Evidence-Based Complementary and Alternative Medicine
Volume 2018 (2018), Article ID 5327589, 1 page
https://doi.org/10.1155/2018/5327589

Erratum

Erratum to “Therapeutic Effectiveness and Safety of Mesotherapy in Patients with Osteoarthritis of the Knee”

Liang Chen,¹ Dongqing Li,² Jun Zhong,¹ Bo Qiu,¹ and Xianglei Wu3,4

¹Department of Orthopaedics, Renmin Hospital of Wuhan University, 9 Zhangzhidong Street, Wuhan, Hubei 430060, China
²Department of Microbiology, School of Basic Medical Science, Wuhan University, 185 Donghu Road, Wuhan, Hubei 430071, China
³Institute of ENT, EENT Hospital of Fudan University, 83 Fenyang Road, Shanghai 300021, China
⁴Laboratory of Immunology, University of Lorraine, avenue du Morvan, 54511 Vandoeuvre-lès-Nancy, France

Correspondence should be addressed to Bo Qiu; qbtg163@163.com and Xianglei Wu; wxlthibaut@gmail.com

Received 10 April 2018; Accepted 22 April 2018; Published 14 May 2018

Copyright © 2018 Liang Chen et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Therapeutic Effectiveness and Safety of Mesotherapy in Patients with Osteoarthritis of the Knee” [1], Dr. Bo Qiu should be listed as a corresponding author along with Xianglei Wu.

References

L. Chen, D. Li, J. Zhong, B. Qiu, and X. Wu, “Therapeutic effectiveness and safety of mesotherapy in patients with osteoarthritis of the knee,” Evidence-Based Complementary and Alternative Medicine, vol. 2018, Article ID 6513049, 6 pages, 2018.