Evidence-Based Complementary and Alternative MedicineVolume 2012 (2012), Article ID 320760, 8 pagesdoi:10.1155/2012/320760

Research Article

Adverse Drug Reactions in a Complementary Medicine Hospital: A Prospective, Intensified Surveillance Study

M. Süsskind,¹ P. A. Thürmann,² C. Lüke,¹ E. Jeschke,¹ M. Tabali,¹ H. Matthes,¹ and T. Ostermann³

¹Research Institute Havelhöhe, Gemeinschaftskrankenhaus Havelhöhe, 14089 Berlin, Germany²Philipp-Klee Institute of Clinical Pharmacology, HELIOS KlinikumWuppertal, Witten/Herdecke University, 42283 Wuppertal, Germany³Center for Integrative Medicine, Witten/Herdecke University, 58313 Herdecke, Germany

Received 22 August 2011; Revised 6 November 2011; Accepted 23 November 2011

Academic Editor: Arndt Büssing

Copyright © 2012 M. Süsskind et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Background. Anthroposophic medicine is one of the widely used approaches of complementary and alternative medicine. However, few prospective studies have generated safety data on its use. Objectives. We aimed to assess adverse drug reactions (ADRs) caused by anthroposophical medicines (AMEDs) in the anthroposophical Community Hospital Havelhoehe, GERMANY. Study Design and Methods. Between May and November 2007, patients of six medical wards were prospectively assessed for ADRs. Suspected ADRs occurring during hospitalization were documented and classified in terms of organ manifestation (WHO SOC-code), causality (according to the Uppsala Monitoring Centre WHO criteria), and severity. Only those ADRs with a severity of grade 2 and higher according to the CTCAE classification system are described here. Results. Of the 3,813 patients hospitalized, 174 patients (4.6%) experienced 211 ADRs (CTCAE grade 2/3 , 90.5%, CTCAE grade 4/5 , 9.5%) of which 57 ADRs (27.0%) were serious. The median age of patients with ADRs (62.1% females) was 72.0 (IQR: 61.0; 80.0). Six patients (0.2%) experienced six ADRs (2.8% of ADRs) caused by eight suspected AMEDs, all of which were mild reactions (grade 2). Conclusion. Our data show that ADRs caused by AMEDs occur rarely and are limited to mild symptoms.

1. Introduction

The term “complementary and alternative medicine” (CAM) describes a variety of approaches to medical theory and practice including homeopathy, herbal medicine, naturopathy, anthroposophic medicine, and traditional Chinese medicine, all of which are becoming increasingly accepted by practitioners of conventional medicine [1, 2]. One of the main reasons for such a high level of interest and demand for complementary medicine is the belief of patients and physicians that “natural” products or services are safer than conventional allopathic products [3]. Although there is substantial evidence that herbal medicines can cause serious adverse reactions [4], there is still a lack of knowledge on the occurrence of adverse reactions to CAM [5].

Anthroposophic medicine is one of the most frequently used traditional European approaches of CAM which involves the use of a variety of therapies, including art, music, eurythmy (movement therapy), massage, and counselling as well as anthroposophic medicines (AMEDs) [6, 7]. Anthroposophical pharmacotherapy uses substances from the mineral, plant, and animal kingdoms [8, 9]. Substances undergo a variety of pharmaceutical processes and are applied in many different dilutions like in homeopathy, but also in different preparations and combinations. Apart from drug intake, AMEDs may also be applied as external treatments with oils, ointments, and plant extracts.

Only few prospective studies have generated safety data on AMEDs and most of them result from outpatient investigations. In a prospective cohort study in 662 patients using AMED chronically only 20 patients reported possible or probable ADRs associated with AMED, none of them was serious [10, 11]. In particular, no data have been reported so far on AMED-associated ADRs occurring in hospitals.

In contrast, the nature and frequency of ADRs following the use of conventional drugs in hospitalized patients have been thoroughly studied in recent years [12–14]. Thus, comprehensive ADR surveillance in a hospital setting promises to be an efficient tool to detect all kind of ADRs and all grades of severity.

The aim of this prospective pharmocoepidemiological study was to estimate the incidence of adverse drug reactions (ADRs) with a special focus on ADRs caused by CAM and, in particular, AMEDs. We therefore conducted this study in a community hospital, where AMEDs are frequently used along with conventional drugs and therapies. In order to provide for a valid basis of our detection method and to prove comprehensiveness, ADRs associated with the use of allopathic pharmaceuticals used were also collected and can be compared with data published in the international literature [15–17].

2. Material and Methods

2.1. Patients

A prospective, comprehensive collection of ADRs on six medical wards, including two gastroenterology wards, two general internal medicine wards, one pneumology ward, and one cardiology ward, was carried out at the Community Hospital Havelhöhe (GKH) in Berlin over a six-month period between May 15 and November 15, 2007. The GKH is a community hospital with a focus on anthroposophic medicine where about 63% of inpatients on medical wards receive one or more CAM drugs (median 3 (IQR: 1; 5)), of which 92% receive at least one AMED (median 3 (IQR: 1; 5); personal communication), that is, approximately 58% of all patients admitted receive an AMED.

