Evidence-Based Complementary and Alternative Medicine
Volume 2019 (2019), Article ID 9537603, 10 pages
https://doi.org/10.1155/2019/9537603

Research Article

Effects of Crinum jagus Water/Ethanol Extract on Shigella flexneri-Induced Diarrhea in Rats

Paul Aimé Noubissi,¹ Michel Archange Fokam Tagne,² Gaëtan Olivier Fankem,³ Joseph Ngakou Mukam,³ Henri Wambe,⁴ and René Kamgang3,5

¹Department of Zoology and Animal Physiology, Faculty of Science, University of Buea, Cameroon
²Department of Biological Science, Faculty of Science, University of Ngaoundéré, Cameroon
³Animal Physiology Laboratory, Faculty of Science, University of Yaoundé I, Cameroon
⁴Department of Biological Science, Faculty of Science, University of Dschang, Cameroon
⁵Laboratory of Endocrinology and Radioisotopes, Institute of Medical Research and Medicinal Plants Studies (IMPM), Yaoundé, Cameroon

Correspondence should be addressed to Paul Aimé Noubissi; noubiaime@yahoo.fr

Received 9 November 2018; Revised 2 January 2019; Accepted 21 February 2019; Published 12 March 2019

Academic Editor: Susana Gorzalczany

Copyright © 2019 Paul Aimé Noubissi et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Diarrheal disease, characterized by the release of more than three loose or liquid stools per day, remains one of the leading causes of morbidity and mortality in children below 5 years of age in developing countries. Many drugs used in diarrhea management face contraindication and, with regard to infectious diarrhea, resistance of some bacterial strains; this therefore increases the need of new alternative and more effective drugs. This study aimed to evaluate anti-Shigella flexneri activities of Crinum jagus water/ethanol extract. In vitro activities were assayed by disc diffusion and agar dilution methods and in vivo section on Shigella flexneri-induced diarrhea in rats. This was done by oral administration of 9 X 10⁸ CFU of Shigella flexneri to rats that were treated twice daily with Crinum jagus water/ethanol extract for seven consecutive days. Ciprofloxacin was used as positive control. Daily Shigella flexneri load was evaluated. After one treatment week, animals were then sacrificed and interleukins (IL-2 and INF-γ), immunoglobulins (IgA and IgM), motilin, vasoactive intestinal peptide, and ions (sodium, potassium, calcium, and chloride) levels were determined. Also, blood cell count was realized. Crinum jagus water/ethanol extract dose-dependently inhibited Shigella flexneri growth with inhibition diameter of 18.90 and 25.36 mm, respectively, at 0.39 and 200 mg/mL. Minimum inhibitory concentration (MIC) was 0.10 mg/mL and minimum bactericidal concentration (MBC) was 0.30 mg/mL with MBC/MIC ratio of 3.0. In Shigella flexneri-induced diarrheic rats, Crinum jagus reduced (p<0.01) diarrheal stools emission and Shigella load and lowered IL-2, INF-γ, IgA, IgM, and motilin blood levels, whereas it increased (p<0.01) vasoactive intestinal peptide, sodium, potassium, calcium, and chloride blood levels. In diarrheal rats, Crinum jagus restored the decreasing white blood cells and haemoglobin and restored the damaged colon epithelium, where it reduced the density of mucus-filled goblet cells. These results confirm the use of Crinum jagus in ethnomedicine in diarrhea treatment.

1. Introduction

Diarrhea is the emission of more than three soft or liquid stools in 24 h [1]. It can last few days to few weeks and is at the origin of the body dehydration and the loss of mineral salts necessary for survival. Diarrhea can be provoked by an increased motility of the digestive tract, increased secretion, and/or decreased fluid absorption, resulting in electrolytes (Na⁺, K⁺, and Cl⁻) and water loss [1]. Diarrheal diseases, which are the second leading cause of mortality in children below five years of age, are responsible for more than 3 million deaths each year worldwide [2]. According to World Health Organization (WHO), in developing countries, each infant yearly experiences about three episodes of diarrhea; and about 1.5 billion cases of diarrhea occur each year in developing countries, resulting in 5.483 deaths every day [3]. In Cameroon, diarrhea is the main cause of infant mortality and ranks third in morbidity with prevalence of 13.6% across the country [3]. Despite the declining diarrheal mortality rates, diarrheal diseases are still considered as one of the principal causes of childhood morbidity and mortality in developing countries [4]. They kill more young children around the world than tuberculosis, acquired immune deficiency syndrome (AIDS), and malaria combined [5]. Diarrhea is sometimes caused by microbial agents (bacteria, viruses, and/or parasites) colonizing the digestive tract. Other etiologies include food poisoning, antibiotics, laxative agents, or certain medical conditions. With other infectious diseases, diarrhea will remain a source of concern for global health over the next 20-30 years.

Among infectious diarrhea, shigellosis continues to wreak havoc around the world, with a high infectivity rate. It is the main cause of bloody diarrhea worldwide and is endemic in most developing countries, causing more than 164.7 million episodes of bloody diarrhea and about 700 000 deaths per year [6]. Ninety nine percent (99%) of shigellosis occurs in developing countries with most cases (about 70%) and deaths (about 60%) in children below five years of age [7]. In human, 10 to 200 Shigella organisms are enough to induce shigellosis [8]. In most diarrhea cases, especially in malnourished infants or in immune deficiency, patients die actually from severe dehydration with electrolyte imbalance [9]. Oral rehydration therapy has been at the center of the effective diarrheal diseases management. It often fails, however, in high stool output condition. Furthermore, although currently used drugs are important in diarrhea management, they are still associated with adverse effects and contraindications [10]. Different antibiotics are effective in the management of infectious diarrhea but they usually face resistance developed by some microbial strains [11, 12]. In addition, diarrheal diseases management cost is high, as is the unavailability or toxicity of conventional drugs, which increases the need for alternative medicines based on medicinal plants available locally for the treatment of these diseases [13].

