Evidence-Based Complementary and Alternative Medicine

Volume 2013 (2013), Article ID 737401, 9 pages

http://dx.doi.org/10.1155/2013/737401

Research Article

Antistress Effects of the Ethanolic Extract from Cymbopogon schoenanthus Growing Wild in Tunisia

Mahmoud Ben Othman,¹ Junkyu Han,2,3 Abdelfatteh El Omri,² Riadh Ksouri,⁴ Mohamed Neffati,⁵ and Hiroko Isoda2,3

¹Graduate School of Life and Environmental Sciences, University of Tsukuba, 1-1-1 Tennodai, Tsukuba City, Ibaraki 305-8572, Japan

²Faculty of Life and Environmental Sciences, University of Tsukuba, 1-1-1 Tennodai, Tsukuba City, Ibaraki 305-8572, Japan

³Alliance for Research on North Africa (ARENA), University of Tsukuba, 1-1-1 Tennodai, Tsukuba City, Ibaraki 305-8572, Japan

⁴Laboratoire d’Adaptation des Plantes aux Stress Abiotiques, Centre de Biotechnologie à la Technopole de Borj-Cédria (CBBC), BP 901, 2050 Hammam-lif, Tunisia

⁵Arid Lands Institute, Range Ecology Laboratory, 4119 Medenine, Tunisia

Received 19 April 2013; Accepted 2 September 2013

Academic Editor: John R. S. Tabuti

Copyright © 2013 Mahmoud Ben Othman et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

This study aimed to investigate the antistress properties of the ethanol extract of Cymbopogon schoenanthus (CSEE), growing wild in the southern part of Tunisia. The effect of extracts on H₂O₂-induced cytotoxicity and stress in human neuroblastoma SH-SY5Y cells. Its effect on stress-induced in ICR mice was exposed to force swim and tail suspension, in concordance with heat shock protein expression (HSP27 and HSP90), corticosterone, and catecholamine neurotransmitters level. Our results demonstrated that pretreatment of SH-SY5Y cells with CSEE at 1/2000, 1/1000, and 1/500 v/v dilutions significantly inversed H₂O₂-induced neurotoxicity. Moreover, CSEE treatments significantly reversed heat shock protein expression in heat-stressed HSP47-transformed cells (42°C, for 90 min) and mRNA expression of HSP27 and HSP90 in H₂O₂-treated SH-SY5Y. Daily oral administration of 100 mg/kg and 200 mg/kg CSEE was conducted to ICR mice for 2 weeks. It was resulted in a significant decrease of immobility time in forced swimming and tail suspension tests. The effect of CSEE on animal behavior was concordant with a significant regulation of blood serum corticosterone and cerebral cortex levels of catecholamine (dopamine, adrenaline, and noradrenaline). Therefore, this study was attempted to demonstrate the preventive potential of CSEE against stress disorders at in vitro and in vivo levels.

1. Introduction

Stress is known to induce alterations in various physiological responses even leading to pathological states [1]. It was demonstrated that different stress paradigms [2, 3] significantly affected learning and memory function and intensified fear memory in mice. The effects are supposed to be an outcome of a complex interaction of stress and altered activity of different mechanisms such as decrease in central neurotransmitters, neurohormonal factors [4], and neurotrophic factors [5] and increase in free radical generation and oxidative damage in the central nerve system [6].

In view of the potential use of natural products and botanicals as stress adaptogens, antioxidant rich phytochemical extracts are gaining a lot of interest. In this respect, several plants are traditionally and clinically used for the management of neurological disorders. From our previous research and others, several plants and herb preparations were demonstrated to protect against neuronal damage [7], Parkinson and Alzheimer’ disease [8, 9], to improve neuronal differentiation [10], and to act against depression [11, 12], epilepsy [13], and anxiety [14].

Recent surveys reported that psychiatric conditions especially stress and depression were among the most common mood pathologies treated with complementary and alternative therapies [15, 16]. This correlates with a worldwide increasing trend to integrate traditional medicine with primary health care, because of its “green image”, its cultural significance, and its accessibility to all societal categories [17].

Herbal medicines are an important part of the culture and traditions in the African continent where around 122 drugs originating from 94 species have been discovered through ethnobotanical leads [18]. North Africa and Sahara are known by their richness in medicinal plants which are gathered and used as greens, spices, and condiments [19]. About 70% of the wild plants in North Africa are known to be of potential value in fields such as medicine and biotechnology.

Tunisia has a large plant biodiversity. Actually, over 350 species are considered herbal, medicinal, and aromatic plants (HMAP). These resources are used, mainly by rural communities for traditional phytotherapy, and practiced for several generations and civilizations [20]. Preservation of these species and knowledge of their uses require specific intervention, and these resources should not be lost due to environmental degradation, agricultural expansion, and urbanization. In this respect, this study was conducted to elucidate the traditional usage of Cymbopogon schoenanthus L. spring (CS).

CS is an aromatic culinary herb grown in the southern area of Tunisia, and it is locally known as “El bekherai”. It is used for several preparations of meat and salad or served with tea because of its pleasant aroma appreciated by north African inhabitants [21]. Besides its use in culinary preparations, CS is also used in folk medicine. Its decoction and infusion are taken as diuretic to reduce intestine spasm and to act against food poisoning, antirheumatism, antianorexia, and digestive [22]. Our recent research demonstrated that CS extracts and essential oil have antioxidant and acetylcholinesterase inhibitory properties [23, 24].

