Evidence-Based Complementary and Alternative Medicine

Volume 2013 (2013), Article ID 329392, 5 pages

http://dx.doi.org/10.1155/2013/329392

Review Article

Factors Contributing to De Qi in Acupuncture Randomized Clinical Trials

Yi Yang, Lin-Peng Wang, Lei Zhang, Li-Chen Wang, Jia Wei, Jia-Jian Li, and Yi-Le Sun

Acupuncture and Moxibustion Department, Beijing Hospital of Traditional Chinese Medicine, Capital Medical University, 23 Meishuguanhou Street, Dongcheng District, Beijing 100010, China

Received 12 April 2013; Accepted 19 May 2013

Academic Editor: Gerhard Litscher

Copyright © 2013 Yi Yang et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

De qi is a core concept of acupuncture and is necessary to produce therapeutic effect. In 2010, de qi has been received as a term in the official extension of the CONSORT Statement. However, there are few articles that discuss which factors have influences on obtaining de qi in clinical trials. This paper aims to explore these factors and give advice on trial design in order to optimize de qi in acupuncture RCTs.

1. Background

One of the fundamental characteristics of traditional Chinese acupuncture is the “obtaining of qi,” more commonly known by the pinyin de qi. The de component means “obtain,” and the qi component is often translated as “vital energy” [1]. Commonly, the term qi zhi has been used for the same phenomenon, which indicates “arrival of qi.” Both concepts originated from the classic book of traditional Chinese medicine (TCM) named Huang Di Neijing (also translated as Yellow Emperor’s Inner Classic of Internal Medicine), which is the first comprehensive literature of TCM and treated as the authoritative guideline for Chinese medication and acupuncture until present day [2].

De qi is considered by many acupuncturists to be a fundamental component of acupuncture since the early classical texts. Neijing (Lingshu Chapter 1) states “For acupuncture to be successful, the qi must arrive (qi zhi). Acupuncture’s effects come about like the clouds blown away by the wind” [2]. A more famous saying from the acupuncture poem Biao You Fu (Ode to Clear Obscurity) reads “If the qi comes quickly, the effect will be quick. If the qi comes slowly, the effect will be bad” [3]. Consistently with the classics, recent studies also provide evidence in support of this de qi phenomenon and indicate a statistically significant correlation between de qi and treatment efficacy [4, 5].

According to the theory of TCM and acupuncture experts, de qi is a composite of variable sensations experienced by both the patient and the administering acupuncturist [6, 7]. Typically, the acupuncturist would perceive de qi as heaviness or tension on the needle while stimulating it. In response to being punctured, the patient would perceive a sensation of soreness, numbness, heaviness, distension around the point, or even a sensation travelling to a specific place [3, 8].

The randomized controlled trial (RCT) is considered the gold standard to provide evidence for a treatment’s efficacy [9, 10]. To improve and standardize reporting quality of RCTs, the CONSORT Statement was published in 1996 and received extensive applications [11]. Subsequently, extensions to CONSORT have been developed to cover the reporting of nonpharmacological treatments and pragmatic trials [12–14]. Since there are acupuncture-specific aspects to reporting not covered by these extensions, the Standards for Reporting Interventions in Clinical Trials of Acupuncture (STRICTA) was published in 2001 and its revision was added as an official extension of CONSORT in 2010 [15]. In these guidelines, de qi was listed to be a necessary part in acupuncture interventions. However, on the STRICTA checklist, there is a lack of articles discussing which terms in this list have significant or potential influences on obtaining de qi, and thereby how to effectively utilize de qi to create valid acupuncture RCTs. This paper aims to explore these terms and give advice on their design methods in acupuncture RCTs.

Given that there is a broad diversity of acupuncture styles (e.g., traditional Chinese medicine, Japanese, Korean, Western, Five Element, ear acupuncture, etc.), this paper will focus only on traditional Chinese acupuncture due to the nature of the authors’ clinical and research experiences.

