Evidence-Based Complementary and Alternative Medicine

Volume 2014 (2014), Article ID 626972, 1 page

http://dx.doi.org/10.1155/2014/626972

Erratum

Erratum to “Shenqi Fuzheng Injection Alleviates the Transient Worsening Caused by Steroids Pulse Therapy in Treating Myasthenia Gravis”

Guo-Yan Qi, Peng Liu, and Bu-Lang Gao

Department of Oncology, Shijiazhuang First Hospital and Hebei Provincial Hospital of Myasthenia Gravis, 36 Fanxi Road, Shijiazhuang, Hebei 050011, China

Received 23 February 2014; Accepted 6 March 2014; Published 18 March 2014

Copyright © 2014 Guo-Yan Qi et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

There were errors that occurred in the captions of Figures and 3.

The corrections of errors in these captions should be as follows.

Figure  2: Duration of transient worsening during steroids pulse therapy. Most of the worsening occurs between 3 and 5 days in the treatment group and between 3 and 10 days in the control group. D: day.

Figure  3: The effect results were shown in both groups with different treatment.

RE: recovery; BR: basic recovery; MI: marked improvement; IM: improvement; IN: ineffectiveness.