Using in vitro bioassay and in vivo models, the antistress effect of ethanol extract of Cymbopogon schoenanthus (CSEE) was evaluated with a focus on the heat shock protein role in protecting neuronal cells against H₂O₂-induced cytotoxicity in SH-SY5Y cells, corticosterone, and catecholamine regulated levels in stressed-mice. Human neuroblastoma SH-SY5Y cells and HSP47-transformed cells were used as in vitro model; tail-suspended and forced-swim ICR mice were used as in vivo model.

2. Materials and Methods

2.1. Plant Extracts Preparation

C. schoenanthus was collected from the south of Tunisia in February 2011. The leaves were allowed to dry on the shadow at 25°C, and then they were ground into fine powder. 100 g of the powdered leaves was soaked in 1000 mL of ethanol (70%), for 2 weeks. The liquid fraction was centrifuged, filtered at 0.22 μm, and kept at −80°C.

2.2. HPLC Analysis of CSEE

Diluted samples were injected to RP-HPLC. The separation of phenolic compounds was performed with an Agilent 1100 series HPLC system equipped with online degasser (G 1322A), quaternary pump (G 1311A), a thermostatic autosampler (G 1313A), column heater (G1316A), and diode array detector (G 1315A). Instrument control and data analysis were carried out using Agilent HPLC Chemstation 10.1 Edition of Windows 2000. The separation was carried out on a reverse phase ODS C18 (250 mm × 4.6 mm ID, 5 μm particle size Hypersil) column used as stationary phase at ambient temperature. The mobile phase consisted of acetonitrile (solvent A) and water sulphuric acid (0.2%) (Solvent B). The flow rate was kept at 0.5 mL·min⁻¹. The gradient program was as follows: 15% of A/85% of B at 0–12 min, 40% of A/60% of B at 12–14 min, 60% of A/40% of B at 14–18 min, 80% of A/20% of B at 18–20 min, 90% of A/10% of B at 20–24 min, and 100% of A at 24–28 min. The injection volume was 20 μL, and peaks were monitored at 280 nm. Peak identification was obtained by comparing the retention time and the UV spectra of sample phenolic chromatogram with those of pure standards from Sigma (St. Louis, MO, USA). Analyses were performed in triplicates.

2.3. Cell Culture

Human neuroblastoma SH-SY5Y cells were cultured in 1 : 1 mixture of Dulbecco’s minimum essential medium (DMEM; Sigma, USA) and Ham’s F-12 nutrient mixture (Sigma, USA) supplemented with 15% fetal bovine serum (FBS; Sigma, USA), 1% nonessential MEM amino acid, and 1% penicillin (5000 μg/mL)-streptomycin (5000 IU/mL) solution (ICN Biomedical, Inc.). The cells were cultured in 100 mm dishes and passaged by trypsinization using 0.25% Trypsin-EDTA (Sigma) at 80% confluence twice a week. Medium was changed every other day, and cells were incubated at 37°C (5% CO₂).

Chinese hamster ovary (CHO) cells, stably transfected with (+) or without (−) HSP47 promoter, were cultured in F12 medium supplemented with 10% FBS, 0.2% Kanamycin solution, and 0.1% G418 (Gibco BRL 13075-015). The cells were cultured in 75 cm² T-flasks and passaged by trypsinization at 80% confluence. Medium was changed every two days, and cells were incubated at 37°C (5% CO₂).

2.4. Neuroprotective Properties of CSEE against H₂O₂-Induced Cytotoxicity in SH-SY5Y Cells

SH-SY5Y cells were seeded at  cell/well in 96 well microplates and allowed to attach for 24 h incubation. Then cells were treated with CSEE (1/100, 1/1000, and 1/10000) for 72 h to investigate the noncytotoxic concentrations or in combination with H₂O₂. In H₂O₂ treatment panel, SH-SY5Y cells were pretreated with CSEE at 1/2000, 1/1000, and 1/500 for 24 h, followed by treatment with 150 μM H₂O₂ for 24 h. Cell viability was performed using 3-(4, 5-Dimethylthiazol-2-yl)-2, 5-diphenyltetrazolium bromide (MTT) as explained in our previous research [10]. Briefly, 10 μL of MTT solution (5 mg/mL in PBS (−)) was added to each well of 96-well plates and incubated for 6 h at 37°C in a 95% humidified air—5% CO₂ incubator. Then the formazan was formed and later dissolved in 10% sodium dodecyl sulfate (SDS). The absorbance was determined at 570 nm using blanks (wells which contain a mixture of extract and medium without cells) as a reference. Cell viability was reported as a percentage of control cells (cells treated with medium only).

2.5. HSP47 Assay

HSP47-transformed cells were plated at 1 × 10⁴ cells/well in 100 μL of culture medium and allowed to attach and grow for 48 h at 37°C (5% CO₂). Then, the cells were subjected to a heat shock for 90 min at 42°C, and recovered at 37°C during 2 h. After the recovery time, cells were treated with CSEE (1/1000, 1/500, and 1/100 v/v dilutions) and incubated for 3 h at 37°C, in 5% CO₂ incubator. Then the cells were washed twice with PBS (−), and HSP47 assay was performed as described in our previous study [25]. Moreover, the effect of CSEE on HSP47-transformed cell viability was investigated using MTT assay as previously described.