Crinum jagus (Amaryllidaceae) is a plant widely used in African folk medicine as antitumor, antiviral, antiparasitic, and immunostimulator plant and against mental trouble and snake bite [14]. According to traditional healers in the Western Region of Cameroon (Central Africa), Crinum jagus is used against poison and in the treatment of gastrointestinal diseases [15]. In previous studies, Crinum jagus ethanol/water extract administered in rats at 25, 50, and 100 mg/kg BW showed significant antidiarrheal and antisecretory activity on castor oil-induced diarrhea [9]. Phytochemical study of this extract showed the presence of volatile oils, fatty acids, catechic tannins, carbohydrates, alkaloids, sterols, triterpenes, flavonoids, coumarins, anthocyanidins, polyphenols, and saponins [15]. This study thus aimed to investigate the antidiarrheal potential of ethanol/water crude extract of Crinum jagus on Shigella flexneri-induced diarrhea in albino rats.

2. Materials and Methods

2.1. Plant Material

Fresh Crinum jagus plants were collected from Batié (West Region, Cameroon, harvesting coordinates 9°25′17′′N and 13°27′2′′E) in August 2012. The study site did not involve endangered or protected species. The plant specimen was identified at the Yaounde National Herbarium, in comparison with the specimen referenced HNC 14049. The whole plant was cleaned, reduced into small pieces, dried in the shade, and then crushed to get a powder. The plant powder was extracted with ethanol/water mixture (1:4). For this, 1 kg of powder was macerated for 48 h in 5 L (1 L of ethanol/4 L of water) at room temperature and then filtered with N° 1 Whatman filter paper. The residue obtained was further macerated for 48 h in the same solvent (5 L) and then filtered. Likewise, the 2 filtrates obtained were pooled and concentrated in a rotary evaporator (BÜCHI Rota vapor R-124) at 45°C to obtain 291.6 g of dry dark hydroethanolic extract which was stored at +4°C in a well-closed container until use. Extract solutions were prepared with distilled water before oral administration to rats or for in vitro tests.

2.2. Experimental Animals

Healthy Wistar albino rats (110–150 g) of either sex obtained from the animal house of the University of Buea, Faculty of Science, Department of Zoology and Animal Physiology, were used. Animals housed in clean metabolic cages (1 rat/cage) had free access to water and standard rat diet consisting of carbohydrates 50-55%, fats 15-20%, and proteins 25-30% [16]. In vivo experiments were performed following the European Union Guidelines on Animal Care (Council EEC 86/609) [17] adopted in Cameroon by the Institutional Committee of the Ministry of Scientific Research and Innovation.

2.3. Microbial Strains

The microbial strain, Shigella flexneri, used in this study was obtained from the Centre Pasteur of Yaoundé, Cameroon, and was isolated from local patients.

2.4. In Vitro Antimicrobial Studies: Antimicrobial Susceptibility

The susceptibility screening of Crinum jagus ethanol/water extract was performed by the disk diffusion method [18]. Muller-Hinton agar medium (Diagnostic Liofilchem, Italy, Ref 610033) was autoclaved (121°C, 15 min) and poured into sterile petri dishes (4 mL/petri dish, 3-4 mm depth). After solidification, culture media were inoculated with 1 mL of Shigella flexneri suspensions at 5.0 X 10⁵ CFU/mL. Filter paper discs of 6 mm diameter were impregnated with 10 μL of plant extract at various dilutions (0.39, 0.78, 1.56, 3.12, 6.25, 12.50, 25.00, 50.00, 100.00, and 200.00 mg/mL) or with ciprofloxacin (RYAN PHARMA UK; 30 μg/mL) and placed on the surface of the inoculated Muller-Hinton agar. The inoculated plates were kept at room temperature for 1 h and then incubated at 37°C during 24 h for antibacterial activity. Each assay in this experiment was replicated three times [19].

2.5. In Vitro Antimicrobial Studies: Minimal Inhibitory Concentration (MIC)

Ciprofloxacin (1.0 X 10⁻³ to 15.0 X 10-3 mg/mL) was used as standard for antibacterial activities. Minimum inhibitory concentration is the lowest concentration with no visible microbial growth [20]; it was determined by agar dilution technique [21, 22]. All inhibition assays were conducted in triplicate. A solution set of extract of concentrations ranging from 50.00 to 0.05 mg/mL was prepared by dilution and 2 mL aliquot of each extract solution was added to 18 mL of presterilized molten Muller-Hinton agar or to 18 mL of Salmonella Shigella Agar (SS Agar, Titan Biotech Ltd. India 386) at 40°C giving a final concentration ranging from 5.00 to 0.005 mg/mL.

The medium in tubes was then allowed to solidify. The surfaces of the media were streaked with 18-hour-old Shigella flexneri cultures, and the tubes were later incubated for 24 h at 37°C. After 24 h of incubation, the tubes were observed and the first in the series (ascending extract or antibiotic concentrations) not showing visible growth was considered as the MIC [23].

2.6. In Vitro Antimicrobial Studies: Minimum Bactericidal Concentration (MBC) Assessment

To determine the minimum bactericidal concentration of the plant extract against Shigella flexneri, the tubes that showed no microbial growth were subcultured by streaking with a platinum loop on sterile Muller Hinton agar plates and incubated for 24 h at 37°C. The MBC values were considered as the lowest concentrations of the extract not showing any microbial growth on the agar plates [18]. All antimicrobial tests were performed under strict aseptic conditions.

