Emergency Medicine International
Volume 2012 (2012), Article ID 493816, 1 page
doi:10.1155/2012/493816

Erratum

Erratum to “The Challenge of Triaging Chest Pain Patients: The Bernese University Hospital Experience”

Martin Rohacek,¹ Amina Bertolotti,¹ Nadine Grützmüller,¹ Urs Simmen,² Hans Marty,¹ Heinz Zimmermann,¹ Aristomenis Exadaktylos,¹ and Spyridon Arampatzis¹

¹Department of Emergency Medicine, University Hospital Bern, Freiburgstrasse, 3010 Bern, Switzerland
²Statistical Consulting, Malzgase 9, 3042 Basel, Switzerland

Received 13 December 2011; Accepted 14 December 2011

Copyright © 2012 Martin Rohacek et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the original paper, the corresponding author’s forename and surname were accidentally swapped. In this erratum, we state the correct version of the corresponding author’s name, Spyridon Arampatzis, as requested.