1.1. Acupoints Selection

Acupoints vary in their ability and characteristic to produce de qi. Hui et al. found that among three commonly used acupoints LI4 (Hegu), ST36 (Zusanli), and LV3 (Taichong), LI4 showed the most prominent response in the frequency and intensity as well as the largest number of de qi sensations [16]. Cheng reported that acupoints on the head and extremities are more inclined to achieve de qi when compared with acupoints on the trunk [17]. Recent electrophysiologic studies explained these differences as a consequence of different nerve innervations and tissue structures around acupoints [17–19]. For example, they stated that stimulation to the trunk acupoints elicits somatic autonomic reflex at the spinal level whereas stimulation to the extremity acupoints elicits a somatic autonomic reflex at the brain level [19]. However, literature has pointed out that in comparison with daily practice, the needle sensation in experimental research is often required to be very strong in order to demonstrate a therapeutic effect [20]. Given the wide variety of acupoints’ characteristics, acupuncture practitioners in future research should be flexible instead of seeking intense sensation of de qi blindly on every single acupoint. Excessive needle stimulation is prone to produce discomfort and noxious effects [21]. From another aspect, when selecting acupuncture points for noneffective control groups, those located in trunk or other thick body regions with fewer nerve fibers are considered to be the ideal choice. These acupoints are deemed to rarely elicit de qi and therefore produce only minor or no unexpected therapeutic effects.

In a study by Vincent et al., patients were asked to assess their needle sensations after acupuncture intervention when needles were applied to acupuncture points and nonacupuncture points (sham acupoints) [22]. The results showed no significant differences in needle sensations between acupuncture points and nonacupuncture points for any locations. Studies that shared similar results may be due to their inappropriate selection for sham acupoints. According to research about the nature of meridian and acupoint, we have recognized that acupoints are not as small as needle tips [23]. However, the upper range of them has not yet been established. Consequently, when selecting sham acupoints, the optimal distance away from real acupoints remains controversial. Sham acupoints which are too close to real ones may be included in the effective range of real acupoints and erroneously induce de qi in the control group. In order to provide more evidence for sham acupoint selection, further studies on the nature of meridian and acupoint range are required.

1.2. Depth of Insertion

The depth of insertion is another term that is directly related to the production of de qi. Park et al. applied acupuncture at four different depths including the epidermis, corium, fascia, and muscle [24]. Their results showed that only when punctured into the muscle can acupuncture produce statistically significant needle sensations (de qi). It has been demonstrated that many of the de qi sensations are conveyed by different nerve fiber systems. For example, sensations including aching, soreness, distension, heaviness, warmth, and dull pain are conveyed by the slower conducting Aδ and C fibers, whereas numbness is conveyed by the faster conducting Aβ fibers [25, 26]. Since these fibers are more densely distributed in the tendinomuscular layers [27], only acupuncture manipulation inserted into this depth could elicit valid de qi sensations. Based on these findings, superficial acupuncture without penetrating the skin is considered to be an ideal sham acupuncture intervention that effectively and easily blinds patients as well as avoids de qi.

1.3. Needle Stimulation

As major patterns of acupuncture manipulations, it has been confirmed that manual acupuncture and electroacupuncture (EA) produce different types and intensities of de qi sensations. For example, Leung et al. found that “aching” is the predominant de qi sensation derived from manual acupuncture whereas “tingling” is the predominant de qi sensation derived from EA [28]. One possible reason of this difference is that EA had different modulatory effects on the brain cortex from those by manual acupuncture [29]. It has been proven that different manual stimulation techniques (e.g., lifting-thrusting and twirling rotating) and variations in the direction, angle, and depth of needle insertion can affect the outcome of acupuncture treatment [30, 31]. However, there is no widespread agreement on how strong or which de qi sensations and needle stimulations should be used for a therapeutic effect.

Laser acupuncture usually serves as a contrast of therapeutic acupuncture, in the control group. Compared with a metal needle, laser acupuncture does not pierce skin and has always been considered to have no therapeutic effect as well as no evocation of de qi. However, in some study reports published in 2012, researchers have demonstrated that subjects with laser acupuncture also experienced de qi [32–34]. On the basis that de qi is the sign of acupuncture efficacy these studies signify that using laser acupuncture as an intervention in the control group may cause underestimation of acupuncture effects.

1.4. Practitioner Background

De qi is not only a fundamental sign of effective treatment, but also influences the speed of and potential for recovery [2, 5, 8]. Different technical processes of acupuncture insertion and stimulation lead to different characteristics of de qi and therefore different treatment results. As the person that conducts all of these manipulations, the acupuncturist is the vital determinant about the evocation and intensity of de qi. Hence it is essential to report pertinent information about the acupuncturist providing treatment including qualifications or affiliations and years in acupuncture practice, as well as any other experiences that may be relevant to the trial. Relevant differences (if any) in the qualification, training, and experience of the participating acupuncturists should be highlighted. Since the level of reporting has historically been poor, recent reviews of acupuncture trials have stressed the need to extensively document these characteristics [35, 36]. The eligibility criteria for acupuncturists should also be explained, as these will influence the homogeny of the trial results. Training for the acupuncturists before the trial is necessary and important for achieving uniform manipulations of needle insertion and stimulation to be conducted during the trial. Where there are known to be potential variations between practitioners, selecting a random sample of practitioners will reduce expertise bias and help improve the applicability of the results [37].