2.7. In Vivo Antimicrobial Studies: Shigella flexneri-Induced Diarrhea in Rats

Before experimentation, all rats were deparasitized by daily administration (6:00 AM and 6:00 PM) of tetracycline (tetracycline HCl, New Divine Favour Pharma IND. LTD., Nigeria) 10 mg/kg BW for 3 consecutive days. Four days after this deparasitization, animals were placed separately in individual cages and received per os, except the normal control group, an oral administration of 9.0 X 10⁸ CFU/mL of Shigella flexneri corresponding to a 3.0 McFarland turbidity standard [19].

Soon after the appearance of the first diarrheal stools (approximately 24 h after Shigella flexneri administration), diarrheic rats were divided into five groups of five rats each:

(i) Diarrheic control group (DC) receiving distilled water (10 mL/kg BW)

(ii) Positive control group (Cipro) receiving ciprofloxacin (RYAN PHARMA, UK) 2.5 mg/kg BW

(iii) Three test groups treated with C. jagus water/ethanol extract of 25 (WECj25), 50 (WECj50), or 100 (WECj100) mg/kg BW.

Animals were treated twice daily for 7 days and, each day, their behavior and weight variation were evaluated as well as Shigella flexneri density in the stools. For this, 0.5 g of fresh stools collected from each diarrheic rat was dissolved in 4.5 mL sterile physiologic solution. After homogenization, 250 μL of the obtained stools solution was further diluted in 9.750 mL of sterile physiologic solution. 50 μL of this final solution was finally taken and cultured on SS agar for 24 h at 37°C. Shigella density was then determined by direct count of colonies number [24]. After treatment period, rats were sacrificed and blood was collected for spectrophotometric determination of ions (sodium, potassium, calcium, and chloride) levels, for the determination of interleukin-2 (IL-2), interferon gamma (INF-γ), immunoglobulins (IgA and IgM), motilin, and vasoactive intestinal peptide levels using ELISA method as well as for blood cell count using hematology analyzer (Golden Harvest Industries BC 2800 Hematology Analyzer). Colon was used for histological studies.

2.8. Acute Toxicity

The acute oral toxicity of C. jagus water/ethanol extract was carried out using the limit test recommendations of OECD 425 Guideline. One healthy adult female Wistar rat was fasted (with free access to water) for 18 h and then orally loaded with 5000 mg/kg of the extract. The rat was then strictly observed during 14 days for general signs and symptoms of toxicity (locomotion, aggressiveness, nature of the fur, quality of the stools, marked pain, and distress). After this observation period, since the animal survived, two additional female rats received the same treatment [25].

3. Results

3.1. Antimicrobial Susceptibility

Crinum jagus water/ethanol extract inhibited Shigella flexneri growth (Table 1). The antimicrobial activity was dose-dependent with an inhibition diameter of 25.36 and 18.90 mm, respectively, at 200 and 0.39 mg/mL. Ciprofloxacin (30 μg/mL) was very effective against Shigella flexneri with an inhibition diameter of 28.0 mm.

Table 1: Shigella flexneri’s sensitivity to Crinum jagus ethanol/water extract and ciprofloxacin.

Treatment
Concentrations (mg/mL)
Inhibition diameter (mm)

Crinum jagus extract
200.00

100.00

50.00

25.00

12.50

6.25

3.13

1.56

0.78

0.39

Ciprofloxacin
0.03

3.2. Minimal Inhibitory Concentration and Minimum Bactericidal Concentration (MBC)

The water/ethanol extract and ciprofloxacin showed in vitro inhibitory activity on Shigella flexneri growth. The minimum inhibitory concentrations (MICs) were, respectively, 0.10 and 2.0 X 10-3 mg/mL; and the minimum bactericidal concentrations were 0.30 and 4.0 X 10-3 mg/mL, respectively (Table 2). MBC/MIC ratios were 3.0 and 2.0, respectively, for Crinum jagus and ciprofloxacin.

Table 2: Minimum inhibitory concentration (MIC) and minimum bactericidal concentration (MBC) of Crinum jagus water/ethanol extract and ciprofloxacin on Shigella flexneri.

Inhibition parameters
Crinum jagus
Ciprofloxacin

Minimum inhibitory concentration (mg/mL)
0.10
2.0X10⁻³

Minimum bactericidal concentration (mg/mL)
0.30
4.0X10⁻³

MBC/MIC ratio
3.0
2.0

3.3. Effect of Crinum jagus Water/Ethanol Extract on Rats’ Shigella flexneri Load

In diarrheic control rat stools (DC), S. flexneri load increased from the first day of onset of diarrhea stools: +57 and +92% (p<0.01), respectively, on the second and third day as compared to the initial bacterial load. In treated groups, bacterial load significantly (p<0.01) decreased (Figure 1). The number of S. flexneri in rats treated with C. jagus water/ethanol extract significantly decreased (p<0.01) from the first to the seventh day of treatment. On the seventh day, bacterial load as compared to the initial load was 42, 26, 29, and 50%, respectively, for C. jagus water/ethanol extract at 25, 50, or 100 mg/kg and for ciprofloxacin 2.5 mg/kg (Figure 1).

Figure 1: Shigella flexneri load in rat stools after 7 days of treatment with C. jagus water/ethanol extract of 25 (WECj25), 50 (WECj50), and 100 mg/kg (WECj100) and ciprofloxacin 2.5 mg/kg (Cipro) (n =5). Significant difference: p<0.01 compared to diarrheic control (DC); p<0.01 and p<0.05 compared to the initial bacterial load.

