Evidence-Based Complementary and Alternative Medicine

Volume 2014 (2014), Article ID 106940, 5 pages

http://dx.doi.org/10.1155/2014/106940

Research Article

Bilateral Hegu Acupoints Have the Same Effect on the Heart Rate Variability of the Healthy Subjects

Wang Guangjun, Tian Yuying, Jia Shuyong, Zhou Wenting, and Zhang Weibo

Institute of Acupuncture and Moxibustion, China Academy of Chinese Medical Sciences, Beijing 100700, China

Received 3 June 2014; Accepted 12 June 2014; Published 26 June 2014

Academic Editor: Gerhard Litscher

Copyright © 2014 Wang Guangjun et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Background. The specificity of acupuncture points (acupoints) is one of the key concepts in traditional acupuncture theory, but the question of whether there is adequate scientific evidence to prove or disprove specificity has been vigorously debated in recent years. Acupoint laterality is an important aspect of acupoint specificity. Data is particularly scarce regarding the laterality of the same channel, namesake acupoint located on opposite sides of the body. Our previous study results suggest that Neiguan acupoint (PC6) has the laterality. The aim of this study was to investigate whether Hegu (LI4) also has laterality from the perspective of heart rate variability. Methods. A total of twenty-eight healthy female volunteers were recruited for this study and were randomly separated into the group I () and the group II () according to the register order. In the group I, left LI4 was stimulated in the first epoch and the right LI4 was stimulated in the second epoch. In the group II, right LI4 was stimulated in the first epoch and left LI4 was stimulated in the second epoch. Electrocardiogram was recorded and heart rate variability was analyzed. Results. The results show that there were no significant differences of heart rate variablity between the group I and the group II in the time domain and in the frequency domain. Conclusions. Bilateral Hegu acupoints have the same effect on the heart rate variability of the healthy subjects.

1. Background

In the traditional Chinese medicine (TCM) theory, acupoint specificity is an essential principle [1, 2] which means that the therapeutic efficacy mainly resulted from the correct acupoint choice. However, it is still not clear whether right or left acupoint should be selected for the purpose of treating a particular disease. From the perspective of acupuncture analgesia, stimulation of specific acupuncture points will promote the release of analgesic substances in the central nervous system such as opioid peptides [3, 4], and the targets of these substances locate in the central nervous system and result in the systemic analgesic effect, which means that the bilateral acupoints might have the same effect. On the other hand, there are such records as “if someone has disease related with the left side, the treatment point is the right side, and vice versa,” “巨 刺” and “缪 刺” in the Yellow Emperor Neijing, which emphasized that specific lateral side acupoint stimulation might lead to the therapeutic advantages under the specific conditions. Particularly, this idea was developed into the concept of contralateral acupuncture in recent years [5, 6] and we summarized the acupoint laterality [7]. From our previous study, we found that ipsilateral stimulation of Hegu (LI4) corresponded to the increased blood perfusion in the contralateral Hegu (LI4) [8]. Moreover, the increased degree of blood perfusion was asymmetrical, which suggested that the LI4 has the laterality in the perspective of blood distribution [9]. Further study indicated that acupuncture different side Neiguan (PC6) had the different effect on the heart rate variability, which means that PC6 also has the laterality [10]. Recently, the Quchi (LI11) effects on the HRV in patients with hypertension were investigated and the results partly supported our result [11]. However, there is still scarcity of the evidence that every acupoint has the laterality from the perspective of HRV modulation. The aim of this study is to explore whether different side LI4 stimulation can result in the different effect on the heart rate variability.

2. Materials and Methods

2.1. Ethics Statement

This study was reviewed and approved by the Institutional Review Board at the Institute of Acupuncture and Moxibustion, China Academy of Chinese Medical Sciences. Each participant read and signed an informed consent form.

2.2. Subjects and Design

Twenty-eight (28) healthy female volunteers were recruited in this study. All subjects were students from the China Academy of Chinese Medical Sciences and Beijing University of TCM. None of the subjects had a history of prior disease nor had they taken any medication in the six months prior to the study. Each subject was provided with informed consent and had an adequate understanding of the procedure and purpose of this study. Basic characteristics of the participants are shown in Table 1. The subjects were randomly separated into the group I () and the group II () according to the register order. In the group I, left LI4 was stimulated in the first epoch and the right LI4 was stimulated in the second epoch. In the group II, right LI4 was stimulated in the first epoch and left LI4 was stimulated in the second epoch.

