosis than single miRNAs. However, there is no standing panel of valid miRNAs. Yang et al. investigated the combination miR-21, miR-155, and miR-216 with an SEN and an SPE of 0.83 [31]. Liu et al. showed the combination miR-16 and miR-196a with an SEN of 0.87 and an SEN of 0.74 [23]. Ganepola et al. investigated the combination miR-22-3p, miR-642b-3p, and miR-885-5p as markers in early diagnosis PaC with 0.91 SEN and 0.91 SPE [14]. The miR-21 is the most commonly studied. Yang et al. proved that the diagnostic value of miR-21 (SEN: 0.90, SPE: 0.67) was higher than that of miR-216 (SEN: 0.87, SPE: 0.60) [31]. Similarly, Wang et al. performed that miR-21 was more accurate than miR-155 [38]. We also found that miR-21s as biomarkers for the early diagnosis of PaC was more valuable than other miRNAs. In addition, the testing efficiency of miRNAs that were derived from tissue is higher than that of blood and pancreatic juice or feces. The testing threshold plays an important role in disease diagnosis. However, our meta-analyses showed that half of the included studies did not report testing threshold, which may have an impact on the results. Thus, future studies should pay attention to it.

Compared with the conventional biomarkers, miRNAs provide some advantages including sensitive to degradation, more reliable measurement of expression levels, more stable in human specimens, rapid collection, and less invasive [64]. Different levels of miRNA expression help to distinguish between pancreatic cancer patients and healthy controls, which demonstrates potential capability for PaC. Based on the meta-analysis of the 40 articles, we found that miRNAs have a relatively high SEN and SPE in distinguishing patients with PaC from healthy controls, especially using multiple miRNA profiling, which was consistent with the results of Ding et al. [16]. In order to confirm the noninvasiveness, high accuracy, and effectiveness of miRNAs in PaC diagnosis, we still need to further study. For the diagnostic accuracy of miRNAs to distinguish PaC from healthy controls, the SEN was 0.82 (95% CI, 0.81–0.83) and the SPE was 0.76 (95% CI, 0.74–0.78). By contrast, for unhealthy controls, the SEN was 0.79 (95% CI, 0.78–0.81) and the SPE was 0.79 (95% CI, 0.78–0.81), showing a lower accuracy compared with healthy controls. Therefore, we should strictly regulate the diseases among the included studies in the future, especially confusing disease with PaC.

There are limitations when interpreting the results of this study which are as follows: high heterogeneity was conducted in this meta-analysis; the cutoff values are different in the various studies and were not available in some studies; no statistical data was reported concerning African populations; some studies had less sample size; and the vast majority of the studies included healthy subjects as controls.

In conclusion, this meta-analysis showed that miRNA is a useful biomarker for PaC diagnosis and the usefulness of miRNAs in the diagnosis of PaC was pointed out, particularly multiple miRNAs. However, there is still a need for further studies to confirm the validity of employing miRNAs as biomarkers to diagnose PaC.

Conflicts of Interest

The authors declare that they have no conflicts of interest.

Supplementary Materials

The database consists of the following data selected articles. (Supplementary Material)

References

A. Sultana, C. Tudur Smith, D. Cunningham, N. Starling, J. P. Neoptolemos, and P. Ghaneh, “Meta-analyses of chemotherapy for locally advanced and metastatic pancreatic cancer: results of secondary end points analyses,” British Journal of Cancer, vol. 99, no. 1, pp. 6–13, 2008.

R. L. Siegel, S. A. Fedewa, K. D. Miller et al., “Cancer statistics for Hispanics/Latinos, 2015,” CA: A Cancer Journal for Clinicians, vol. 65, no. 6, pp. 457–480, 2015.

M. Abue, M. Yokoyama, R. Shibuya et al., “Circulating miR-483-3p and miR-21 is highly expressed in plasma of pancreatic cancer,” International Journal of Oncology, vol. 46, no. 2, pp. 539–547, 2015.