3.4. Effect of Crinum jagus Water/Ethanol Extract on Shigella flexneri Diarrheic Rats’ Body Weight Variation

After the onset of diarrhea, we observed a weight decrease in diarrheic control animals. After seven treatment days, weight loss was about 8.0% compared to the initial weight. On the other hand, treated animals presented slight weight gain during the treatment period. The increase as compared to the initial weight was 5.0, 7.0, 6.0, and 8.0% at 7th day, respectively, with C. jagus water/ethanol extract (WECj25, WECj50, and WECj100) and ciprofloxacin 2.5 mg/kg (Figure 2).

Figure 2: Mean body weight variation in Shigella flexneri-induced diarrhea in rats during 7 days’ administration of water, C. jagus water/ethanol extract of 25 mg/kg (WECj25), 50 mg/kg (WECj50), and 100 mg/kg (WECj100), and ciprofloxacin 2.5 mg/kg (Cipro) (n =5). Significant difference: p<0.05 compared to the initial weight.

3.5. Effect of Crinum jagus Water/Ethanol Extract on Shigella flexneri Diarrheic Rats’ Interleukin-2 and Interferon Gamma Plasma Levels

Interleukin-2 level significantly increased (p<0.01) in diarrheic control group compared to normal rats: 299.35 ± 16.18 pg/mL against 184.70 ± 16.22 pg/mL. Interleukin-2 concentrations were 213.56 ± 13.77, 293.63 ± 12.57, 238.95 ± 19.84, and 188.49 ± 20.31 pg/mL, respectively, in group treated with ciprofloxacin and C. jagus water/ethanol extract of 25, 50, or 100 mg/kg BW, respectively (Figure 3(a)). S. flexneri administration induced a significant (p<0.01) increase of interferon-γ plasma level (Figure 3(b)). During one week of C. jagus water/ethanol extract treatment, plasma concentration of this cytokine significantly reduced. It was 173.92 ± 15.34 pg/mL in diarrheic control group and 137.51 ± 13.15, 153.32 ± 10.76, 122.73 ± 14.39, and 126.82 ± 10.03 pg/mL in groups treated with ciprofloxacin and C. jagus water/ethanol extract of 25, 50, and 100 mg/kg, respectively (Figure 3(b)).

(a)

(b)

Figure 3: Concentration of interleukin-2 (a) and interferon-γ (b) in diarrheic rats treated with C. jagus water/ethanol extract of 25 mg/kg (WECj25), 50 mg/kg (EWCj50), and 100 mg/kg (EWCj100) and ciprofloxacin 2.5 mg/kg (Cipro) (n =5). Significant difference: p<0.01 compared to diarrheic control (DC); p<0.01 and p<0.05 compared to normal control (NC).

3.6. Effect of Crinum jagus Water/Ethanol Extract on Shigella flexneri Diarrheic Rats’ Immunoglobulins A and M Plasma Levels

Normal rat IgA plasma level was 88.50 ± 3.98 ng/mL. S. flexneri administration increased IgA level in diarrheic control group (139.77 ± 5.03 ng/mL). Treatments with 25, 50, or 100 mg/kg of the extract significantly (p<0.01) reduced IgA level: 104.42 ± 6.34, 90.55 ± 6.36, and 90.47 ± 1.14 ng/mL, respectively (Figure 4(a)). In rats treated with ciprofloxacin, IgA plasma level was 88.95 ± 4.28 ng/mL. Diarrheic control rat IgM level significantly increased (p<0.01) compared to normal ones (43.12 ± 3.08 against 53.97 ± 3.60 ng/mL, respectively, for normal and diarrheic control rats). Ciprofloxacin or C. jagus water/ethanol extract (25, 50, or 100 mg/kg) treated groups showed reduction in IgM plasma level: 45.97 ± 0.51, 49.23 ± 2.73, 48.10 ± 1.74, and 47.66 ± 2.24 ng/mL, respectively (Figure 4(b)).

(a)

(b)

Figure 4: Concentration of immunoglobulins A (a) and M (b) in diarrheic rats treated with C. jagus water/ethanol extract of 25 mg/kg (WECj25), 50 mg/kg (EWCj50), and 100 mg/kg (EWCj100) and ciprofloxacin 2.5 mg/kg (Cipro) (n =5). Significant difference: p<0.01 compared to diarrheic control (DC); A: p<0.01 and B: p<0.05 compared to normal control (NC).

3.7. Effect of Crinum jagus Water/Ethanol Extract on Shigella flexneri Diarrheic Rats’ Vasoactive Intestinal Peptide (VIP) and Motilin Levels

Shigella flexneri infection brought a significant (p<0.01) decrease of VIP (Figure 5(a)) but no significant effect on motilin (Figure 5(b)) plasma levels. VIP concentration was 333.03 ± 1.26 and 329.87 ± 0.77 pg/mL, respectively, in normal control and diarrheic control groups against 333.02 ± 0.78, 331.13 ± 1.41, 334.29 ± 1.00, and 334.93 ± 1.19 pg/mL in groups treated with ciprofloxacin or water/ethanol C. jagus extract of 25, 50, and 100 mg/kg (Figure 5(a)).

(a)

(b)

Figure 5: VIP (a) and motilin (b) plasma concentrations in normal rats and in diarrheic rats treated with C. jagus water/ethanol extract of 25 mg/kg (WECj25), 50 mg/kg (WECj50), and 100 mg/kg (WECj100) and ciprofloxacin 2.5 mg/kg (Cipro) (n =5). Significant difference: p<0.05 and p<0.01 compared to diarrheic control (DC); p<0.01 compared to normal control (NC).