2.6. Effect of CSEE on HSP27 and HSP90 mRNA Expression in H₂O₂-Treated SH-SY5Y Cells

SH-SY5Y cells were plated at  cells/mL in 100 mm dish and allowed to attach for 24 h, then treated with various concentrations of CSEE at 1/500, 1/1000, and 1/2000 for 24 h, and then cotreated with 150 μM H₂O₂ for 24 h. Cells were washed with cold PBS, and total RNA was extracted using Isogen Kit (Wako, Japan). Total RNA was quantified by Thermo scientific Nano drop 2000 (USA). Reverse transcription reactions were performed using the Superscript III reverse transcriptase kit (Invitrogen, Carlsbad, CA, USA) [11].

All Primer sets: HSP27 (Hs03044127_g1), HSP90 alpha (Hs00743767_sH), and GAPDH and TaqMan probes for experimental genes were analyzed using Applied Biosystems. HSP27 and HSP90 mRNA expression was quantified using TaqMan real-time quantitative PCR (AB 7500 fast real-time system, Applied Biosystems, U.S.A.). Amplifications were performed in 20 μL final volume as explained in our previous study [11]. Gene expression was normalized to GAPDH and reported as fold of control.

2.7. Animal Treatment

Sixty-four ICR mice weighing between 26–30 g at 5 weeks of age (Charles River, Japan) were used for in vivo experiments. The animals were individually housed and allowed to acclimatize with free access to food and water for extra one week under a 12/12 light dark cycle, with controlled temperature (23°C) and humidity (40–60%). After acclimatization, animals were assigned to 2 groups of 32 animals each that were used respectively for TST and FST. Each group was randomized into 4 subgroups of 8 animals each: (1) vehicle control group (administered with distilled water), (2) imipramine group (administered with 15 mg/kg imipramine), (3) CSSE 100 group (administered with 100 mg/kg CSSE), and (4) CSSE 200 group (administered with 200 mg/kg CSSE).

Imipramine and C. schoenanthus dried ethanol extract were freshly dissolved in distilled water and were orally administered (p.o) to mice in a volume of 10 mL/kg body weight daily for 13 consecutive days. One hour prior to extract and drug administration, all mice were deprived from food but not water; in other time periods, all animals had free access to food and water [26].

2.8. Tail Suspension Test

The tail suspension test (TST) was based on the method of Steru et al. [27] with minor modifications. Briefly, all mice were individually suspended by the tail with clamp (1 cm distant from the top) for 6 min in a box ( cm) with the head 5 cm to the bottom. Testing was carried out in a darkened room with minimal background noise, 1 h after plant extract and 30 min after imipramine administration. The duration of immobility time was considered during the final 3 min interval.

2.9. Forced Swimming Test

The forced swimming test (FST) was conducted as previously described by Porsolt et al. [28]. Briefly, each mouse was placed in a 25 cm glass cylinder (14 cm diameter) filled with water up to 15 cm, maintained at °C, and forced to swim for 6 min (before the swimming session). Then mice were removed and dried. They were again forced to swim in a similar environment for a period of 6 min and 24 h later (test session). Immobility duration was recorded using a camera during the last 3 min of the 6 min tests. Extracts were administered 1 h before the forced swimming test, or imipramine was administered 30 min before the test. In the subchronic treatment study, the same dosages of extracts or imipramine, as those in the acute treatment study, were administered once a day for 2 weeks, and the final treatment was conducted 1 h (extracts) or 30 min (imipramine) before behavioral tests.

2.10. Determination of Corticosterone in CSEE-Treated ICR Mice Blood Serum

Serum corticosterone (CORT) levels in the control and CSEE-treated mice were determined using an enzyme immunoassay kit (AssayMax Corticosterone ELISA Kit, AssayPro LLC) according to manufacturer’s recommendations. Blood serum was collected by centrifugation at 3000 xg for 10 min, then it was diluted at 1/200 with EIA diluent and immediately stored at −20°C until use. 25 μL of different serum samples or standard solution was mixed with 25 μL of biotinylated corticosterone in each well and allowed to stand for 2 h at room temperature. Then wells were washed and incubated with 50 μL of streptavidin-peroxidase conjugate for 30 min; afterwards, wells were washed again and incubated with 50 μL of chromogen substrate solution for 30 min until the optimal blue color density develops. Then, 50 μL of stop solution was added to each well, and finally, the absorbance in each well was recorded at 450 nm. The level of CORT was also calculated using standard curve and reported in ng/mL.

2.11. Determination of Dopamine (DOP), Adrenaline (ADR), and Noradrenaline (NAD) in CSSE-Treated ICR Mice Brain Tissue

Cerebral cortex catecholamine (Dopamine (DOP), adrenaline (ADR), and noradrenaline (NAD)) levels were determined using 3-CAT Research ELISA (Labor Diagnostika Nord GmbH & Co. KG) according to manufacturer’s instructions. Briefly, 100 mg of brain tissue was homogenised. Also 60 μL of brain sample or standards were mixed with 25 μL of TE buffer into all wells, and the plate was shaken for 1 h at room temperature. After washing twice, 150 μL of acylation buffer and 25 μL of acylation reagent were added to each well. Then wells were shaken, washed, and incubated with 200 μL of hydrochloric acid for 10 min at room temperature. 190 μL from each well were taken and incubated for 2 h at 37°C with 50 μL of enzyme solution. Afterwards, 75 μL of samples from enzyme plate were mixed with 50 μL of the respective antiserum into all wells and incubated for 18 h at 4°C. Plates were incubated for 30 min at room temperature after washing and adding 100 μL of enzyme conjugate in each well. Then, wells incubated with 100 μL of substrate for 30 min at room temperature and 50 μL of stop solution was added. Finally, the absorbance in each well was recorded at 450 nm and the level of catecholamine was calculated using standard curve and reported in ng/mL.