Almost half of patients (46%) in this study came from the geographical catchment area, 32.9% of patients admitted came from further regions within Berlin (approx. 30 km), and 21.1% were admitted from other regions in Germany or from abroad. The latter came to the GKH with the intention of receiving anthroposophic medicine.

2.2. Anthroposophic Medications (AMEDs) Used in Hospital

For this study, we used data from the hospital pharmacy to describe usage of the most frequently prescribed substances during the study period on the wards under surveillance, regardless of dilution, pharmaceutical processing, or combination with other substances (Table 1). For example, the frequently prescribed plant Arnica montana is included in 19 different preparations of AMEDs (i.e., whole plant and root preparations in 4 different dilutions, preparations of Arnica processed with four other plants, essence, gel, ointment, and oil in combination with cuprum), which are administered orally, subcutaneously, or externally.

Table 1: Most frequently prescribed anthroposophic medications (AMEDs) based on plant and metal preparationsa at the Community Hospital Havelhoehe.

Plant/metala
Main indication
Ampoules [mL]
Dilutions [mL]
Triturations [g]
Tablets []
Ointments/oils [g]

Kalanchoe daigremontiana/pinnata (cathedral bells)
Psychic agitation, restlessness, and anxiety
4512
200
745

Viscum album (mistletoe extract)
Cancer
2251

Aconitum napellus (monkshood)
(Neuropathic) Pain
1468
500

20 000

Aurum (gold)
Harmonisation of salutogenic forces
1570
2700
50

3 500

Argentum (silver)
Activation of anabolic processes
1330
90

Arnica montana (arnica)
Traumatic injury
638
4210

18 820

Fragaria vesca/Vitis vinifera (strawberry/vine leaves)
Toxic hepatic damage

8200

aComprising plants and metals in different concentrations, partly also in combination with other ingredients.

2.3. Comprehensive ADR Surveillance and Data Collection

Prior to investigation, the physicians and nurses of all participating wards were trained in order to increase awareness for ADRs according to a program developed for an educational intervention to improve primary care physicians ADR reporting [18]. Besides principles and theories of ADRs, typical ADR trigger symptoms and case studies were discussed. Clinical staff was invited to refer directly or by phone to the investigator to report potential ADRs.

A specially trained physician conducted the investigation. She visited the wards three times a week, questioned attending physicians and nurses, and examined the patients’ drug charts and medical records for evidence of potential ADRs. A set of trigger symptoms used by the German Network of Pharmacovigilance Centers [19] was applied as were changes in medication and predefined laboratory parameters surpassing specified threshold values (according to CTCAE criteria more than grade II) [20], for detection of ADRs. Nurses’ notes were screened for subjective symptoms, such as nausea, vomiting, or headache. In case of suspected ADRs, the investigator conferred with the attending physicians and nurses.

Patient data collected included age, gender, weight, height, date of admission and discharge, Kanofsky index (if applicable), all diagnoses (ICD-10), and drugs (dose, route, and duration of administration). ADR description included start, duration and outcome, suspected drug(s), and management strategies (e.g., drug withdrawal, dose reduction, and additional treatment).

Patients with ADRs obviously resulting in hospital admission and chemotherapy-induced ADRs (such as nausea, vomiting, and leucopenia) were excluded in the study protocol. Recurrences of clostridium-associated diarrhea were subsumed as one ADR.

2.4. Assessment and Classification of ADRs

ADRs were classified according to the definition of Edwards and Aronson [21]. We restricted ADR classification to type A, pharmacologic effects which are dose dependent and predictable, and type B, effects which are dose independent and unpredictable, which are the most frequent and accessible types of ADRs recognized in the literature. CIOMS criteria were applied for case definitions [22]. As sources of information for the verification of potential adverse effects, the manufacturer’s summary of product characteristics [23], Lexi-Comp Online [24], a Handbook of ADRs [25], and Medline search were used.

Suspected ADRs were assessed and defined according to internationally accepted criteria [22] and classified in terms of organ manifestation (WHO SOC-code), causality [26, 27], and severity [20]. Causality was defined and assessed according to definitions of the Uppsala Monitoring Centre and was classified as certain, probable/likely, possible, unlikely, conditional/unclassified, or unassessable/unclassifiable. Only “possible,” “probable,” and “definite” ADRs were taken into consideration; such were also classified in terms of causality according to Naranjo et al. [26]. Furthermore, ADRs were classified according to the International Conference on Harmonization criteria as serious and nonserious, as well as in terms of severity according to the Common Terminology Criteria for Adverse Events (CTCAE) in grades 1 to 5 (mild-letal) [20, 26, 28, 29].

Assessment for causality and severity was done independently by at least two investigators. Internal quality assurance proceedings were arranged in regular meetings with the clinical pharmacologist. In addition, if any discrepancies in scoring were discussed between the investigators in conjunction with the clinical pharmacologist, specific medical questions were reconsidered with the respective medical specialist. The consent attained this way was accepted as the final ADR classification.