3.8. Effect of Crinum jagus Water/Ethanol Extract on Shigella flexneri Diarrheic Rats’ Ionic Parameters

Diarrheic control rats showed an important decrease of Na⁺, K⁺, Ca⁺⁺, and Cl⁻ plasma levels: respectively, 93.33 ± 4.08, 3.75 ± 0.08, 2.44 ± 0.03, and 95.74 ± 1.46 against 143.33 ± 4.08, 5.11 ± 0.09, 3.25 ± 0.01, and 113.83 ± 2.29 mmol/L in normal control. Crinum jagus water/ethanol extract (100 mg/kg) significantly (p<0.01) and dose-dependently restored these ions levels: 140.00 ± 4.08, 5.11 ± 0.07, 3.12 ± 0.09, and 107.98 ± 1.36 mmol/L, respectively, for Na⁺, K⁺, Ca⁺⁺, and Cl⁻ (Table 3).

Table 3: Sodium, potassium, calcium, and chloride plasma levels in rats infected with Shigella flexneri after treatment with C. jagus water/ethanol extract and ciprofloxacin.

Ions
NC
DC
Cipro
WECj25
WECj50
WECj100

Na⁺

K⁺ (mmol/L)

Ca⁺⁺ (mmol/L)

Cl⁻ (mmol/L)

WECj25, WECj50, and WECj100: C. jagus water/ethanol extract of 25, 50, and 100 mg/kg; Cipro: ciprofloxacin 2.5 mg/kg; NC: normal control; DC: diarrheic control; Na⁺: sodium ions; K⁺: potassium ions; Ca⁺⁺: calcium ions; Cl⁻: chloride ions (n=5). Significant difference: p<0.01 compared to normal control (NC); p<0.01 compared to diarrheic control (DC).

3.9. Effect of Crinum jagus Water/Ethanol Extract on Shigella flexneri Diarrheic Rats’ Blood Cell Count

Blood cell count in diarrhea control rats (DC) showed a reduction of WBC (2.74 ± 0.75 X 10³/mm³) and haemoglobin (11.16 ± 0.80 g/dL) and an increase of RBC (6.42 ± 0.45 X 10⁶ / mm³) and platelets (374.80 ± 2.05 X 10⁶ / mm³) compared to normal rats. Hematocrits (Ht), mean globular volume (MGV), mean globular haemoglobin (MGH), and mean corpuscular haemoglobin concentration (MCHC) were, respectively, 40.04 ± 1.76%, 59.98 ± 2.06 μm³, 34.02 ± 3.79, and 31.56 ± 2.07 ρg/dL in normal control (Table 4). Water/ethanol C. jagus extract significantly (p<0.05) and dose-dependently increased Ht (44.40 ± 0.86%) and MCHC (35.04 ± 0.97 ρg/dL) compared to diarrheic control (Table 4).

Table 4: Blood cell count in rats infected with Shigella flexneri after treatment with C. jagus water/ethanol extract and ciprofloxacin.

Groups
NC
TD
Cipro
WECj25
WECj50
WECj100

WBCX10³/mm³

RBCX10⁶/mm³

Hb (g/dL)

Ht (%)

PcX10⁶/mm³

MGV (μm³)

MGH (ρg)

MCHC (ρg/dL)

WECj25, WECj50, and WECj100: C. jagus water/ethanol extract of 25, 50, and 100 mg/kg; Cipro: ciprofloxacin 2.5 mg/kg; NC: normal control; DC: diarrheic control; WBC: white blood cell; Hb: haemoglobin; Ht: hematocrit; RBC: red blood cell; Pc: platelets; MGV: mean globular volume; MGH: mean globular haemoglobin; MCHC: mean corpuscular haemoglobin concentration (n=5). Significant difference: p<0.05 and p<0.01 compared to normal control (NC); p<0.01 and p<0.05 compared to diarrheic control (DC).

3.10. Intestine Morphology of Shigella flexneri-Infected Rats after Treatment with C. jagus Water/Ethanol Extract and Ciprofloxacin

Control rat colon presented epithelium with normal and large folds and microfolds (V) (Figure 6(a)). Diarrheic control animal colon (Figure 6(b)) showed abrasion and erosion of the mucosal lining, giving rise to large interfolds space (EV) and a great number of mucus-filled goblet cells. C. jagus water/ethanol extract of 25 mg/kg (Figure 6(c)), 50 mg/kg (Figure 6(d)), and 100 mg/kg (Figure 6(f)) and ciprofloxacin (2.5 mg/kg) (Figure 6(e)) dose-dependently restored the epithelium structures, with well-reconstituted folds and microfolds, and reduced the density and the size of mucus-filled goblet cell.

(a)

(b)

(c)

(d)

(e)

(f)

Figure 6: Histology of the colon in normal rats (a), diarrheic control rats (b), and rats treated with C. jagus water/ethanol extract of 25 mg/kg (c), 50 mg/kg (d), and 100 mg/kg (f) and with ciprofloxacin (2.5 mg/kg) (e). Light blue color: abrasion of the colon epithelium; orange color: mucus-filled goblet cell; purple color: goblet cell free from mucus; (L) colon lumen.

3.11. Acute Toxicity

One hour after extract administration (5000 mg/kg), rat became less motile and exhibited some abdominal contractions. These signs lasted for about 30 min, and, within the 14 observation days, no behavioral trouble and signs of toxicity were noticed. Normal stools were emitted, and no death was recorded. Median lethal dose of this extract may be greater than 5 000 mg/kg BW, and the extract may be weakly toxic.