2.12. Statistical Analysis

All data were expressed as mean ± S.E.M, and significances were calculated using Student’s -test. Statistical significance was set at .

3. Results

3.1. HPLC Analysis

Seven phenolic compounds were successfully identified in CSEE based on the retention time and spectral characteristics of their peaks against those of the standards using RP-HPLC coupled with UV-Vis multiwave length detector. The chromatogram of plant extract was compared to authentic standards of phenolic acid and flavonoid profiles, which allowed us to identify 5 phenolic compounds at 330 nm: quercetin-3-rhamnoside, trans-cinnamic acid, resorcinol, caffeic acid, and 2.5-dihydroxybenzoic acid and 2 others phenolic compounds at 280 nm: ferulic acid and gallic acid (Table 1).

Table 1: Major compounds of C. schoenanthus identified by HPLC.

RT
Compounds
Structure
Percentage (%)
Detection wave length (nm)

9,674
Resorcinol

5.08
330

10,103
Caffeic acid

3.18
330

11,708
2.5-Dihydroxybenzoic acid

2.01
330

13,463
Quercetin-3-rhamnoside

32.56
330

19,124
Trans-cinnamic acid

9.72
330

5,58
Gallic acid

8.80
280

13,463
Quercetin-3-rhamnoside

32.82
280

13,931
Ferulic acid

9.83
280

3.2. CSEE Protects SH-SY5Y Cells against H₂O₂-Induced Toxicity

To determine the noncytotoxic concentrations of CSEE, SH-SY5Y cells were treated with CSEE at 1/10000, 1/1000, and 1/100 v/v dilution for 72 h. CSEE did not affect SH-SY5Y cell viability. However at 1/100 dilution cell viability slightly decreased, but this decrease was not significant (Figure 1(a)).

(a)

(b)

Figure 1: Neuroprotective properties of CSEE against H ₂O ₂-induced cytotoxicity. SH-SY5Y cells were seeded at cell/well in 96-well microplate and treated with (a) CSEE (1/10000, 1/1000, and 1/100 v/v dilutions) for 72 h, (b) SH-SY5Y cells were pretreated with CSEE (1/10000, 1/1000 and 1/500 v/v dilutions) for 24 h and then treated with 150 μM H₂O₂ for 24 h. Cell viability was determined using MTT assay as explained in Materials and Methods. Each bar represents the mean of 3 independent trials ± SD. *, ** versus control cells, (Student’s -test).

In preliminary experiments, 150 μM H₂O₂ was found to be the challenging concentration to reduce SH-SY5Y cells by 40% after 24 h exposure (data not shown). Pretreatment of SH-SY5Y cells with CSEE (1/2000, 1/1000, and 1/500 v/v dilutions) significantly and dose dependently improved cell viability in H₂O₂-treated cells to reach %, %, and % of control, respectively.

3.3. CSEE Reduce Heat Stress Effect in HSP47 Transformed Cells

To investigate the antistress effect of CSEE, HSP47-transformed cells were used as model. Cells were heat-shocked for 90 min at 42°C, 5%CO₂ and recovered for 2 h at 37°C, 5%CO₂. Then cells were exposed to CSEE at 1/1000, 1/500, and 1/100 v/v dilutions for 3 h. CSEE significantly and dose dependently reduced HSP47 expression by %, %, and % of control, respectively without cytotoxic effect (Figure 2).

Figure 2: Effect of CSEE on HSP47 expression and cell viability in Chinese hamster ovary transformed cells. Cells were seeded at  cell/well in 96-well microplate and treated with CSEE at 1/1000, 1/500, 1/100 v/v dilution. Cell viability and HSP47 expression were performed as explained in Materials and Methods. Each bar represents the mean of 3 independent trials ± SD. *, ** versus control cells, (Student’s -test).

3.4. CSEE Pretreatment Reduces the H₂O₂-Stimulated mRNA Expression of HSP27 and HSP90 in SH-SY5Y Cells

To assess the mechanism by which CSEE reversed H₂O₂-induced toxicity, we investigated the effects of CSEE pretreatments on heat shock proteins HSP27 and HSP90 mRNA expression in H₂O₂-treated SH-SY5Y cells. H₂O₂ treatment increased HSP27 and HSP90 by and fold of control, respectively. When pretreated with CSEE (1/2000, 1/1000, and 1/500) for 24 h, HSP27 mRNA expression significantly decreased to reach the control level. HSP90 mRNA significantly decreased only in 1/1000 and 1/500 dilution treatments to reach fold of control (Figure 3).

Figure 3: Effect of CSEE on mRNA expression of HSP27 and HSP90 in H ₂O ₂-treated SH-SY5Y cells. SH-SY5Y cells were seeded at  cell/mL in 100 mm dish and was treated with CSEE (1/500, 1/1000 and 1/2000) for 24 h, and then they were treated with 150 μM H₂O₂ for 24 h. The mRNA expression of genes was normalized to GPDH mRNA expression and expressed as ratio of control. Each bar represents the mean of duplicate ± SD. *, ** versus positive control group, and #, ## versus control group (Student’s -test).

3.5. CSEE Oral Administration Reduced Immobility Time in the TST and in the FST

CSEE at 100 and 200 mg/kg (p.o) caused neither the death of any animal nor the change in mice coat color. Moreover, CSEE doses (p.o) did not reduce body weight in TST or FST significantly (data not shown).