2.5. Mistletoe-Induced ADRs

Although mistletoe (Viscum album) can be considered a herbal chemotherapeutic agent due to its cytotoxic properties, we decided to include mistletoe-associated ADRs although ADRs following allopathic cytotoxic drugs had been excluded. Other characteristics, such as modulation of the immune system, have been shown for mistletoe [30–33]. As a consequence, mistletoe is prescribed as a remedy for diverse diseases, for example, rheumatological diseases, hepatitis, and cancer and can be coded using three different ATC codes (L01CP01 plant cytostatics, M09AP06 plant preparations for musculoskeletal disorders, and C02KP02 plant antihypertensive).

Due to its immunomodulating properties mistletoe provokes local (reddening and swelling) and systemic (rise in temperature/fever) reactions, which can be considered type A reactions according to Rawlins [34].

Reactions exceeding the expected measure were classified separately for intravenous or local application and documented in a special section in the database. The criteria are listed below and follow CTCAE criteria: increase of body temperature axillary >38.0°C (CTCAE II°, hypersensitivity including drug reaction); reddening at the assured injection site >50 mm (CTCAE I); itching exceeding the injection site (CTCAE II, pruritus/itching); local swelling >10 mm (CTCAE II°II); swelling of the lymph node >10 mm; unexpected, uncharacteristic reaction.

2.6. Collection and Documentation of Drug Prescriptions

Data on medicines prescribed in the hospital were collected and recorded manually. In order to achieve a high completeness of data, the recording of all drugs, including causative drugs, was performed only for patients with an ADR and not for patients without a suspected ADR.

ADR-associated drugs were classified by the anatomical therapeutic chemical (ATC) code.

2.7. Data Analysis

Collected data were structured hierarchically, allowing for evaluation of a patient and the admission and ADR level using the database QuaDosta, a PostgreSQL database [35]. All statistical analyses were performed using SPSS 16.0 for Windows. Descriptive analysis was used to determine patients with ADRs and ADR frequencies according to SOC code, ATC code, and severity. Medians and interquartile ranges (IQRs) were calculated for continuous, not normally distributed data. The two-tailed chi-square test was used to analyze differences in proportions and the median test was used to analyze age differences. A -value of less than 0.05 was regarded as indicating a statistically significant difference. Subgroup analyses were performed for drug groups according to ATC code.

3. Results

3.1. Patient Characteristics

Over a six-month period, a total of 3,813 patients (2,063 females; 54.1%) with a mean age ofyears, median 55 years, were admitted, stayed at least one night, and were assessed for ADRs (Table 2).

Table 2: Demographic data of admitted patients and of patients suffering from ADRsa.

Patients with ADR
Hospitalized patients

Number (%)
174 (4.6)
3813

Gender ( male/ female, %)
43/131 (62.1)**
1750/2063 (54.1)

Age (median, IQR)
72, 61.0; 80.0 **
67, 55.0; 77.0

aMultiple hospitalizations of the patients were counted as separate cases of the same patient. ** all hospitalized versus patients with ADR.

The leading admittance diagnoses were coronary heart disease (5.9%), fatigue (3.5%), dyspnoea (2.7%), pain (2.7%), pneumonia (2.2%), and lung cancer (2.2%).

12.9% of the patients had different types of cancer, 3.5% received chemotherapy, and 9.1% received mistletoe during the hospital stay.

174 patients (4.6%) experienced at least one ADR during their stay in hospital (ADR). The ADR-experiencing patients were more likely to be female (62.1% females, ) and older when compared to patients without ADR (median age 72 years, IQR 61.0; 80.0, see Table 2, ).

3.2. ADRs

A total of 211 ADRs (including the 6 ADRs caused by CAM) were detected and documented on the basis of WHO/UMC criteria. They were judged as probable in 123 cases (59%), 72 were judged as likely (34%), and 10 as definite (5%). This assessment was in good accordance with the Naranjo scoring, where 105 ADRs were considered probable (49.8%), 99 possible (46.9%), and seven as highly probable (3.3%).The greater number of ADRs with (84.4%) were identified as type A reactions.

Distribution of severity and seriousness of ADR is shown in Table 3. The majority of ADRs were of severity grades II and III and 26.1% were deemed serious according to [36] (see Table 3). Of these 55 serious ADRs, 33 led to a prolongation of the hospital stay and 20 were life threatening or potentially life threatening. Eleven patients with serious ADRs did not fully recover, two patients died: one from acute renal failure (vancomycin and gentamicin) and one from Salmonella sepsis (prednisolone).

Table 3: Characterization of adverse drug reactions (ADRs) of hospital in-patients according to severity grade and seriousness.

ADR characteristics

Total number identified
211

Severity grade CTCAE (, %)

    II/III
191, 90.5%

    IV/V
19, 9.5%

Serious (, %)
55, 26.1%

All 156 nonserious ADRs abated without sequelae and the outcome of four patients was unknown.