Table 1: Basic characteristics of the study participants.

Characters
Group I ()
Group II ()

Age (years)
26.14 ± 1.19
25.93 ± 1.39

High (cm)
164.93 ± 3.92
162.21 ± 4.35

Body weight (kg)
54.64 ± 6.96
52.64 ± 4.92

Body mass index (BMI)
18.69 ± 5.61
20.01 ± 1.7

2.3. Electrocardiogram Measurement Protocol

Before the laboratory procedure began, subjects were placed in a temperature-controlled room (24–26°C) to rest for 10 minutes. The standard lead II ECG was recorded with NeurOne system (NeurOne, MEGA electronics Ltd., Finland) [10]. The data were digitized with a sampling rate of 1000 Hz. In the first epoch, the successive ECG were recorded and symbolized as C1. In the second epoch, the successive ECG were recorded and symbolized as C2. In each epoch, a 30 min ECG recording was obtained (shown in Figure 1). The interval of two experimental epochs is at least 7 days.

Figure 1: Procedure of acupuncture and measurement. ECG recording time point; IN: insert needle; SA: stop acupuncture; SR: slowly rotate the needle every 5 min. The needle was slowly rotated every 5 min for a total of 30 min during the C1 and C2 acupuncture sessions; RT: rest time between two epochs.

2.4. Acupuncture Protocol

For every participant, either the right or left LI4 was stimulated during the first epoch of the study and the opposite side LI4 was stimulated during the second epoch. The interval time between the two epochs was at least 8 days. For the acupuncture procedure, a small acupuncture needle, 0.25 × 25 mm (100112, Zhen Huan), was gently inserted into a depth of 15 mm in LI4. The needle was slowly rotated every 5 min for a total of 30 min during the acupuncture session in order to maintain the soreness and numbness sensation of De-Qi [8, 12]. The acupuncture process is illustrated in the figure.

2.5. Data Analysis

The raw data recorded by NeurOne system was exported with ASC format and then imported into Kubio HRV software and analyzed [13]. The analysis parameter was default. In the time domain, the mean RR interval (RR), the standard deviation of RR intervals (STDRR), the root mean square of successive differences (RMSSD), the number of successive intervals differing more than 50 ms (NN50), and the corresponding relative amount of NN50 (pNN50) were analyzed. In the frequency domain, the power spectrum density was analyzed with AR spectrum method in normalized units. The low frequency (LF) and high frequency (HF) were defined as 0.04–0.15 Hz and 0.15–0.4 Hz, respectively. Data are expressed as mean ± SD. For each parameter, the difference of C1-C2 was calculated and then -test was performed between group I and group II. The level of significance was defined as . Statistical analyses were performed using SPSS (SPSS Inc., Chicago, IL, USA).

3. Results

Table 2 presents the results of time domain analysis and frequency domain analysis. In the time domain, mean RR, STD RR, RMSSD, NN50, pNN50, SDANN, and SDNN index were analysed and there was no significant difference between the group I and the group II. In the frequency domain, the power of VLF, LF, and HF, the power percentage of VLF, LF, and HF, the normalized LF and HF, the total power, and LF/HF ratio were analyzed and there were no significant differences between the group I and the group II.

Table 2: Results of heart rate variability.

Group I ()
Group II ()

C1
C2
C1
C2

Mean RR (ms)
876.72 ± 90.13
843.27 ± 54.87
913.64 ± 142.68
865.18 ± 106.56
−0.5474
0.5888

STD RR (ms)
55.9 ± 16.66
54.85 ± 16.24
55.19 ± 13.26
53.62 ± 20.08
−0.1349
0.8938

RMSSD (ms)
45.93 ± 21.62
41.4 ± 17.62
45.48 ± 18.95
41.89 ± 26.63
0.1772
0.8607

NN50 (count)
464.86 ± 362.08
446 ± 371.65
476.64 ± 316.35
395.43 ± 409.93
−0.7654
0.4509

pNN50 (%)
23.48 ± 19.79
21.47 ± 18.56
25.21 ± 17.83
19.92 ± 21.39
−0.7206
0.4776

VLF (ms²)
1602.75 ± 925.69
1567.78 ± 1097.23
1379.81 ± 585.48
1401.52 ± 578.8
0.2157
0.8309