The antistress effect of orally administered CSEE in ICR mice was investigated for 13 consecutive days by recording immobility time in TST and FST.

The baseline of immobility time (day 0, prior to CSEE (p.o)), shows 2 clusters (Figure 4). However, on day 1, the immobility time did not show any significant difference among the four animal groups. The TST was assessed every four days, and starting from day 5 the immobility time was increased in control and imipramine groups to reach  sec and  sec on day 13. In CSEE-treated groups, 100 mg/kg and 200 mg/kg doses significantly maintained the immobility time in ICR mice shorter than that in vehicle and imipramine groups during all the period of the experiment. In fact, both 100 and 200 mg/kg CSEE resulted in  sec on day 13 with a similar trend. The effects of CSEE appeared to be more potent than those of imipramine during the last days of treatment.

Figure 4: Effect of administration of CSEE on the immobility time in the TST. ICR mice were orally administrated with distilled water in control group, 15 mg/kg imipramine, and 100 and 200 mg/kg CSEE. The immobility time in the TST was calculated as reported in Materials and Methods. Data are represented as the average of 5 observations ± SEM. * versus Control group (Student’s -test).

Similarly to TST, FST was assessed every four days during 2 weeks. The immobility time was increased in the control group to reach  sec in the last day of treatment. In imipramine group, the immobility time was decreased to reach  sec on day 5, then it was increased to reach  sec on the day 13 (Figure 5). However, CSEE at 100 and 200 mg/kg significantly reduced the immobility time to reach  sec on D13.

Figure 5: Effect of administration of CSEE on the immobility time in the FST. ICR mice were orally administered with distilled water in control group, 15 mg/kg imipramine in positive control group, and 100 and 200 mg/kg of CSEE. The immobility time in the FST was calculated as reported in Materials and Methods. Data are represented as the average of 5 observations ± SEM. * versus control group (Student’s -test).

3.6. Effects of CSEE on Serum Corticosterone Levels

The swim stress procedure evoked a significant increase in serum CORT levels  ng/mL in the control group (Figure 6). CSEE, at 100 mg/kg and 200 mg/kg, and imipramine (15 mg/kg) significantly reduced the serum CORT levels in FST-induced stress in mice to , , and  ng/mL, respectively.

Figure 6: Effect of CSEE on serum level of corticosterone in ICR mice subjected to FST and TST. Mice fed with 100 and 200 mg/kg of CSEE for 14 days were sacrificed by spinal cord dislocation one day after the last behavior test; then the blood sample was collected, and the serum was rapidly separated. Plasma corticosterone was measured using Assay Max Corticosterone ELISA kit as explained in Materials and Methods. Each value represents the mean of ±SD (). * versus control group (Student’s -test).

Similarly with FST, a significant increase in serum CORT concentrations was observed in control mice exposed to TST. Further, 100 and 200 mg/kg of CSEE and imipramine (15 mg/kg) significantly reduced the serum CORT levels in mice to , , and  ng/mL, respectively (Figure 6).

3.7. Effect of CSEE on Monoamine Neurotransmitters Levels in Brain

DOP, ADR, and NAD were significantly decreased to , , and  ng/mL, respectively, in stressed mice when exposed to tail suspension test (Table 2). CSEE at 100 mg/kg and 200 mg/kg and imipramine (15 mg/kg) significantly increased the DOP, ADR, and NAD levels (Table 2). A significant increase of monoamine neurotransmitter levels was observed in treated groups’ brain in FST. However, in control group, DOP, ADR, and NAD were significantly decreased to , , and  ng/mL respectively.

Table 2: Effect of CSEE on DOP, ADR, and NAD levels (ng/mL) in the brain of ICR mice. Mice fed with 100 and 200 mg/kg of CSEE for 14 days were sacrificed by dislocation of the cervical spine one day after the last behavioral test, and then the brain samples were rapidly washed with PBS (−) and stored at −80°C until use. Monamine neurotransmitters levels were quantified using ELISA kit as explained in Section 2.

Groups
TST
FST

DOP
ADR
NAD
DOP
ADR
NAD

Control

Imipramine

100 mg/kg

200 mg/kg

With, DOP: dopamine, ADR: adrenaline, and NAD: noradrenaline.

Each value represents the mean ± SD (). , versus Control group (Student’s -test).

4. Discussion

The present study investigated the potential preventive effect of CSEE against stress in H₂O₂-treated SH-SY5Y cells, in heat-stressed HSP47-transformed cells, and in two mouse models of despair tasks: the TST and the FST. Moreover, neurobiochemical and neuropharmacological paradigms were used as tools to contribute to the understanding of the involvement of heat shock proteins (HSP27 and HSP90), catecholamines neurotransmitters (dopamine, adrenaline, and noradrenaline), and corticosterone in the antistress-like activity of CSEE.

It is well known that chronic exposure to stress is causative factor of free radical generation and reactive oxygen species elevation in the body [6]. Oxidative stress is well demonstrated to be a leading factor in neuronal cell death and damage [29]. Thus, antioxidants intake might be an effective strategy to protect the human body against stress-mediated pathologies. In this respect, phytochemicals, botanicals, and plant extracts are gaining a lot of interest as complementary supplements to fight against oxidative stress. In the current study, CSEE, a polyphenol-rich plant extract, treatment showed a significant protective effect against H₂O₂-induced toxicity in SH-SY5Y cells and against heat stress-induced in HSP47-transformed cells. Moreover, CSEE significantly reversed HSP27 and HSP90 mRNA expressions in H₂O₂-treated SH-SY5Y cells.