4. Discussion

In vitro, Crinum jagus extract showed concentration-dependent antibacterial activities. The MIC/MBC ratio was lower than 4 and could thus indicate a bactericidal activity [26]. This activity was further confirmed by the reduced bacterial load observed with in vivo studies. In diarrheic control rats, Shigella flexneri induced diarrhea characterized by soft, liquid, mucus linked, and bloody stools, emitting a fetid odor. Bloody stool reflects the invasion or destruction of the epithelial cells of the host’s intestine, resulting in ulceration and hemorrhage. Furthermore, an increase in bacterial load, weight loss, interleukin-2, interferon gamma, immunoglobulins A and M, and motilin blood levels and a decrease in VIP, K⁺, Na⁺, and Cl⁻ ions blood concentrations and white blood and red blood cells were observed. As in diarrheal patients, diarrheal rats showed increased motilin blood levels. Motilin induces intestine smooth muscle contraction via its receptors located on circular smooth muscle [27, 28] or indirectly by activation of serotonin 5-HT₃ receptors [29]. Bacterial antigens, particularly lipopolysaccharides (LPS), are responsible for the inflammation of colon mucosa with, as consequence, the abundant fluid accumulation in the small intestine [30, 31]. This fluid content, particularly, in acid or alkali and in fat which are potent secretagogue for motilin may have increased plasma motilin level [32]. Treatment with Crinum jagus ethanol/water extract may have decreased bacterial load, hence LPS concentration, and therefore fluid accumulation, which resulted in a decrease of plasma motilin concentration.

VIP (vasoactive intestinal peptide) is a neurotransmitter that inhibits the contraction of intestine smooth muscles. Its action here is closely linked to that of nitric oxide (NO), another intestine inhibitory neurotransmitter, so that the release of one leads to the release of the other [33]. Crinum jagus may have stimulated the production or secretion of VIP, since its administration to rats induced an increase of this hormone. The increase in red and white blood cells observed in extract treated animals may indicate that Crinum jagus like many other plants has immunomodulatory properties [34].

Morphologically, the colon of diarrheal rats showed an eroded epithelium, folds with large interfolds spaces, and abrasions, giving them a flat appearance with many goblet cells filled with mucus. Mucus production is a defense reaction of the digestive tract and it occurs whenever the mucosa integrity is endangered. Crinum jagus ethanol/water extract and ciprofloxacin protected colon morphology and restored the epithelium to its normal appearance with large folds and microfolds with many well-reconstituted digits and goblet cells where mucus density has decreased considerably.

Increase in Shigella load and the quantity of glary bloody diarrheal stools observed in diarrheic control rats may be a consequence of bacterial overgrowth and, hence, Shiga toxin production, destruction of defense cells, and intestinal tissue. All these are typical signs of infectious diarrhea with invasive germs [35]. Shiga toxin is responsible for intestinal mucosa inflammation, the consequences of which include increase in motilin production and alteration of electrolytes absorption. This may thus explain the decrease observed in K⁺, Ca⁺⁺, Na⁺, and Cl⁻ concentrations in nontreated diarrheal animals [35]. In these control animals, increase of interleukin-2, interferon gamma, and immunoglobulins A and M may be seen as a defense reaction against Shigella overgrowth. Diarrheal animals treated with extract or ciprofloxacin showed normal stools with no blood or mucus and a decrease in Shigella load. This drop in Shigella load could have resulted from direct action of some Crinum jagus bioactive compounds such as phenolic compounds on the bacteria. Phenolic compounds in fact were shown to induce rupture of bacteria plasma membrane and increase its permeability [36]. Decrease observed in Shigella load can be thought not to be a result of the immune system activity, since treatment with extract or ciprofloxacin did not induce significant increase of interleukin-2, interferon gamma, and immunoglobulins A and M blood levels more than what was observed in untreated diarrheal animals.

Colonization of the digestive mucosa by bacteria, including Shigella and Salmonella, is followed by activation of the lymphoid tissue and, hence, payer’s patches and gut associated lymphoid tissue (GALTs), as well as significant immunoglobulins and cytokines production [36, 37]. IgA, the most important immunoglobulin produced in the intestine and other mucosal surfaces, is the first defense line against bacteria and viruses [38]. It inhibits microbe adherence and mucosal surfaces colonization, neutralizes microbial toxins, limits microbial growth, and activates the expulsion of microbial plasmids [39]. IgM activates the complement system and contributes to the agglutination and neutralization of bacteria and viruses and is also necessary in the induction of memory B cells [40]. IL-2 activates T and B cells maturation and immunoglobulin production [41]. INF-gamma by activating macrophages and T helper cells causes phagocytosis and intracellular bacteria destruction. It also activates the expression of the adhesion factor VCAM-1 of the intestinal epithelium, which binds microbes for destruction [37]. The extract or ciprofloxacin relatively decreased immunoglobulin and cytokine levels in diarrheal animals. This may be due to a decrease in the stimulation of lymphoid systems or immunoglobulins production, following bacteria destruction or elimination.

Crinum jagus extracts protected diarrheal animals against weight loss. The weight gain caused by the plant extract may result from the stimulation of the appetite or the reduction of water and electrolyte losses.

5. Conclusion

In vivo, Crinum jagus extract inhibited bacterial growth and was found to be bactericidal. It prevented animal from glary bloody stools and decreased bacterial load in infected treated rats. Furthermore, C. jagus increased vasoactive intestinal peptide, decreased motilin productions, and restored colonic epithelium. These results support the use of the plant by traditional healers in the treatment of infectious diarrhea and could therefore be used for production, in collaboration with chemists and pharmacists, of improved forms of traditional medicines that will be used by population for effective treatment of shigellosis. In future studies, detailed phytochemical profiles of the extract would be determined to elucidate the major compounds underlying the reported antidiarrheic effect.

Data Availability

The data used to support the findings of this study are available from the corresponding author upon request.

Conflicts of Interest

Regarding the publication of this paper, the authors declare that there are no conflicts of interest.