A. De Rosa, I. C. Cameron, and D. Gomez, “Indications for staging laparoscopy in pancreatic cancer,” HPB, vol. 18, no. 1, pp. 13–20, 2016.

V. Ambros, “The functions of animal microRNAs,” Nature, vol. 431, no. 7006, pp. 350–355, 2004.

U. Haug, M. N. Wente, C. M. Seiler, R. Jesnowski, and H. Brenner, “Stool testing for the early detection of pancreatic cancer: rationale and current evidence,” Expert Review of Molecular Diagnostics, vol. 8, no. 6, pp. 753–759, 2008.

K. Yonemori, H. Kurahara, K. Maemura, and S. Natsugoe, “MicroRNA in pancreatic cancer,” Journal of Human Genetics, vol. 62, no. 1, pp. 33–40, 2017.

R. Navon, H. Wang, I. Steinfeld, A. Tsalenko, A. Ben-Dor, and Z. Yakhini, “Novel rank-based statistical methods reveal microRNAs with differential expression in multiple cancer types,” PLoS One, vol. 4, no. 11, article e8003, 2009.

J. A. Weber, D. H. Baxter, S. Zhang et al., “The microRNA spectrum in 12 body fluids,” Clinical Chemistry, vol. 56, no. 11, pp. 1733–1741, 2010.

H. Zhao, J. Shen, L. Medico, D. Wang, C. B. Ambrosone, and S. Liu, “A pilot study of circulating miRNAs as potential biomarkers of early stage breast cancer,” PLoS One, vol. 5, no. 10, article e13735, 2010.

J. Wang, J. Chen, P. Chang et al., “MicroRNAs in plasma of pancreatic ductal adenocarcinoma patients as novel blood-based biomarkers of disease,” Cancer Prevention Research, vol. 2, no. 9, pp. 807–813, 2009.

J. Q. Liu, J. Gao, Y. Ren, X. W. Wang, W. W. Wang, and H. Lu, “The value of plasma miR-21 in the diagnosis of pancreatic cancer,” Chinese Journal of Gastroenterology, vol. 8, pp. 860–863, 2011.

J. Q. Liu, J. Gao, Z. S. Li, Y. Ren, W. W. Wang, and H. Lu, “Detection and diagnostic value of plasma miR-155 in patients with pancreatic cancer,” Chinese Journal of Pancreatic Diseases, vol. 11, no. 2, pp. 79–81, 2011.

G. A. Ganepola, J. R. Rutledge, P. Suman, A. Yiengpruksawan, and D. H. Chang, “Novel blood-based microRNA biomarker panel for early diagnosis of pancreatic cancer,” World Journal of Gastrointestinal Oncology, vol. 6, no. 1, pp. 22–33, 2014.

C. Wan, Y. Shen, T. Yang, T. Wang, L. Chen, and F. Wen, “Diagnostic value of microRNA for pancreatic cancer: a meta-analysis,” Archives of Medical Science, vol. 8, no. 5, pp. 749–755, 2012.

Z. Ding, H. Wu, J. Zhang, G. Huang, and D. Ji, “MicroRNAs as novel biomarkers for pancreatic cancer diagnosis: a meta-analysis based on 18 articles,” Tumor Biology, vol. 35, no. 9, pp. 8837–8848, 2014.

Z. Pei, S. M. Liu, J. T. Huang et al., “Clinically relevant circulating microRNA profiling studies in pancreatic cancer using meta-analysis,” Oncotarget, vol. 8, no. 14, pp. 22616–22624, 2017.

L. Wu, Y. Zhang, and X. T. Ceng, “Application of QUADAS-2 in the quality assessment tool for diagnostic accuracy studies,” Journal of Hubei Medical College, vol. 3, pp. 201–208, 2013.