A probable underlying mechanism of this protection may be associated with the presence of flavonoids (Resorcinol and Quercetin-3-rhamnoside) and phenolic acids (Trans-cinnamic acid, Ferulic acid and Gallic acid). In our study, we demonstrated that CSEE protection against H₂O₂-induced stress was regulated by heat shock proteins (HSP). In fact, HSPs provide a fundamental mechanism to defend neuronal cells against the effect of diverse stressors like temperature, oxidation, inflammation, xenobiotics, irradiation, and pollutants [25]. HSPs are becoming a therapeutic target in neurodegenerative diseases and aging because the pathogenesis mechanism of these diseases is thought to be related to an abnormal increase of unfolded protein response [30]. Beside its role against protein aggregation, HSP27 is reported to have the capacity to sequester cytochrome C when released from the mitochondria into the cytosol and to have important antioxidant properties [31] by decreasing the abundance of reactive oxygen species (ROS) [32] and maintaining glutathione in its reduced form [33]. Moreover, HSP27 is involved in the cell survival mechanism since its depletion was demonstrated by Rocchi et al. [34] to result in cell apoptosis through caspase3 activation. On the other hand, it was reported that HSP90 acts on misfolded proteins induced by conditions such as heat and the presence of ROS. In addition, in the absence of HSP90, many clients are turned over when misfolded or misassembled [35]. Same authors suggested that “stress” moves cells away from homeostasis and leads to an increase of the load for HSP90 and its co-chaperones.

Since the first emergence of “stress”, researchers tried to find and develop several animal models to solve this problem. The tail suspension and forced swimming tests are the most common predictive tests for screening the beneficial properties of medicinal plants [27, 28].

In traditional medicine, C. schoenanthus was used for several treatments. However, its antistress effect is still not yet established in vivo. Within the same genus of Cymbopogon, C. citratus essential oil was reported to have an anxiolytic activity [36, 37]. Moreover, Quintans-Júnior et al. [38] demonstrated the anticonvulsant effect of the essential oil from C. winterianus. The present study was the first to demonstrate that oral administration of C. schoenanthus ethanol extract (100 and 200 mg/kg, p.o.) significantly reduced immobility time in the TST and FST in mice compared to vehicle group and the classical tricyclic antidepressant, imipramine (15 mg/kg, p.o.) treated group. The immobility time in TST and FST, referred to behavioral despair in animals, is believed to reproduce a condition similar to human depression [39]. Thus, a reduction in the total duration of immobility indicates an antistress effect [27, 40]. Moreover, the effect of CSEE on animal behavior was concordant with its effect on blood corticosterone and cerebral cortex monoamine levels. In fact, CSEE oral administration at 200 mg/kg significantly decreased corticosterone levels to  ng/mL and improved DOP, ADR, and NAD to 6.6±, 0.6±, and 53.7± ng/mL, respectively. In this respect, from our and others research, there is a great interest in phytochemicals and dietary molecules that may interact with the hypothalamic-pituitary-adrenal (HPA) axis and the mono-amenergic, catecholaminergic, and cholinergic systems [11, 41]. The precise mechanisms by which CSEE produced its antistress effects were not fully understood. However, according to our results, this effect could be regulated by its interaction with the monoaminergic system and HPA axis. In this context, it is already suggested that the first step of antistress effect mechanism should be considered as an increase in the monoamine levels at the synapse [42] and a decrease in corticosterone serum levels [43].

Taken together, our results demonstrated that CSEE was effective in producing significant antistress effects at in vitro and in vivo levels. The molecular mechanism by which CSEE exhorted its beneficial effects seems to be partially modulated by chaperone activation, monoaminergic system, and HPA axis regulation. Furthermore, the in vivo results of CSEE oral administration showed a comparable effect to the established commercial antidepressant drug (imipramine). The decrease of immobility time was dose dependent in two models. These results indicated that CSEE had a dose-dependent antistress effect that was comparable to established commercial antidepressant drugs.

The HPLC analysis of CSEE identified several compounds with known neuroprotective activities like caffeic acid, ferulic acid, and quercetin. However, future studies should be addressed in exploring their mixture and the molecular mechanism that may regulate their activities.

Acknowledgment

This work was partially supported by the JST-JICA’s Science and Technology Research Partnership for Sustainable Development (SATREPS).

References

G. P. Chrousos, “Stress as a medical and scientific idea and its implications,” Advances in Pharmacology, vol. 42, pp. 552–556, 1998.

I. Nijholt, N. Farchi, M. Kye et al., “Stress-induced alternative splicing of acetylcholinesterase results in enhanced fear memory and long-term potentiation,” Molecular Psychiatry, vol. 9, no. 2, pp. 174–183, 2004.

A. Das, D. Rai, M. Dikshit, G. Palit, and C. Nath, “Nature of stress: differential effects on brain acetylcholinesterase activity and memory in rats,” Life Sciences, vol. 77, no. 18, pp. 2299–2311, 2005.

J. P. Herman and W. E. Cullinan, “Neurocircuitary of stress, HPA axis,” Trends in Neurosciences, vol. 20, no. 2, pp. 78–84, 1997.

E. Badowska-Szalewska, I. Klejbor, T. Cecot, J. H. Spodnik, and J. Moryś, “Changes in NGF/c-Fos double staining in the structures of the limbic system in juvenile and aged rats exposed to forced swim test,” Acta Neurobiologiae Experimentalis, vol. 69, no. 4, pp. 448–458, 2009.