LF (ms²)
601.15 ± 389.84
586.25 ± 374.28
568.15 ± 555.34
549.14 ± 528.43
−0.0463
0.9634

HF (ms²)
966.4 ± 862.48
834.81 ± 713.49
1046.1 ± 823.59
1059.35 ± 1425.28
0.5885
0.5613

VLF (%)
54.53 ± 16.2
54 ± 15.25
50.17 ± 19.04
56.03 ± 16.78
1.5706
0.1284

LF (%)
18.04 ± 6.66
19.11 ± 6.8
17.8 ± 11.91
17.21 ± 5.69
−0.6633
0.513

HF (%)
27.39 ± 13.85
26.86 ± 13.96
32 ± 15.89
26.72 ± 14.51
−1.267
0.2164

LF (n.u.)
41.44 ± 12.61
44.12 ± 16.84
35.73 ± 18.11
41.17 ± 12.98
0.6232
0.5386

HF (n.u.)
58.47 ± 12.62
55.81 ± 16.84
64.2 ± 18.11
58.76 ± 12.99
−0.6254
0.5372

Total power (ms²)
3171.55 ± 1873.31
2989.72 ± 1860.04
2994.95 ± 1327.92
3011.03 ± 2345
0.4523
0.6548

LF/HF ratio
0.78 ± 0.37
1.01 ± 0.83
0.76 ± 0.81
0.8 ± 0.53
−0.8358
0.4109

RR: RR intervals; STDRR: standard deviation of RR intervals; RMSSD: root mean square of successive differences between RR intervals; NN50: the number of successive intervals differing more than 50 ms; pNN50: the corresponding relative amount of NN50 (pNN50); LF: low frequency; HF: high frequency; VLF: very low frequency; data are expressed as mean ± SD. For each parameter, the difference of C1-C2 was calculated and then -test was performed between the group I and the group II.

4. Discussion

Heart rate variability (HRV) analysis by Fourier transform is a noninvasive method to investigate autonomic balance [14]. The variance in the high frequency (HF) range (0.15–0.40) Hz is thought to primarily reflect vagal activity while the variance in the low frequency (LF) range (0.04–0.15 Hz) is influenced both by the vagus and the sympathetic nervous system [15]. When a needle is inserted into a point on the body various neural and neuroactive components are activated [16, 17]. Mechanism explore has been shown that acupuncture have the clear central nervous system and autonomic nervous system effects both in humans [18, 19] and in animals [20]. Because the electroacupuncture can mimic the direct vagus stimulation effect [21], the analysis of HRV provides quantitative information regarding autonomic control mechanisms in the body [22]; thus, HRV has recently been adopted as an index used to evaluate the effects of acupuncture [23].

Previous study indicated that the cardiac modulatory balance differs between genders and is characterized by a greater influence of the autonomic vagal component in women and by the sympathetic component in men [24]. Another study investigated the influence of age and gender on the short-term HRV indices and revealed significant modifications of the indices especially by age but partly also by gender especially in the younger groups [25]. To exclude gender bias, we only recruited the healthy adult females in our study [10].

Previous studies demonstrated that acupuncture manipulation significantly decreased the LF spectral component of HRV and significantly reduced LF/HF, which is an index of sympathetic activity [26]. Related results suggested that appropriate stimulation at the PC6 can modulate the HRV in healthy subjects [27]. In our previous study, acupuncture different side PC6 results in lateral effect, and this effect on heart rate variability mainly occurred in the acupuncture period. After acupuncture was discontinued, this effect disappeared [10].

In this study, the laterality of LI4 was explored. From the previous study, manual stimulation of Hegu (LI4) resulted in specific changes in alpha EEG frequency and in HRV parameters [28]. We originally expected that stimulate different side LI4 also can result in the different effect on HRV, but the results are apparently at odds with our prospective. One possible explanation is according to traditional acupuncture theory: PC6 is a relative specific acupoint for cardiovascular disease and is one of the most commonly used acupoints in classical texts [29–31]; however, LI4 belongs to large intestine meridian and is not sensitive to modulate the cardiovascular function.

5. Conclusions

Bilateral Hegu acupoints have the same effect on the heart rate variability of the healthy subjects.

Conflict of Interests

The authors declare that they have no conflict of interests.

Authors’ Contribution

Wang Guangjun carried out the design and participated in data collection. Tian Yuying, Jia Shuyong, and Zhou Wenting participated in data collection. Zhou Wenting led the design and participated in data collection. Professor Zhang Weibo led the design and participated in data collection. All authors contributed to the final paper and approved the final version.