J. B. Reitsma, A. S. Glas, A. W. S. Rutjes, R. J. P. M. Scholten, P. M. Bossuyt, and A. H. Zwinderman, “Bivariate analysis of sensitivity and specificity produces informative summary measures in diagnostic reviews,” Journal of Clinical Epidemiology, vol. 58, no. 10, pp. 982–990, 2005.

J. P. T. Higgins and S. G. Thompson, “Quantifying heterogeneity in a meta-analysis,” Statistics in Medicine, vol. 21, no. 11, pp. 1539–1558, 2002.

R. Morimura, S. Komatsu, D. Ichikawa et al., “Novel diagnostic value of circulating miR-18a in plasma of patients with pancreatic cancer,” British Journal of Cancer, vol. 105, no. 11, pp. 1733–1740, 2011.

Y. Ren, J. Gao, X. W. Wang et al., “Evaluation of the value of fecal microRNAs detection in the diagnosis of pancreatic cancer,” Chinese Journal of Pancreatic Diseases, vol. 11, no. 2, pp. 104–106, 2011.

J. Liu, J. Gao, Y. du et al., “Combination of plasma microRNAs with serum CA19-9 for early detection of pancreatic cancer,” International Journal of Cancer, vol. 131, no. 3, pp. 683–691, 2012.

R. Liu, X. Chen, Y. du et al., “Serum microRNA expression profile as a biomarker in the diagnosis and prognosis of pancreatic cancer,” Clinical Chemistry, vol. 58, no. 3, pp. 610–618, 2012.

Y. Ren, J. Gao, J. Q. Liu et al., “Differential signature of fecal microRNAs in patients with pancreatic cancer,” Molecular Medicine Reports, vol. 6, no. 1, pp. 201–209, 2012.

F. Pan, Y. Wen, S. J. Ma et al., “Study on the correlation between the expression of plasma miRNA and pancreatic cancer,” Journal of Nanjing Medical University, vol. 11, pp. 1541–1544, 2012.

W. S. Wang, L. X. Liu, G. P. Li et al., “Combined serum CA19-9 and miR-27a-3p in peripheral blood mononuclear cells to diagnose pancreatic cancer,” Cancer Prevention Research, vol. 6, no. 4, pp. 331–338, 2013.

C. Zhao, J. Zhang, S. Zhang et al., “Diagnostic and biological significance of microRNA-192 in pancreatic ductal adenocarcinoma,” Oncology Reports, vol. 30, no. 1, pp. 276–284, 2013.

G. P. Ding, Exosomal MicroRNA in Pancreatic Cancer and Its Effect on the Immune Function of DC, Zhejiang University, Hangzhou, 2013.

M. S. Lin, W. C. Chen, J. X. Huang, H. J. Gao, and H. H. Sheng, “Aberrant expression of microRNAs in serum may identify individuals with pancreatic cancer,” International Journal of Clinical and Experimental Medicine, vol. 7, no. 12, pp. 5226–5234, 2014.

J. Y. Yang, Y. W. Sun, D. J. Liu, J. F. Zhang, J. Li, and R. Hua, “MicroRNAs in stool samples as potential screening biomarkers for pancreatic ductal adenocarcinoma cancer,” American Journal of Cancer Research, vol. 4, no. 6, pp. 663–673, 2014.

J. Zhang, C.-Y. Zhao, S.-H. Zhang et al., “Upregulation of miR-194 contributes to tumor growth and progression in pancreatic ductal adenocarcinoma,” Oncology Reports, vol. 31, no. 3, pp. 1157–1164, 2014.

W. Z. Pan, Study on the Correlation of Plasma miRNA with Pancreatic Cancer Diagnosis, Shandong University, Jinan, 2014.

W. Shi, Study on the Abnormal Expression of miR-155 and miR-196a in the Diagnosis of Pancreatic Cancer, Kunming Medical University, Kunming, 2014.