L. Wang, G. Muxin, H. Nishida, C. Shirakawa, S. Sato, and T. Konishi, “Psychological stress-induced oxidative stress as a model of sub-healthy condition and the effect of TCM,” Evidence-based Complementary and Alternative Medicine, vol. 4, no. 2, pp. 195–202, 2007.

K. Hemanth Kumar, A. Tamatam, A. Pal, and F. Khanum, “Neuroprotective effects of Cyperusrotundus on SIN-1 induced nitric oxide generation and protein nitration: ameliorative effect against apoptosis mediated neuronal cell damage,” NeuroToxicology, vol. 34, pp. 150–159, 2013.

J. S. Shim, H. G. Kim, M. S. Ju, J. G. Choi, S. Y. Jeong, and M. S. Oh, “Effects of the hook of Uncaria rhynchophylla on neurotoxicity in the 6-hydroxydopamine model of Parkinson's disease,” Journal of Ethnopharmacology, vol. 126, no. 2, pp. 361–365, 2009.

M. T. Hsieh, W. H. Peng, C. R. Wu, K. Y. Ng, C. L. Cheng, and H. X. Xu, “Review on experimental research of herbal medicines with anti-amnesic activity,” Planta Medica, vol. 76, no. 3, pp. 203–217, 2010.

A. El Omri, J. Han, P. Yamada, K. Kawada, M. B. Abdrabbah, and H. Isoda, “Rosmarinus officinalis polyphenols activate cholinergic activities in PC12 cells through phosphorylation of ERK1/2,” Journal of Ethnopharmacology, vol. 131, no. 2, pp. 451–458, 2010.

K. Sasaki, A. El Omri, S. Kondo, J. Han, and H. Isoda, “Rosmarinus officinalis polyphenols produce anti-depressant like effect through monoaminergic and cholinergic functions modulation,” Behavioural Brain Research, vol. 238, pp. 86–94, 2013.

L. C. Hsu, Y. J. Ko, H. Y. Cheng, et al., “Antidepressant-like activity of the ethanolic extract from Uncaria lanosa Wallich var. appendiculata ridsd in the forced swimming test and in the tail suspension test in mice,” Evidence-Based Complementary and Alternative Medicine, vol. 2012, Article ID 497302, 12 pages, 2012.

W. Y. Lo, F. J. Tsai, C. H. Liu et al., “Uncaria rhynchophylla upregulates the expression of MIF and cyclophilin A in kainic acid-induced epilepsy rats: a proteomic analysis,” American Journal of Chinese Medicine, vol. 38, no. 4, pp. 745–759, 2010.

M. Carro-Juarez, J. F. Rodrıguez-Landa, M. D. L. Rodriguez-Pena, M. D. J. Rovirosa-Hernandez, and F. Garcia-Orduna, “The aqueous crude extract of Montanoa frutescens produces anxiolytic-like effects similarly to diazepam in Wistar rats: involvement of GABAA receptor,” Journal of Ethnopharmacology, vol. 143, no. 2, pp. 592–598, 2012.

M. Adams, F. Gmünder, and M. Hamburger, “Plants traditionally used in age related brain disorders-A survey of ethnobotanical literature,” Journal of Ethnopharmacology, vol. 113, no. 3, pp. 363–381, 2007.

K. J. Hunt, H. F. Coelho, B. Wider et al., “Complementary and alternative medicine use in England: results from a national survey,” International Journal of Clinical Practice, vol. 64, no. 11, pp. 1496–1502, 2010.

M. Mander, Marketing of Indigenous Medicinal Plants in South Africa, A Case Study in KwaZulu-Natal, FAO, Rome, Italy, 1998.

D. S. Fabricant and N. R. Farnsworth, “The value of plants used in traditional medicine for drug discovery,” Environmental Health Perspectives, vol. 109, no. 1, pp. 69–75, 2001.

D. Rivera, C. Obón, M. Heinrich, C. Inocencio, A. Verde, and J. Fajardo, “Gathered Mediterranean food plants—ethnobotanical investigations and historical development,” Forum of Nutrition, vol. 59, pp. 18–74, 2006.

M. Neffati and A. Ouled Belgacem, A Multidisciplinary Study of Herbal, Medicinal and Aromatic Plants in Southern Tunisia: A New Approach, Regional Consultation on Linking Producers to Markets: Lessons Learned and Successful Practices, Cairo, Egypt, 2006.

IUCN, A Guide to Medicinal Plants in North Africa, IUCN, Gland, Switzerland, 2005.

E. Le Floc'h, Contribution à une Étude Ethnobotanique de la Flore Tunsienne, Programme Flore et Végétation tunisienne, Ministère del’Enseignement supérieur et de la Recherche scientifique, Tunis, 1983.

A. Khadri, M. L. M. Serralheiro, J. M. F. Nogueira, M. Neffati, S. Smiti, and M. E. M. Araújo, “Antioxidant and antiacetylcholinesterase activities of essential oils from Cymbopogon schoenanthus L. Spreng. Determination of chemical composition by GC-mass spectrometry and ¹³C NMR,” Food Chemistry, vol. 109, no. 3, pp. 630–637, 2008.

A. Khadri, M. Neffati, S. Smiti et al., “Antioxidant, antiacetylcholinesterase and antimicrobial activities of Cymbopogon schoenanthus L. Spreng (lemon grass) from Tunisia,” LWT-Food Science and Technology, vol. 43, no. 2, pp. 331–336, 2010.

