Evidence-Based Complementary and Alternative MedicineVolume 2011 (2011), Article ID 726510, 7 pagesdoi:10.1155/2011/726510

Research Article

Acu-TENS and Postexercise Expiratory Flow Volume in Healthy Subjects

Shirley P. C. Ngai,¹ Alice Y. M. Jones,¹ and Christina W. Y. Hui-Chan²

¹Department of Rehabilitation Sciences, The Hong Kong Polytechnic University, Hung Hom, Kowloon, Hong Kong²Department of Physical Therapy, University of Illinois at Chicago, Chicago, IL 60612-7249, USA

Received 26 May 2010; Revised 28 September 2010; Accepted 28 December 2010

Copyright © 2011 Shirley P. C. Ngai et al. Shirley P. C. Ngai et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Transcutaneous Electrical Nerve Stimulation over acupoints (Acu-TENS) facilitates recovery of resting heart rate after treadmill exercise in healthy subjects. Its effect on postexercise respiratory indices has not been reported. This study investigates the effect of Acu-TENS on forced expiratory volume in 1 second (FEV1) and forced vital capacity (FVC) in healthy subjects after a submaximal exercise. Eleven male subjects were invited to the laboratory twice, two weeks apart, to receive in random order either Acu-TENS or Placebo-TENS (no electrical output from the TENS unit) over bilateral Lieque (LU7) and Dingchuan (EX-B1) for 45 minutes, before undergoing exercise following the Bruce protocol. Exercise duration, rate of perceived exertion (RPE), and peak heart rate (PHR) were recorded. Between-group FEV1 and FVC, before, immediately after, at 15, 30, and 45minutes postexercise, were compared. While no between-group differences in PHR, RPE, and FVC were found, Acu-TENS was associated with a longer exercise duration (0.9 min ()) and a higher percentage increase in FEV1 at 15 and 45 minutes postexercise (3.3 ± 3.7% () and 5.1 ± 7.5% (), resp.) compared to Placebo-TENS. We concluded that Acu-TENS was associated with a higher postexercise FEV1 and a prolongation of submaximal exercise.

1. Introduction

Aerobic training improves the body’s ability to meet increased ventilatory demands during exercise, and ventilatory endurance contributes to improved exercise performance [1]. Exercise can increase airway resistance in subjects with reactive airways [2] which consequently leads to increased work of breathing and induces a sensation of shortness of breath, thereby limiting exercise performance and training intensity [1].

Within the concepts of Traditional Chinese Medicine (TCM), maintenance of health and normalization of body function stems from a balance of “yin” and “yang” and free flow of energy (Qi) along various meridians in the body [3]. Previous studies have suggested that acupuncture, a technique which facilitates free flow of Qi, can alleviate dyspnoeic symptoms [4, 5], reduce postexercise bronchoconstriction [6], and improve exercise capacity [4].

Acupuncture, though effective, is invasive and may be associated with complications such as pneumothorax, inadvertent puncture of internal organs, infection, and vasovagal reaction [7, 8]. Transcutaneous Electrical Nerve Stimulation (TENS), on the other hand, is a noninvasive modality, and has been widely used in clinical practice for analgesia [9]. Wang and coworkers [10] demonstrated that TENS triggered the release of frequency-dependent opioid receptors in the same way as acupuncture. Levin and Hui-Chan [11] showed that TENS excited large diameter afferents (Aα, Aβ) in humans, similar to those excited by electro-acupuncture in animals [12]. Application of TENS over an acupuncture point (Acu-TENS) has been shown to facilitate the return to resting heart rate after an intensive treadmill exercise in healthy subjects [13]. Its effect on respiratory parameters after exercise in healthy subjects has not been reported. This study aims to investigate the effect of Acu-TENS on forced expiratory volume in one second (FEV₁), a test of pulmonary function used to assess airway resistance, during sub-maximal treadmill exercise in healthy subjects.

2. Materials and Methods

Ethics approval was obtained from the departmental research committee of the involved university. Male subjects, aged 18 or above, with no known history of respiratory, cardiovascular, musculo-skeletal, neurological, or endocrine disorders, were invited to participate in the study. Male subjects only were recruited for the convenience of ECG monitoring during exercise. Study details were explained, and written consent was obtained from each subject prior to data collection. All subjects were asked to complete a questionnaire confirming an absence of any of the aforementioned disorders or upper respiratory tract infection during the 2 weeks prior to the commencement of the study.