2. Discussion

The STRICTA checklist clearly states that, in acupuncture RCTs, eliciting of de qi as well as the difference between the responses required in the protocol and those actually obtained should be reported in the Results section [15]. But there is no mention in the statement of how to assess whether de qi was attained. The majority of acupuncture clinical studies only mention de qi at intervention design without any assessments or reports to describe whether the subjects and acupuncturists actually obtained de qi [36]. Since different experiences of needle sensations may be associated with different outcomes, it is absolutely essential that de qi is carefully considered. This is especially so given that these RCTs are evaluating the therapeutic effects of acupuncture with de qi being an important variable. The complexity of ensuring that similar levels of de qi were experienced is a major challenge in our field. For this reason, attempts have been made to apply a scale to quantify the needle sensation.

A number of researchers have sought to establish a credible rating scale for de qi, such as the McGill Pain Questionnaire [22], Subjective Acupuncture Sensation Scale (SASS) [4], the Massachusetts General Hospital Acupuncture Sensation Scale [38], the Southampton Needle Sensation Questionnaire [39], and the de qi composite [16]. It should be noted that the existing scales and questionnaires do have limitations. Some experienced acupuncturists have stated that the scale descriptors do not tally with those given by their patients who often described more subtle sensation, such as a cool flow sensation, or sensations going from one point to another [40]. Furthermore, the terms in some scales are not clear for patients to understand. For example, some patients could not easily identify the difference between the term is “spreading” and “radiating” [40]. However, given that de qi sensations have been recognized as an important variable for different individuals, conditions, and needle stimulations, the use of de qi scales will be a promising way to facilitate the de qi sensation being controlled for in clinical and experimental studies. In addition, quantitatively calculated de qi sensations may offer a meaningful method to further interpret the findings of RCTs and increase validity. It is also recommended that future studies should assess de qi at each acupuncture consultation to reduce recall bias.

In TCM theory, the de qi felt by the acupuncture practitioner is as important as the de qi felt by the patient [6, 8, 41]. It is also reported that the practitioner’s needle sensations are more objective than those of patients and are necessary for obtaining treatment results [42]. For some experts, de qi is an intuitive sensation that is affected by the condition of the patient or the anatomical location of the point and thereby hard to describe or assess in a quantitative or qualitative way. However, the practitioner questionnaire is considered to be a fairly reliable guide to the obtainment of de qi [43]. Even though there have been many attempts to assess the needle sensations experienced by the practitioner [44], a validated de qi questionnaire has not been developed. Further studies to develop tools assessing de qi based on the practitioner’s feeling or senses should be conducted.

3. Conclusion

In recent years, although there has been increasing evidence from randomized trials and systematic reviews on the efficacy of acupuncture, the conclusions remain controversial. The lack of significant difference between real and sham acupuncture in RCTs may result from the omission of certain important components of acupuncture, especially the obtainment of de qi. According to the study reports of acupuncture, factors in the STRICTA statement including the point selection, needle stimulation, and depth of insertion will contribute to the achievement of de qi. Taking all these factors into consideration would have considerable implications for the design and interpretation of acupuncture clinical trials. Meanwhile, assessment of the de qi sensations for both patients and acupuncture practitioners may be conducive to ascertain and control the de qi sensations in future clinical and experimental studies.

References

J. K. Ted, The Web that Has No Weaver: Understanding Chinese Medicine, McGraw-Hill, Chicago, Ill, USA, 2000.

S. Yang, Inner Classic of the Yellow Emperor, Great Simplicity (Huang Di Nei Jiang Tai Su), People's Health Publishing, Beijing, China, 1987.

J. Yang, Great Compendium of Acupuncture and Moxibustion (Zhen Jiu Da Cheng), People's Health Publishing, Beijing, China, 1963.

J. Kong, D. T. Fufa, A. J. Gerber et al., “Psychophysical outcomes from a randomized pilot study of manual, electro, and sham acupuncture treatment on experimentally induced thermal pain,” Journal of Pain, vol. 6, no. 1, pp. 55–64, 2005.