Acknowledgments

The authors sincerely acknowledge the International Foundation for Science and the Organization of Islamic Cooperation for providing adequate financial support to carry out this research work. They also acknowledge Institute of Medical Research and Medicinal Plants Studies (IMPM), Yaoundé, Cameroon, for providing laboratory facilities during this study. Finally, they are grateful to the Centre Pasteur of Yaoundé, Cameroon, for providing Shigella flexneri strain. This work was supported by the International Foundation for Science (IFS) and the Organization of Islamic Cooperation (OIC/COMSTECH) under Grant no. F/5779-1.

References

P. Shamkuwar, “Role of potassium channels, nitric oxide pathway and adrenergic receptors in antidiarrhoeal effect of mebarid,” Asian Journal of Pharmaceutical and Clinical Research, vol. 6, no. 2, pp. 290-291, 2013.

K. R. Kumar, A. Shaik, J. V. Gopal, and P. Raveesha, “Evaluation of antidiarrhoeal activity of aqueous bulb extract of Allium cepa against castor oil-induced diarrhoea,” International Journal of Herbal Medicine, vol. 1, no. 3, pp. 64–67, 2013.

B. N. Yongsi, G. Salem, and J. Bruneau, “Épidémiologie géographique des maladies diarrhéiques à Yaoundé (Cameroun),” M@ppemonde, vol. 89, no. 1, pp. 1–18, 2008.

S. Afroz, M. Alamgir, M. T. H. Khan, S. Jabbar, N. Nahar, and M. S. K. Choudhuri, “Antidiarrhoeal activity of the ethanol extract of Paederia foetida Linn. (Rubiaceae),” Journal of Ethnopharmacology, vol. 105, no. 1-2, pp. 125–130, 2006.

(C.D.C.) Centers for disease control and prevention, “Global diarrhea burden,” Global Water Sanition and Hygiene, 2015.

N. Taneja and A. Mewara, “Shigellosis: epidemiology in India,” Indian Journal of Medical Research, vol. 143, pp. 565–576, 2016.

W. H. O. (WHO), Guidelines for the control of shigellosis , including epidemics due to Shigella dysenteriae type 1, WHO Documents Production Service, Geneva, Switzeland, 2005.

M. Emch, M. Ali, and M. Yunus, “Risk areas and neighborhood-level risk factors for Shigella dysenteriae 1 and Shigella flexneri,” Health & Place, vol. 14, no. 1, pp. 96–105, 2008.

P. A. Noubissi, A. Ngwewondo, M. A. Tagne Fokam, G. O. Fankem, and R. Kamgang, “Spasmolytic and anti-secretory activities of water / ethanol Crinum jagus extract,” International Journal of Pharmacology, Phytochemistry and Ethnomedicine, vol. 5, pp. 52–59, 2016.

M. K. Rahman, M. A. U. Chowdhury, M. T. Islam, M. A. Chowdhury, M. E. Uddin, and C. D. Sumi, “Evaluation of antidiarrheal activity of methanolic extract of maranta arundinacea linn. leaves,” Advances in Pharmacological Sciences, vol. 2015, Article ID 257057, 6 pages, 2015.

M. D. L. Rangel, S. G. De Aquino, J. M. De Lima et al., “In vitro effect of Cinnamomum zeylanicum Blume essential oil on Candida spp. involved in oral infections,” Evidence-Based Complementary and Alternative Medicine, vol. 2018, Article ID 4045013, 13 pages, 2018.

T. Tadesse, E. Hailu, E. Gurmu, and F. Mechesso, “Experimental assessment of antidiarrheal and antisecretory activity of 80% methanolic leaf extract of Zehneria scabra in mice,” BMC Complementary and Alternative Medicine, vol. 14, no. 460, pp. 1–8, 2014.

K. Sairam, S. Hemalatha, A. Kumar et al., “Evaluation of anti-diarrhoeal activity in seed extracts of Mangifera indica,” Journal of Ethnopharmacology, vol. 84, no. 1, pp. 11–15, 2003.

A. Ogunkunle and O. Olopade, “Studies on the asthma coughs plant Crinum jagus L. (Amaryllidaceae) in Nigeria,” African Journal of Plant Science, vol. 5, no. 2, pp. 108–114, 2011.

C. Mvongo, P. A. Noubissi, R. Kamgang et al., “Phytochemical studies and in vitro antioxidant potential of two different extracts of crinum jagus,” International Journal of Pharmaceutical Sciences and Drug Research, vol. 6, no. 6, pp. 2354–2359, 2015.

R. Kamgang, R. Youmbi Mboumi, A. Foyet Fondjo, M. A. Fokam Tagne, G. P. R. Mengue N'dillé, and J. Ngogang Yonkeu, “Antihyperglycaemic potential of the water-ethanol extract of Kalanchoe crenata,” Journal of Natural Medicines, vol. 62, no. 1, pp. 34–40, 2008.

J. A. Smith, F. A. R. Van Den Broek, J. C. Martorell, H. Hackbarth, O. Ruksenas, and W. Zeller, “Principles and practice in ethical review of animal experiments across Europe: summary of the report of a FELASA working group on ethical evaluation of animal experiments,” Laboratory Animals, vol. 41, no. 2, pp. 143–160, 2007.

R. Kamgang, M. A. Fokam Tagne, H. Gonsu Kamga et al., “Activity of aqueous ethanol extract of Euphorbia scordifolia on Shigella dysenteriae type 1-induced diarrhea in rats,” International Journal of Pharmaceutical Sciences and Drug Research, vol. 7, no. 1, pp. 40–45, 2015.

A. B. Shinde and Y. R. Mulay, “Phytochemical analysis and antibacterial properties of some selected Indian medicinal plants,” International Journal of Current Microbiology and Applied Sciences, vol. 4, no. 3, pp. 228–235, 2015.