2.1. Experimental Procedures (Figure 1)

This study adopted a single-blinded, randomized, crossover design. Male subjects (through “snow ball” invitation) with good general health were invited to visit the university laboratory twice, 2 weeks apart, as a washout period. They were asked to refrain from coffee, tea, and chocolate on the day of the visit [14]. Upon arrival at the university laboratory, subjects rested in a sitting position for 30 minutes to establish a steady state cardiopulmonary system. Baseline resting heart rate was monitored (S610; Polar; Finland). FEV₁ and forced vital capacity (FVC) were measured according to the American Thoracic Society [15] guidelines using a spirometer (Pony, Cosmed, Italy) calibrated with a 3 L syringe prior to data collection.

At the first visit, subjects were asked to draw from an opaque sealed envelope an allocation number indicating either Acu-TENS or Placebo-TENS as the first intervention, with the opposite intervention applied at their subsequent visit a fortnight later.

(1)Acu-TENS: subjects received TENS over the acupuncture points—Dingchuan (EX-B1) and Lieque (LU-7) for 45 minutes prior to exercise. Dingchuan is located 0.5 cun lateral to the lower border of 7th cervical vertebra (C7). Lieque is located 1.5 cun above the radial styloid process between the tendons of brachioradialis and abductor pollicis longus (Figures 2(a) and 2(b)). A “cun” is an ancient Chinese measurement unit used to locate an acupuncture point and is the distance between the medial ends of the creases of the middle and distal interphalangeal joints of the middle finger. This finger-cun method was used for location of the acupuncture points, because our previous work has demonstrated that stimulation of the acupuncture points located by this method was effective [13, 16, 17]. The intensity of stimulation was increased until it produced a painful stimulus and then reduced until tolerable. (2)Placebo-TENS: it was identical to the Acu-TENS group except that there was no electrical current delivered by the machine to the subject. To enhance Placebo credibility, a display of an intensity output light and a countdown of intervention timer were activated.

Figure 1: Flow diagram of the study procedure.

(a)

(b)

Figure 2: Electrode placement over (a) Dingchuan (EX-B1), (b) Lieque (LU 7).

Skin area over the selected acupuncture points was cleaned with an alcohol swab. Four electrodes of 20 × 20 mm², filmed with aqueous gel, were then placed over the points and attached to a dual channel portable TENS unit (ITO 320; ITO Co. Ltd; Japan). Stimulation frequency was adjusted to 2 Hz, with a pulse width of 200 μs. Prior to data collection, voltage, pulse width, and frequency output from the TENS unit were verified as being consistent and accurate by means of a 100 MHz Oscilloscope (MSO6014A; Agilent Technologies; USA). Subjects were informed that, depending on the frequency used, they might or might not feel electrical stimulation during the intervention.

Subjects were then asked to perform treadmill exercise adopting the Bruce protocol which was terminated when maximal exercise intensity was reached [18] or when the subject felt too tired or short of breath to continue the exercise. Lung function parameters and heart rate were measured in a sitting posture, immediately after, and at 15, 30, and 45 minutes after exercise. Exercise duration, rate of perceived exertion (RPE), and peak heart rate (PHR) were recorded at the termination of exercise. Room temperature and relative humidity in the laboratory were maintained at constant levels during both visits.

3. Statistical Analysis

Demographic and baseline data including age, height, weight, and body mass index (BMI) were recorded. Pre-exercise heart rate, FEV₁, FVC, percentage of predicted FEV₁ and FVC, exercise duration, PHR, percentage of maximal heart rate, and RPE reached at the end of exercise were recorded at the 2 visits and were compared by paired -test. Percentage changes of FEV₁ and FVC at each time point (i.e., immediately after, and at 15, 30, and 45 minutes postexercise) were compared between the Acu-TENS and Placebo-TENS groups using repeated measures ANOVA followed by post hoc analysis. All data were analysed using the statistical software (SPSS for Windows version 16; SPSS, Chicago, IL). Type I error level was set at .