The organ systems mainly affected were the gastrointestinal tract (, 52%; main symptoms: diarrhea , constipation , nausea , GI-bleeding , and gastric ulcer ), the CNS (, 17%; main symptoms: vertigo , somnolence , and headache ), and psychiatric disorders (, 11.4%; main symptoms: psychosis , disorientation , and aggressiveness ). The most frequent adverse effects overall were diarrhea, constipation, nausea, and antibiotic-associated diarrhea.

3.3. Drugs Associated with ADRs

Altogether 389 (multiple nominations possible) drugs were associated with 211 ADRs. All drugs causing the ADRs were initiated in the hospital. The most common groups of ADR-related drugs were anti-infectives (, 32%) followed by opiates (, 12%), cardiovascular drugs (, 12.3%), steroids (, 9%), and antithrombotics (, 8.7%) (see Table 4).

Table 4: Drugs most frequently associated with the identified adverse drug reactions (ADRs)a.

Drug group (ATC-Code)
No (%) ADRs
Drugs (number of ADRs for each causative drug)
Adverse drug reactions main symptoms
CTCAE severity upgrade ()

Opioids (N02A)
35
Morphine (23), fentanyl (4), tramadol (4), oxycodone/naloxone (1), hydromorphone (1), oxycodone (1), and piritramide (1)
Constipation (19), nausea (9), nightmares (3), itching (1), disorientation (1), seizure (1), vomiting (1), emesis (1), hyperacusis (1), sedation (1), and haemolytic anaemia (1)
Grade II (28) grade III (7)

Penicillin/beta-lactamase inhibitors (J01C)
40
Sultamicillin (17), piperacillin (14), combactam (8), and amoxicillin (1)
Diarrhoea (10), C. difficile-associated diarrhoea (6), nausea (3), dyspnoea (2), emesis (2) allergic reactions (2), drug eruption (1), renal failure (1), and vaginal mycosis (1)
Grade II (22) grade III (17), and grade IV (1)

Cephalosporin/ Carbapenem (J01D)
36
Cefuroxime (23), ceftriaxone (10), and imipenem/cilastatin (3)
C. difficile-associated diarrhoea (12), diarrhoea (6), drug eruption (6), anaphylactic reaction grade III (1), seizures (1), tongue swelling (1), angioedema (1), renal failure (1), and collapse (1)
Grade II (16), grade III (16), grade IV (3), grade V (1)

Corticosteroids for Systemic Use (H02AB)
17
Prednisolone (7), dexamethasone (4), prednisone (5), and methylprednisolone (1)
Hyperglycaemia (10), psychotic reaction (2), confusion (1), hypertension (1), cephalgia (1), secondary sepsis (1), gastric ulcer (1), and oesophagitis (1)
Grade II (2), grade III (11), grade IV (4), and grade V (1)

Platelet aggregation inhibitors excluding heparin (B01AC)
24
Clopidogrel (6) and ASA (18)
Bleeding (11), anaemia (2), abdominal pain (1), gastric ulcer (1), and gastritis (1)
Grade II (14), grade III (4), and grade IV (6)

Loop diuretics (C03CA)
16
Furosemide (10) and torasemide (6)
Renal failure acute or chronic (12), hypotension (2), exsiccosis (2), itching (1), uraemia (1), pemphigoid reaction (1), and electrolyte disorder (1)
Grade II (9), grade III (4) grade IV (1), and grade V (2)

Quinolones (J01M)
15
Levofloxacin (7), ciprofloxacin (7), and moxifloxacin (1)
C. difficile-associated diarrhoea (2), diarrhoea (2), and increase in GT (2), alkaline phosphatase (2), vertigo (1), seizure (1), and constipation (1)
Grade II (6) and grade III (9)

Macrolides (J01F)
13
Clarithromycin (9) and clindamycin (4)
C. difficile-associated diarrhoea (5), diarrhoea (3), membranous colitis (1), drug fever, (1) allergic reaction (1), and drug eruption (1)
Grade II (7) and grade III (6)

Heparin group (B01AB)
10
Enoxaparin (8) and heparin (2)
Bleeding (10)
Grade II (6), grade III (2), and grade IV (2)

Oral Antidiabetics (A10B)
11
Metformin (8) and exenatide (3)
Diarrhoea (7), meteorism (4), abdominal pain (1), nausea (1), and acute renal failure (1)
Grade II (10) and grade III (1)

aMultiple drugs may be attributed to one or more symptoms, as well to severity grades (CTCAE).

3.4. ADRs Associated with AMED Medication

Altogether only six CAM-associated ADRs were detected. All associated medicaments were AMEDs. According to the CTCAE scale, all ADRs were grade II and none were serious. All patients had recovered from these ADRs at the time of discharge. Table 5 shows details of AMED-associated ADRs. Assuming that approximately 58% of all patients admitted during the surveillance period received AMED, only 0.27% (6 of 2212 AMED-exposed patients) suffered an AMED-associated ADR.

Table 5: Adverse drug reactions (ADRs) caused by complementary and alternative medicine (CAM) drugs.