O. O. Olajuyigbe and A. J. Afolayan, “In vitro antibacterial and time-kill assessment of crude methanolic stem bark extract of Acacia mearnsii de wild against bacteria in shigellosis,” Molecules, vol. 17, no. 2, pp. 2103–2118, 2012.

M. Vats, S. Neha, and S. Sardana, “Antimicrobial activity of stem bark extracts of Nyctanthes arbortristis linn. (Oleaceae),” International Journal of Pharmacognosy and Phytochemical Research, vol. 1, no. 1, pp. 12–14, 2009.

A. Khan, M. Rahman, and S. Islam, “Antibacterial, antifungal and cytotoxic activities of tuberous roots of amorphophallus campanulatus,” Turkish Journal of Biology, vol. 31, no. 3, pp. 167–172, 2007.

M. F. Hasan, R. Das, A. Khan, M. S. Hossain, and M. Rahman, “The determination of antibacterial and antifungal activities of Polygonum hydropiper (L.) root extract,” Advances in Biological Research, vol. 3, no. 1-2, pp. 53–56, 2009.

S. L. Wansi, I. Kamtchouing, J. R. Kuiate et al., “Antidiarrhoeal and antimicrobial activities of the Pentadesma butyracea stem bark methanolic extract,” International Journal of Pharmacy, vol. 4, no. 2, pp. 147–154, 2014.

OECD/OCDE 425, “Oecd guidelines for the testing of chemicals,” pp. 1–27, 2008.

M. A. Fokam Tagne, P. A. Noubissi, G. O. Fankem, and R. Kamgang, “Effects of Oxalis barrelieri L. (Oxalidaceae ) aqueous extract on diarrhea induced by Shigella dysenteriae type 1 in rats,” Health Science Report, vol. e20, pp. 1–8, 2017.

G. J. Sanger, Y. Wang, A. Hobson, and J. Broad, “Motilin: towards a new understanding of the gastrointestinal neuropharmacology and therapeutic use of motilin receptor agonists,” British Journal of Pharmacology, vol. 170, no. 7, pp. 1323–1332, 2013.

C.-Y. Chen and C.-Y. Tsai, “Ghrelin and motilin in the gastrointestinal system,” Current Pharmaceutical Design, vol. 18, no. 31, pp. 4755–4765, 2012.

T. Ohno, E. Mochiki, and H. Kuwano, “The roles of motilin and ghrelin in gastrointestinal motility,” International Journal of Peptides, vol. 2010, Article ID 820794, 6 pages, 2010.

I. Depoortere, T. Thijs, L. Thielemans, J. C. Keith, G. Van Assche, and T. L. Peeters, “Effect of recombinant human interleukin-11 on motilin and substance P release in normal and inflamed rabbits,” Regulatory Peptides, vol. 97, no. 2-3, pp. 111–119, 2001.

Y.-C. Liang, H.-J. Liu, S.-H. Chen, C.-C. Chen, L.-S. Chou, and L. H. Tsai, “Effect of lipopolysaccharide on diarrhea and gastrointestinal transit in mice: Roles of nitric oxide and prostaglandin E2,” World Journal of Gastroenterology, vol. 11, no. 3, pp. 357–361, 2005.

G. A. Gomez, E. W. Englander, and G. H. Greeley, “Postpyloric gastrointestinal geptides,” in Physiology of the Gastronintestinal Tract, pp. 155–198, Elsevier Inc., 2012.

L. A. Van Geldre and R. A. Lefebvre, “Interaction of NO and VIP in gastrointestinal smooth muscle relaxation,” Current Pharmaceutical Design, vol. 10, no. 20, pp. 2483–2497, 2004.

O. H. Jorum, N. M. Piero, and A. K. Machocho, “Haematological effects of dichloromethane-methanolic leaf extracts of Carissa edulis (Forssk.) Vahl in normal rat models,” Journal of Hematology & Thromboembolic Diseases, vol. 4, no. 1, pp. 1–8, 2016.

K. Hodges and R. Gill, “Infectious diarrhea: cellular and molecular mechanisms,” Gut Microbes, vol. 1, no. 1, pp. 4–21, 2010.

E. Sánchez, N. Heredia, M. D. R. Camacho-Corona, and S. García, “Isolation, characterization and mode of antimicrobial action against Vibrio cholerae of methyl gallate isolated from Acacia farnesiana,” Journal of Applied Microbiology, vol. 115, no. 6, pp. 1307–1316, 2013.

S. Bao, K. W. Beagley, M. P. France, J. Shen, and A. J. Husband, “Interferon-γ plays a critical role in intestinal immunity against Salmonella typhimurium infection,” The Journal of Immunology, vol. 99, no. 3, pp. 464–472, 2000.

A. J. Macpherson, L. Hunziker, K. McCoy, and A. Lamarre, “IgA responses in the intestinal mucosa against pathogenic and non-pathogenic microorganisms,” Microbes and Infection, vol. 3, no. 12, pp. 1021–1035, 2001.

Y. Guruprasad, “Role of immunoglobulins in oral submucous fibrosis,” Journal of Cranio-Maxillary Diseases, vol. 4, no. 1, p. 3, 2015.

C. Rutemark, E. Alicot, A. Bergman et al., “Requirement for complement in antibody responses is not explained by the classic pathway activator IgM,” Proceedings of the National Acadamy of Sciences of the United States of America, vol. 108, no. 43, pp. E934–E942, 2011.

G. Gronowicz, E. R. Secor, J. R. Flynn, and L. T. Kuhn, “Human biofield therapy does not affect tumor size but modulates immune responses in a mouse model for breast cancer,” Journal of Integrative Medicine, vol. 14, no. 5, pp. 389–399, 2016.