4. Results

Eleven male subjects participated in the study. Their mean age (±SEM) and BMI were 25.0 ± 1.3 years and 23.4 ± 1.4 kgm⁻², respectively. The mean cun was 2.1 ± 0.0 cm. Nine subjects undertook daily exercise and participated in regular soccer matches. Ten were nonsmokers while one was an exsmoker who had stopped smoking for 2 years. All subjects had basal FEV₁ and FVC which were more than 85% of the predicted value and an FEV₁/FVC ratio >75%. There were no differences in preintervention baseline variables between the two visits () (Figure 3). No adverse effect was reported.

Figure 3: Baseline physiological parameters recorded before interventions.

The findings showed that the percentage of maximal heart rate reached was 92.6 ± 2.5% with Acu-TENS and 93.3 ± 2.8% with Placebo-TENS at termination of exercise (Table 1, Figure 4). Exercise duration was, however, longer with Acu-TENS when compared with Placebo-TENS intervention by 0.9 min (), but there were no differences in PHR and RPE between the two interventions (Table 1, Figure 4).

Table 1: Variables recorded at different postexercise time points.

Acu-TENS
Placebo-TENS
Mean difference Acu-TENS − Placebo-TENS (95%CI)
value

Peak heart rate (beats per min)
180.7 ± 5.7
182.1 ± 6.0
−1.4 (−7.1 to 4.3)
.606

Heart Rate, % maximum
92.6 ± 2.5
93.3 ± 2.8
−0.7 (−3.7 to 2.2)
.601

Rate of perceived exertion
17.0 ± 0.4
17.2 ± 0.5
−0.2 (−0.6 to 0.2)
.341

Exercise duration, min
17.1 ± 0.5
16.1 ± 0.6
0.9 (0.1 to 1.7)
.026†

Δ FEV₁ postexercise, %

    0 min
3.4 ± 1.4
0.5 ± 0.9
2.9 (−0.6 to 6.4)
.098

    15 min
3.1 ± 1.7
−0.2 ± 1.1
3.3 ( 0.9 to 5.8)
.013†

    30 min
2.5 ± 1.3
−1.0 ± 1.2
3.5 (−1.3 to 8.3)
.135

    45 min
3.0 ± 1.2
−2.1 ± 1.2
5.1 (0.1 to 10.1)
.047†

Δ FVC postexercise, %

    0 min
−3.0 ± 1.6
−2.6 ± 1.3
−0.4 (−3.5 to 2.7)
.784

    15 min
0.0 ± 1.3
0.5 ± 1.3
−0.5 (−3.7 to 2.8)
.763

    30 min
0.0 ± 1.1
0.1 ± 1.4
−0.1 (−3.5 to 3.4)
.974

    45 min
−0.2 ± 1.0
−1.0 ± 1.7
0.8 (−3.6 to 5.2)
.705

Data are mean ± SEM unless otherwise indicated. † denotes ; FEV₁: forced expiratory volume in one second, FVC: forced vital capacity, HR: heart rate; Δ denotes percentage change: (postexercise data − pre-exercise data)/pre-exercise data × 100%.

Figure 4: Variables recorded immediately postexercise. RPE: rate of perceived exertion; † denotes .

After exercise, there was an increase in FEV₁ of 2.5% to 3.4%, over all time points in the Acu-TENS group. Placebo-TENS group showed a slight increase in FEV₁ immediately after exercise but then a decrease of FEV₁ 45 minutes postexercise. Between-group differences in the percentage change of FEV₁ were significant at 15 minutes (3.3 ± 1.1% ()) and 45 minutes (5.1 ± 2.2% ()) (Table 1, Figure 5(a)). The change in FVC did not reach a statistically significant level (Table 1, Figure 5(b)).

(a)

(b)

Figure 5: Percentage change in postexercise (a) Forced Expiratory Volume in 1 second (FEV₁) and (b) Forced Vital Capacity (FVC). † denotes .

5. Discussion

Our study demonstrated that subjects after Acu-TENS had an increase in FEV₁ after exercise while a reduction in postexercise FEV₁ was associated with Placebo-TENS. Such a difference was statistically significant at 15 and 45 minutes after exercise. Subjects who received Acu-TENS could exercise for a longer duration at near maximal exercise intensity (>90% of their predicted heart rate maximum) compared to when they received Placebo-TENS treatment.