Indication
Patients age, sex
Drug ingredient and route of application
Concomitant medication also possibly related* and route of application
ADR
Type of ADR
Causality

Rheumatoid arthritis
62, f
Equisetum/Formica s.c.
Arnica/levisticum s.c.
Local skin reaction (erythema)
B
Probable

Rheumatoid arthritis
62, f
Mistletoe plant extracta1 s.c.
—
Local skin reaction (erythema) (8 × 8 cm)
A
Probable

Mesothelioma cancer
65, m
Mistletoe plant extracta2 s.c.
—
Temp. >38.6°C; Local skin reaction (erythema) 15 × 10 cm
A
Probable

Breast cancer
41, f
Mistletoe plant extracta3 s.c.
Pamidronate, i.v
Temp. 39.6°C
A
Possible

Chronic hepatitis C
35, f
Fragaria vesca/Vitis vinifera p.o.

Maculopapular exanthema forearms
B
Possible

Depression
53, f
Gentiana, Bryophyllum p.o.
Metamizole p.o.
Drug eruption
B
Possible

*Drugs for which the causal relationship to the same ADR was also considered to be possible; a1Iscucin salicis A; a2Abnoba viscum fraxini 20 mg; a3Helixor M 1 mg. s.c.: subcutaneous, p.o.: per os, i.v. and intravenous.

All three mistletoe reactions (erythema and fever) occurred between 18 and 24 hours after injection, as well as the erythema after the injection of Equisetum, Formica, Arnica, and Levisticum.

The maculopapular exanthema after hepatodoron (Fragaria vesca/Vitis vinifera) affecting both forearms appeared two days after the first oral application of the drug and was considered a type IV reaction. The skin eruption appearing on the chest of the patient about 5 hours after the first oral application of Gentiana, Bryophyllum, and metamizole was judged to be a type II (cytotoxic) reaction.

4. Discussion

To our knowledge, this is the first prospective study on the burden of adverse drug reactions (ADRs) in a hospital, where patients are treated with standard drugs and complementary and alternative medicine (CAM). In this specific case, most patients were treated with anthroposophic medicine (AMED). In order to demonstrate the comprehensiveness of our detection method, ADRs caused by conventional drugs were also captured. In comparison with the literature, the estimation of 4.6% of all hospitalised patients with ADRs in our study is comparable to the results of a systematic review from 2002 by Wiffen and colleagues [37], who estimated an ADR incidence of 3.7% worldwide from studies undertaken after 1985. Our results also compare well with findings of Moore et al. on internal medicine wards where 6.6% of all patients suffered from ADRs [38]. However, Lazarou at al. estimated an ADR incidence of 10.9% in their meta-analysis of 39 prospective studies undertaken in American hospitals between 1966 and 1996 [15]. We excluded ADRs associated with chemotherapy, which are generally expected and also not recorded in some of the studies [37, 39]. Fattinger et al. report the ADR incidence of 11% in two Swiss hospitals, which is reduced after the exclusion of chemotherapy-induced ADRs to 8% [40].

When looking at drug classes responsible for ADRs, our results also correspond to data in the literature, where antibiotics, opioids, antithrombotics, and cardiovascular agents are the most frequently documented drugs associated with ADRs in hospitalized patients [39].

Discrepancies in results of all ADR studies are well known, mainly methodological differences have been found responsible and were thoroughly investigated and described [37, 39, 41]. Taken together, nature and frequency of the ADRs in our study compare well with data published in the literature for a comprehensive collection of ADRs in hospitals and prove the reliability of our approach.

4.1. ADRs Associated with the Use of AMED

Our main concern was the investigation of the burden of ADRs occurring in hospitals associated with AMED.

We detected six AMED-associated ADRs (2.8% of ADRs) in approximately 0.27% of AMED-exposed patients, all of which were of mild severity (CTCAE grade II), and none of which were serious.

In three cases, the ADR-suspected drugs were mistletoe extracts associated with three ADRs, all with a probable causality; a rise in temperature >38.5°C was recorded for two cases, whereas a local reaction with swelling and reddening in a diameter of 8 × 8 cm was observed in the other. All these reactions appeared after the first administration of the extracts to the patients. The detection of only three reactions fulfilling these criteria appears to be rather low. This is probably due to the fact that local reactions of mistletoe are an indicator of the immunomodulatory action and seen as desired reactions and therefore are not identified and documented as exceptional events or even ADRs.

Unfortunately, we cannot perform a precise incidence calculation from our data since the exact number of patients exposed is unknown. Even in the case that all 492 patients in our cohort with a diagnosis of cancer received mistletoe, 0.61% of these patients (3/492) have experienced an ADR. This calculation probably underestimates the true incidence. A comparison with the literature shows that the above-described ADRs are reported in most studies of mistletoe therapy (mostly concerning tumour patients) and are also listed in the new summary of product characteristics of the products (SPC of Helixor, Abnoba, Iscucin and Iscador). In the case of Abnoba f.ex., ADR rates between 0.9 and 47% (including local and systemic ADRs) were reported [42]. According to a clinical study of Büssing et al. 21% of patients treated with mistletoe developed an erythema >3 cm [43].