W. Takeda and J. Wessel, “Acupuncture for the treatment of pain of osteoarthritic knees,” Arthritis Care and Research, vol. 7, no. 3, pp. 118–122, 1994.

X. Cheng, Chinese Acupuncture and Moxibustion, Foreign Language Press, Beijing, China, 1987.

H. Xu, Acupuncture (Zhen Jiu Xue), People's Health Publishing, Beijing, China, 2004.

M. Qiu, Chinese Acupuncture and Moxibustion, Churchill Livingstone, Edinburgh, UK, 1993.

P. J. Devereaux and S. Yusuf, “The evolution of the randomized controlled trial and its role in evidence-based decision making,” Journal of Internal Medicine, vol. 254, no. 2, pp. 105–113, 2003.

C. Paterson and P. Dieppe, “Characteristic and incidental (placebo) effects in complex interventions such as acupuncture,” British Medical Journal, vol. 330, no. 7501, pp. 1202–1205, 2005.

C. Begg, M. Cho, S. Eastwood, et al., “Improving the quality of reporting of randomized controlled trials. The CONSORT statement,” The Journal of the American Medical Association, vol. 276, no. 8, pp. 637–639, 1996.

I. Boutron, D. Moher, D. G. Altman, K. F. Schulz, and P. Ravaud, “Extending the CONSORT statement to randomized trials of nonpharmacologic treatment: explanation and elaboration,” Annals of Internal Medicine, vol. 148, no. 4, pp. 295–309, 2008.

I. Boutron, D. Moher, D. G. Altman, K. F. Schulz, and P. Ravaud, “Methods and processes of the CONSORT group: example of an extension for trials assessing nonpharmacologic treatments,” Annals of Internal Medicine, vol. 148, no. 4, pp. W-60–W-66, 2008.

M. Zwarenstein, S. Treweek, J. J. Gagnier et al., “Improving the reporting of pragmatic trials: an extension of the CONSORT statement,” British Medical Journal, vol. 337, Article ID a2390, 2008.

H. Macpherson, D. G. Altman, R. Hammerschlag et al., “Revised standards for reporting interventions in clinical trials of acupuncture (stricta): extending the consort statement,” PLoS Medicine, vol. 7, no. 6, Article ID e1000261, 2010.

K. K. S. Hui, E. E. Nixon, M. G. Vangel et al., “Characterization of the “deqi” response in acupuncture,” BMC Complementary and Alternative Medicine, vol. 7, article 33, 2007.

K. J. Cheng, “Neuroanatomical characteristics of acupuncture points: relationship between their anatomical locations and traditional clinical indications,” Acupuncture in Medicine, vol. 29, no. 4, pp. 289–294, 2011.

K. Zhou, J. Fang, X. Wang et al., “Characterization of De Qi with electroacupuncture at acupoints with different properties,” Journal of Alternative and Complementary Medicine, vol. 17, no. 11, pp. 1007–1013, 2011.

A. Sato, “Neural mechanisms of autonomic responses elicited by somatic sensory stimulation,” Neuroscience and Behavioral Physiology, vol. 27, no. 5, pp. 610–621, 1997.

S. Birch and R. L. Felt, Understanding Acupuncture, Churchill Livingstone, Edinburgh, UK, 1999.

K. K. S. Hui, J. Liu, O. Marina et al., “The integrated response of the human cerebro-cerebellar and limbic systems to acupuncture stimulation at ST 36 as evidenced by fMRI,” NeuroImage, vol. 27, no. 3, pp. 479–496, 2005.

C. A. Vincent, P. H. Richardson, J. J. Black, and C. E. Pither, “The significance of needle placement site in acupuncture,” Journal of Psychosomatic Research, vol. 33, no. 4, pp. 489–496, 1989.

J. Jia, Y. Yu, J. H. Deng et al., “A review of Omics research in acupuncture: the relevance and future prospects for understanding the nature of meridians and acupoints,” Journal of Ethnopharmacology, vol. 140, no. 3, pp. 594–603, 2012.

J. J. Park, M. Akazawa, J. Ahn et al., “Acupuncture sensation during ultrasound guided acupuncture needling,” Acupuncture in Medicine, vol. 29, no. 4, pp. 257–265, 2011.

G. W. Lu, “Characteristics of afferent fiber innervation on acupuncture points zusanli,” The American Journal of Physiology, vol. 245, no. 4, pp. R606–R612, 1983.