Airway diameter is primarily influenced by parasympathetic nervous system fibres with sparse sympathetic innervations [19]. Parasympathetic control dominates at rest, but vagal tone is reduced or even abolished during exercise [20], thereby leading to relaxation of the airway smooth muscle and consequently, bronchodilation. This mechanism is a possible explanation for the initial increase in FEV₁ observed immediately after exercise in our subjects, irrespective of the intervention. Respiratory data in our Placebo-TENS group were similar to those reported by de Bisschop and coworkers [21]. In their cohort of healthy subjects, a bronchodilation effect appeared during exercise but lasted only 90 seconds after exercise, followed by an immediate increase in airway resistance. It has been suggested that this postexercise bronchoconstrictor effect is mediated by the prompt restoration of vagal tone at exercise cessation [22].

Whether any immediate change in airway calibre occurs in healthy subjects, during and/or after exercise, has been a controversial issue [2]. Some researchers have reported no change in airway resistance during exercise [23–25], while others, a decrease [26, 27]. Variation in exercise intensity and duration among these studies may account for the inconsistent findings. In this current study, subjects receiving Acu-TENS demonstrated an increase in postexercise FEV₁ which was maintained for 60 minutes. They were also able to exercise at sub-maximal exercise intensity for almost a minute longer than subjects in the Placebo-TENS group.

Low-frequency, high-intensity TENS has been shown to trigger the release of endorphin [28–30]. Effect of endorphin on the respiratory centre has been reported to suppress exercise-induced hyperventilation [31–33]. Stimulation of opioid μ-receptors was shown to specifically augment beta-adrenoceptor-mediated bronchodilation in a canine model [34]. Sluka and Walsh [35] conducted a series of animal studies which demonstrated that the type of opioid release induced by TENS is frequency dependent. Furthermore, low-frequency, high-intensity TENS was reported to be effective in triggering μ- and δ-opioid receptors [30]. Stimulation of these opioid receptors can affect respiratory control leading to a decrease in respiratory rate [33, 36, 37]. Our recent work has demonstrated that 45 minutes of Acu-TENS improved FEV₁ and diminished dyspnoea sensation in patients with chronic obstructive pulmonary disease, and these effects were associated with an increase in blood endorphin levels [16, 17]. Furthermore, the improvement in FEV₁ was only demonstrable in patients in whom the electrical stimulation was applied over acupuncture points and not in the patient cohort treated with non-acupoint stimulation (electrical stimulation over the patella). This suggests that the effect of Acu-TENS on FEV₁ is point specific [16].

Muscle contractions resulting from low-frequency, high-intensity TENS will excite large diameter afferents [11, 12], stimulation of which has been shown to release endogenous opioids [11, 30]. Neural output from the respiratory centre is influenced by exercise-induced opioid release [32]. It is postulated that Acu-TENS applied prior to exercise will excite large diameter afferents both directly and indirectly though muscle contractions, which trigger the release of endogenous opioids, which then continues during exercise. The duration of endogenous opioid effect can last more than 1 hour [38], and this might explain the sustained increase in FEV₁ after exercise. Endogenous opioid release during exercise may attenuate ventilatory limitation during exercise either centrally at the respiratory centre and/or peripherally by directly lowering airway resistance, thereby prolonging exercise duration (Figure 6).

Figure 6: A hypothetical diagram illustrating a mechanism of effect on exercise duration and postexercise airway response of Acu-TENS.

An increase in sympathetic tone in bronchial muscle is associated with bronchodilation, while an increase in parasympathetic tone induces bronchoconstriction [39]. Stimulation of certain acupuncture points such as NeiGuan (PC6) is believed to induce an increase in parasympathetic tone, thereby affecting the heart rate [40]. The improvement in FEV₁ in our subject cohort after Acu-TENS could be associated with changes in autonomic nervous system activity. Investigation of the effects of Acu-TENS on the autonomic nervous system was however beyond the scope of this current study.