As mistletoe extract is a drug quite frequently administered in anthroposophic medicine and the most frequently prescribed complementary drug in oncology (approx. 12 mio. daily doses in 2007 in Germany) [44], this clinically important ADR should be a matter of reporting. Indeed the drug safety database of the Drug Commission of the German Medical Association (AkdÄ) includes a list of 113 reports of 349 suspected ADRs in connection with mistletoe administration up to April 2010 (personal communication). The sources of these reports include spontaneous reporting as well as systematic research. Unfortunately, causality is not uniformly assessed, and, in many cases, multiple medications were administered, thus hampering a clear correlation of ADRs and mistletoe.

There is some evidence that the local reactions and probably also the systemic ADRs (mostly elevated temperature) are dose dependent and disappear with dose reduction, whereas the individual dose causing an ADR differs widely between patients and even the same patient may react in a different way to different mistletoe preparations [45]. Almost all reported ADRs had a mild course resulting in complete recovery [42].

The three other cases of ADRs possibly associated with AMED occurred in a local reaction (erythema) following the subcutaneous injection of Equisetum and Formica and of Arnica and Levisticum. After the readjustment to oral administration of these drugs, the erythema declined. Hepatodoron (Fragaria vesca/Vitis vinifera) is one of the most frequently prescribed AMEDs in our hospital (roughly 1640 daily doses during the study period, considering the regular prescription of 4–6 tablets per day) and it is classified as a possible causative for the maculopapular exanthema. From 1990 to April 2010 two suspected ADRs from spontaneous reporting are listed for hepatodoron in the above-mentioned database of the Drug Commission of the German Medical Association.

Another ADR-suspected AMED from the list of most frequently used AMEDs was bryophyllum together with gentiana. As they were administered concomitantly with metamizole, a drug frequently associated with exanthema, the causality was classified as only possible.

In summary, all ADR-suspected AMEDs belong to the most frequently administered drugs in our hospital. Except ADRs following mistletoe injections, which are classified as probable in all cases, the causality for the other AMEDs was considered as only possible.

5. Limitations

The exclusion of chemotherapy-induced ADRs could have led to an underrating of ADRs caused by drugs given concomitantly to chemotherapy. This would apply in our study preferably to ADRs occurring after the frequently coadministered mistletoe. However, the symptoms caused by mistletoe, consisting mainly of local erythema at the injection site, differ strongly from the symptoms caused by chemotherapy (e.g., nausea, vertigo) and should not be missed.

Unfortunately, we were unable to document the medications of all patients comprehensively, precluding an exact estimation of incidence of ADRs per prescriptions or patients exposed. Moreover, in the case of AMEDs, neither dose nor duration of therapy can be standardized, as described (e.g., in the case of the pronounced interindividual reactions of patients to different doses and/or preparations of mistletoe). Therefore, a simplified calculation using the concept of daily drug doses (DDD) would give an unreliable and imprecise estimate of exposure.

As case definition and causality assessment of ADRs is an issue in all studies estimating ADRs, we undertook several measures to provide for a reliable assessment, that is, two independent physicians used two algorithms in parallel and in case of disagreements a third assessor and/or medical specialist was involved.

Finally, this study unlike others was not designed to assess effects or efficacy of AMEDs [46].

6. Conclusion

Despite the skepticism towards CAM and AMEDs [47], our data show that ADR surveillance is possible and a reasonable safety profile of AMEDS can be assumed. ADRs associated with allopathic medication detected in our study were comparable with regard to incidence and nature to published data, underlining the comprehensiveness of our prospective survey.

In summary, our results suggest that ADRs caused by AMEDs occur only with a low incidence and produce mainly mild to moderate symptoms. Since mistletoe extracts were the predominantly used AMEDs in this cohort of patients, most ADRs were associated with mistletoe extracts. This study showed the difficulties to comprehensively document the complete medications of all patients. Thus interpretation of our results must be done with great caution.

Acknowledgment

This study was supported by a grant from the University of Witten/Herdecke and Software AG Foundation.

References

B. B. O'Connor, C. Calabrese, E. Cardeña et al., “Defining and describing complementary and alternative medicine,” Alternative Therapies in Health and Medicine, vol. 3, no. 2, pp. 49–57, 1997.

O. Caspi, L. Sechrest, H. C. Pitluk, C. L. Marshall, I. R. Bell, and M. Nichter, “On the definition of complementary, alternative, and integrative medicine: societal mega-stereotypes vs. the patients' perspectives,” Alternative Therapies in Health and Medicine, vol. 9, no. 6, pp. 58–62, 2003.

S. P. Myers and P. A. Cheras, “The other side of the coin: safety of complementary and alternative medicine,” Medical Journal of Australia, vol. 181, no. 4, pp. 222–225, 2004.

M. H. Farah, R. Edwards, M. Lindquist, C. Leon, and D. Shaw, “International monitoring of adverse health effects associated with herbal medicines,” Pharmacoepidemiology and Drug Safety, vol. 9, no. 2, pp. 105–112, 2000.