Acknowledgments

This research was supported by the National Natural Science Foundation of China (81001553) and the Fundamental Research Funds for the Central Public Welfare Research Institutes (ZZ070806).

References

L. Zhao, J. Chen, C. Z. Liu et al., “A review of acupoint specificity research in China: status Quo and prospects,” Evidence-Based Complementary and Alternative Medicine, vol. 2012, Article ID 543943, 16 pages, 2012.

P. J. Rong, J. J. Zhao, J. H. Gao et al., “Progress of research on specificity of meridian acupoint efficacy,” Chinese Journal of Integrative Medicine, vol. 19, no. 12, pp. 889–893, 2013.

Z.-Q. Zhao, “Neural mechanism underlying acupuncture analgesia,” Progress in Neurobiology, vol. 85, no. 4, pp. 355–375, 2008.

J. S. Han, “Acupuncture: neuropeptide release produced by electrical stimulation of different frequencies,” Trends in Neurosciences, vol. 26, no. 1, pp. 17–22, 2003.

M. K. Kim, T. Y. Choi, M. S. Lee, H. Lee, and C. Han, “Contralateral acupuncture versus ipsilateral acupuncturein the rehabilitation of post-stroke hemiplegic patients: a systematic review,” BMC Complementary and Alternative Medicine, vol. 10, article 41, 2010.

Y. M. Woo, M. S. Lee, Y. Nam, H. J. Cho, and B. C. Shin, “Effects of contralateral electroacupuncture on brain function: A double-blind, randomized, pilot clinical trial,” Journal of Alternative and Complementary Medicine, vol. 12, no. 8, pp. 813–815, 2006.

G. J. Wang, “Study on acupoint laterality: the important supplement to acupoint specificity,” Chinese Acupuncture & Moxibustion, vol. 32, no. 8, pp. 709–712, 2012.

W. Guangjun, T. Yuying, J. Shuyong, H. Tao, and Z. Weibo, “Change of blood perfusion in hegu acupoint after contralateral hegu acupoint was stimulated,” Journal of Alternative and Complementary Medicine, vol. 18, no. 8, pp. 784–788, 2012.

G. Wang, J. Han, G. Litscher, and W. Zhang, “System identification algorithm analysis of acupuncture effect on mean blood flux of contralateral hegu acupoint,” Evidence-based Complementary and Alternative Medicine, vol. 2012, Article ID 951928, 7 pages, 2012.

G. Wang, Y. Tian, S. Jia, W. Zhou, and W. Zhang, “Pilot study of acupuncture point laterality: evidence from heart rate variability,” Evidence-Based Complementary and Alternative Medicine, vol. 2013, Article ID 476064, 7 pages, 2013.

G. Litscher, W.-P. Cheng, G.-Y. Cheng et al., “Acupuncture point laterality: investigation of acute effects of Quchi (LI11) in patients with hypertension using heart rate variability,” Evidence-Based Complementary and Alternative Medicine, vol. 2014, Article ID 979067, 6 pages, 2014.

N. Goldman, M. Chen, T. Fujita et al., “Adenosine A1 receptors mediate local anti-nociceptive effects of acupuncture,” Nature Neuroscience, vol. 13, no. 7, pp. 883–888, 2010.

J. P. Niskanen, M. P. Tarvainen, P. O. Ranta-Aho, and P. A. Karjalainen, “Software for advanced HRV analysis,” Computer Methods and Programs in Biomedicine, vol. 76, no. 1, pp. 73–81, 2004.

A. H. Kemp and D. S. Quintana, “The relationship between mental and physical health: insights from the study of heart rate variability,” International Journal of Psychophysiology, vol. 89, no. 3, pp. 288–296, 2013.

P. K. Stein and R. E. Kleiger, “Insights from the study of heart rate variability,” Annual Review of Medicine, vol. 50, pp. 249–261, 1999.

Z. J. Zhang, X. M. Wang, and G. M. McAlonan, “Neural acupuncture unit: a new concept for interpreting effects and mechanisms of acupuncture,” Evidence-based Complementary and Alternative Medicine, vol. 2012, Article ID 429412, 2012.

M. Kim, Y. Park, and U. Namgung, “Acupuncture-stimulated activation of sensory neurons,” Journal of Acupuncture and Meridian Studies, vol. 5, no. 4, pp. 148–155, 2012.