A. EL Omri, J. Han, M. Ben Abdrabbah, and H. Isoda, “Down regulation effect of Rosmarinus officinalis polyphenols on cellular stress proteins in rat pheochromocytoma PC12 cells,” Cytotechnology, pp. 1–10, 2011.

L. T. Yi, Q. Xu, Y. C. Li, L. Yang, and L. D. Kong, “Antidepressant-like synergism of extracts from magnolia bark and ginger rhizome alone and in combination in mice,” Progress in Neuro-Psychopharmacology and Biological Psychiatry, vol. 33, no. 4, pp. 616–624, 2009.

L. Steru, R. Chermat, B. Thierry, and P. Simon, “The tail suspension test: a new method for screening antidepressants in mice,” Psychopharmacology, vol. 85, no. 3, pp. 367–370, 1985.

R. D. Porsolt, A. Bertin, and M. Jalfre, “Behavioral despair in mice: a primary screening test for antidepressants,” Archives Internationales de Pharmacodynamie et de Therapie, vol. 229, no. 2, pp. 327–336, 1977.

N. G. Milton, “Role of hydrogen peroxide in the aetiology of Alzheimer's disease: implications for treatment,” Drugs and Aging, vol. 21, no. 2, pp. 81–100, 2004.

L. Zhao, C. Rosales, K. Seburn, D. Ron, and S. L. Ackerman, “Alteration of the unfolded protein response modifies neurodegeneration in a mouse model of Marinesco-Sjögren syndrome,” Human Molecular Genetics, vol. 19, no. 1, Article ID ddp464, pp. 25–35, 2009.

C. Garrido, S. Gurbuxani, L. Ravagnan, and G. Kroemer, “Heat shock proteins: endogenous modulators of apoptotic cell death,” Biochemical and Biophysical Research Communications, vol. 286, no. 3, pp. 433–442, 2001.

A. P. Arrigo, S. Virot, S. Chaufour, W. Firdaus, C. Kretz-Remy, and C. Diaz-Latoud, “Hsp27 consolidates intracellular redox homeostasis by upholding glutathione in its reduced form and by decreasing iron intracellular levels,” Antioxidants and Redox Signaling, vol. 7, no. 3-4, pp. 414–424, 2005.

P. Mehlen, C. Kretz-Remy, X. Préville, and A. Arrigo, “Human hsp27, Drosophila hsp27 and human αB-crystallin expression-mediated increase in glutathione is essential for the protective activity of these proteins against TNFα-induced cell death,” EMBO Journal, vol. 15, no. 11, pp. 2695–2706, 1996.

P. Rocchi, P. Jugpal, A. So et al., “Small interference RNA targeting heat-shock protein 27 inhibits the growth of prostatic cell lines and induces apoptosis via caspase-3 activation in vitro,” BJU International, vol. 98, no. 5, pp. 1082–1089, 2006.

K. B. Kaplan and R. Li, “A prescription for “stress”-the role of Hsp90 in genome stability and cellular adaptation,” Trends in Cell Biology, vol. 22, no. 11, pp. 576–583, 2012.

M. M. Blanco, C. A. R. A. Costa, A. O. Freire, J. G. Santos Jr., and M. Costa, “Neurobehavioral effect of essential oil of Cymbopogon citratus in mice,” Phytomedicine, vol. 16, no. 2-3, pp. 265–270, 2009.

C. A. Costa, D. O. Kohn, V. M. De Lima, A. C. Gargano, J. C. Flório, and M. Costa, “The GABAergic system contributes to the anxiolytic-like effect of essential oil from Cymbopogon citratus (lemongrass),” Journal of Ethnopharmacology, vol. 137, no. 1, pp. 828–836, 2011.

L. J. Quintans-Júnior, T. T. Souza, B. S. Leite et al., “Phythochemical screening and anticonvulsant activity of Cymbopogon winterianus Jowitt (Poaceae) leaf essential oil in rodents,” Phytomedicine, vol. 15, no. 8, pp. 619–624, 2008.

C. E. Renard, E. Dailly, D. J. P. David, M. Hascoet, and M. Bourin, “Monoamine metabolism changes following the mouse forced swimming test but not the tail suspension test,” Fundamental and Clinical Pharmacology, vol. 17, no. 4, pp. 449–455, 2003.

J. F. Cryan, C. Mombereau, and A. Vassout, “The tail suspension test as a model for assessing antidepressant activity: review of pharmacological and genetic studies in mice,” Neuroscience and Biobehavioral Reviews, vol. 29, no. 4-5, pp. 571–625, 2005.

L. T. Yi, J. M. Li, Y. C. Li, Y. Pan, Q. Xu, and L. D. Kong, “Antidepressant-like behavioral and neurochemical effects of the citrus-associated chemical apigenin,” Life Sciences, vol. 82, no. 13-14, pp. 741–751, 2008.

Y. Xu, Z. Wang, W. You et al., “Antidepressant-like effect of trans-resveratrol: involvement of serotonin and noradrenaline system,” European Neuropsychopharmacology, vol. 20, no. 6, pp. 405–413, 2010.

M. Aihara, I. Ida, N. Yuuki et al., “HPA axis dysfunction in unmedicated major depressive disorder and its normalization by pharmacotherapy correlates with alteration of neural activity in prefrontal cortex and limbic/paralimbic regions,” Psychiatry Research, vol. 155, no. 3, pp. 245–256, 2007.