N. Baber, “Complementary medicines, clinical pharmacology and therapeutics,” British Journal of Clinical Pharmacology, vol. 55, no. 3, p. 225, 2003.

I. S. Cantor and S. Rosenzweig, “Anthroposophic perspectives in primary care,” Primary Care, vol. 24, no. 4, pp. 867–887, 1997.

H. J. Hamre, C. Becker-Witt, A. Glockmann, R. Ziegler, S. N. Willich, and H. Kiene, “Anthroposophic therapies in chronic disease: the Anthroposophic Medicine Outcomes Study (AMOS),” European Journal of Medical Research, vol. 9, no. 7, pp. 351–360, 2004.

W. Otto, Remedies for Typical Diseases: Concerning the Remedies Developed by Rudolf Steiner Using New Concepts and New Methods, Mercury Press, Spring Vailley, NY, USA, 1996.

IAAP, T.I.A.o.A.P. Anthroposophic Pharmaceutical Codex APC, 2005, http://www.iaap.org.uk/

H. J. Hamre, C. M. Witt, A. Glockmann, W. Tröger, S. N. Willich, and H. Kiene, “Use and safety of anthroposophic medications in chronic disease: a 2-year prospective analysis,” Drug Safety, vol. 29, no. 12, pp. 1173–1189, 2006.

E. Jeschke, T. Ostermann, C. LüKe et al., “Remedies containing asteraceae extracts: a prospective observational study of prescribing patterns and adverse drug reactions in German primary care,” Drug Safety, vol. 32, no. 8, pp. 691–706, 2009.

S. Pourseyed, F. Fattahi, Z. Pourpak et al., “Adverse drug reactions in patients in an Iranian department of internal medicine,” Pharmacoepidemiology and Drug Safety, vol. 18, no. 2, pp. 104–110, 2009.

E. C. Davies, C. F. Green, S. Taylor, P. R. Williamson, D. R. Mottram, and M. Pirmohamed, “Adverse drug reactions in hospital in-patients: a prospective analysis of 3695 patient-episodes,” PLoS ONE, vol. 4, no. 2, Article ID e4439, 2009.

P. A. Thürmann, “Detection of drug-related adverse events in hospitals,” Expert Opinion on Drug Safety, vol. 2, no. 5, pp. 447–449, 2003.

J. Lazarou, B. H. Pomeranz, and P. N. Corey, “Incidence of adverse drug reactions in hospitalized patients: a meta-analysis of prospective studies,” Journal of the American Medical Association, vol. 279, no. 15, pp. 1200–1205, 1998.

C. Kongkaew, P. R. Noyce, and D. M. Ashcroft, “Hospital admissions associated with adverse drug reactions: a systematic review of prospective observational studies,” Annals of Pharmacotherapy, vol. 42, no. 7-8, pp. 1017–1025, 2008.

D. W. Bates, N. Spell, D. J. Cullen et al., “The costs of adverse drug events in hospitalized patients,” Journal of the American Medical Association, vol. 277, no. 4, pp. 307–311, 1997.

M. Tabali, E. Jeschke, A. Bockelbrink et al., “Educational intervention to improve physician reporting of adverse drug reactions (ADRs) in a primary care setting in complementary and alternative medicine,” BMC Public Health, vol. 9, article 274, 2009.

S. Schneeweiss, J. Hasford, M. Göttler, A. Hoffmann, A. K. Riethling, and J. Avorn, “Admissions caused by adverse drug events to internal medicine and emergency departments in hospitals: a longitudinal population-based study,” European Journal of Clinical Pharmacology, vol. 58, no. 4, pp. 285–291, 2002.

CTCAE, Common Terminology Criteria for Adverse Events v3.0 (CTCAE), 2003, http://ctep.cancer.gov/protocolDevelopment/electronic_applications/docs/ctcaev3.pdf

I. R. Edwards and J. K. Aronson, “Adverse drug reactions: definitions, diagnosis, and management,” The Lancet, vol. 356, no. 9237, pp. 1255–1259, 2000.

CIOM, Reporting adverse events Definitions of Terms and Criteria for their Use, 2000, http://www.cioms.ch/publications/reporting_adverse_drug.pdf

Fachinfo-Service, “Fachinfo-Service (SPCs) Deutschland,” acessed 2007

Lexi-Comp, Lexi-Comp Online, 2007, http://online.lexi.com/crlsql/servlet/crlonline

B. Müller-Oerlinghausen, et al., Handbuch der unerwünschten Arzneimittelwirkungen, Urban & Fischer, München, Germany, 1999.

C. A. Naranjo, U. Busto, and E. M. Sellers, “A method for estimating the probability of adverse drug reactions,” Clinical Pharmacology and Therapeutics, vol. 30, no. 2, pp. 239–245, 1981.