K. Nishijo, H. Mori, K. Yosikawa, and K. Yazawa, “Decreased heart rate by acupuncture stimulation in humans via facilitation of cardiac vagal activity and suppression of cardiac sympathetic nerve,” Neuroscience Letters, vol. 227, no. 3, pp. 165–168, 1997.

J. D. Wang, T. B. J. Kuo, and C. C. H. Yang, “An alternative method to enhance vagal activities and suppress sympathetic activities in humans,” Autonomic Neuroscience: Basic & Clinical, vol. 100, no. 1-2, pp. 90–95, 2002.

X. Y. Gao, S. P. Zhang, B. Zhu, and H. Q. Zhang, “Investigation of specificity of auricular acupuncture points in regulation of autonomic function in anesthetized rats,” Autonomic Neuroscience: Basic and Clinical, vol. 138, no. 1-2, pp. 50–56, 2008.

R. Torres-Rosas, G. Yehia, G. Pena, P. Mishra, M. Del Rocio Thompson-Bonilla, and M. A. Moreno-Eutimio, “Dopamine mediates vagal modulation of the immune system by electroacupuncture,” Nature Medicine, vol. 20, no. 3, pp. 291–295, 2014.

“Heart rate variability: standards of measurement, physiological interpretation and clinical use. Task Force of the European Society of Cardiology and the North American Society of Pacing and Electrophysiology,” Circulation, vol. 93, no. 5, pp. 1043–1065, 1996.

Z. Y. Li, C. T. Wang, A. F. T. Mak, and D. H. K. Chow, “Effects of acupuncture on heart rate variability in normal subjects under fatigue and non-fatigue state,” European Journal of Applied Physiology, vol. 94, no. 5-6, pp. 633–640, 2005.

S. G. Dutra, A. P. Pereira, G. C. Tezini, J. H. Mazon, M. C. Martins-Pinge, and H. C. Souza, “Cardiac autonomic modulation is determined by gender and is independent of aerobic physical capacity in healthy subjects,” PloS ONE, vol. 8, no. 10, Article ID e77092, 2013.

A. Voss, R. Schroeder, C. Fischer, A. Heitmann, A. Peters, and S. Perz, “Influence of age and gender on complexity measures for short term heart rate variability analysis in healthy subjects,” in Conference Proceedings Annual International Conference of the IEEE Engineering in Medicine and Biology Society, pp. 5574–5577, 2013.

S. Sakai, E. Hori, K. Umeno, N. Kitabayashi, T. Ono, and H. Nishijo, “Specific acupuncture sensation correlates with EEGs and autonomic changes in human subjects,” Autonomic Neuroscience: Basic & Clinical, vol. 133, no. 2, pp. 158–169, 2007.

G. Litscher, L. Wang, X. Wang, and I. Gaischek, “Laser acupuncture: two acupoints (Baihui, Neiguan) and two modalities of laser (658 nm, 405 nm) induce different effects in neurovegetative parameters,” Evidence-based Complementary and Alternative Medicine, vol. 2013, Article ID 432764, 6 pages, 2013.

K. Streitberger, J. Steppan, C. Maier, H. Hill, J. Backs, and K. Plaschke, “Effects of verum acupuncture compared to placebo acupuncture on quantitative EEG and heart rate variability in healthy volunteers,” Journal of Alternative and Complementary Medicine, vol. 14, no. 5, pp. 505–513, 2008.

Y. C. P. Arai, N. Kato, M. Matsura et al., “Transcutaneous electrical nerve stimulation at the PC-5 and PC-6 acupoints reduced the severity of hypotension after spinal anaesthesia in patients undergoing Caesarean section,” British Journal of Anaesthesia, vol. 100, no. 1, pp. 78–81, 2008.

C. M. Witt, K. Meissner, D. Pach et al., “Stimulation of gastric slow waves with manual acupuncture at acupuncture points ST36 and PC6—a randomized single blind controlled trial,” Neurogastroenterology and Motility, vol. 24, no. 5, pp. 438–445, 2012.

J. H. Lin, C. H. Shih, K. Kaphle et al., “Acupuncture effects on cardiac functions measured by cardiac magnetic resonance imaging in a feline model,” Evidence-Based Complementary and Alternative Medicine, vol. 7, no. 2, pp. 169–176, 2010.