Evidence-Based Complementary and Alternative Medicine
Volume 2017 (2017), Article ID 1720793, 1 page
https://doi.org/10.1155/2017/1720793

Corrigendum

Corrigendum to “Effectiveness and Safety of Electroacupuncture on Poststroke Urinary Incontinence: Study Protocol of a Pilot Multicentered, Randomized, Parallel, Sham-Controlled Trial”

Seungwon Shin,¹ Jiwon Lee,1,2 Ami Yu,³ Junghee Yoo,⁴ and Euiju Lee2,3,5

¹Department of Clinical Korean Medicine, Graduate School, Kyung Hee University, 26 Kyungheedae-ro, Dongdaemun-gu, Seoul 02447, Republic of Korea
²Stroke Center, Kyung Hee University Korean Medicine Hospital, 23 Kyungheedae-ro, Dongdaemun-gu, Seoul 02447, Republic of Korea
³Korean Medicine Clinical Trial Center, Kyung Hee University Korean Medicine Hospital, 23 Kyungheedae-ro, Dongdaemun-gu, Seoul 02447, Republic of Korea
⁴College of Nursing Science, Kyung Hee University, 23 Kyungheedae-ro, Dongdaemun-gu, Seoul 02447, Republic of Korea
⁵College of Korean Medicine, Kyung Hee University, 23 Kyungheedae-ro, Dongdaemun-gu, Seoul 02447, Republic of Korea

Correspondence should be addressed to Junghee Yoo; mapsi@daum.net and Euiju Lee; sasangin@daum.net

Received 17 January 2017; Accepted 20 February 2017; Published 5 April 2017

Copyright © 2017 Seungwon Shin et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Effectiveness and Safety of Electroacupuncture on Poststroke Urinary Incontinence: Study Protocol of a Pilot Multicentered, Randomized, Parallel, Sham-Controlled Trial” [1], the first author’s affiliation should be changed to “Department of Clinical Korean Medicine, Graduate School, Kyung Hee University, 26 Kyungheedae-ro, Dongdaemun-gu, Seoul 02447, Republic of Korea” only. The corrected author and affiliations lists are shown above.

References

S. Shin, J. Lee, A. Yu, J. Yoo, and E. Lee, “Effectiveness and safety of electroacupuncture on poststroke urinary incontinence: study protocol of a pilot multicentered, randomized, parallel, sham-controlled trial,” Evidence-Based Complementary and Alternative Medicine, vol. 2016, Article ID 5709295, 6 pages, 2016.