J. Y. Yang, Y. W. Sun, and R. Hua, “The application value of fecal miRNAs in pancreatic ductal adenocarcinoma screening diagnosis,” Journal of Hepatobiliary Surgery, vol. 26, no. 5, pp. 388–392, 2014.

S. Komatsu, D. Ichikawa, M. Miyamae et al., “Malignant potential in pancreatic neoplasm; new insights provided by circulating miR-223 in plasma,” Expert Opinion on Biological Therapy, vol. 15, no. 6, pp. 773–785, 2015.

Y. X. Hu, H. R. Zhang, W. Shi et al., “The value of plasma miR-210 combined with serum tumor markers in the diagnosis of pancreatic cancer,” Chinese Journal of Gastroenterology, vol. 35, no. 10, pp. 1135–1143, 2015.

S. B. Wang, J. P. Liu, K. J. Lei, and Y. M. Jia, “Study on the relationship between the abnormal expression of miRNAs and the clinical features in patients with pancreatic cancer,” Cancer, vol. 35, no. 8, pp. 905–910, 2015.

X. G. Wang, Z. Tong, and G. Jin, “The value of serum miR-155 in the diagnosis and prognosis of pancreatic cancer,” Chinese Journal Department of Hepatobiliary Surgery, vol. 21, no. 3, pp. 189–193, 2015.

Y. Wu, Z. Z. Wang, and L. Y. Huang, “Preliminary study of serum miRNAs as a marker for the diagnosis of pancreatic cancer,” Ningxia Medical Journal, vol. 37, no. 8, pp. 675–677, 2015.

E. J. Lee, Y. Gusev, J. Jiang et al., “Expression profiling identifies microRNA signature in pancreatic cancer,” International Journal of Cancer, vol. 120, no. 5, pp. 1046–1054, 2007.

M. Dillhoff, J. Liu, W. Frankel, C. Croce, and M. Bloomston, “MicroRNA-21 is overexpressed in pancreatic cancer and a potential predictor of survival,” Journal of Gastrointestinal Surgery, vol. 12, no. 12, pp. 2171–2176, 2008.

N. Hanoun, Y. Delpu, A. A. Suriawinata et al., “The silencing of microRNA 148a production by DNA hypermethylation is an early event in pancreatic carcinogenesis,” Clinical Chemistry, vol. 56, no. 7, pp. 1107–1118, 2010.

J. K. Ryu, H. Matthaei, M. dal Molin et al., “Elevated microRNA miR-21 levels in pancreatic cyst fluid are predictive of mucinous precursor lesions of ductal adenocarcinoma,” Pancreatology, vol. 11, no. 3, pp. 343–350, 2011.

A. E. Szafranska-Schwarzbach, D. C. Whitcomb, M. B. Lloyd et al., “A multi-center study of a microRNA-based assay for the diagnosis of pancreatic ductal adenocarcinoma in fine needle aspirates,” Pancreas, vol. 40, no. 8, pp. 1356–1356, 2011.

A. S. Bauer, A. Keller, E. Costello et al., “Diagnosis of pancreatic ductal adenocarcinoma and chronic pancreatitis by measurement of microRNA abundance in blood and tissue,” PLoS One, vol. 7, no. 4, article e34151, 2012.

J. B. Munding, A. T. Adai, A. Maghnouj et al., “Global microRNA expression profiling of microdissected tissues identifies miR-135b as a novel biomarker for pancreatic ductal adenocarcinoma,” International Journal of Cancer, vol. 131, no. 2, pp. E86–E95, 2012.

N. C. Panarelli, Y. T. Chen, X. K. Zhou, N. Kitabayashi, and R. K. Yantiss, “MicroRNA expression aids the preoperative diagnosis of pancreatic ductal adenocarcinoma,” Pancreas, vol. 41, no. 5, pp. 685–690, 2012.

N. A. Schultz, J. Werner, H. Willenbrock et al., “MicroRNA expression profiles associated with pancreatic adenocarcinoma and ampullary adenocarcinoma,” Modern Pathology, vol. 25, no. 12, pp. 1609–1622, 2012.