The Uppsala Monitoring Centre, The use of the WHO-UMC system for standardised case causality assessment, http://who-umc.org/Graphics/24734.pdf

A. L. Camargo, M. B. Cardoso Ferreira, and I. Heineck, “Adverse drug reactions: a cohort study in internal medicine units at a university hospital,” European Journal of Clinical Pharmacology, vol. 62, no. 2, pp. 143–149, 2006.

N. Tavassoli, E. Duchayne, B. Sadaba et al., “Detection and incidence of drug-induced agranulocytosis in hospital: a prospective analysis from laboratory signals,” European Journal of Clinical Pharmacology, vol. 63, no. 3, pp. 221–228, 2007.

P. W. Joller, J. M. Menrad, T. Schwarz et al., “Stimulation of cytokine production via a special standardized mistletoe preparation in an in vitro human skin bioassay,” Drug Research, vol. 46, no. 6, pp. 649–653, 1996.

B. A. Berg and G. M. Stein, “Einfluß einer Misteltherapie auf die Tumorabwehr-Eine kritische immunologische Analys,” in Die Mistel in der Tumortherapie, Grundlagenforschung und Klinik, R. B. R. Scheer, H. Becker, P. A. Berg, and V. Fintelmann, Eds., KVC Verlag, Essen, Germany, 2001.

G. M. Stein and P. A. Berg, “Characterisation of immunological reactivity of patients with adverse effects during therapy with an aqueous mistletoe extract,” European Journal of Medical Research, vol. 4, no. 5, pp. 169–177, 1999.

A. Büssing, K. Suzart, J. Bergmann, U. Pfüller, M. Schietzel, and K. Schweizer, “Induction of apoptosis in human lymphocytes treated with Viscum album L. is mediated by the mistletoe lectins,” Cancer Letters, vol. 99, no. 1, pp. 59–72, 1996.

M. D. Rawlins, “Clinical pharmacology. Adverse reactions to drugs,” British Medical Journal, vol. 282, no. 6268, pp. 974–976, 1981.

E. Jeschke, F. Schad, J. Pissarek, B. Matthes, U. Albrecht, and H. Matthes, “QuaDoSta—a freely configurable system which facilitates multi-centric data collection for healthcare and medical research,” MS Medizinische Informatik, Biometrie und Epidemiologie, 2007, http://www.egms.de/en/journals/mibe/2007-3/mibe000058.shtml

EMEA, “ICH Topic E2A: clinical safety data management: definitions and standards for expedited reporting,” T.E.A.f.t.E.o.M. Products, Editor, 1995

P. Wiffen, M. Gill, and J. Edwards, “Adverse drug reactions in hospital patients: a systematic review of the prospective and retrospective studies,” Bandolier Extra, pp. 1–16, 2002.

N. Moore, D. Lecointre, C. Noblet, and M. Mabille, “Frequency and cost of serious adverse drug reactions in a department of general medicine,” British Journal of Clinical Pharmacology, vol. 45, no. 3, pp. 301–308, 1998.

P. A. Thürmann, “Methods and systems to detect adverse drug reactions in hospitals,” Drug Safety, vol. 24, no. 13, pp. 961–968, 2001.

K. Fattinger, M. Roos, P. Vergères et al., “Epidemiology of drug exposure and adverse drug reactions in two Swiss departments of internal medicine,” British Journal of Clinical Pharmacology, vol. 49, no. 2, pp. 158–167, 2000.

M. Kvasz, I. E. Allen, M. J. Gordon et al., “Adverse drug reactions in hospitalized patients: a critique of a meta-analysis,” Medscape General Medicine, vol. 2, no. 2, p. E3, 2000.

R. Saller, F. Itzen, and M. J., “Undesired drug effects of therapy with mistletoe preparations in cancer patients-a systemic review,” R. Scheer, et al., Ed., KVC Verlag, Essen, Germany, 2005.

A. Büssing, W. Tröger, C. Stumpf, and M. Schietzel, “Local reactions to treatments with viscum album L. extracts and their association with T-lymphocyte subsets and quality of life,” Anticancer Research, vol. 28, no. 3 B, pp. 1893–1897, 2008.

U. Schwabe and D. Paffrath, “Immunotherapeutics and cytostatics,” U. Schwabe and D. Paffrath, Eds., Springer, Heidelberg, Germany, 2009.

V. F. Semiglasov, V. V. Stepula, A. Dudov, W. Lehmacher, and U. Mengs, “The standardised mistletoe extract PS76A2 improves QoL in patients with breast cancer receiving adjuvant CMF chemotherapy: a randomised, placebo-controlled, double-blind, multicentre clinical trial,” Anticancer Research, vol. 24, no. 2 C, pp. 1293–1302, 2004.

H. Matthes, W. E. Friedel, P. R. Bock, and K. S. Zänker, “Molecular mistletoe therapy: friend or foe in established antitumor protocols? a multicenter, controlled, retrospective pharmaco-epidemiological study in pancreas cancer,” Current Molecular Medicine, vol. 10, no. 4, pp. 430–439, 2010.

E. Ernst, “Anthroposophic medicine: a critical analysis,” MMW-Fortschritte der Medizin, vol. 150, supplement1, pp. 1–6, 2008.