P. W. Wen-Zhu Lin, Experimental Acupuncture, Shanghai Scientific and Technology Publishing House, Shanghai, China, 1999.

Z. Hou, “Acupuncture sensations receptors and afferent nerve pathways in spinal cord. National Symposium on Acupuncture Anesthesia,” Xi'an: Journal of Xi'an Medical College, pp. 49–59, 1974.

A. Y. Leung, J. Park, G. Schulteis, J. Duann, and T. Yaksh, “The electrophysiology of De Qi sensations,” Journal of Alternative and Complementary Medicine, vol. 12, no. 8, pp. 743–750, 2006.

V. Napadow, N. Makris, J. Liu, N. W. Kettner, K. K. Kwong, and K. K. S. Hui, “Effects of electroacupuncture versus manual acupuncture on the human brain as measured by fMRI,” Human Brain Mapping, vol. 24, no. 3, pp. 193–205, 2005.

L. Wang, M. X. Jing, J. M. Zhi, J. Lu, C. Y. Wang, and Q. G. Liu, “Effects of reinforcing and reducing methods by twirling and rotating the needle on contents of CGRP and NO in rats with stress-induced hypertension,” Zhongguo Zhen Jiu, vol. 31, no. 4, pp. 337–341, 2011.

G. Fan, Y. Zhao, and Z. Fu, “Acupuncture analgesia and the direction, angle and depth of needle insertion,” Zhongguo Zhen Jiu, vol. 30, no. 11, pp. 965–968, 2010.

G. Litscher, G. Bauernfeind, G. Mueller-Putz, and C. Neuper, “Laser-induced evoked potentials in the brain after nonperceptible optical stimulation at the neiguan acupoint: a preliminary report,” Evidence-Based Complementary and Alternative Medicine, vol. 2012, Article ID 292475, 6 pages, 2012.

F. Beissner and I. Marzolff, “Investigation of acupuncture sensation patterns under sensory deprivation using a geographic information system,” Evidence-Based Complementary and Alternative Medicine, vol. 2012, Article ID 591304, 10 pages, 2012.

G. Litscher, “Yes, there is deqi sensation in laser acupuncture,” Evidence-Based Complementary and Alternative Medicine, vol. 2013, Article ID 198254, 2013.

S. L. Prady and H. MacPherson, “Assessing the utility of the Standards for Reporting Trials of Acupuncture (STRICTA): a survey of authors,” Journal of Alternative and Complementary Medicine, vol. 13, no. 9, pp. 939–943, 2007.

S. L. Prady, S. J. Richmond, V. M. Morton, and H. MacPherson, “A systematic evaluation of the impact of STRICTA and CONSORT recommendations on quality of reporting for acupuncture trials,” PLoS One, vol. 3, no. 2, Article ID e1577, 2008.

P. J. Devereaux, M. Bhandari, M. Clarke et al., “Need for expertise based randomised controlled trials,” British Medical Journal, vol. 330, no. 7482, pp. 88–91, 2005.

J. Kong, R. Gollub, T. Huang et al., “Acupuncture De Qi, from qualitative history to quantitative measurement,” Journal of Alternative and Complementary Medicine, vol. 13, no. 10, pp. 1059–1070, 2007.

P. White, F. Bishop, H. Hardy et al., “Southampton needle sensation questionnaire: development and validation of a measure to gauge acupuncture needle sensation,” Journal of Alternative and Complementary Medicine, vol. 14, no. 4, pp. 373–379, 2008.

H. MacPherson and A. Asghar, “Acupuncture needle sensations associated with De Qi: a classification based on experts' ratings,” Journal of Alternative and Complementary Medicine, vol. 12, no. 7, pp. 633–637, 2006.

K. K. K. S. Hui, T. N. Sporko, M. G. Vangel, M. Li, J. Fang, and L. Lao, “Perception of Deqi by Chinese and American acupuncturists: a pilot survey,” Chinese Medicine, vol. 6, no. 1, article 2, 2011.

J. E. Park, Y. H. Ryu, Y. Liu, et al., “A literature review of de qi in clinical studies,” Acupuncture in Medicine, 2013.

J. H. Mei, S. Gao, and G. H. Chen, “Relationship between neuro-psychological factors and effect of acupuncture in treating Bell's palsy,” Zhongguo Zhong Xi Yi Jie He Za Zhi, vol. 30, no. 10, pp. 1026–1029, 2010.

J. Park, A. White, C. Stevinson, E. Ernst, and M. James, “Validating a new non-penetrating sham acupuncture device: two randomised controlled trials,” Acupuncture in Medicine, vol. 20, no. 4, pp. 168–174, 2002.