Emergency Medicine International
Volume 2019 (2019), Article ID 9752671, 2 pages
https://doi.org/10.1155/2019/9752671

Corrigendum

Corrigendum to “Imbalanced Regional Development of Acute Ischemic Stroke Care in Emergency Departments in China”

Jianguo Li,¹ Jingming Liu,¹ Yuefeng Ma,² Peng Peng,³ Xiaojun He,² and Wei Guo¹

¹Emergency Department, Beijing Tiantan Hospital, Capital Medical University, Beijing 100070, China
²Department of Chinese Journal of Emergency Medicine, The Second Hospital of Zhejiang University Medical College, Hangzhou 310009, China
³The First Affiliated Hospital of Xinjiang Medical University, Wulumuqi 830001, China

Correspondence should be addressed to Wei Guo; guowei1010@163.com

Received 10 October 2019; Accepted 14 October 2019; Published 21 November 2019

Copyright © 2019 Jianguo Li et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Imbalanced Regional Development of Acute Ischemic Stroke Care in Emergency Departments in China” [1], there was an error in Figure 1 where the Taiwan Island was missing. The corrected version of Figure 1 is shown as follows.

Figure 1: Map of regions involved in the survey.

References

J. Li, J. Liu, Y. Ma, P. Peng, X. He, and W. Guo, “Imbalanced regional development of acute ischemic stroke care in emergency departments in China,” Emergency Medicine International, vol. 2019, Article ID 3747910, 7 pages, 2019.