A. Li, J. Yu, H. Kim et al., “MicroRNA array analysis finds elevated serum miR-1290 accurately distinguishes patients with low-stage pancreatic cancer from healthy and disease controls,” Clinical Cancer Research, vol. 19, no. 13, pp. 3600–3610, 2013.

B. Madhavan, S. Yue, U. Galli et al., “Combined evaluation of a panel of protein and miRNA serum-exosome biomarkers for pancreatic cancer diagnosis increases sensitivity and specificity,” International Journal of Cancer, vol. 136, no. 11, pp. 2616–2627, 2015.

G. A. Cote, A. J. Gore, S. D. McElyea et al., “A pilot study to develop a diagnostic test for pancreatic ductal adenocarcinoma based on differential expression of select miRNA in plasma and bile,” The American Journal of Gastroenterology, vol. 109, no. 12, pp. 1942–1952, 2014.

N. A. Schultz, C. Dehlendorff, B. V. Jensen et al., “MicroRNA biomarkers in whole blood for detection of pancreatic cancer,” JAMA, vol. 311, no. 4, pp. 392–404, 2014.

J. Permuth-Wey, D. T. Chen, W. J. Fulp et al., “Plasma microRNAs as novel biomarkers for patients with intraductal papillary mucinous neoplasms of the pancreas,” Cancer Prevention Research (Philadelphia, Pa.), vol. 8, no. 9, pp. 826–834, 2015.

N. Habbe, J. B. M. Koorstra, J. T. Mendell et al., “MicroRNA miR-155 is a biomarker of early pancreatic neoplasia,” Cancer Biology & Therapy, vol. 8, no. 4, pp. 340–346, 2009.

A. Jemal, R. Siegel, J. Xu, and E. Ward, “Cancer statistics, 2010,” CA A Cancer Journal for Clinicians, vol. 60, no. 5, pp. 277–300, 2010.

W. Q. Chen, S. W. Zhang, H. M. Zeng et al., “The incidence and mortality of malignant tumors in China in 2010,” Chinese Journal of Oncology, vol. 23, no. 1, pp. 1–10, 2014.

F. X. Real, “A “catastrophic hypothesis” for pancreas cancer progression,” Gastroenterology, vol. 124, no. 7, pp. 1958–1964, 2003.

A. E. Frampton, L. Castellano, T. Colombo et al., “MicroRNAs cooperatively inhibit a network of tumor suppressor genes to promote pancreatic tumor growth and progression,” Gastroenterology, vol. 146, no. 1, pp. 268–277.e18, 2014.

N. B. Jamieson, D. C. Morran, J. P. Morton et al., “MicroRNA molecular profiles associated with diagnosis, clinicopathologic criteria, and overall survival in patients with resectable pancreatic ductal adenocarcinoma,” Clinical Cancer Research, vol. 18, no. 2, pp. 534–545, 2012.

A. E. Frampton, J. Krell, N. B. Jamieson et al., “microRNAs with prognostic significance in pancreatic ductal adenocarcinoma: a meta-analysis,” European Journal of Cancer, vol. 51, no. 11, pp. 1389–1404, 2015.

X. T. Zeng and M. W. He, Meta-Analysis Software for Diagnostic Accuracy Test, Military Medical Science Press, Beijing, China, 2014.

A. E. Frampton, E. Giovannetti, N. B. Jamieson et al., “A microRNA meta-signature for pancreatic ductal adenocarcinoma,” Expert Review of Molecular Diagnostics, vol. 14, no. 3, pp. 267–271, 2014.

X. Chen, Y. Ba, L. Ma et al., “Characterization of microRNAs in serum: a novel class of biomarkers for diagnosis of cancer and other diseases,” Cell Research, vol. 18, no. 10, pp. 997–1006, 2008.