Table 1 showed a 3.3% and 5.1% between-group difference in FEV₁ at 15 and 45 minutes, respectively, after exercise. This change corresponds to an expired volume of less than 200 mL. Such a degree of change is not considered “clinically significant” [41]. However, as Gotshall [2] pointed out, in normal individuals, the airway calibres are in a near-maximal or maximally dilated state, and so further dilation upon exercise is likely to be of small magnitude. Kagawa and Kerr [27] and Warren and coworkers [42], however, showed that exercise induced a powerful bronchodilating effect in healthy individuals, but the airways of their subjects were “preconstricted” by oral propanolol prior to the exercise. Although the magnitude of improvement in FEV₁ in our subjects with normal airway diameter appeared to be small, the relative change induced in subjects with reactive or narrowed airways may be of greater clinical significance.

In summary, this study demonstrated that the application of Acu-TENS produced a slight but significant increase in postexercise FEV₁ together with a capacity to prolong sub-maximal exercise duration. Our hypothesis that the sustained increase in postexercise FEV₁ could be a result of endogenous opioid neurohumoral modulation and/or a consequence of altered autonomic nervous system activity requires further investigation.

6. Conclusion

Contrary to Placebo-TENS, our findings showed a statistically significant enhancement of postexercise FEV₁ and prolongation of sub-maximal exercise duration after administration of Acu-TENS in subjects with normal health. In other words, Acu-TENS, a noninvasive modality, is able to attenuate the drop in FEV₁ and enhance the respiratory response to exercise. Our study suggests that Acu-TENS has the potential to improve the postexercise FEV₁ and may have a role in extending the duration of exercise training.

Acknowledgment

This project was partially supported by the University Niche Area Grant, The Hong Kong Polytechnic University.

References

W. D. McArdle, F. I. Katch, and V. L. Katch, Essentials of Exercise Physiology, Lippincott Williams & Wilkins, Philadelphia, Pa, USA, 2000.

R. W. Gotshall, “Airway response during exercise and hyperpnoea in non-asthmatic and asthmatic individuals,” Sports Medicine, vol. 36, no. 6, pp. 513–527, 2006.

G. Liu, A. Hyodo, and Q. Cao, Fundamentals of Acupuncture and Moxibustion, Tianjin Science & Technology Translation, Tianjin, China, 1994.

K. Jobst, J. H. Chen, K. McPherson, et al., “Controlled trial of acupuncture for disabling breathlessness,” Lancet, vol. 2, no. 8521, pp. 1416–1419, 1986.

S. Joos, C. Schott, H. Zou, V. Daniel, and E. Martin, “Immunomodulatory effects of acupuncture in the treatment of allergic asthma: a randomized controlled study,” Journal of Alternative and Complementary Medicine, vol. 6, no. 6, pp. 519–525, 2000.

K. P. Fung, O. K. W. Chow, and S. Y. So, “Attenuation of exercise-induced asthma by acupuncture,” Lancet, vol. 2, no. 8521, pp. 1419–1422, 1986.

A. White, S. Hayhoe, A. Hart, et al., “Adverse events following acupuncture: prospective survey of 32 000 consultations with doctors and physiotherapists,” Acupuncture in Medicine, vol. 19, pp. 84–92, 2001.

L. Lao, G. R. Hamilton, J. Fu, and B. M. Berman, “Is acupuncture safe? A systematic review of case reports,” Alternative Therapies in Health and Medicine, vol. 9, no. 1, pp. 72–83, 2003.

A. J. Robinson, “Transcutaneous electrical nerve stimulation for the control of pain in musculoskeletal disorders,” Journal of Orthopaedic and Sports Physical Therapy, vol. 24, no. 4, pp. 203–226, 1996.

J. Q. Wang, L. Mao, and J. S. Han, “Comparison of the antinociceptive effects induced by electroacupuncture and transcutaneous electrical nerve stimulation in the rat,” International Journal of Neuroscience, vol. 65, no. 1–4, pp. 117–129, 1992.

M. F. Levin and C. W. Y. Hui-Chan, “Conventional and acupuncture-like transcutaneous electrical nerve stimulation excite similar afferent fibers,” Archives of Physical Medicine and Rehabilitation, vol. 74, no. 1, pp. 54–60, 1993.

B. Pomeranz and D. Paley, “Electroacupuncture hypalgesia is mediated by afferent nerve impulses: an electrophysiological study in mice,” Experimental Neurology, vol. 66, no. 2, pp. 398–402, 1979.

L. C. T. Cheung and A. Y. M. Jones, “Effect of Acu-TENS on recovery heart rate after treadmill running exercise in subjects with normal health,” Complementary Therapies in Medicine, vol. 15, no. 2, pp. 109–114, 2007.

R. O. Crapo, R. Casaburi, A. L. Coates, P. L. Enright, J. L. Hankinson, C. G. Irvin, N. R. MacIntyre, R. T. McKay, J. S. Wanger, S. D. Anderson, D. W. Cockcroft, J. E. Fish, and P. J. Sterk, “Guidelines for methacholine and exercise challenge testing—1999,” American Journal of Respiratory and Critical Care Medicine, vol. 161, no. 1, pp. 309–329, 2000.

M. R. Miller, J. Hankinson, V. Brusasco, F. Burgos, R. Casaburi, A. Coates, R. Crapo, P. Enright, C. P. M. van der Grinten, P. Gustafsson, R. Jensen, D. C. Johnson, N. MacIntrye, R. McKay, D. Navajas, O. F. Pedersen, R. Pellegrino, G. Viegi, and J. Wagner, “Standardisation of spirometry,” European Respiratory Journal, vol. 26, no. 2, pp. 319–338, 2005.

S. P. C. Ngai, A. Y. M. Jones, C. W. Y. Hui-Chan, F. W. S. Ko, and D. S. C. Hui, “Effect of 4 weeks of Acu-TENS on functional capacity and β-endorphin level in subjects with chronic obstructive pulmonary disease: a randomized controlled trial,” Respiratory Physiology and Neurobiology, vol. 173, pp. 29–36, 2010.

S. P. C. Ngai, A. Y. M. Jones, C. W. Y. Hui-Chan, H. P. M. Yu, and C. Q. He, “Acute effects of Acu-TENS on FEV₁ and blood-endorphin level in subjects with COPD,” Alternative Therapies in Health and Medicine. In press.

J. Kang, E. C. Chaloupka, M. A. Mastrangelo, G. B. Biren, and R. J. Robertson, “Physiological comparisons among three maximal treadmill exercise protocols in trained and untrained individuals,” European Journal of Applied Physiology, vol. 84, no. 4, pp. 291–295, 2001.

R. W. Costello and A. D. Fryer, “Cholinergic mechanisms in asthma,” in Asthma, P. J. Barnes, M. M. Gruenstein, A. R. Leff, and A. J. Woolcock, Eds., pp. 965–984, Lippincott-Raven, New York, NY, USA, 1997.

A. Pichon, M. Roulaud, A. Denjean, and C. de Bisschop, “Airway tone during exercise in healthy subjects: effects of salbutamol and ipratropium bromide,” International Journal of Sports Medicine, vol. 26, no. 5, pp. 321–326, 2005.

C. de Bisschop, A. Pichon, H. Guénard, and A. Denjean, “Accounting for flow dependence of respiratory resistance during exercise,” Respiratory Physiology and Neurobiology, vol. 136, no. 1, pp. 65–76, 2003.

R. Perini, C. Orizio, A. Comande, M. Castellano, M. Beschi, and A. Veicsteinas, “Plasma norepinephrine and heart rate dynamics during recovery from submaximal exercise in man,” European Journal of Applied Physiology and Occupational Physiology, vol. 58, no. 8, pp. 879–883, 1989.

R. Gilbert and J. H. Auchincloss, “Mechanics of breathing in normal subjects during brief, severe exercise,” Journal of Laboratory and Clinical Medicine, vol. 73, no. 3, pp. 439–450, 1969.

D. G. Stubbing, L. D. Pengelly, J. L. C. Morse, and N. L. Jones, “Pulmonary mechanics during exercise in normal males,” Journal of Applied Physiology, vol. 49, no. 3, pp. 506–510, 1980.

K. C. Beck, R. E. Hyatt, P. Mpougas, and P. D. Scanlon, “Evaluation of pulmonary resistance and maximal expiratory flow measurements during exercise in humans,” Journal of Applied Physiology, vol. 86, no. 4, pp. 1388–1395, 1999.

N. M. Lefcoe, “The time course of maximum ventilatory performance during and after moderately heavy exercise,” Clinical Science, vol. 36, no. 1, pp. 47–52, 1969.

J. Kagawa and H. D. Kerr, “Effects of brief graded exercise on specific airway conductance in normal subjects,” Journal of Applied Physiology, vol. 28, no. 2, pp. 138–144, 1970.

D. L. Turner, “Cardiovascular and respiratory control mechanisms during exercise: an integrated view,” Journal of Experimental Biology, vol. 160, pp. 309–340, 1991.

M. Eriksson and B. Sjölund, “Acupuncture-like electroanalgesia in TNS resistant chronic pain,” in Sensory Functions of the Skin, Y. Zotterman, Ed., pp. 575–581, Pergamon Press, New York, NY, USA, 1976.

J. S. Han and Q. Wang, “Mobilization of specific neuropeptides by peripheral stimulation of identified frequencies,” News in Physiological Sciences, vol. 7, pp. 176–180, 1992.

J. H. Mitchell and R. F. Schmidt, “Cardiovascular reflex control by afferent fibres from skeletal muscle receptors,” in Handbook of Physiology. The Cardiovascular System, J. T. Shepherd and F. M. Abboud, Eds., vol. 3, part II, pp. 623–658, American Physiology Society, Bethesda, Md, USA, 1983.

P. Thoren, J. S. Floras, P. Hoffmann, and D. R. Seals, “Endorphins and exercise: physiological mechanisms and clinical implications,” Medicine and Science in Sports and Exercise, vol. 22, no. 4, pp. 417–428, 1990.

K. Takita, E. A. P. Herlenius, S. G. E. Lindahl, and Y. Yamamoto, “Actions of opioids on respiratory activity via activation of brainstem μ-, δ- and κ-receptors; an in vitro study,” Brain Research, vol. 778, no. 1, pp. 233–241, 1997.

E. Tagaya, J. Tamaoki, A. Chiyotani, and K. Konno, “Stimulation of opioid mu-receptors potentiates beta adrenoceptor-mediated relaxation of canine airway smooth muscle,” Journal of Pharmacology and Experimental Therapeutics, vol. 275, no. 3, pp. 1288–1292, 1995.

K. A. Sluka and D. Walsh, “Transcutaneous electrical nerve stimulation: basic science mechanisms and clinical effectiveness,” Journal of Pain, vol. 4, no. 3, pp. 109–121, 2003.

A. Liguori, W. H. Morse, and J. Bergman, “Respiratory effects of opioid full and partial agonists in rhesus monkeys,” Journal of Pharmacology and Experimental Therapeutics, vol. 277, no. 1, pp. 462–472, 1996.

Y. F. Su, R. W. McNutt, and K. J. Chang, “Delta-opioid ligands reverse alfentanil-lnduced respiratory depression but not antinociception,” Journal of Pharmacology and Experimental Therapeutics, vol. 287, no. 3, pp. 815–823, 1998.

D. Walsh, “Transcutaneous electrical nerve stimulation,” in Acupuncture and Related Techniques in Physical Therapy, V. Hopwood, M. Lovesey, and S. Mokone, Eds., pp. 111–118, Churchill Livingstone, Singapore, 1997.

L. Lundy-Ekman, Neuroscience Fundamentals for Rehabilitation, Saunders Elsevier, St. Louis, Mo, USA, 2007.

S. T. Huang, G. Y. Chen, H. M. Lo, J. G. Lin, Y. S. Lee, and C. D. Kuo, “Increase in the vagal modulation by acupuncture at Neiguan point in the healthy subjects,” American Journal of Chinese Medicine, vol. 33, no. 1, pp. 157–164, 2005.

R. Pellegrino, G. Viegi, V. Brusasco, R. O. Crapo, F. Burgos, R. Casaburi, A. Coates, C. P. M. van der Grinten, P. Gustafsson, J. Hankinson, R. Jensen, D. C. Johnson, N. MacIntyre, R. McKay, M. R. Miller, D. Navajas, O. F. Pedersen, and J. Wanger, “Interpretative strategies for lung function tests,” European Respiratory Journal, vol. 26, no. 5, pp. 948–968, 2005.

J. B. Warren, S. J. Jennings, and T. J. H. Clark, “Effect of adrenergic and vagal blockade on the normal human airway response to exercise,” Clinical Science, vol. 66, no. 1, pp. 79–85, 1984.